International Journal of Antennas and Propagation

Volume 2013 (2013), Article ID 834314, 5 pages

http://dx.doi.org/10.1155/2013/834314

Research Article

Millimeter Wave Antenna with Mounted Horn Integrated on FR4 for 60 GHz Gbps Communication Systems

Waleed Tariq Sethi, Hamsakutty Vettikalladi, and Majeed A. Alkanhal

Electrical Engineering Department, King Saud University, Riyadh 11451, Saudi Arabia

Received 11 September 2013; Accepted 3 October 2013

Academic Editor: Mandeep Singh Jit Singh

Copyright © 2013 Waleed Tariq Sethi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A compact high gain and wideband millimeter wave (MMW) antenna for 60 GHz communication systems is presented. The proposed antenna consists of a multilayer structure with an aperture coupled microstrip patch and a surface mounted horn integrated on FR4 substrate. The proposed antenna contributes impedance bandwidth of 8.3% (57.4–62.4 GHz). The overall antenna gain and directivity are about 11.65 dBi and 12.51 dBi, which make it suitable for MMW applications and short-range communications. The proposed antenna occupies an area of 7.14 mm × 7.14 mm × 4 mm. The estimated efficiency is 82%. The proposed antenna finds application in V-band communication systems.

1. Introduction

During the last decade, a lot of knowledge about 60 GHz millimeter wave (MMW) has been congregated, and different architectures have been proposed and scrutinized in developing commercial applications for millimeter wave communication systems [1]. Large propagation and penetration losses at 60 GHz make it viable for use in short-range and single room environments communication. The demand for high-speed multimedia communications, such as real-time video streaming and huge data file transmission, are increasing rapidly. One of the most promising solutions to fulfill the speed and bandwidth requirements is to make use of MMW gigabit wireless communication. Short-range high data bit rate communication systems operating at 60 GHz are considered today as emerging solutions for video data streaming or video downloading needs. The recent trend on the development of millimeter wave frequencies systems has led to many innovative techniques with their successful demonstrations in different applications.

The elementary single element microstrip antenna designed on a thin substrate has limited gain of 5–7 dBi and a narrow bandwidth of around 1.5%–2.5%. Efforts have been made to increase both the gain and bandwidth with the help of stacked parasitic patch [2]. The aperture coupled microstrip patch antenna’s (ACMPA) feeding technique [3] has intrinsic properties which makes it an attractive feature for millimeter wave applications [4]. Wide band operation of this type of microstrip antenna has been demonstrated at microwave frequencies (1–10 GHz) using either single [5, 6] or stacked patch configurations [7]. However, this structure can be optimized either for the gain or for the bandwidth. There is a need to increase the gain of radiating patch element without sacrificing the bandwidth.

One method to increase the gain of the antenna is to make use of array principle, but the antenna size and feeding network complexity become a limitation factor. The most promising solution to improve the gain of the antenna while keeping the overall antenna size within limits is to make use of hybrid configurations [8–14] where multiple antennas are excited together over the same frequency range of operation. Costanzo [8] proposed a hybrid configuration to increase the gain of an antenna by making use of circular waveguide elements, which were electromagnetically coupled to circular apertures via a stripline. Correspondingly, in [15] a surface mounted short horn is used with an aperture antenna where slant angle of horn antenna with respect to frequency is optimized in order to view its impact on gain of the antenna. Another configuration uses a surface mounted pyramidal horn excited by a rectangular patch antenna and a dipole as in [9] or by a patch surrounded by a resonating ring as in [10]. Use of superstrate with or without parasitic radiators is another method considered as one of the novel gain-enhancing techniques [14].

In this paper, we propose a high gain and wide band aperture coupled microstrip antenna with a mounted Horn on a FR4 substrate in the frequency range of 57–64 GHz. The structure has bandwidth of 8.3% with a maximum gain of 11.65 dBi.

2. Antenna Design

Figure 1(a) shows the side view of the proposed multilayer antenna, while the exploded 3D view is displayed in Figure 1(b). The design is a combination of ACMPA and a Horn antenna mounted on FR4 substrate, where the waveguide part of the horn is integrated on FR4 substrate. The model was simulated and optimized using RF simulation software CSTMicrowave Studio. The antenna is tuned to operate in a wide band of frequencies at 60 GHz. The multi-layer antenna has three substrates with layers 1 and 2 having Rogers Duroid RT-5880 with , and thickness  mm and  mm, while the third layer has FR 4 as a substrate with and thickness  mm and a mounted Horn. A Rohacell foam of thickness  mm is placed around the Horn on top of third layer. The addition of FR4 and foam has no other effect, except to provide support to the mounted Horn, on the antenna performance. The ground with thickness  mm) is made of conducting metal with a rectangular slot perpendicular to the microstrip feed having dimensions of and as given in Table 1. The patch is located on the top of the substrate, at layer 2, has dimensions of and as given in Table 1. The dimensions of substrates and ground are taken as  mm² for the manufacturing point of view. The microstrip feed line at the bottom of lower substrate has a feed width of  mm as calculated from Ansoftdesigner. The feeding mechanism of the ACMPA excites the square patch that feeds the metallic pyramidal horn with a thin wall (2 mm). The horn has a great effect on enhancing the overall gain of the antenna without influencing the center frequency or the operating bandwidth. Table 1 shows the optimized values for the proposed antenna.

Table 1: Parameters of the proposed antenna in mm.

Design
Antenna element
Dimensions/parameters (mm)

Layer 1
Microstrip feed
Feed width, = 0.386

Thickness,     

 Stub length,

Substrate
RT Duroid 5880 

Length,  

Width,  

Thickness,

Ground
Thickness,  

Length,  

Width,

Rectangular slot
Thickness,  

Slot length,  

Slot width,

Layer 2
Substrate
RT Duroid 5880

Thickness,  

Patch

Length,    

 Width,   

Length,  

Width,

Layer 3
Substrate
FR4

Thickness,  

tan

Cut in FR4
Length,  

Width,

Horn
Horn dimensions
Horn length,  

Horn width,  

Waveguide length,  

Waveguide width,  

Thickness of metal horn,

Full structure
Total height
4

(a)

(b)

Figure 1: (a) Cutting Plane of a multilayer ACMPA with mounted Horn on FR4. (b) Exploded view of the proposed antenna.

3. Results and Discussion

The effect on the simulated return loss, gain, and directivity with and without FR4 mounted Horn is clarified in this section. The addition of FR4 mounted Horn on ACMPA improves the gain from 5.6 dBi to 11.65 dBi. The variations of the return loss with horn dimensions are shown in Figure 2. The addition of Horn does not affect the return loss. The dimensions of the waveguide and the optimized mounted Horn are given in Table 1. Figure 3 shows the pyramidal horn antenna with a rectangular input waveguide. The initial length of the rectangular waveguide is chosen to be , which is a half wavelength at 60 GHz. The rectangular waveguide length has an effect on the reflection coefficient, which is minimum when is around . For the pyramidal section we choose initial dimensions such that and [14]. Starting from initial dimensions of the horn, we first adjusted the length of the rectangular waveguide such that a minimum reflection coefficient occurs at 60 GHz. Next, the length and aperture size of the pyramidal section were optimized to get the maximum bandwidth and gain of the proposed structure. The improved gain by the addition of pyramidal horn was established by using the well-known gain expression [16, 17] given as

After numerous sessions of parameter sweeping, we obtained the following optimum dimensions:  mm,  mm,  mm,  mm, and  mm.

Figure 2: Varied Horn dimensions.

Figure 3: Dimensions of waveguide and pyramidal horn.

The parameters of the proposed structure with ACMPA alone and after the addition of Horn antenna remain the same at 8.3%, while the gain and directivity of the structure without the addition of Horn is 5.6 dB and 6.68 dBi, respectively. The beamwidths of the -plane and -plane, without the Horn, for the proposed antenna at 60 GHz are 89.5° and 91.7°, respectively. Figure 4 shows the comparison and improvement of gain and bandwidth of ACMPA alone and after the addition of Horn antenna. With the ACMPA structure alone having the same thickness at  mm, the bandwidth achieved is 3.4 GHz. With different thickness at  mm and  mm, the improved bandwidth is 4.98 GHz. The final bandwidth achieved is 8.3% (57.437–62.426 GHz). The addition of Horn results in an increase in the directivity and gain of the proposed antenna and has no effect on the bandwidth. The maximum directivity and gain achieved are 12.51 dBi and 11.65 dBi. The simulation has taken into account the substrate and metallic losses. The estimated efficiency is 82%.

Figure 4: Comparison of gain and bandwidth of ACMPA with and without Horn.

Figures 5(a) and 5(b) show the comparison of the simulated radiation patterns, in both the -plane and the -plane, with and without horn for the proposed antenna at 60. The ACMPA influences the side-lobe level and radiation pattern symmetry of the proposed horn-patch combined structure, in the -plane and -plane. Thus for the horn-patch combined structure the -plane has side-lobe of level −10.3 dB, half-power beamwidth of 34.9°, and a back radiation of −18.11 dB. The -plane radiation pattern has a side-lobe of −17.6, half-power beamwidth of 54.4°, back radiation of −17.67 dB, and cross polarization level of <−30 dB. Figures 6(a) and 6(b) show the -plane and -plane radiation patters, of the proposed antenna with horn, for the frequencies at 58, 60, and 62 GHz, respectively.

(a)

(b)

Figure 5: (a) Simulated -plane radiation pattern with and without Horn. (b) Simulated -plane radiation pattern with and without Horn.

(a)  

(b)

Figure 6: (a) Simulated -plane radiation pattern at 58, 60, and 62 GHz. (b) Simulated -plane radiation pattern at 58, 60, and 62 GHz.

4. Conclusion

From many hybrid techniques available for achieving a high gain antenna with stacked elements, one ACMPA with a FR4 mounted Horn for millimeterwave (MMW) application has been simulated using CST Microwave Studio. An enhanced bandwidth and gain have been achieved by the addition of FR4 mounted horn antenna. The simulated antenna satisfies the <−10 dB return loss bandwidth of 8.3% around 60 GHz with 11.65 dBi of maximum gain. The estimated efficiency is 82%.

Acknowledgment

The authors thank the Deanship of Scientific Research, Research Center at College of Engineering, King Saud University, for funding.

References

R. Piesiewicz, T. Kleine-Ostmann, N. Krumbholz et al., “Short-range ultra-broadband terahertz communications: concepts and perspectives,” IEEE Antennas and Propagation Magazine, vol. 49, no. 6, pp. 24–39, 2007.

R. Q. Lee, K. F. Lee, and J. Bobinchak, “Characteristics of a two layer electromagnetically coupled rectangular microstrip antenna,” Electronics Letters, vol. 23, no. 20, pp. 1070–1072, 1987.

D. M. Pozar, “A microstrip antenna aperture coupled to a microstripline,” Electronics Letters, vol. 21, no. 2, pp. 49–50, 1985.

D. M. Pozar and D. H. Schaubert, “Comparison of architectures for monolithic phased array antennas,” Microwave Journal, vol. 29, pp. 93–103, 1986.

J. F. Zuercher, “SSFIP: a global concept for high-performance broadband planar antennas,” Electronics Letters, vol. 24, no. 23, pp. 1433–1435, 1988.

F. Croq and A. Papiernik, “Large bandwidth aperture-coupled microstrip antenna,” Electronics Letters, vol. 26, no. 16, pp. 1293–1294, 1990.

C. H. Tsao, Y. M. Hwang, F. Killburg, and F. Dietrich, “Aperture coupled patch antenna with wide bandwidth and dual polarization capabilities,” Antennas and Propagation Society International Symposium, vol. 3, pp. 936–939, 1988.

S. Costanzo, “Hybrid array antenna for broadbandmillimeter-wave applications,” Progress In Electromagnetics Research, vol. 83, pp. 173–183, 2008.

S. Methfesse and L. Schmidt, “Design of a balanced-fed patch-excited horn antenna at millimeter-wave frequencies,” in Proceedings of the 4th European Conference on Antennas and Propagation (EuCAP '10), pp. 1–4, April 2010.

P. Kumar, D. Batra, and A. K. Shrivastav, “High gain microstrip antenna capacitive coupled to a square ring with surface mounted conical horn,” Journal of Communications Technology and Electronics, vol. 1, no. 1, pp. 7–9, 2010.

R. Shireen, T. Hwang, S. Shi, and D. W. Prather, “Stacked patch excited horn antenna at 94 GHz,” Microwave and Optical Technology Letters, vol. 50, no. 8, pp. 2071–2074, 2008.

Nasimuddin, K. P. Esselle, and A. K. Verma, “GAIN enhancement of aperture-coupled dielectric-resonator antenna with surface mounted horn,” in Proceedings of the 28th General Assembly of URSI, New Delhi, India, October 2005.

A. Bedair, Design and development of high gain wideband microstrip antenna and DGS filters using numerical experimentation approach [Ph.D. thesis], Guericke-Universität, Magdeburg, Germany, 2005.

H. Vettikalladi, O. Lafond, and M. Himdi, “High-efficient and high-gain superstrate antenna for 60-GHz indoor communication,” IEEE Antennas and Wireless Propagation Letters, vol. 8, pp. 1422–1425, 2009.

Y. Ranga, A. K. Verma, K. P. Esselle, and A. R. Weily, “Gain enhancement of UWB slot with the use of surface mounted short horn,” in Proceedings of the IEEE International Symposium on Antennas and Propagation and CNC-USNC/URSI Radio Science Meeting-Leading the Wave (AP-S/URSI '10), pp. 1–4, July 2010.

K. B. Baltzis, “Theoretical establishment and evaluation of a novel optimal pyramidal horn design criterion,” Progress in Electromagnetics Research, vol. 108, pp. 361–383, 2010.

K. T. Selvan, “Accurate design method for optimum gain pyramidal horns,” Electronics Letters, vol. 35, no. 4, pp. 249–250, 1999.