International Journal of Analytical Chemistry
Volume 2018 (2018), Article ID 2561921, 1 page
https://doi.org/10.1155/2018/2561921

Corrigendum

Corrigendum to “GC Method Validation for the Analysis of Menthol in Suppository Pharmaceutical Dosage Form”

Murad N. Abualhasan,¹ Abdel Naser Zaid,¹ Nidal Jaradat,¹ and Ayman Mousa²

¹Department of Pharmacy, Faculty of Medicine & Health Sciences, An Najah National University, Nablus, State of Palestine
²R&D Department, Avalon Pharma, Riyadh, Saudi Arabia

Correspondence should be addressed to Murad N. Abualhasan; m_abualhasan@najah.edu

Received 3 May 2018; Accepted 17 May 2018; Published 13 August 2018

Copyright © 2018 Murad N. Abualhasan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “GC Method Validation for the Analysis of Menthol in Suppository Pharmaceutical Dosage Form” [1], the menthol structure presented in Figure 1 was incorrect and should be corrected as follows.

Figure 1: Structure of (–)-menthol.

References

M. N. Abualhasan, A. N. Zaid, N. Jaradat, and A. Mousa, “GC Method Validation for the Analysis of Menthol in Suppository Pharmaceutical Dosage Form,” International Journal of Analytical Chemistry, vol. 2017, Article ID 1728414, 5 pages, 2017.