International Journal of Antennas and Propagation
Volume 2016 (2016), Article ID 4743207, 8 pages
http://dx.doi.org/10.1155/2016/4743207

Research Article

Low-Profile Repeater Antenna with Parasitic Elements for On-On-Off WBAN Applications

Do-Gu Kang, Jinpil Tak, and Jaehoon Choi

Department of Electronics and Communications Engineering, Hanyang University, 222 Wangsimni-ro, Seongdong-gu, Seoul 133-791, Republic of Korea

Received 23 October 2015; Revised 28 December 2015; Accepted 11 January 2016

Academic Editor: Muhammad Ramlee Kamarudin

Copyright © 2016 Do-Gu Kang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A low-profile repeater antenna with parasitic elements for on-on-off WBAN applications is proposed. The proposed antenna consists of a planar inverted-F antenna (PIFA), two parasitic elements, and a ground plane with a slot. Due to the slot, the impedance matching of the resonance formed by the PIFA is improved, which makes the proposed antenna operate in the 5.8 GHz industrial, scientific, and medical (ISM) band. To cover the 5.2 GHz wireless local area network (WLAN) band, a dual resonance characteristic is realized by the slot and the two parasitic elements. The first coupling between the PIFA and the slot not only makes the slot operate as a resonator, but also forms secondary coupling between the slot and the two parasitic elements. The two parasitic elements operate as an additional resonator due to secondary coupling. The antenna has the enhanced near surface radiation in the 5.8 GHz ISM band due to addition of the slot and radiation toward off-body direction in the 5.2 GHz WLAN band. In order to evaluate antenna performance considering the human body effect, the antenna characteristics on a human equivalent phantom are analyzed.

1. Introduction

In recent years, wireless body area network (WBAN) systems, communication systems transmitting or receiving a considerable amount of information near the human body, have been studied for various applications including medical, healthcare, automotive, and military services [1–3]. The antenna for WBAN systems should meet specific requirements, such as low-profile, low specific absorption rate (SAR), and stable performance, because the WBAN devices including the antenna are placed around the human body [4]. By establishing the proper communication link among WBAN devices, the vital signs of patients can be observed and transmitted [5]. In order to monitor the health status of patients, it is necessary to ensure robust on-off body communication between the wearable device (on-body device) and the monitoring device (off-body device) [6]. To improve on-off body communication performance, an on-on-off body repeater antenna suitable for on-on body communication (on-body device to the repeater antenna) and on-off body communication (the repeater antenna to off-body device) is needed. For on-on body communication, the antenna should strongly radiate along the surface direction of the body like a vertical monopole, that is, the monopole mounted vertically with respect to the ground [7, 8]. However, since a vertical monopole has the largest height, it is not appropriate for on-body applications. For on-off body communication, the maximum radiation of the antenna should be in the normal to the surface of the body [9]. To satisfy the previously mentioned features, low-profile repeater antennas for on-on body and on-off body communications are researched [10–12]. These repeater antennas consist of two radiators and two substrates: a half-circular patch (on-on body) and a slot (on-off body) [10], a long stripline (on-on body) and a patch (on-off body) [11], and a circular patch (on-off body) and a T-shaped patch (on-off body) [12]. However, these repeater antennas have the largest height due to the two substrates, which is not suitable for on-body applications. To overcome this problem, the repeater antenna is designed using a single substrate in this paper.

A low-profile repeater antenna with parasitic elements for on-on-off WBAN applications is proposed in this paper. By adding a slot and two parasitic elements, the antenna has a wideband characteristic covering the 5.2 GHz wireless local area network (WLAN) band (5.15 GHz–5.35 GHz) and the 5.8 GHz industrial, scientific, and medical (ISM) band which is defined as 5.725 GHz–5.825 GHz [13–15]. Due to the slot, near surface radiation is enhanced in the 5.8 GHz ISM band for on-on body communication. In the 5.2 GHz WLAN band, the antenna has on-off body radiation characteristics. The antenna performance is investigated by using a human equivalent phantom to include the effect of the human body.

2. Antenna Configuration

The proposed antenna consists of a PIFA, two parasitic elements, and a ground plane with a slot as shown in Figure 1. The PIFA with two parasitic elements is located on an FR4 substrate (, ). The dimension of the substrate is 41 mm × 48 mm × 1 mm. The ground plane with the slot is placed on the bottom of the substrate. The slot is used to improve the impedance matching of the PIFA and operates as a resonator through the electromagnetic coupling between the PIFA and the slot. The two parasitic elements act as an additional resonator due to the secondary coupling between the slot and the two parasitic elements.

(a)

(b)

Figure 1: Configuration of the proposed antenna: (a) top view and (b) bottom view.

Figure 2 shows the simulation set-up of the proposed antenna on the phantom with a dimension of 200 mm × 270 mm × 60 mm. The antenna and the phantom are separated by a distance of 10 mm. To analyze the performance of the antenna on a human body, a phantom of human muscle tissue with electrical properties of and  S/m is used [16].

Figure 2: Simulation set-up of the proposed antenna on the phantom.

3. Operating Principle

Figure 3 shows the simulated reflection coefficients of the proposed antenna in air and on the phantom and those of the antenna without the slot. The proposed antenna has three resonances and a −10 dB reflection coefficient bandwidth of 0.74 GHz (5.12 GHz–5.86 GHz) covering the 5.2 GHz WLAN band and the 5.8 GHz ISM band. The resonance frequency of the antenna without the slot is due to the PIFA element and increases from 5.61 GHz to 5.77 GHz () with improved impedance matching by adding a slot. The reason why the resonance frequency increases due to the slot is because the coupling between the PIFA and the ground plane decreases due to a null field formed on the PIFA by the slot as shown in Figure 4, which decreases the equivalent electrical length of the PIFA. Eventually, the required bandwidth of the 5.8 GHz ISM band is satisfied. The dual resonances ( and ) formed by the slot and two parasitic elements provide enough −10 dB reflection coefficient bandwidth to cover the 5.2 GHz WLAN band. When the reflection coefficients of the proposed antenna with and without the phantom are compared, it is observed that the antenna operates stably over the 5.2 GHz WLAN band and the 5.8 GHz ISM band, regardless of the existence of the phantom. The simulations are performed using HFSS [17].

Figure 3: Simulated reflection coefficients of the proposed antenna in air and on the phantom and those of the antenna without a slot.

Figure 4: Simulated surface current distribution on the ground plane of the proposed antenna at 5.77 GHz.

Figures 4 and 5 illustrate the simulated surface current and electric field distributions of the proposed antenna, respectively. As shown in Figure 4, the PIFA mainly acts as a resonator at  GHz. In Figure 5, the first coupling between the PIFA and the slot not only makes the slot operate as a resonator at  GHz but also generates the secondary coupling between the slot and the two parasitic elements. At  GHz, the two parasitic elements act as a resonator due to the secondary coupling.

(a)

(b)

Figure 5: Simulated electric field distributions on the ground plane of the proposed antenna: (a) 5.18 GHz and (b) 5.4 GHz.

4. Parametric Analysis and Optimization

Figure 6 illustrates the simulated reflection coefficients for various values of width . As the width of the PIFA decreases slightly, the impedance matching of and deteriorates greatly. In contrast, formed by the PIFA remains relatively unchanged. The reason why the reduction of has an impact on and is that the electromagnetic coupling between the PIFA and the slot is affected substantially by the change in width of the PIFA. To achieve the wideband characteristic covering the 5.2 GHz WLAN band and the 5.8 GHz ISM band, is chosen to be 10 mm.

Figure 6: Simulated reflection coefficients for various values of width .

In Figure 7, the simulated reflection coefficients for various values of gap distance are shown. As increases, increases with the degraded impedance matching, which confirms that the resonance at is formed by the two parasitic elements. Because is the gap distance between the two parasitic elements, the length of the two parasitic elements decreases by increasing . In turn, the resonance frequency moves to the higher frequency side. By choosing  mm, the proposed antenna simultaneously satisfies the 5.2 GHz WLAN band and the 5.8 GHz ISM band.

Figure 7: Simulated reflection coefficients for various values of gap distance .

Figure 8 shows the simulated reflection coefficients for various values of length . As decreases, the impedance matching at and deteriorates and the resonance frequency decreases. When is 20 mm, the performance of the antenna is optimized to cover the 5.2 GHz WLAN band and the 5.8 GHz ISM band.

Figure 8: Simulated reflection coefficients for various values of length .

Figure 9 shows the simulated reflection coefficients for various values of distance between the antenna and the phantom. As increases, the impedance matching of mainly deteriorates. When is 10 mm, the wideband characteristic covering the 5.2 GHz WLAN band and the 5.8 GHz ISM band is achieved. Also, regardless of the change in , the −10 dB reflection coefficients bandwidth covers fully the 5.2 GHz WLAN band and the 5.8 GHz ISM band.

Figure 9: Simulated reflection coefficients for various values of distance .

5. Simulated and Measured Results

In Figure 10, the manufactured prototype antenna is shown. In order to analyze the prototype antenna performance considering the human body effect, a manufactured human equivalent phantom [18] is used as shown in Figure 11.

(a)

(b)

Figure 10: Manufactured prototype antenna: (a) top view and (b) bottom view.

Figure 11: Measurement set-up of the prototype antenna on the manufactured phantom.

Figure 12 illustrates the simulated and measured reflection coefficients of the proposed antenna. The simulated reflection coefficient is well matched with the measured one. The manufactured prototype antenna has a wide bandwidth (5.1 GHz–5.86 GHz) that can fully cover the 5.2 GHz WLAN band and the 5.8 GHz ISM band.

Figure 12: Simulated and measured reflection coefficients of the proposed antenna.

Figure 13 shows the simulated and measured radiation patterns of the proposed antenna. The simulated radiation patterns agree well with the measured ones. At 5.18 GHz, the antenna mainly radiates towards the direction which is normal to the phantom surface for on-off body communication. Because the antenna has maximum radiations along the θ = 30° direction in the -plane and the θ = 45° and 330° directions in the -plane at 5.77 GHz, the proposed antenna is suitable for on-on body communication in the 5.8 GHz ISM band. Therefore, the radiation characteristics of the proposed antenna are suitable for on-on-off WBAN repeater application. According to [19], the PIFA generally has maximum radiation towards the direction normal to the PIFA surface, whereas the proposed antenna has maximum radiation towards the surface due to the slot in the ground plane. The measured peak gains are 1.2 dBi and 1.91 dBi at 5.18 GHz and 5.77 GHz, respectively.

(a)

(b)

Figure 13: Simulated and measured radiation patterns of the proposed antenna: (a) 5.18 GHz and (b) 5.77 GHz.

Figure 14 shows the simulated average SAR distributions of the proposed antenna when it is placed on the human equivalent phantom. The SAR value should be lower than 1.6 W/Kg over a 1 g volume of tissue in a partial body [20]. When the input power of 65 mW is applied, the average SAR values are 0.55 W/kg at 5.18 GHz and 0.25 W/kg at 5.77 GHz.

(a)

(b)

Figure 14: Simulated average SAR distributions of the proposed antenna when placed on the human equivalent phantom (input power: 65 mW): (a) 5.18 GHz and (b) 5.77 GHz.

Figure 15 illustrates the simulation set-up of the on-body to on-body communication link. The two proposed antennas are placed on the human equivalent flat phantom with a dimension of 200 mm × 800 mm × 60 mm. A distance between two proposed antennas is 500 mm. Figure 16 illustrates the simulated -parameters of the on-body to on-body communication link. The simulated peak value is −55.6 dB at 5.77 GHz, which is suitable for the on-body to on-body communication link, described in [21].

Figure 15: Simulation set-up of the on-body to on-body communication link.

Figure 16: Simulated -parameters of the on-body to on-body communication link.

In Table 1, the size comparison between previous repeater antennas and the proposed antenna is given. The proposed antenna not only has the thinnest thickness but also occupies the smallest volume among the four repeater antennas in the comparison. Therefore, the proposed antenna is suitable as a low-profile on-body repeater antenna.

Table 1: Size comparison between previous repeater antennas and proposed antenna.

Previous works
Volume occupation
Thickness

[10]
5956.6 mm³
3.15 mm (0.026 @ 2.45 GHz)

[11]
148500 mm³
5.5 mm (0.045 @ 2.45 GHz)

[12]
4320 mm³
3.2 mm (0.026 @ 2.4 GHz)

Proposed antenna
1968 mm³
1 mm (0.017 @ 5.18 GHz)

6. Conclusion

A low-profile PIFA antenna with parasitic elements for on-on-off WBAN repeater applications is proposed in this paper. By using the slot and the parasitic elements, the antenna on the phantom has a wide −10 dB reflection coefficient bandwidth of 0.76 GHz covering the 5.2 GHz WLAN band and the 5.8 GHz ISM band. The near surface radiation of the antenna is enhanced by the slot for the 5.8 GHz ISM band on-on body communication. In addition, the antenna mainly radiates towards the direction normal to the phantom surface at the 5.2 GHz WLAN band. Consequently, the proposed antenna is a promising candidate for on-on-off WBAN applications.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This research was supported by the Korea Ministry of Land, Infrastructure, and Transport. It was also supported by the Korea Agency for Infrastructure Technology Advancement (Project no. 15PTSI-C054118-07).

References

T. Zasowski, F. Althaus, M. Stager, A. Wittneben, and G. Troster, “UWB for noninvasive wireless body area networks: channel measurements and results,” in Proceedings of the IEEE Conference on Ultra Wideband Systems and Technologies (UWBST '03), pp. 285–289, IEEE, November 2003.

P. S. Hall and Y. Hao, Antennas and Propagation for Body-Centric Wireless Communications, Artech House, Norwood, Mass, USA, 2006.

S. Kim, K. Kwon, and J. Choi, “Design of a miniaturized high-isolation diversity antenna for wearable WBAN applications,” Journal of Electromagnetic Engineering and Science, vol. 13, no. 1, pp. 28–33, 2013.

N. Haga, K. Saito, M. Takahashi, and K. Ito, “Characteristics of cavity slot antenna for body-area networks,” IEEE Transactions on Antennas and Propagation, vol. 57, no. 4, pp. 837–843, 2009.

C.-H. Kang, S.-J. Wu, and J.-H. Tarng, “A novel folded UWB antenna for wireless body area network,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 2, pp. 1139–1142, 2012.

C.-H. Lin, Z. Li, K. Ito, M. Takahashi, and K. Saito, “Dual-mode antenna for on-/off-body communications (10 MHz/2.45 GHz),” Electronics Letters, vol. 48, no. 22, pp. 1383–1385, 2012.

C. A. Balanis, Antenna Theory: Analysis and Design, chapter 1, Wiley-Interscience, New York, NY, USA, 3rd edition, 2005.

P. S. Hall, Y. Hao, Y. I. Nechayev et al., “Antennas and propagation for on-body communication systems,” IEEE Antennas and Propagation Magazine, vol. 49, no. 3, pp. 41–58, 2007.

K. Kwon, J. Ha, S. Lee, and J. Choi, “Design of a dual-band on-body antenna for a wireless body area network repeater system,” International Journal of Antennas and Propagation, vol. 2012, Article ID 350797, 5 pages, 2012.

Y. Hong, J. Tak, and J. Choi, “Dual-band dual-mode patch antenna for on-on-off WBAN applications,” Electronics Letters, vol. 50, no. 25, pp. 1895–1896, 2014.

H. J. Lee, K. L. Ford, and R. J. Langley, “Switchable on/off-body communication at 2.45 GHz using textile microstrip patch antenna on stripline,” Electronics Letters, vol. 48, no. 5, pp. 254–256, 2012.

J. Tak, S. Woo, J. Kwon, and J. Choi, “Dual-band dual-mode patch antenna for on-/off-body WBAN communications,” IEEE Antennas and Wireless Propagation Letters, no. 99, pp. 1–4, 2015.

B. G. Lee and S. Choi, Broadband Wireless Access and Local Networks: Mobile Wimax and Wifi, Artech House, Norwood, Mass, USA, 2008.

G. Held, Building a Wireless Office, CRC Press, Boca Raton, Fla, USA, 2008.

Cisco, “WLAN radio frequency design considerations,” in Enterprise Mobility 4.1 Design Guide (OL-14435-01), chapter 3, Cisco Systems, San Jose, Calif, USA, 2007.

D. L. Means and W. Kwok, Evaluating Compliance with FCC Guidelines for Human Exposure to Radiofrequency Electromagnetic Fields, Supplement C (Edition 01-01) to OET Bulletin 65 (Edition 97-01), Federal Communications Commission Office of Engineering & Technology, 2001.

Ansys High Frequency Structure Simulator (HFSS), ver.15, Ansys Corporation, http://www.ansys.com/Products/Electronics/ANSYS-HFSS

S. Lee, W. Seo, K. Kwon, and J. Choi, “The study on implementation of a semi-solid flat phantom with equivalent electrical properties to whole human body at MICS and ISM band,” The Journal of Korean Institute of Electromagnetic Engineering and Science, vol. 23, no. 1, pp. 101–107, 2012.

Z. Zhang, Antenna Design for Mobile Devices, chapter 4, John Wiley & Sons, Singapore, 2011.

IEEE, “IEEE standard for safety levels with respect to human exposure to radio frequency electromagnetic fields, 3 KHz to 300 GHz,” IEEE Standard C 95, IEEE, 1999.

J. Tak, S. Lee, and J. Choi, “All-textile higher order mode circular patch antenna for on-body to on-body communications,” IET Microwaves, Antennas & Propagation, vol. 9, no. 6, pp. 576–584, 2015.