International Journal of Antennas and Propagation
Volume 2015 (2015), Article ID 370763, 7 pages
http://dx.doi.org/10.1155/2015/370763

Research Article

MIMO Antenna with High Isolation for WBAN Applications

Do-Gu Kang, Jinpil Tak, and Jaehoon Choi

Department of Electronics and Communications Engineering, Hanyang University, 222 Wangsimni-ro, Seongdong-gu, Seoul 133-791, Republic of Korea

Received 18 September 2014; Revised 23 December 2014; Accepted 4 February 2015

Academic Editor: Yuan Yao

Copyright © 2015 Do-Gu Kang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A multi-input multi-output (MIMO) antenna with high isolation is proposed for 2.4 GHz ISM band (2.4–2.485 GHz) WBAN applications. The proposed MIMO antenna consists of two PIFA elements and utilizes an isolator composed of a shorted strip and two slits in the ground plane. Although the separation between the two PIFAs is minimized to 8 mm (0.06 ), isolation performance is improved by virtue of an isolator. To analyze the antenna’s performance on a human body, the proposed antenna is placed on a human muscle-equivalent flat phantom and is investigated through simulations. The measured −10 dB reflection coefficient bandwidth of the antenna ranges from 2.11 GHz to 2.6 GHz, and the isolation is lower than −38 dB over the 2.4 GHz ISM band.

1. Introduction

Given the fast progress of wireless communication technologies, wireless body area network (WBAN) systems have received considerable attention for various applications [1, 2]. Because WBAN systems can be placed on or in the human body with high permittivity and conductivity at microwave frequencies, the gain and efficiency of an antenna for WBAN systems can be degraded [3–6]. Furthermore, to operate in WBAN communication environment, the antenna should have compact size, low height, insensitiveness to human body effects, and low specific absorption rate (SAR) [7].

Many researchers have conducted various studies on the performance analysis of on-body WBAN communication systems in the industrial, scientific, and medical (ISM) bands [8–11]. Because of reflections/scatterings that occur in a neighborhood environment and/or on the human body, severe multipath fading can arise in on-body communication links [9]. Multipath fading not only decreases the communication reliability of multisignals but also worsens the efficiency of a WBAN system [12]. To improve communication performance under the influence of multipath fading, a diversity technique such as multiple-input and multiple-output (MIMO) is necessary. Since the independence of the multisignals can be improved by the high isolation of a MIMO antenna, a MIMO technique is frequently used to overcome the deterioration of communication performance due to multipath fading [13].

To achieve high isolation between MIMO antenna elements, an isolator has been used by many researchers [14–17]. A MIMO antenna with a high isolation characteristic is proposed by using a shorted strip and two slits in the ground plane [17]. The antenna has isolation lower than −32 dB for on-body WBAN applications in the 2.4 GHz ISM band. The MIMO antenna utilizes two planar inverted-F antenna (PIFA) elements with lengths of λ/4 at a resonant frequency to achieve a compact size [18]. The performance of the proposed antenna on the human muscle-equivalent flat phantom is analyzed by examining data such as the -parameter characteristic, current distribution, radiation pattern, SAR, and envelope correlation coefficient (ECC).

2. Antenna Design and Analysis

2.1. Basic Geometry

The proposed MIMO antenna consists of two PIFAs, a shorted strip, and two slits in a ground plane, as shown in Figure 1. The shorted strip, along with the two slits, acts as an isolator. The PIFAs, which have dimensions of 12 × 10.5 × 2 mm³, are located on a FR4 substrate () with a 1 mm thickness and an area of 40 × 40 mm². The two PIFAs are symmetrically placed with a separation distance of 8 mm (0.06 ) in the -axis direction. The isolator and the ground plane are printed on the upper side of the substrate.

(a)

(b)

Figure 1: Geometry of the proposed antenna: (a) top view; (b) PIFA.

To consider the effects on the human body, the simulation setup of an antenna on a human muscle-equivalent flat phantom is illustrated in Figure 2. The phantom, with a volume of 200 × 270 × 60 mm³, has the relative dielectric constant () and the conductivity ( S/m) of human tissue [19]. Considering practical applications such as wearable Bluetooth services, the antenna is placed on the phantom with a separation distance of 10 mm to satisfy the required clearance to assemble the cover [3]. The antenna geometry was designed and analyzed by utilizing the high frequency structure simulator (HFSS 14) [20].

Figure 2: Proposed antenna on the phantom for simulation setup.

The simulated -parameter characteristics of the proposed antenna with and without the isolator are compared in Figure 3. The optimized design parameters are  mm and  mm. The proposed antenna has a −10 dB reflection coefficient bandwidth ranging from 2.27 GHz to 2.6 GHz, which fully covers the desired 2.4 GHz ISM band. When the isolator is added between the two PIFAs, the isolation is improved significantly with a slight shift of the resonant frequency. The antenna has isolation below −32 dB in the 2.4 GHz ISM band.

Figure 3: Simulated -parameter characteristics for the proposed antenna with and without isolator.

To investigate the effect of the isolator, the simulated current distributions with and without the isolator at 2.4 GHz are shown in Figure 4. By exciting port 1, substantial current is induced at PIFA 2 in the absence of the isolator. After the isolator is added, the induced current on PIFA 2 becomes weak. This is because the impedance of the λ/4 isolator becomes large at 2.4 GHz so that the current flowing from port 1 to PIFA 2 is blocked by the isolator [21, 22].

Figure 4: Simulated current distributions for the proposed antenna at 2.4 GHz (port 1: on, port 2: off): (a) without isolator; (b) with isolator.

2.2. Key Parameter Analysis

The -parameters of the proposed antenna with respect to a variation in the length () of the PIFA radiator are shown in Figure 5. As decreases, the resonance frequency shifts toward a higher frequency, while the isolation is improved. However, as decreases beyond 27.5 mm, the isolation deteriorates. When  mm, the antenna satisfies the 2.4 GHz ISM band with optimum isolation.

Figure 5: Simulated -parameters for various values of length ( mm).

In Figure 6, the -parameters of the proposed antenna with respect to the various lengths () of the shorted strip are illustrated. A variation in also changes the slit’s length because the tip of the shorted strip is fixed. As increases, the isolation performance is improved and good impedance matching is obtained. However, after  mm, the isolation degrades. To achieve optimum isolation performance,  mm is chosen.

Figure 6: Simulated -parameters for various values of length ( mm).

3. Antenna Performance

Photographs of the fabricated antenna and the human muscle-equivalent flat phantom for the measurement setup are shown in Figure 7 [23]. By utilizing the fabricated phantom ( and  S/m), the performance of the antenna on the human body can be investigated.

(a)

(b)

Figure 7: Fabricated antenna and measurement setup. (a) Fabricated antenna; (b) the antenna on the phantom for measurement setup.

The simulated and measured -parameter characteristics of the proposed antenna are compared in Figure 8. The measured and simulated results are in reasonably good agreement. The measured −10 dB reflection coefficient bandwidth of the fabricated antenna is 490 MHz from 2.11 GHz to 2.6 GHz, which satisfies the entire 2.4 GHz ISM band. The fabricated antenna has a measured isolation below −38 dB in the 2.4 GHz ISM band.

Figure 8: Simulated and measured -parameter results for the proposed antenna on the human muscle-equivalent flat phantom.

To analyze the effects on the human body when the proposed antenna operates, the SAR value of the antenna is calculated at 2.4 GHz, as shown in Figure 9. The Federal Communications Commission (FCC) of the United States requires that the SAR be lower than 1.6 W/kg over a volume of 1 g of tissue [24]. The antenna has a SAR of 1.52 W/kg when an input power of 100 mW is applied. Thus, the proposed antenna can be used for low power Bluetooth device applications [25].

Figure 9: Simulated SAR distribution of the proposed antenna on the phantom at 2.4 GHz (input power: 100 mW).

The simulated and measured far-field radiation patterns of the proposed antenna on the phantom are compared at 2.4 GHz, as shown in Figure 10. The simulated and measured radiation patterns agree very well, except for those in the back radiation direction () of the plane. The difference between the simulated and measured radiation patterns of the plane occurs because the phantom has different conductivity values (conductivity for simulation: 1.95 S/m, conductivity for measurement: 0.94 S/m). Because the radiated field reflected by the phantom with high conductivity used in the simulation is stronger than that of the measurement, the backward radiation decreases. When the conductivity for the simulation becomes 0.94 S/m, the simulated radiation patterns are almost the same as the measured ones, as shown in Figure 11. The radiation patterns of PIFA 1 are somewhat analogous to those of PIFA 2. The antenna has quasi-omnidirectional radiation patterns in the plane and has its peak radiation in the outward normal to the phantom surface in the plane.

(a)

(b)

Figure 10: Simulated and measured radiation patterns of the proposed antenna at 2.4 GHz. (a) plane; (b) plane (σ for simulation: 1.95 S/m, σ for measurement: 0.94 S/m).

Figure 11: Simulated and measured radiation patterns ( plane) of the proposed antenna at 2.4 GHz (σ for simulation and measurement: 0.94 S/m).

Measured radiation characteristics of the two PIFAs at 2.4 GHz are compared in Table 1. The efficiencies of PIFA 1 and PIFA 2 are 21.34% and 21.37%, respectively.

Table 1: Measured peak gain and radiation efficiency.

2.4 GHz
PIFA 1
PIFA 2

Peak gain (dBi)
0.54
0.59

Efficiency (%)
21.34
21.37

The envelope correlation coefficient (ECC) is commonly utilized to evaluate the diversity capability of a MIMO antenna system. The ECC must be computed by using three-dimensional radiation patterns [26]. ECCs computed by simulated radiation patterns and measured radiation patterns are shown in Figure 12. The measured ECC agrees very well with the simulated one. The proposed antenna has an ECC value that is lower than 0.5 in the 2.4 GHz ISM band. When the computed ECCs with and without the isolator are compared, ECC performance improves owing to the improved isolation between PIFA 1 and PIFA 2.

Figure 12: Simulated and measured envelope correlation coefficients of the proposed antenna with and without isolator.

4. Conclusion

A high isolation MIMO antenna is designed to operate in the 2.4 GHz ISM band for WBAN applications. When installed on a human muscle-equivalent flat phantom, the antenna satisfies the −10 dB reflection coefficient bandwidth of the 2.4 GHz ISM band. An isolator, consisting of a shorted strip and two slits, is added between the two PIFAs to improve the isolation. Although the two PIFAs are placed close to each other with a separation distance of only 8 mm (0.06 ), the antenna exhibits an isolation lower than −38 dB in the 2.4 GHz ISM band. Therefore, the above-mentioned properties prove that the proposed antenna is suitable for WBAN applications.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This research was partially supported by the MSIP (Ministry of Science, ICT and Future Planning), Korea, under the ITRC (Information Technology Research Center) support program (NIPA-2014-H0301-14-1017) supervised by the NIPA (National IT Industry Promotion Agency).

References

T. Zasowski, F. Althaus, M. Stager, A. Wittneben, and G. Troster, “UWB for noninvasive wireless body area networks: channel measurements and results,” in Proceedings of the IEEE Conference on Ultra Wideband Systems and Technologies (UWBST '03), pp. 285–289, November 2003.

P. S. Hall and Y. Hao, Antennas and Propagation for Body-Centric Wireless Communications, Artech House, Norwood, Mass, USA, 2006.

M. U. Rehman, Y. Gao, Z. Wang et al., “Investigation of on-body bluetooth transmission,” IET Microwaves, Antennas and Propagation, vol. 4, no. 7, Article ID IMAPCH000004000007000871000001, pp. 871–880, 2010.

C.-P. Deng, X.-Y. Liu, Z.-K. Zhang, and M. M. Tentzeris, “A miniascape-like triple-band monopole antenna for WBAN applications,” IEEE Antennas and Wireless Propagation Letters, vol. 11, pp. 1330–1333, 2012.

Z. N. Chen, A. Cai, T. S. P. See, X. Qing, and M. Y. W. Chia, “Small planar UWB antennas in proximity of the human head,” IEEE Transactions on Microwave Theory and Techniques, vol. 54, no. 4, pp. 1846–1856, 2006.

P. S. Hall, Y. Hao, Y. I. Nechayev et al., “Antennas and propagation for on-body communication systems,” IEEE Antennas and Propagation Magazine, vol. 49, no. 3, pp. 41–58, 2007.

N. Haga, K. Saito, M. Takahashi, and K. Ito, “Characteristics of cavity slot antenna for body-area networks,” IEEE Transactions on Antennas and Propagation, vol. 57, no. 4, pp. 837–843, 2009.

J. Tak, K. Kwon, S. Kim, and J. Choi, “Dual-band on-body repeater antenna for in-on-on WBAN applications,” International Journal of Antennas and Propagation, vol. 2013, Article ID 107251, 12 pages, 2013.

A. A. Serra, P. Nepa, G. Manara, and P. S. Hall, “Diversity for body area networks,” in Proceedings of the 29th URSI General Assembly, pp. 1–4, Chicago, Ill, USA, August 2008.

L. Akhoondzadeh-Asl, I. Khan, and P. S. Hall, “Polarisation diversity performance for on-body communication applications,” IET Microwaves, Antennas & Propagation, vol. 5, no. 2, pp. 232–236, 2011.

T. Aoyagi, M. Kim, J.-I. Takada, K. Hamaguchi, and R. Kohno, “Numerical simulations for wearable BAN propagation channel during various human movements,” IEICE Transactions on Communications, vol. 94, no. 9, pp. 2496–2500, 2011.

S. L. Cotton and W. G. Scanlon, “A statistical analysis of indoor multipath fading for a narrowband wireless body area network,” in Proceedings of the IEEE International Symposium on Personal, Indoor and Mobile Radio Communications, pp. 1–5, IEEE, 2006.

S. Zhang, B. K. Lau, A. Sunesson, and S. He, “Closely-packed UWB MIMO/diversity antenna with different patterns and polarizations for USB dongle applications,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 9, pp. 4372–4380, 2012.

J. Lee, S. Hong, and J. Choi, “Design of an ultra-wideband mimo antenna for PDA applications,” Microwave and Optical Technology Letters, vol. 52, no. 10, pp. 2165–2170, 2010.

J.-F. Li, Q.-X. Chu, and T.-G. Huang, “A compact wideband MIMO antenna with two novel bent slits,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 2, pp. 482–489, 2012.

M. S. Sharawi, A. B. Numan, M. U. Khan, and D. N. Aloi, “A dual-element dual-band MIMO antenna system with enhanced isolation for mobile terminals,” IEEE Antennas and Wireless Propagation Letters, vol. 11, pp. 1006–1009, 2012.

K. Wang, R. A. M. Mauermayer, and T. F. Eibert, “Compact two-element printed monopole array with partially extended ground plane,” IEEE Antennas and Wireless Propagation Letters, vol. 13, pp. 138–140, 2014.

Y.-X. Guo, M. Y. W. Chia, and Z. N. Chen, “Miniature built-in multiband antennas for mobile handsets,” IEEE Transactions on Antennas and Propagation, vol. 52, no. 8, pp. 1936–1944, 2004.

D. L. Means and W. Kwok, “Evaluating compliance with FCC guidelines for human exposure to radiofrequency electromagnetic fields,” Supplement C (Edition 01-01) to OET Bulletin 65 (Edition 97-01), Federal Communications Commission Office of Engineering & Technology, 2001.

Ansys High Frequency Structure Simulator (HFSS), ver.14, Ansys Corporation

M. Ayatollahi, Q. Rao, and D. Wang, “A compact, high isolation and wide bandwidth antenna array for long term evolution wireless devices,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 10, pp. 4960–4963, 2012.

J.-H. Lim, Z.-J. Jin, C.-W. Song, and T.-Y. Yun, “Simultaneous frequency and isolation reconfigurable MIMO PIFA using pin diodes,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 12, pp. 5939–5946, 2012.

S.-Y. Lee, W.-B. Seo, K. Kwon, and J.-H. Choi, “The study on implementation of a semi-solid flat phantom with equivalent electrical properties to whole human body at MICS and ISM band,” The Journal of Korean Institute of Electromagnetic Engineering and Science, vol. 23, no. 1, pp. 101–107, 2012.

IEEE, “IEEE standard for safety levels with respect to human exposure to radio frequency electromagnetic fields, 3 KHz to 300 GHz,” IEEE Standard C95, IEEE, 1999.

M. Patel and J. Wang, “Applications, challenges, and prospective in emerging body area networking technologies,” IEEE Wireless Communications, vol. 17, no. 1, pp. 80–88, 2010.

J.-F. Li, Q.-X. Chu, and T.-G. Huang, “A compact wideband MIMO antenna with two novel bent slits,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 2, pp. 482–489, 2012.