Emergency Medicine International
Volume 2020 (2020), Article ID 6474308, 10 pages
https://doi.org/10.1155/2020/6474308

Research Article

Continuous Hemofiltration Reduces Mortality in Severe Acute Pancreatitis: A Meta-Analysis

Yulin Guo,¹ Feng Cao,¹ Chen Li,² Huaxia Yang,² Shaoyou Xia,² and Fei Li¹

¹Department of General Surgery, Xuanwu Hospital, Capital Medical University, Beijing 100053, China
²Department of General Surgery, PLA Army General Hospital, Beijing 100853, China

Correspondence should be addressed to Fei Li; feili36@ccmu.edu.cn

Received 4 January 2020; Revised 20 March 2020; Accepted 27 April 2020; Published 29 June 2020

Academic Editor: Roberto Cirocchi

Copyright © 2020 Yulin Guo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Severe acute pancreatitis (SAP) is a deadly condition, with a mortality rate ranging from 15% to 30%. Recently, blood purification therapy has been adopted in administrating SAP patients. The present study aimed at evaluating the effect of continuous hemofiltration therapy for SAP. Methods. A systematic search of Cochrane Library, PubMed, and Embase was carried out until October 1st, 2019. Prospective studies comparing outcomes for SAP patients between continuous hemofiltration and standard therapy were enrolled. Results. Continuous hemofiltration therapy was associated with lower level of PACHE II score (MD = −1.49; 95% CI: −2.69 to −0.29, ), CRP (MD = −1.56 mg/L; 95% CI: −2.64 to −0.47, ), Cr (MD = −3.57 umol/L; 95% CI: −5.50 to −1.65, ), and Bun (MD = −3.63 mmol/L; 95% CI: −6.07 to −1.20, ) at 72 h after onset of treatment. Continuous hemofiltration therapy was associated with shorter length of abdominal pain relief time (MD = −1.82 hours; 95% CI: −2.93 to −0.71, ), lower surgery rate (OR = 0.15; 95% CI: 0.03 to 0.78, ), and mortality rate (OR = 0.54; 95% CI: 0.37 to 0.77, ). Conclusions. continuous hemofiltration therapy could effectively alleviate SAP as early as 72 hours after onset of treatment, lowering the level of Bun, Cr, CRP, and APACHE II scores. Continuous hemofiltration therapy could confer SAP patients with lower mortality rates.

1. Introduction

The incidence of acute pancreatitis is 13 to 45/100,000, with about 20–30% of them presenting with severe acute pancreatitis (SAP) every year [1, 2]. SAP is a life-threatening condition characterized by local inflammation involving surrounding tissues and systemic inflammatory response syndrome (SIRS) which could contribute to multiple organ dysfunction syndrome (MODS). The mortality rate of SAP is ranging from 15% to 30%, irrespective of the advances in supportive care and technical development in therapy [2, 3].

The standard treatment of SAP consists of fasting, gastrointestinal decompression, parenteral nutritional, administration of somatostatin, and fluid restoration therapy. Recently, blood purification therapy has become more commonly used in administrating SAP patients. As cytokines and inflammatory products excessively released during the pathological process of SIRS in SAP are considered to be crucial mediators leading to MODS, continuous hemofiltration could remove these inflammatory mediators from the circulation by means of convective filtration, dispersion, and adsorption, blocking the pathological process and eliminating the cytokine cascade [4–6]. Despite some study opposing the benefits brought by the continuous hemofiltration for SAP, most studies have reported the effectiveness of continuous hemofiltration on SAP and its complications, but there are still some items such as abdominal pain relief, the cost of hospitalization, and the need for surgery that need to be further explored [7, 8]. The superiority of continuous hemofiltration for SAP needs to be well defined. The present study was carried out to determine the effect of continuous hemofiltration therapy for SAP, with strict study selection and more profound analyzed items.

2. Material and Methods

2.1. Literature Search Strategy

The present study was performed and reported according to the Preferred Reporting Items for Systematic Reviews and Meta-Analyses (PRISMA) guidelines with a PRISMA checklist and algorithm. Databases including Cochrane Library, PubMed, and EMBASE were searched to find potential studies that evaluate the effect of continuous hemofiltration therapy for patients with SAP (until October 1st, 2019). The search terms were as follows: pancreatitis, ((hemofiltration or haemofiltration) or Diahemofiltration), (((blood purification) or (blood replacement)) or CRRT) [continuous renal replacement therapy, CRRT]. These terms and their combinations were used in the process of searching. And the searching algorithm was as follows: ((((((((hemofiltration OR haemofiltration) OR Diahemofiltration) OR (blood purification)) OR (blood replacement)) OR CRRT)) AND pancreatitis) AND acute) AND severe. Moreover, to broaden the sources of potential articles, the “related articles” function was applied. The references of related articles were also traced with carefulness for potential articles on this topic. No language restriction was applied.

2.2. Study Selection

The inclusion criteria for the present study include the following: (1) SAP was diagnosed according to the Atlanta classification and its subsequent revised versions or the diagnostic criteria developed by the Chinese Medical Association. (2) Adult patients were prospectively grouped to receive continuous hemofiltration therapy or the standard treatment once the patient was diagnosed as SAP. (3) Studies reported at least one of the primary outcomes after continuous hemofiltration therapy. (4) The studies should be published as full-length articles. (5) Chinese studies should have an English abstract.

The exclusion criteria include the following: (1) Letters, case reports, case series, conferences, and reviews without original data were excluded. (2) SAP patients presented with acute renal failure at admission. (3) SAP patients presented with a history of chronic kidney diseases and need regular dialysis therapy before admission. (4) The study lacks a control group. (5) Retrospective study, in which grouping was made based on the treatment history but not the initial grouping plan, was excluded because of the improper design. For example, patients received continuous hemofiltration treatment according to whether there exists a complication but not the grouping plan [9]. (6) SAP patients in the control group received continuous hemofiltration therapy after the onset of treatment [7, 10]. (7) Apart from the continuous hemofiltration therapy, patients in the study group receive traditional Chinese medicine, plasma exchange, hemoperfusion, or other kinds of combination therapies [11, 12]. (8) Studies with small group size (less than 10 patients) were excluded [13]. (9) For studies involving an overlapped population, only the better-quality one could be included. 10) Studies lack baseline information, the necessary outcome of interests, or English abstracts were excluded.

EndNote X6 software was employed to perform the process of study searching and selection. Two authors independently scanned the titles and abstracts of the retrieved studies to determine potential studies. Then, the full texts of these studies were carefully assessed, in accordance with the inclusion and exclusion criteria. Disagreement happening during the selection process was discussed and resolved by participants from Beijing Union Medical College.

2.3. Data Collection and Quality Assessment

Data were extracted by two authors independently. General information extracted was as follows: author information, publication date (year), clinical characteristics, and research type. The outcomes of interest were outcomes after continuous hemofiltration therapy. The primary endpoints in the present study included APACHE II score, surgery rate after treatment, and mortality rate. These primary endpoints were adopted to assessing the effect of continuous hemofiltration on the remission and survival outcomes of SAP patients.

The Jadad scale and the Newcastle–Ottawa Scale (NOS) were applied to assess the methodological quality of randomized clinical trials (RCTs) and other prospective studies, respectively. The Jadad scale consists of three methodological items: randomization (0–2 points), blinding (0–2 points), and dropouts and withdrawals (0-1 point). RCT that achieve a Jadad score of 3 or more are of moderate to high quality. For NOS evaluation, three methodological items should be concerned: sample selection, design of the control and comparability, and outcome assessment. Studies that acquire a NOS score of six or more are of moderate to high quality. Disagreement happening during the selection process was discussed and resolved by participants from Beijing Union Medical College.

2.4. Statistical Analysis

Data were synthesized with Review Manager (The Cochrane Collaboration, Version 5.3, UK), and Adobe Photoshop software (Adobe Systems Software Ireland Ltd., Version CS5, USA) was used to create the artwork. Mean differences (MDs) and 95% confidence intervals (CIs) were calculated to analyze the continuous data. For dichotomous data, odds ratios (ORs) and 95% CIs were applied. When continuous data were reported as median with range, the mean and standard deviation were estimated using the method reported previously [14]. To evaluate the heterogeneity across studies, the I² test was applied. If or I² value <50%, the assumption of study homogeneity was accepted and a fixed effect model was used. Otherwise, a random-effect model was used. Sensitivity analysis was performed to assess the strength and reliability of results by excluding one study in turn. Subgroup analysis was conducted regarding the patterns of hemofiltration. When data of interest under hemofiltration was reported by less than two of the included studies, the subgroup analysis was not conducted. Publication bias was assessed by funnel plot. Besides, Begg’s and Egger’s tests were employed to aid in detecting publication bias with STATA software (Version 10.0, STATA Corporation, Texas, USA). A value <0.05 indicates statistical significance.

3. Results

3.1. Study Characteristics and Quality Assessment

We obtained 219 studies according to the systemic search, and 2 repetitive studies were removed. After reading titles and abstracts, 170 unrelated studies, 2 letters, 7 case reports, 14 case series, 5 reviews, and 1 study with duplicated data were removed. Then, there remained 18 studies, and full texts of these studies were carefully checked. Finally, 9 studies met the inclusion criteria for qualitative synthesis (Table 1) (Figure 1) [15–23]. In quantitative synthesis, 8 studies were included (Table 1) (Figure 1) [15–22]. A total of 470 patients were eligible in quantitative synthesis, with 242 patients receiving continuous hemofiltration therapy and 228 controls. General information including the characteristics and demographics of all included studies is shown in Table 1. The quality of most included RCTs except Wang et al.’s [21] study was relatively low. However, all the 2 prospective studies scored eight stars, indicating high quality (Table 1).

Table 1: Baseline characteristics and demographics of patients included.

References
Study type
Subtype of hemofiltration
Number
Age
Gender (male/female)
Etiological factors (gallstones/alcohol/hyperlipidemia/others)
Apache II score at admission
Amylase, μ/l
C-reactive protein, mg/L
Creatinine, μmol/L
Score

CH
CO
CH
CO
CH
CO
CH
CO
CH
CO
CH
CO
CH
CO
CH
CO

[15]
Randomized controlled trial
CVVH
10
10
57.7 ± 19.4
60.7 ± 11.4
6/4
6/4
NR
NR
14.7 ± 3.3
13.1 ± 1.5
NR
NR
NR
NR
NR
NR
2b

[16]
Randomized controlled trial
CVVH
22
15
NR
NR
NR
NR
NR
NR
14.8 ± 4.5
14.6 ± 4.7
692 ± 273
680 ± 285
243 ± 18
242 ± 20
108 ± 21
109 ± 24
2b

[17]
Randomized controlled trial
CVVH
33
30
49.3 (19–81)
50.7 (19–79)
18/15
16/14
18/8/4/3
15/6/5/4
15.3 ± 5.7
14.9 ± 5.1
942.7 ± 815.1
1060.3 ± 987.3
NR
NR
NR
NR
2b

[18]
Randomized controlled trial
HVHF
30
30
44.1 ± 9.5
49.7 ± 17.0
21/9
18/12
NR
NR
15.3 ± 1.0
13.8 ± 3.6
NR
NR
NR
NR
235.3 ± 75.9
197.6 ± 61.2
2b

[19]
Prospective study
HVHF
32
29
53.0 ± 15.7
48.2 ± 12.5
12/20
10/19
NR/7/4/21
N/6/5/18
19.3 ± 4.7
19.4 ± 4.4
NR
NR
155.1 ± 49
153.4 ± 51.31
NR
NR
8c

[20]
Randomized controlled trial
Hemofiltration
32
32
52.31 ± 11.96
51.58 ± 12.64
21/11
23/9
NR
NR
20.37 ± 4.58
20.61 ± 3.58
NR
NR
29.81 ± 7.06
28.93 ± 7.24
126.30 ± 16.54
125.57 ± 15.81
2b

[21]
Randomized controlled trial
CVVDH
65
60
46.5 ± 10.4
45.6 ± 11.2
35/30
33/27
24/13/15/13
25/13/11/11
15.97 ± 1.63
16.66 ± 1.70
NR
NR
NR
NR
NR
NR
3b

[22]
Prospective study
HVHF
18
22
53.94 ± 16.46
50.55 ± 14.99
14/4
11/11
10/1/NR/7
10/0/NR/12
NR
NR
876.3 ± 178.0
619.9 ± 566.2
209.3 ± 171.4
227.8 ± 89.8
267 ± 48
263 ± 52
8c

[23]
Randomized controlled trial
Hemofiltration
46
46
38.87 ± 6.47
39.13 ± 6.56
24/22
22/24
7/16/20/3
9/14/18/5
18.75 ± 3.04
18.93 ± 3.16
NR
NR
174.28 ± 9.25
173.84 ± 9.48
NR
NR
2b

CH, continuous hemofiltration; CO, control; CVVH, continuous venovenous hemofiltration; CVVDH, continuous venovenous diahemofiltration; HVHF, high-volume hemofiltration. aSignificant difference. bRandomized clinical trial (RCT), and the Jadad scale points. cThe Newcastle–Ottawa Scale (NOS) score.

Figure 1: Flow diagram of literature search and selection.

3.2. The Pooled Results of Items regarding Biochemical Tests and Symptoms

Data on CRP at 72 h after treatment were reported by four studies, involving 202 patients. The level of CRP was significantly decreased by the continuous hemofiltration therapy at 72 h after the onset of treatment compared with standard therapy (MD = −1.56 mg/L; 95% CI: −2.64 to −0.47, ; I² = 91%, for heterogeneity) (Table 2) [16, 19, 20, 22]. Data on ALT at 72 h after treatment were available in three studies, involving 164 patients. The pooled results of ALT at 72 h after the treatment showed no statistical difference (MD = −0.35U/L; 95% CI: −0.83 to 0.13, ; I² = 57%, for heterogeneity) (Table 2) [18, 20, 22]. As for items considering the kidney function, four studies reported Cr at 72 h after treatment, involving 201 patients. The level of Cr was significantly decreased by the continuous hemofiltration therapy at 72 h after the onset of treatment compared with standard therapy (MD = −4.96 umol/L; 95% CI: −7.77 to −2.15, ; I² = 98%, for heterogeneity) (Table 2) [16, 18, 20, 22]. Data on Bun at 72 h after treatment were reported by four studies, including 201 patients. The pooled results also showed a significantly lower level of Bun in the continuous hemofiltration group at 72 h after the onset of therapy (MD = −3.63 mmol/L; 95% CI: −6.07 to −1.20, ; I² = 97%, for heterogeneity) (Table 2) [16, 18, 20, 22]. The abdominal pain relief time for SAP patients was reported by three studies, involving 185 patients. The pooled results showed a significantly shorter length of abdominal pain relief time for patients receiving continuous hemofiltration therapy (MD = −1.82 hours; 95% CI: −2.93 to −0.71, ; I² = 86%, for heterogeneity) (Table 2) [15, 21, 22].

Table 2: Summary of pooled results.

Pooled result
Statistical method
Number of studies
MD/OR
95% CI
value
Heterogeneity

P
I²

APACHE II score at 24 h after treatment
Random
3
−2.41
−5.16, 0.34
0.09
0.0002
88

APACHE II score at 72 h after treatment
Random
5
−1.8
−3.15, −0.44
0.009
<0.00001
96

CRP at 72 h after treatment (mg/L)
Random
4
−1.56
−2.64, −0.47
0.005
<0.00001
91

ALT at 72 h after treatment (U/L)
Random
3
−0.35
−0.83, 0.13
0.16
0.10
57

Cr at 72 h after treatment (umol/L)
Random
4
−4.96
−7.77, −2.15
0.0005
<0.00001
98

Bun at 72 h after treatment (mmol/L)
Random
4
−3.63
−6.07, −1.20
0.003
<0.00001
97

Abdominal pain relief time (hours)
Random
3
−1.82
−2.93, −0.71
0.001
0.0006
86

Surgery rate
Random
3
0.15
0.03, 0.78
0.02
0.06
64

Mortality rate
Fixed
5
0.57
0.37, 0.85
0.007
0.98
0

Length of hospital stay after treatment (days)
Random
5
−0.51
−2.46, 1.44
0.61
<0.00001
97

Cost of hospitalization (10 000 RMB)
Random
3
−0.72
−1.64, 0.20
0.12
0.002
84

MD, mean difference; OR, odds ratio; CI, confidence interval. Statistical difference, . Statistical difference, .

3.3. The Pooled Results of Items regarding Primary Endpoints and Hospitalization

Three studies reported the APACHE II (Acute Physiology and Chronic Health Evaluation II) score at 24 h after the onset of treatment, involving 249 patients. Difference in the APACHE II score at 24 h after treatment between the groups was not significant (MD = −.41; 95% CI: −5.61 to 0.34, ; I² = 88%, for heterogeneity) (Table 2) [17, 19, 21]. APACHE II score at 72 h after the treatment was reported by five studies, with 350 patients. The pooled results showed that continuous hemofiltration therapy could significantly decrease the APACHE II score of SAP patients at 72 h after treatment compared with standard treatment (MD = −1.80; 95% CI: −3.15 to −0.44, ; I² = 96%, for heterogeneity) (Table 2) [18–22]. When the severity of SAP got worse despite the routine or continuous hemofiltration therapy, these patients would need surgical intervention. Data on surgery rate were shown in three studies, involving 121 patients. The pooled results showed surgery rate for patients in the continuous hemofiltration group was significantly lower (OR = 0.15; 95% CI: 0.03 to 0.78, ; I² = 64%, for heterogeneity) (Table 2) [15, 19, 22]. The overall mortality rates after the treatment were reported by five studies, with 323 patients. The pooled result showed significant lower mortality rates for patients receiving continuous hemofiltration therapy (OR = 0.57; 95% CI: 0.37 to 0.85, ; I² = 0, for heterogeneity) (Table 2) [16, 18, 19, 21, 22]. Both length of hospital stay [15, 16, 19, 21, 22] and the cost of hospitalization [15, 21, 22] were comparable between the therapies (Table 2).

3.4. Sensitivity Analysis

As significant heterogeneity was observed, sensitivity analysis was conducted in the following items: APACHE II score at 24 h after treatment, APACHE II score at 72 h after treatment, CRP at 72 h after treatment, ALT at 72 h after treatment, and Cr at 72 h after treatment, Bun at 72 h after treatment, the abdominal pain relief time, surgery rate, and mortality.

For APACHE II score at 24 h after treatment, heterogeneity remained high when carrying out the sensitivity analysis. After excluding Wang et al.’s study [21], APACHE II score at 24 h became significantly lower for patients receiving continuous hemofiltration therapy (MD = −3.67; 95% CI: −6.40 to −0.94, ; I² = 65%, for heterogeneity). For APACHE II score at 72 h after treatment, sensitivity analysis was carried out with no significant change in results. The heterogeneity of the APACHE II score at 72 h after treatment disappeared after excluding the Wang et al.’s study [21]. As for CRP, ALT, Cr, and Bun at 72 h after the treatment, high heterogeneity existed consistently with no significant change in these results. For abdominal pain relief time, heterogeneity disappeared after the removal of Abulimiti et al.’s study [22], but no significant change in results was observed. As for the surgery rate, the heterogeneity disappeared after the removal of Abulimiti et al.’s study [22]. After the removal of Mao et al.’s study, surgery rate became comparable between the groups (OR = 0.12; 95% CI: 0.01 to 1.35, ; I² = 82%, for heterogeneity) [15]. For mortality, the significance remained consistent with no significant heterogeneity in these results.

3.5. Publication Bias

The funnel plot on mortality showed no publication bias without studies in significant areas (Figure 2(a)). As the results of the APACHE II score at 24 h after treatment, APACHE II score at 72 h after treatment, and surgery rate were not stable during sensitivity analysis, both Begg’s and Egger’s tests were performed. The funnel plot on the APACHE II score at 24 h after the onset of treatment showed one study lied in the significant areas, indicating an existence of publication bias (Figure 2(b)) [17, 19, 21]. However, no publication bias was found by Begg’s and Egger’s tests (Begg’s tests, ; Egger’s tests, ). The funnel plot on APACHE II scores at 72 h after treatment showed two studies analyzed were in the significant areas, which indicated the existence of publication bias (Figure 2(c)) [18–22]. However, there was also no publication bias found by both Begg’s and Egger’s tests regarding APACHE II score at 72 h after treatment (Begg’s tests, ; Egger’s tests, ). As for the surgery rate, the funnel plot showed one study analyzed lied on the boundary line (Figure 2(d)) [19]. But no publication bias was found by Begg’s and Egger’s tests (Begg’s tests, ; Egger’s tests, ). Although no publication bias was detected by Begg’s and Egger’s tests on the above items, these results may be limited by the small size of the studies included.

(a)

(b)

(c)

(d)

Figure 2: Funnel plot for pooled results. (a) Funnel plot of mortality rate after the treatment. (b) Funnel plot of APACHE II score at 24 h after the onset of treatment. (c) Funnel plot of APACHE II score at 72 h after the onset of treatment. (d) Funnel plot of surgery rate after the treatment.

3.6. Subgroup Analysis

Subgroup analysis regarding the hemofiltration mode was conducted. Items of interest consisting of data from more than two of the included studies were analyzed. Thus, pooled analysis of these items regarding HVHF treatment was conducted. APACHE II score at 72 h after the HVHF treatment was reported by three studies, with 161 patients. The pooled results showed that HVHF could significantly decrease the APACHE II score of SAP patients at 72 h after treatment compared with standard treatment (MD = −0.97; 95% CI: −1.30, −0.64, ; I² = 30%, for heterogeneity) (Table 3) [18, 19, 22]. Data on ALT at 72 h after HVHF treatment were available in two studies, involving 100 patients. The pooled results showed that HVHF could significantly decrease the level of ALT at 72 h after the treatment (MD = −0.56 U/L; 95% CI: −0.96, −0.15, ; I² = 51%, for heterogeneity) (Table 3) [18, 22]. However, there was no significant difference found between the HVHF and standard treatment considering the level of CRP, Cr, and Bun at 72 h after treatment (Table 3). Data on surgery rate were shown in two studies, involving 101 patients. The pooled results showed surgery rate for patients receiving HVHF treatment was significantly lower than that of patients who received the standard treatment (OR = 0.17; 95% CI: 0.07, 0.42, ; I² = 82%, for heterogeneity) (Table 3) [19, 22]. The mortality rates after the treatment were reported by three studies, with 161 patients. The pooled result showed a significant lower mortality rates for patients receiving HVHF treatment than that of patients who received the standard treatment (OR = 0.55; 95% CI: 0.33, 0.92, ; I² = 0, for heterogeneity) (Table 3) [18, 19, 22].

Table 3: Subgroup pooled results for patients receiving continuous high-volume hemofiltration.

Pooled result
Statistical method
Number of studies
MD/OR
95% CI
value
Heterogeneity

I² (%)

APACHE II score at 72 h after treatment
Fixed
3
−0.97
−1.30, −0.64
<0.00001
0.24
30

CRP at 72 h after treatment (mg/L)
Random
2
−1.01
−2.22, 0.21
0.11
0.005
88

ALT at 72 h after treatment (U/L)
Fixed
2
−0.56
−0.96, −0.15
0.007
0.15
51

Cr at 72 h after treatment (umol/L)
Random
2
−1.75
−4.10, 0.60
0.14
<0.00001
95

Bun at 72 h after treatment (mmol/L)
Random
2
−1.32
−2.72, 0.08
0.06
0.003
89

Surgery rate
Random
2
0.17
0.07, 0.42
0.0001
0.02
82

Mortality rate
Fixed
3
0.55
0.33, 0.92
0.02
0.82
0

Length of hospital stay after treatment (days)
Random
2
1.24
−3.34, 5.82
0.59
<0.00001
99

MD, mean difference; OR, odds ratio; CI, confidence interval. Statistical difference, . Statistical difference, .

4. Discussion

The present study conducted a meta-analysis comparing the efficacy between continuous hemofiltration and standard therapy in patients with SAP. The present study showed that continuous hemofiltration treatment in this patient group was associated with a significant reduction in the level of APACHE II score, CRP, Bun, and Cr at 72 h after the onset of treatment as well as the abdominal pain relief time, contributing to a significant reduction in the incidence of surgery rate and mortality.

As a severe inflammatory status, SAP induces excessive leukocyte activation and migration of neutrophils to the inflamed area contributing to a consequent release of inflammatory mediators, which results in an uncontrolled pathogenic progression of pancreatic infection to necrosis and SIRS [24, 25]. Thus, treatment strategies aimed at interrupting this process could be effective. Blood purification therapy including hemofiltration, hemodiafiltration, hemodialysis, and other modalities, was traditionally used for AKI (acute kidney injury) and sepsis. Blood purification could nonspecifically remove the inflammatory mediators with moderate molecular weights such as tumour necrosis factor-α, interleukin (IL)-1β, IL-6, and IL-8, which can activate and lead to progressively “waterfall-like” chain reaction playing an important role in the pathogenesis of SIRS [26, 27]. Moreover, studies also concluded that continuous hemofiltration could decreases the systemic overflow of inflammatory mediators, which helps restoring the balance between body proinflammatory system and anti-inflammatory system [28, 29]. Because the uncontrolled cytokines and inflammatory mediators excessively released during the pathological process of SIRS in SAP are considered to be crucial mediators leading to MODS and even death, the above effect of continuous hemofiltration could be effective on the treatment of SAP. Recently, continuous hemofiltration has been widely adopted in severe inflammatory status such as SAP, and a previous study had confirmed the effect of continuous hemofiltration on decreasing the level of inflammatory mediators for SAP patients [4].

In the present study, the patients treated with continuous hemofiltration, administered in addition to routine treatment, showed a significantly lower level of Cr and Bun compared to those in the control group as early as 72 hours after the onset of treatment. These results confirmed the effect of continuous hemofiltration on kidney function and are similar to the results after the CVVH (continuous venovenous hemofiltration) treatment from a retrospective study conducted by Chen et al. [30]. The effect of continuous hemofiltration on SAP could be proved by the significant reduction in CRP and APACHE II scores at 72 h after the initiating of treatment in the present study, for CRP is the marker of the inflammatory status and APACHE II score is the indicator of acute physiological status. The reduced levels of CRP and APACHE II scores at 72 h after the treatment highlighted the effect of continuous hemofiltration on clearing inflammatory mediators and improving immune function, which thereby decreased the mortality rate of SAP patients in the present study [5]. This result is in line with the study conducted by Miao et al. that reported the APACHE II score of SAP patient who had received a 72 h continuous hemofiltration was significantly lower than the patient under routine treatment [31]. In the retrospective study conducted by Wu et al., both CRP and APACHE II score for AP patients from the CRRT group were significantly lower than those of patients from the control group after treatment. Moreover, the mortality rate for the CRRT group was lower, though the difference did not reach significance [9]. In the present study, continuous hemofiltration contributed to a significantly lower rate for SAP patients who turned to surgical intervention after the treatment, which may further confirm that continuous hemofiltration might alleviate SAP and reduce the need for surgery. Though with high heterogeneity and inconsistent sensitivity analysis result, the reduced surgery rate was similar to the results reported by Feng et al. that the surgical intervention rate was lower for AP patients who had received hemofiltration and peritoneal dialysis treatment than patients with routine treatment only [32]. Based on the above benefits brought by the continuous hemofiltration, the present study proposed continuous hemofiltration for SAP. Generally, the cost of a novel treatment strategy brings about the cost-effectiveness concern. Few studies have reported the cost-effectiveness analysis results of various hemofiltration modes for SAP, but the cost comparison to the routine treatment was not elucidated [33]. The present study confirms that continuous hemofiltration does not increase the expense burden considering the additional continuous hemofiltration therapy to the routine treatment. Moreover, the present meta-analysis conducted a subgroup analysis and showed that HVHF mode may improve the status of patients regarding the reduced APACHE II score at 72 h after the HVHF treatment. Although the levels of CRP, Cr, and Bun at the time point of 72 h were not significantly decreased, HVHF mode could still reduce the surgery rate and mortality rate of SAP patients effectively.

The previously reported durations of continuous hemofiltration were various, ranging from 24 h to 7 days [10, 15]. Some authors thought that the timing and duration of hemofiltration for SAP were important [34]. Thus, to explore the evidence explicating the duration of hemofiltration for effectively treating SAP would be of clinical significance. We collected these data of interest at different time points and analyzed the item of interest reported by more than three of the included studies at the same time point. In the present study, data involving time points such as Bun, Cr, ALT, CRP, and APACHE II were analyzed according to the same time point after the onset of treatment. The pooled results on Bun, Cr, ALT, CRP, and APACHE II indicated that continuous hemofiltration could effectively alleviate SAP as early as 72 hours after the onset of treatment. Moreover, in order to secure the efficacy and credibility of the pooled results, a study without baseline data was excluded [31, 35]. Besides, retrospective studies in which only SAP patients with complications could receive continuous hemofiltration treatment and constituted the hemofiltration group were not included in the present study, because this study design induced great bias. Lastly, the present study analyzed and concluded the data of abdominal pain relief time, surgery rate, and cost of hospitalization for the first time [8].

In the present study, there exist some limitations. Firstly, not all included studies are RCTs. Besides, most included RCTs are of a relatively low quality. Thus, these could affect the pooled results of the present study. Secondly, variations exist in the protocols regarding continuous hemofiltration therapy, patients, and treatment experiences among different medical centers. These variations might contribute to heterogeneity existing in some synthesized results. For example, high heterogeneity exists in the surgery rate and the sensitivity analysis result of this item was inconsistent. Thus, conclusions should be drawn with caution and justified. Thirdly, not all studies provided all outcomes of interest, which may affect the power of the analysis. Because data of interest under other hemofiltration modes were all reported by less than two of the included studies, the subgroup pooled analysis of these items regarding the other hemofiltration modes could not be conducted. Finally, the risk of bias always existed, even no severe publication bias was indicated by the above analysis.

5. Conclusion

The present study demonstrated that continuous hemofiltration therapy is safe and effective for SAP patients. Continuous hemofiltration therapy could effectively alleviate SAP as early as 72 hours after the onset of treatment, benefiting patients with lower levels of Bun, Cr, CRP, and APACHE II scores. Besides, continuous hemofiltration therapy could confer SAP patients with shorter abdominal pain relief time and lower mortality rate. RCTs in better design are still demanded to clarify these advantages.

Abbreviations

SAP: | Severe acute pancreatitis
SIRS: | Systemic inflammatory response syndrome
MODS: | Multiple organ dysfunction syndrome
CRRT: | Continuous renal replacement therapy
NOS: | Newcastle–Ottawa scale
RCTs: | Randomized clinical trials
MDs: | Mean differences
CIs: | Confidence intervals
ORs: | Odds ratios
APACHE II: | Acute Physiology and Chronic Health Evaluation II
AKI: | Acute kidney injury
CARS: | Compensatory anti-inflammatory response syndrome
Bun: | Blood urea nitrogen
Cr: | Creatinine
ALT: | Alanine transaminase
CRP: | C-reactive protein
CVVH: | Continuous venovenous hemofiltration.

Data Availability

The data supporting this meta-analysis are from previously reported studies and datasets, which have been cited. All data generated or analyzed during this study are included in this published article. The processed data are available from the corresponding author upon reasonable request.

Ethical Approval

The present study was a meta-analysis that analyzed existing studies and did not need to handle individual patient data. Thus, ethical approval was unnecessary.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

Yulin Guo contributed to study planning, design, analysis of data, data interpretation, preparation of manuscript, and funds collection. Chen Li contributed to data collection and entry, analysis of data, and data interpretation. Feng Cao contributed to data collection and entry, analysis of data, and preparation of manuscript. Huaxia Yang contributed to data collection and entry and literature analysis and search. Shaoyou Xia contributed to study planning, design, literature analysis, and literature search. Fei Li contributed to study planning, design, data interpretation, and fund collection.

Acknowledgments

In the process of preparing our article, the authors received valuable advice and help from Professors Taiping Zhang and Qiang Xu from basic surgery of Beijing Union Medical College. The authors would like to thank them. This study was supported by the Construction Project of Clinical Advanced subjects of Capital Medical University (Grant no. 1192070312), Beijing Municipal Science &Technology Commission (Grant no. Z171100001017077), and Beijing Postdoctoral Funding for Scientific Research (Grant no. ZZ2019-18).

References

D. Yadav and A. B. Lowenfels, “The epidemiology of pancreatitis and pancreatic cancer,” Gastroenterology, vol. 144, no. 6, pp. 1252–1261, 2013.

H. C. van Santvoort, O. J. Bakker, T. L. Bollen et al., “A conservative and minimally invasive approach to necrotizing pancreatitis improves outcome,” Gastroenterology, vol. 141, no. 4, pp. 1254–1263, 2011.

A. Párniczky, B. Kui, A. Szentesi et al., “Prospective, multicentre, nationwide clinical data from 600 cases of acute pancreatitis,” PLoS One, vol. 11, Article ID e0165309, 2016.

H. X. Cui, J. Y. Xu, and M. Q. Li, “Efficacy of continuous renal replacement therapy in the treatment of severe acute pancreatitis associated acute respiratory distress syndrome,” European review for medical and pharmacological sciences, vol. 18, no. 17, pp. 2523–2526, 2014.

C. Yu, Z.-H. Liu, Z.-H. Chen, D.-H. Gong, D.-X. Ji, and L. S. H. Li, “Improvement of monocyte function and immune homeostasis by high volume continuous venovenous hemofiltration in patients with severe acute pancreatitis,” The International Journal of Artificial Organs, vol. 31, no. 12, pp. 882–890, 2008.

P. Dumnicka, D. Maduzia, P. Ceranowicz, R. Olszanecki, R. Drożdż, and B. Kuśnierz-Cabala, “The interplay between inflammation, coagulation and endothelial injury in the early phase of acute pancreatitis: clinical implications,” International Journal of Molecular Sciences, vol. 18, no. 2, p. 354, 2017.

X. Zhang, S. Sun, S. Li et al., “Early classic hemofiltration exhibits No benefits in severe acute pancreatitis with early organ failure: a retrospective case-matched study,” Artificial Organs, vol. 38, no. 4, pp. 335–341, 2014.

Y. Hu, W. Xiong, C. Li, and Y. Cui, “Continuous blood purification for severe acute pancreatitis: a systematic review and meta-analysis,” Medicine, vol. 98, Article ID e14873, 2019.

C. Wu, X. Wang, T. Jiang, W. Li, N. Li, and J. Li, “Improved effect of continuous renal replacement therapy in metabolic status and body composition of early phase of acute pancreatitis,” The International Journal of Artificial Organs, vol. 38, pp. 523–529, 2015.

G. Pupelis, H. Plaudis, K. Zeiza, N. Drozdova, M. Mukans, and I. Kazaka, “Early continuous veno-venous haemofiltration in the management of severe acute pancreatitis complicated with intra-abdominal hypertension: retrospective review of 10 years’ experience,” Ann Intensive Care, vol. 20, no. 2, p. S21, 2012.

S. Sun, L. He, M. Bai et al., “High-volume hemofiltration plus hemoperfusion for hyperlipidemic severe acute pancreatitis: a controlled pilot study,” Annals of Saudi Medicine, vol. 35, no. 5, pp. 352–358, 2015.

J. Lu, Y. Xie, J. Du et al., “Penta-therapy for severe acute hyperlipidemic pancreatitis,” The American Journal of Emergency Medicine, vol. 36, no. 10, pp. 1789–1795, 2018.

D. Gong, P. Zhang, D. Ji et al., “Improvement of immune dysfunction in patients with severe acute pancreatitis by high-volume hemofiltration: a preliminary report,” The International Journal of Artificial Organs, vol. 33, no. 1, pp. 22–29, 2010.

S. P. Hozo, B. Djulbegovic, and I. Hozo, “Estimating the mean and variance from the median, range, and the size of a sample,” BMC Med Res Methodol, vol. 5, p. 13, 2005.

E. Mao, Y. Tang, T. Han et al., “Effects of short veno-venous hemofiltration on severe acute pancreatitis,” Zhonghua Wai Ke Za Zhi, vol. 37, pp. 141–143, 1999.

Z. H. Yang, J. Yang, and Y. J. Wang, “Protective effect of continuous veno-venous hemofiltration on tissue and organ damage in patients with severe acute pancreatitis,” Chinese Journal of Critical Care Medicine, vol. 16, pp. 232–234, 2004.

J. Zhang, C. Yuan, G. Hua, R. Tong, X. Luo, and Z. Ying, “Early gut barrier dysfunction in patients with severe acute pancreatitis: attenuated by continuous blood purification treatment,” The International Journal of Artificial Organs, vol. 33, no. 10, pp. 706–715, 2010.

L. Xia, K. J. Qian, Z. G. Zeng et al., “A clinical study of early continuous high-volume-hemofiltration in the treatment of severe acute pancreatitis,” Zhonghua Nei Ke Za Zhi, vol. 51, pp. 871–874, 2012.

J. Guo, W. Huang, X.-N. Yang et al., “Short-term continuous high-volume hemofiltration on clinical outcomes of severe acute pancreatitis,” Pancreas, vol. 43, no. 2, pp. 250–254, 2014.

H. Guo, D. W. Suo, H. P. Zhu, X. M. Sun, and J. Chen, “Early blood purification therapy of severe acute pancreatitis complicated by acute lung injury,” European review for medical and pharmacological sciences, vol. 20, no. 5, pp. 873–8, 2016.

G. Wang, H. Liu, L. Xu et al., “Effect of laparoscopic peritoneal lavage and drainage and continuous venovenous diahemofiltration on severe acute pancreatitis,” Journal of Laparoendoscopic & Advanced Surgical Techniques, vol. 27, no. 11, pp. 1145–1150, 2017.

A. Abulimiti, A. Husaiyin, and Y. Sailai, “Evaluation of HVHF for the treatment of severe acute pancreatitis accompanying MODS,” Medicine, vol. 97, no. 1, p. e9417, 2018.

N. Gao, C. Yan, and G. Zhang, “Changes of serum procalcitonin (PCT), C-reactive protein (CRP), interleukin-17 (IL-17), interleukin-6 (IL-6), high mobility group protein-B1 (HMGB1) and D-dimer in patients with severe acute pancreatitis treated with continuous renal replacement therapy (CRRT) and its clinical significance,” Medical Science Monitor, vol. 24, pp. 5881–5886, 2018.

I. A. AI Mofleh, “Severe acute pancreatitis: pathogenetic aspects and prognostic factors,” World Journal of Gastroenterology, vol. 14, pp. 675–684, 2008.

P. G. Lankisch, M. Apte, and P. A. Banks, “Acute pancreatitis,” The Lancet, vol. 386, no. 9988, pp. 85–96, 2015.

T. Rimmelé and J. A. Kellum, “High-volume Hemofiltration in the Intensive Care Unit,” Anesthesiology, vol. 116, no. 6, pp. 1377–1387, 2012.

B. You, Y. L. Zhang, G. X. Luo et al., “Early application of continuous high-volume haemofiltration can reduce sepsis and improve the prognosis of patients with severe burns,” Critical Care, vol. 22, p. 173, 2018.

T Rimmelé and JA Kellum, “Clinical review: blood purification for sepsis,” Critical care (London, England), vol. 15, no. 1, p. 205, 2011.

T. Hongliang, Z. Rong, W. Xiaojing et al., “The effects of continuous blood purification for SIRS/MODS patients: a systematic review and meta-analysis of randomized controlled trials,” ISRN Hematology, vol. 2012, p. 986795, 2012.

X Chen, M Sun, X Mao, X Liu, and W Sun, “Effectiveness of continuous veno-venous hemofiltration in the treatment of severe acute pancreatitis,” Experimental and therapeutic medicine, vol. 17, no. 4, pp. 2720–2724, 2019.

C. M. Miao, G. Q. Zhang, Z. J. Liu, and J. P. Gong, “Influence of continuous high-volume hemofiltration on IRAK-4 protein expression in severe acute pancreatitis,” Nan Fang Yi Ke Da Xue Xue Bao, vol. 28, pp. 948–951, 2008.

G. H. Feng, Y. Cai, P. H. Jia et al., “Combination of hemofiltration and peritoneal dialysis in the treatment of severe acute pancreatitis,” Zhong Hua Wai Ke Za Zhi, vol. 42, pp. 272–275, 2004.

K. Jiang, X.-Z. Chen, Q. Xia, W.-F. Tang, and L. Wang, “Cost-effectiveness analysis of early veno-venous hemofiltration for severe acute pancreatitis in China,” World Journal of Gastroenterology, vol. 14, no. 12, pp. 1872–1877, 2008.

G. Pupelis, H. Plaudis, A. Grigane, K. Zeiza, and G. Purmalis, “Continuous veno-venous haemofiltration in the treatment of severe acute pancreatitis: 6-year experience,” HPB, vol. 9, no. 4, pp. 295–301, 2007.

J. Xu, Y. Cui, and X. Tian, “Early continuous veno-venous hemofiltration is effective in decreasing intra-abdominal pressure and serum interleukin-8 level in severe acute pancreatitis patients with abdominal compartment syndrome,” Blood Purification, vol. 44, no. 4, pp. 276–282, 2017.