Gastroenterology Research and Practice
Volume 2018 (2018), Article ID 9286014, 1 page
https://doi.org/10.1155/2018/9286014

Corrigendum

Corrigendum to “Computed Tomography Enterography: Quantitative Evaluation on Crohn’s Disease Activity”

Jingyun Cheng,¹ Hui Xie,¹ Hao Yang,¹ Ke Wang,¹ Guobin Xu,¹ and Guangyao Wu²

¹Department of Radiology, Zhongnan Hospital of Wuhan University, Wuhan, Hubei Province 430071, China
²Department of Magnetic Resonance Imaging, Zhongnan Hospital of Wuhan University, Wuhan, Hubei Province 430071, China

Correspondence should be addressed to Guangyao Wu; wuguangy2002@163.com

Received 24 September 2018; Accepted 26 September 2018; Published 5 November 2018

Copyright © 2018 Jingyun Cheng et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Computed Tomography Enterography: Quantitative Evaluation on Crohn’s Disease Activity” [1], the affiliation of the fifth author is incorrect as it should be the same as the first affiliation. The corrected affiliations are shown above.

References

J. Cheng, H. Xie, H. Yang, K. Wang, G. Xu, and G. Wu, “Computed tomography enterography: quantitative evaluation on Crohn’s disease activity,” Gastroenterology Research and Practice, vol. 2018, Article ID 7351936, 6 pages, 2018.