International Journal of Antennas and Propagation
Volume 2015 (2015), Article ID 182140, 6 pages
http://dx.doi.org/10.1155/2015/182140

Research Article

A Novel UWB TEM Horn Antenna with a Microstrip-Type Feed

Youcheng Wang, Guangyou Fang, Hai Su, Yicai Ji, Shengbo Ye, and Xiaojuan Zhang

School of Electronic, Electrical and Communication Engineering, University of Chinese Academy of Sciences, Beijing 100190, China

Received 20 June 2015; Revised 12 August 2015; Accepted 23 August 2015

Academic Editor: Claudio Gennarelli

Copyright © 2015 Youcheng Wang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A novel ultra-wideband (UWB) TEM horn antenna fed by a microstrip-type transition is designed. The feeding structure is directly realized by a microstrip line with the merit of compact size and UWB. To broaden the low frequency band, an arc surface is added at the end of the flare plates. Numerical simulation is applied to discuss the effect of the geometry construction which contains the microstrip-type transition and the circular arc surface at the end of radiating arm. Return loss, radiation pattern, and gain of the fabricated antennas are measured. The measured results show that the antenna yields a wide bandwidth ranging from 1 GHZ to 10.3 GHz with return loss less than −10 dB. The antenna also achieves unidirectional radiation patterns with stable antenna gain. These characteristics imply that the compact antenna may be used for detecting buried objects in the wall or UWB communication systems of band like GSM, Wi-Fi, and so forth.

1. Introduction

TEM horn antenna is commonly used due to its relatively high gain, wideband, and simple structure for various applications [1, 2]. Typical applications include EMC experiments and ground penetrating radar (GPR), detecting hidden objects in wall and UWB communication [3–7]. To radiate electromagnetic waves, the dimension and impedance of the TEM horn antenna should be properly chosen to achieve wideband characteristics [8]. The impedance variation of the tapered plates can be linear [9], Chebyshev type [3], exponential [6], and elliptic profile [10]. Linearly tapered antennas can be constructed easily compared to a Chebyshev type or exponentially tapered antenna. A Chebyshev type tapered antenna could improve the directivity at a fixed taper length. The exponentially tapered plates can achieve a smoother impedance variation. Meanwhile, a worthy feeding mechanism can broaden the bandwidth to a great extent. Typically the TEM horn antenna is fed by a coaxial line [10]. In order to match the impedance between the horn antenna and the unbalanced coaxial line, a compact microstrip-type transition is needed [6]. In the letter, a novel TEM horn antenna fed by a compact microstrip line with asymmetrical section is proposed. The antenna which is modified on the base of [2] is made up of two specially tapered plates and directly fed with a 50 ohm coaxial cable. However, in this paper, an arc surface is added at the end of the flare plates, and the taper is optimized to minimize the reflection. The width of reflector is varied along with the impedance changing from 50 ohms to 370 ohms. Finally, pairs of antenna are manufactured and measured. The measured results show that the proposed antenna has low return loss within a wideband from 1 GHz to 10.3 GHz and moderate gain more than 6 dBi in frequencies higher than 2.5 GHz. The experimental results agree well with the simulated results.

2. Antenna Design and Structure

Based on the transfer line theory, a modification of Dolph-Chebyshev taper presents that the shortest length of the antenna can be designed with a limited frequency band or the maximum bandwidth can be achieved with a given reflection coefficient [11]. Some TEM horn antennas have been published with excellent frequency characters referred to the theory [12, 13]. In the paper [14], the main reflections of horn antenna are divided into port reflections, taper reflections, and aperture reflections. The port reflections can be reduced by transformer matching. The aperture and taper reflections may be determined by the dimension from throat to aperture of horn antenna. In this paper, the taper of proposed antenna is derived from the superellipse function with the power equal to 3. The varied power could control the form of the superellipse, and the value of 3 is defined for shaping the taper to achieve the smooth current distribution. The geometry of the proposed antenna is illustrated in Figure 1. The structure of the antenna can be divided into two parts including the asymmetrical radiation section and a microstrip-type feeding. The asymmetrical radiation section comprises a pair of tapered metal sheets to accomplish the radiation. The side view and top view of the radiation section are illustrated in Figure 1. A quarter of a cubic hyper elliptic curve with  mm and  mm is chosen as the based reference function corresponding to the expression (1), and the parameter determines the curved length with relation to the origin . The center of the cubic hyper elliptic curve is , whose coordinates are of 20 mm and 32.25 mm. The curves of the taper are computed through the parametric functions and versus the parameter according to expressions (2) and (3). To broaden the low frequency band, two symmetrical circular arcs with the radius  mm and the angle degree are loaded at the end of the flare-shaping curves with the center of 59.72 mm and −12.65 mm. The width of horn’s cross section varies with the distance between Cur1 and Cur2 as parallel waveguide or microstrip line [3, 14], and the microstrip-type structure is shown as dot line in Figure 1(b). The microstrip-type structure with air substrate should be matched to the 50-ohm coaxial cable. According to the impedance calculation of the microstrip line, the initial value of is 1.75 mm, is 7 mm, and is 35 mm.

(a)

(b)

Figure 1: The geometry structure of antenna.

The manufactured antenna is shown in Figure 2. The conducting plates are shaped by the copper with thickness of 0.5 mm to keep light weight. To support and fix the plates of the antenna, polystyrene foam which conforms to the antenna can be used for engineering application. The dimension of the horn antenna is 136 × 64 × 40.5 mm. Compared to the regular horn antenna [15], the proposed horn antenna has a much smaller size and good radiation characteristic. The compact size makes it possible to form antenna array with this antenna to improve the gain for detecting buried targets in the wall or ground:

Figure 2: Photograph of the manufactured antenna.

3. Parameter Discussion and Experiments

The frequency band is limited by the dimension of the horn aperture; therefore two symmetrical circular arcs surfaces are loaded at the end of flare plates. Parameters and are critical to the circular arc surface. In Figure 3(a), when varies from 34 mm to 42 mm with a increment of 4 mm, varies slightly from 1 to 10.5 GHz and less than −10 dB. In Figure 3(b), as varies from 4.3 mm to 12.3 mm with a increment of 4 mm, the return loss changes slightly except for the frequency at 2.5 GHz with  mm and  mm. To validate the effectiveness of loading circular arc surface, the simulated return loss of antennas with and without arc surface loadings is shown in Figure 4. The parameter is defined to 1.5 mm,  mm, and  mm, which can imply that the low frequency band is mostly affected by the dimension of aperture. The antenna without arc surface loading performs poorly in low frequency band. While the arc surfaces are loaded, the return loss shifts down from 1.45 GHz to 1.1 GHz and smaller than −10 dB. From 2 GHz to 5 GHz, that is, the return loss achieves lower level by loading the arc surface.

(a)

(b)

Figure 3: Simulated return loss of proposed antenna at (a) height of the arc and (b) length of the arc.

Figure 4: The different return loss between the arc surface loading or not.

The parameters and of microstrip-type transition are learnt by simulation. Figures 5 and 6 illustrate the effects of the width of the microstrip and the thickness of the air substrate on return loss, respectively. In Figure 5, it is obvious that the antenna performs better in high frequency band when the width of microstrip varies from 5 to 8 mm. Here the values of , , and are chosen to be 2 mm, 38 mm, and 8.3 mm, respectively. Figure 6 shows that the return loss in low frequency band becomes lower than −10 dB when height varies from 1.0 mm to 2.5 mm, while in high frequency band it changes slightly. Finally, the geometry of microstrip-type transition is defined with equal to 1.5 mm and equal to 7 mm. The simulated input impedance for the proposed antenna is shown in Figure 7. The real part of impedance is around 50 ohms, and the imaginary part is close to zero with small fluctuations in the whole band. It means that the antenna would be matched well with port of RF connector. The constructed antennas are measured by using Agilent network analyzer N5242A with thru-reflect line calibration to exclude the effects of the connectors and two 50-ohm coaxial cables. The measured results agree well with simulation except at the frequency around 10 GHz as shown in Figure 8. This can be ascribed to the fabrication discrepancy of the horn antenna throat which is made in hand. The RF connectors and coaxial cables may also contribute slightly to the discrepancy at high frequencies. The measured -plane and -plane radiation patterns at the frequencies of 1, 4, 7, and 10 GHz are shown in Figure 9. It can be seen that the maximal radiation is along the central axis of the horn aperture in -plane (-plane), while a declination angle of approximately 15 degrees away from the central axis of the aperture is shown in -plane (-plane). Due to the small size of the antenna, the radiation pattern at 1 GHz is similar to a dipole. As the frequency increases, the radiation pattern shows the characteristic of end-fire type antenna. It is observed that the main lobe patterns keep stable, and the half power beam width of the antenna is about 70 degrees. The front-to-back ratio of the antenna is approximately 13 dB. It is observed that some ripples appeared in the radiation pattern as frequency increases, which can be ascribed to the dimension of lower arm. The curved part of the lower arm near feeding transition can be considered to be a reflector, especially at high frequencies. However, it could not be too large in order to balance the size and the directivity of the antenna.

Figure 5: Simulated return loss of proposed antenna at width of microstrip.

Figure 6: Simulated return loss of proposed antenna at height of air substrate.

Figure 7: Simulated input impedance of proposed antenna.

Figure 8: Measured and simulated input return loss of proposed antenna.

(a)

(b)

Figure 9: Normalized measured radiation patterns for proposed antenna:(a) -plane and (b) -plane.

The peak gain of the proposed antenna from 1 GHz to 10.3 GHz is measured using two-uniform-antenna method and shown in Figure 10. The measured and simulated gain curves show a common trend and agree well with each other, the slight differences may be attributed to the limitation of the measurement condition and the manufacturing errors. As shown in Figure 10, the antenna gain is almost constant in the main frequency bandwidth. Antenna gain is higher than 0 dBi at frequencies higher than 1 GHz and remains relatively stable around 6 dBi from 2.5 GHz to 10 GHz. The antenna can be used as array element when detecting objects buried in wall or ground [7]. Antenna array could improve the gain which may meet requirements of compensating attenuation.

Figure 10: Measured and simulated peak gain of antenna against frequency for proposed antenna. The simulated gain is in the -plane with the azimuth angle equal to 105 degree.

4. Conclusion

A novel UWB TEM horn antenna which is fed by a compact microstrip-type transition and loaded with circular arc surface has been numerically modeled and experimentally investigated. The geometry construction of the microstrip-type transition and the circular arc surface which affects the return loss of the antenna are simulated and discussed. The measured and numerical results are in good agreement with each other. The measured results show that the proposed antenna can provide good end-fire radiation patterns and a broadband impedance bandwidth. The gain of the antenna is larger than 6 dBi in almost entire frequency band. These results indicate that the proposed antenna is expected to be a good candidate for some UWB radar systems or local wireless communication owing to its advantages of low cost, light weight, and compact size. To avoid the interference with other major wireless devices, a notch band may be required. However, the horn antenna is not easy to shape notch band. Generally, the unidirectional horn antenna is possible to avoid interference with other wireless communication devices by proper distribution. Radome could also be used to avoid interference. The application issue will be the next important theme.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work has been supported by the National Basic Research Program of China (“863” Program) of Grant 2012AA061403 and Technical Program of Beijing Transportation Industry under no. of Y4H33A0154.

References

A. Mehrdadian and K. Forooraghi, “Design and fabrication of a novel ultrawideband combined antenna,” IEEE Antennas and Wireless Propagation Letters, vol. 13, pp. 95–98, 2014.

A. O. Boryssenko and D. L. Sostanovsky, “A new two-flare-shaped UWB antenna element,” in Proceedings of the 2005 Antenna Applications Symposium, pp. 451–471, September 2005.

S. B. Bassam and J. A. Rashed-Mohassel, “A chebyshev tapered TEM horn antenna,” PIERS Online, vol. 2, no. 6, pp. 706–709, 2006.

M. İlarslan, A. S. Türk, S. Demirel, M. E. Aydemir, and A. K. Keskin, “A compact vivaldi shaped partially dielectric loaded TEM horn antenna for UWB communication,” International Journal of Antennas and Propagation, vol. 2014, Article ID 847169, 6 pages, 2014.

M. N. Shakib, M. Moghavvemi, and W. N. L. Mahadi, “Design of a compact tuning fork-shaped notched ultrawideband antenna for wireless communication application,” The Scientific World Journal, vol. 2014, Article ID 874241, 8 pages, 2014.

H. Choi and S. Lee, “Design of an exponentially-tapered TEM horn antenna for the wide broadband communication,” Microwave and Optical Technology Letters, vol. 40, no. 6, pp. 531–534, 2004.

A. Godard, L. Desrumaux, V. Bertrand et al., “A transient UWB antenna array used with complex impedance surfaces,” International Journal of Antennas and Propagation, vol. 2010, Article ID 243145, 8 pages, 2010.

K. Chung, S. Pyun, and J. Choi, “Design of an ultrawide-band TEM horn antenna with a microstrip-type balun,” IEEE Transactions on Antennas and Propagation, vol. 53, no. 10, pp. 3410–3413, 2005.

K. Moussakhani, R. K. Amineh, and N. K. Nikolova, “High-efficiency TEM horn antenna for ultra-wide band microwave tissue imaging,” in Proceedings of the IEEE International Symposium on Antennas and Propagation (APSURSI '11), pp. 127–130, July 2011.

J. A. G. Malherbe and N. Barnes, “TEM horn antenna with an elliptic profile,” Microwave and Optical Technology Letters, vol. 49, no. 7, pp. 1548–1551, 2007.

R. P. Hecken, “A near-optimum matching section without discontinuities,” IEEE Transactions on Microwave Theory and Techniques, vol. 20, no. 11, pp. 734–739, 1972.

E. A. Theodoru, M. R. Gorman, P. R. Rigg, and F. N. Kong, “Broadband pulse-optimised antenna,” IEE Proceedings H: Microwaves, Optics and Antennas, vol. 128, no. 3, pp. 124–130, 1981.

Y. Huang, M. Nakhkash, and J. T. Zhang, “A dielectric material loaded TEM horn antenna,” in Proceedings of the 12th International Conference on Antennas and Propagation (ICAP '03), vol. 2, pp. 489–492, IET, March-April 2003.

A. E.-C. Tan, K. Jhamb, and K. Rambabu, “Design of transverse electromagnetic horn for concrete penetrating ultrawideband radar,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 4, pp. 1736–1743, 2012.

D. M. Pozar, Microwave Engineering, John Wiley & Sons, 2009.