International Journal of Analytical Chemistry
Volume 2016 (2016), Article ID 3278363, 1 page
http://dx.doi.org/10.1155/2016/3278363

Corrigendum

Corrigendum to “Extraction of HCV-RNA from Plasma Samples: Development towards Semiautomation”

Imran Amin,¹ Tania Jabbar,1,2 Fawad Ali,¹ and Muhammad Saeed Akhtar³

¹PCR Laboratory, Punjab Institute of Nuclear Medicine (PINUM), Faisalabad 2019, Pakistan
²Department of Clinical Pathology, Punjab Institute of Nuclear Medicine (PINUM), Faisalabad 2019, Pakistan
³Nuclear Medicine Department, Punjab Institute of Nuclear Medicine (PINUM), Faisalabad 2019, Pakistan

Received 6 September 2016; Accepted 29 September 2016

Copyright © 2016 Imran Amin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Extraction of HCV-RNA from Plasma Samples: Development towards Semiautomation” [1], the name of the third author was given incorrectly as Fawad Niazi. The author’s name should have been written as Fawad Ali. The revised author list is shown above.

References

I. Amin, T. Jabbar, F. Niazi, and M. S. Akhtar, “Extraction of HCV-RNA from plasma samples: development towards semiautomation,” International Journal of Analytical Chemistry, vol. 2015, Article ID 367801, 4 pages, 2015.