International Journal of Analytical Chemistry
Volume 2019 (2019), Article ID 6470528, 1 page
https://doi.org/10.1155/2019/6470528

Erratum

Erratum to “Rapid, Validated UPLC-MS/MS Method for Determination of Glibenclamide in Rat Plasma”

Mohd Aftab Alam, Fahad Ibrahim Al-Jenoobi, and Abdullah Mohammed Al-Mohizea

Department of Pharmaceutics, College of Pharmacy, King Saud University, Riyadh, Saudi Arabia

Correspondence should be addressed to Mohd Aftab Alam; afealam@rediffmail.com

Received 6 January 2019; Accepted 8 January 2019; Published 3 February 2019

Copyright © 2019 Mohd Aftab Alam et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Rapid, Validated UPLC-MS/MS Method for Determination of Glibenclamide in Rat Plasma” [1], an acknowledgment should be added as follows:

“Authors thank the Research Center, College of Pharmacy, and Deanship of Scientific Research, King Saud University for funding this research project.”

References

M. A. Alam, F. I. Al-Jenoobi, and A. M. Al-Mohizea, “Rapid, Validated UPLC-MS/MS Method for Determination of Glibenclamide in Rat Plasma,” International Journal of Analytical Chemistry, vol. 2018, Article ID 2569027, 8 pages, 2018.