International Journal of Antennas and Propagation
Volume 2016 (2016), Article ID 5830527, 14 pages
http://dx.doi.org/10.1155/2016/5830527

Research Article

Design of Symmetrical Beam Triple-Aperture Waveguide Antenna for Primary Feed of Reflector

Kanawat Nuangwongsa and Chuwong Phongcharoenpanich

Faculty of Engineering, King Mongkut’s Institute of Technology Ladkrabang, Bangkok 10520, Thailand

Received 20 January 2016; Accepted 10 April 2016

Academic Editor: Shih Yuan Chen

Copyright © 2016 Kanawat Nuangwongsa and Chuwong Phongcharoenpanich. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This research presents a triple-aperture waveguide antenna as the primary feed of parabolic reflectors. The proposed antenna is able to rectify the asymmetry and also achieve a symmetrical unidirectional beam through the application of two parasitic coupling apertures. The design of the antenna is that of a rectangular waveguide (radiating aperture) vertically jointed to the two coupling apertures of the same measurement widthwise (i.e., one stacked on top and the other underneath) to achieve the symmetrical beam. The rectangular waveguide is 97.60 mm and 46.80 mm in width () and height (), respectively, to propagate the WLAN frequency band of 2.412–2.484 GHz. Simulations were carried out to determine the optimal antenna parameters and an antenna prototype was subsequently fabricated and tested. The simulated beamwidths in the - and -planes at  dB were equally 67° (i.e., 67° for both the - and -planes) and at  dB also equally 137°, while the measured results at  dB were equally 65° and at  dB equally 135°. The simulation and measured results are thus in good agreement. The simulated and measured antenna gains are, respectively, 8.25 dBi and 9.17 dBi. The findings validate the applicability of the antenna as the prime feed for rotationally symmetric parabolic reflectors.

1. Introduction

In recent decades, the point-to-point communications systems have rapidly advanced and become one of the brightest areas of the communications business [1]. Specifically, the point-to-point links between hosts and clients are required in several wireless systems for communication over long distances, such as the microwave radio relay link, long length Wi-Fi, wireless WAN/LAN link, satellite communication, and home satellite television [2].

Horn antennas, which are a principal component of the point-to-point communication systems, were first developed nearly a century ago for military and scientific purposes but were not widely adopted until World War II. Typical horn antennas are of either rectangular or conical structures. The rectangular structure can further be divided into the -plane, -plane, and pyramidal horn structures [3, 4].

To enhance the performance of the point-to-point communication requires a narrow-beam antenna with high gain [5], and one possible method to achieve the narrow beam is through a parabolic metal reflector antenna. In addition, the feeding point of the parabolic reflector should be located at the reflector focus to generate the narrow beam (i.e., pencil beam). In [6], the authors reviewed publications on the point-to-point communication and documented that the generation of the pencil beam requires an antenna with symmetrical beam as the primary feed.

The radiation pattern of a parabolic reflector (secondary antenna) typically corresponds to that of the primary feed antenna. In other words, the asymmetric radiation pattern from the primary feed contributes to the asymmetrical incidence of the secondary antenna and vice versa [7]. In fact, it is difficult to obtain the symmetrical radiation pattern at the primary feed due to the beamwidth asymmetry between the - and -planes [8].

To address the asymmetry issue, several antenna structures have been proposed. In [9], a pyramidal horn antenna was utilized to obtain the symmetric radiation patterns in the - and -planes; nevertheless, the antenna structure was large with the width, height, and length of , , and . In [10], the author experimented with a diagonal horn antenna with very low cross-polarization and axially symmetrical field distribution at the horn aperture; however, the antenna has a large aperture size of and in width and height.

Generally, the corrugated horn consisting of parallel slots or grooves can create a hybrid-mode pattern in the aperture which straightens out the electric field and reduces diffractions from the edge [11, 12]. In [13–18], the conical corrugated horn antennas were utilized to generate the symmetrical beam with high gain and low side lobe level. The antennas structures are however complicated. On the contrary, for the typical rectangular corrugated horn antenna structure, the slots or grooves are located inside both vertical and horizontal planes around the rectangular aperture area. The rectangular corrugated horn [19] was experimented and it was reported that this antenna type failed to generate the symmetrical beam despite its relatively large size. In [20], the authors proposed a flared rectangular horn corrugated along the -plane flaring walls to achieve the symmetry in the - and -planes; nevertheless, the antenna construction is very complicated and the antenna aperture is considerably large. For the rectangular waveguide aperture perpendicular to the direction, the diffracted wave is almost in -plane and it is minimal in -plane. The parasitic coupling apertures are proposed to locate in -plane (vertical plane) outside the radiating aperture. One aperture is stacked on top (top section) and the other is stacked underneath (bottom section) the radiating rectangular waveguide (middle section). This makes the proposed triple-aperture waveguide antenna less complicated and easy fabricated compared to the typical corrugated horn antenna.

This research has thus proposed a triple-aperture waveguide antenna as the primary feed of a parabolic reflector. The antenna can achieve a symmetrical unidirectional beam through the use of two parasitic coupling apertures. In fact, an independent use of an open-ended rectangular waveguide as the primary feed of a parabolic reflector is rare due to the asymmetry and low directivity [21]. The proposed antenna design consists of a rectangular radiating waveguide jointed to the two coupling apertures, one stacked on top and the other underneath. In this research, the rectangular waveguide is 97.60 mm and 46.80 mm in width () and height (), respectively, to propagate the WLAN frequency band of 2.412–2.484 GHz. The proposed antenna is for point-to-point communication and thus requires a front feed parabolic reflector [5, 22, 23] and is appropriate for WLAN applications along IEEE 802.11b/g/n. Moreover, the technique of coupling apertures can be applied to other frequency ranges by adjusting the antenna electrical size.

The organization of the research is as follows: Section 1 is the introduction. Section 2 describes the design of the proposed triple-aperture waveguide antenna, while Section 3 discusses the parametric study and the simulation results of the antenna. Section 4 deals with the antenna prototype and the experimental results. The concluding remarks are provided in Section 5.

2. The Antenna Design

The structure of the triple-aperture waveguide antenna, as the name implies, is made up of one radiating section and two coupling sections. The configuration of the proposed antenna is illustrated in Figure 1, in which the radiating aperture is the middle section with the width and height of and , while the two coupling apertures refer to those on top and underneath the radiating aperture, with the width, height, and length of , , and . The width ( mm) and height ( mm) of the rectangular waveguide (the middle section) are fixed, where the relationship between its width () and length () is that of , to achieve the center frequency of 2.45 GHz in the dominant mode () [24–28].

Figure 1: Geometry of the proposed antenna.

Inside the middle section (the radiating section) is mounted a linear electric probe at a distance of from its closed end () along the direction with the axial -axis propagation. The height of linear electric probe () is . The inclusion of both parasitic coupling apertures on the vertical plane at the open end is to reduce the diffraction field and achieve symmetry.

In this research, the initial length of the radiating section () is because the standing wave pattern is repeated every . Therefore, the distance between the maximum and minimum electric field distributions is and the entire length of the radiating section () is approximately so as to realize the maximum electric field density at the aperture, as shown in Figure 2. The length of the rectangular radiating waveguide () is thus 152.40 mm [29].

Figure 2: The simulated electric field distribution of the radiating section of the proposed antenna.

3. Parametric Study and Simulation Results

3.1. The Antenna without Parasitic Coupling Apertures

Under this scenario, simulations were carried out on a waveguide without the parasitic coupling apertures using CST Microwave Studio. The waveguide is of rectangular shape, where the relationship between its width () and length () is that of . In addition, the waveguide is of aluminum material and 2 mm in thickness. Inside the waveguide is an electric probe that is connected to a 50 Ω N-type connector. The width () and length () of the rectangular waveguide are capable of achieving the resonant frequency () at the center frequency of 2.45 GHz. Table 1 tabulates the physical and electrical sizes of the rectangular waveguide (i.e., the antenna without the coupling apertures).

Table 1: Parameters of the antenna without the parasitic coupling apertures.

Parameters
Physical size (mm)
Electrical size

97.60

46.80

152.40

30.00

52.40

Figure 3 illustrates the simulated electric field distribution at the center of the width () side of the antenna without the parasitic coupling apertures at the 2.45 GHz frequency. It is found that the distribution travels in the direction and that the diffraction grows stronger around the edges of the waveguide (the -plane). On the other hand, the diffraction on the -plane is minimal. The -plane phenomenon contributes to the asymmetry between the - and -plane radiations.

Figure 3: The simulated electric field distributions at the center of the width () side of the antenna without parasitic coupling apertures at 2.45 GHz (side view).

Figures 4 and 5, respectively, depict the simulated and gain as well as the input impedance of the antenna without the parasitic coupling apertures. As illustrated in the figures, in the absence of the coupling apertures, the antenna gain (6.70 dBi) is relatively low despite the fairly satisfactory input impedance ( Ω) and  dB.

Figure 4: Simulated and gains relative to frequency of the antenna without parasitic coupling apertures.

Figure 5: Input impedance of the antenna without parasitic coupling apertures.

In Figure 6, the simulated beamwidths at  dB and  dB in the -plane, respectively, are 106° and 270° and in the -plane are 65° and 110°. Since the principle application of the proposed triple-aperture waveguide antenna is the primary feed of a parabolic reflector, this research has thus taken into account the beamwidth at  dB. As illustrated in Figure 6, the radiation patterns of the antenna without the parasitic coupling apertures in the - and -planes are asymmetrical.

(a)

(b)

Figure 6: The simulated radiation patterns of the antenna without parasitic coupling apertures at 2.45 GHz: (a) -plane and (b) -plane.

3.2. The Antenna with Parasitic Coupling Apertures

To rectify the asymmetry, two parasitic coupling apertures are incorporated with the rectangular waveguide whereby one aperture is stacked on top (top section) and the other underneath (bottom section) the radiating waveguide (middle section). To achieve the resonant frequency at the center frequency of 2.45 GHz, this research has utilized the TE₁₀₁ mode to determine the length () and height () of the parasitic coupling apertures [28, 29] while its width () is identical to that of the radiating rectangular waveguide (97.60 mm). Simulations were then carried out using CST Microwave Studio and the optimal simulation results for the waveguide antenna with the parasitic coupling apertures are tabulated in Table 2. The realization of the target resonant frequency is largely subject to and .

Table 2: Parameters of the antenna with the parasitic coupling apertures.

Parameters
Physical size (mm)
Electrical size

97.60

46.80

152.40

30.00

52.40

28.98

50.80

Figure 7 illustrates the simulated electric field distribution of the waveguide antenna with the parasitic coupling apertures at the center of the width () side. It is found that the wave diffraction is reduced with the use of the coupling apertures (the top and bottom shorter sections) in conjunction with the radiating waveguide (the middle section).

Figure 7: The simulated electric field distributions at the center of the width () side of the antenna with parasitic coupling apertures at 2.45 GHz (side view).

3.2.1. Impedance Bandwidth for Various Antenna Parameters

Figure 8 depicts the simulated  dB for various rectangular waveguide lengths () and at the simulated resonates at the center frequency of 2.45 GHz. Figure 9 illustrates the simulated  dB for various electric probe heights () and the results indicate the optimal height of the probe () of . In Figure 10, the simulated for various distances between the probe and the closed end of the radiating waveguide () reveal that the optimal distance that achieves the resonance at the target center frequency is .

Figure 8: Simulated for various waveguide lengths ().

Figure 9: Simulated for various electric probe heights ().

Figure 10: Simulated for various distances between the probe and the closed end of the waveguide ().

Figure 11 illustrates the simulated of the proposed waveguide antenna for various heights () of the coupling aperture, which were varied between and . The results indicate that exerts little influence over and the optimal coupling aperture height () is , at which the beamwidths at  dB and  dB in both the - and -planes are symmetrical. This confirms that the utilization of the coupling apertures contributes to the reduction of the diffraction field at the edges of the radiating waveguide. Figure 12 depicts the simulated for various lengths of the coupling aperture () and the results show that vary considerably with the variation in . The resonant frequency is however achieved at of .

Figure 11: Simulated for various heights of the parasitic coupling apertures ().

Figure 12: Simulated for various lengths of the parasitic coupling apertures ().

3.2.2. Radiation Patterns for Various Heights of the Parasitic Coupling Apertures ()

Figures 13–15, respectively, illustrate the simulated radiation patterns for various heights of the parasitic coupling apertures () in the - and -planes at the lower, center, and upper frequencies of 2.412, 2.45, and 2.484 GHz, where was varied between and . Interestingly, in the -plane, the beamwidths at  dB (HPBW) and  dB for the three frequencies exhibit slight differences. On the other hand, those in the -plane for the aperture heights () between and are noticeably wider than the corresponding beamwidths for the three frequencies in the -plane. For of and , the beamwidths at both  dB and  dB in both planes at the three frequencies are symmetrical. Thus, the coupling aperture height of is selected due to the smallest cross-sectional area with the symmetrical radiation pattern. Table 3 tabulates the beamwidths at  dB (HPBW) and  dB for the three frequencies in the - and -planes for the various heights of the parasitic coupling apertures ().

Table 3: Simulated beamwidths at −3 dB and at −10 dB for various heights of the parasitic coupling apertures () in the - and -planes for the lower, center, and upper frequencies of WLAN.

Aperture heights ()
2.412 GHz
2.45 GHz
2.484 GHz

HPBW
Beamwidth
HPBW
Beamwidth
HPBW
Beamwidth

(−3 dB)
−10 dB
(−3 dB)
−10 dB
(−3 dB)
−10 dB

-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane

104°
67°
200°
124°
208°
66°
202°
124°
105°
64°
202°
124°

78°
66°
196°
130°
74°
64°
196°
130°
72°
63°
128°
196°

67°
67°
137°
137°
67°
67°
137°
137°
66°
66°
138°
138°

69°
69°
144°
142°
69°
69°
142°
142°
69°
69°
142°
142°

70°
71°
154°
148°
70°
70°
154°
148°
71°
70°
152°
148°

(a)

(b)

Figure 13: Simulated radiation patterns for various parasitic coupling aperture heights () at the lower frequency of 2.412 GHz in (a) the -plane and (b) the -plane.

(a)

(b)

Figure 14: Simulated radiation patterns for various parasitic coupling aperture heights () at the center frequency of 2.45 GHz in (a) the -plane and (b) the -plane.

(a)

(b)

Figure 15: Simulated radiation patterns for various parasitic coupling aperture heights () at the upper frequency of 2.484 GHz in (a) the -plane and (b) the -plane.

3.2.3. Radiation Patterns for Various Lengths of the Parasitic Coupling Apertures ()

Figures 16–18, respectively, illustrate the simulated radiation patterns for various lengths of the parasitic coupling apertures () in the - and -planes at the lower, center, and upper frequencies of 2.412, 2.45, and 2.484 GHz, where was varied between and . It is found that at of the symmetry in both planes for the beamwidths at  dB and  dB is achieved. Table 4 tabulates the beamwidths at  dB (HPBW) and  dB for the three frequencies in the - and -planes for the various lengths of the parasitic coupling apertures ().

Table 4: Simulated beamwidths at −3 dB and at −10 dB for various lengths of the parasitic coupling apertures () in the - and -planes for the lower, center, and upper frequencies of WLAN.

Rectangular aperture lengths ()
2.412 GHz
2.45 GHz
2.484 GHz

HPBW
Beamwidth
HPBW
Beamwidth
HPBW
Beamwidth

(−3 dB)
−10 dB
(−3 dB)
−10 dB
(−3 dB)
−10 dB

-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane

65°
69°
210°
142°
65°
68°
206°
142°
65°
68°
202°
140°

66°
68°
158°
138°
65°
67°
148°
138°
65°
67°
146°
136°

67°
67°
137°
137°
67°
67°
137°
137°
66°
66°
138°
138°

71°
68°
138°
136°
70°
67°
138°
134°
70°
66°
138°
132°

75°
68°
138°
134°
74°
67°
140°
134°
73°
67°
140°
132°

(a)

(b)

Figure 16: Simulated radiation patterns for various parasitic coupling aperture lengths () at the lower frequency of 2.412 GHz in (a) the -plane and (b) the -plane.

(a)

(b)

Figure 17: Simulated radiation patterns for various parasitic coupling aperture lengths () at the lower frequency of 2.45 GHz in (a) the -plane and (b) the -plane.

(a)

(b)

Figure 18: Simulated radiation patterns for various parasitic coupling aperture lengths () at the lower frequency of 2.484 GHz in (a) the -plane and (b) the -plane.

Table 5 compares the simulated  dB and  dB beamwidths of the proposed antenna with and without the parasitic couplings apertures at the frequencies of 2.412, 2.45, and 2.484 GHz. Without the coupling apertures, the beamwidths at  dB and  dB in the -plane and those in the -plane for the three frequencies are dissimilar; in other words, the incidence of asymmetry is observed. Nevertheless, with the parasitic coupling apertures on top and underneath the width () side of the radiating rectangular waveguide, the  dB and  dB beamwidths in both planes for the three frequencies become symmetrical.

Table 5: Simulated beamwidths at −3 dB and at −10 dB of the proposed antenna with and without the parasitic coupling apertures at the lower, center, and upper frequencies of WLAN.

Frequency (GHz)
HPBW (−3 dB beamwidth)
−10 dB beamwidth

Without parasitic coupling apertures
With parasitic coupling apertures
Without parasitic coupling apertures
With parasitic coupling apertures

-plane
-plane
-plane
-plane
-plane
-plane
-plane
-plane

2.412
105°
65°
67°
67°
275°
116°
137°
137°

2.450
106°
64°
67°
67°
275°
116°
137°
137°

2.484
108°
63°
66°
66°
276°
116°
138°
138°

Figure 19 depicts the simulated antenna gains for various parasitic coupling aperture heights (). For , the antenna gains are relatively similar for the entire WLAN frequency range. The aperture height () of is thus selected for the smallest cross-sectional area with symmetrical pattern. Figure 20 illustrates the simulated input impedance of the proposed antenna with the coupling apertures. The input impedance () at the center frequency of 2.45 GHz is  Ω.

Figure 19: Simulated antenna gains for various heights of the parasitic coupling apertures ().

Figure 20: Simulated input impedance of the proposed antenna with the parasitic coupling apertures.

When comparing the proposed triple-aperture waveguide antenna with the conventional pyramidal horn antenna, it is obvious that the proposed antenna possesses smaller total antenna length. The length of the probe-fed waveguide must be appropriately designed to achieve the acceptable impedance matching [30]. The total length of the horn antenna is composed of the length of horn aperture and waveguide feeder. However, the radiating aperture and waveguide feeder of the proposed antenna are integrated into single structure. Therefore, the proposed antenna requires smaller total length to achieve the acceptable impedance matching. For instance, the total length of the conventional pyramidal horn antenna is 18.5% larger than that of the proposed antenna structure with the same radiating aperture and antenna gain. In addition, the proposed triple-aperture waveguide antenna has 11-dB lower cross-polarization level than the conventional pyramidal horn antenna with the same antenna size. The reason is that the larger width of the pyramidal horn causes the higher horizontal electric field component.

4. Experimental Results

Figure 21 presents photographs of the prototype of the proposed triple-aperture waveguide antenna. The proposed antenna is operable in the 2.30–2.60 frequency range (12.245%), which also covers the WLAN frequency, for  dB. The antenna prototype was fashioned from aluminum of 2 mm in thickness. The radiation pattern of the prototype antenna is symmetrical with unidirectional pattern, rendering it appropriate for use in the front feeding parabolic reflector in the point-to-point communication.

(a)

(b)

(c)

Figure 21: Photographs of the antenna prototype: (a) perspective view, (b) front view, and (c) side view.

Figure 22 compares the simulated and measured of the waveguide antenna with the parasitic coupling apertures. The simulation and measured results show the operating range of the antenna of 2.28–2.80 GHz and 2.30–2.60 GHz, respectively, indicating their good agreement.

Figure 22: The simulated and measured of the waveguide-dependent triple-aperture antenna.

Figure 23 compares the simulated and measured beamwidths at 2.45 GHz in the - and -planes. Meanwhile, Table 6 tabulates the  dB and  dB beamwidths in both planes for the three frequencies. In Figure 24, the simulation antenna gain in front of the antenna at 0° is compared against the measured gain. The proposed antenna could achieve the maximum gain of 9.17 dBi at the WLAN center frequency.

Table 6: Measured beamwidths at −3 dB and at −10 dB of the proposed antenna with the parasitic coupling apertures in the - and -planes at the lower, center, and upper frequencies of WLAN.

Frequency (GHz)
HPBW (−3 dB beamwidth)
−10 dB beamwidth

-plane
-plane
-plane
-plane

2.412
65°
65°
135°
135°

2.450
65°
65°
135°
135°

2.484
65°
65°
135°
135°

(a)

(b)

Figure 23: The simulated and measured radiation patterns at 2.45 GHz: (a) -plane and (b) -plane.

Figure 24: The simulated and measured antenna gains in front of the antenna (0°).

5. Conclusion

This research has proposed the triple-aperture waveguide antenna as the primary feed of parabolic reflectors. The antenna could rectify the asymmetry and achieve the symmetrical unidirectional beam with the incorporation of two parasitic coupling apertures. The antenna consists of the radiating rectangular waveguide vertically jointed to the two coupling apertures to achieve the symmetrical beam. The rectangular waveguide is 97.60 mm and 46.80 mm in width () and height (), respectively, to propagate the WLAN frequency band of 2.412–2.484 GHz. In this research, the CST Microwave Studio program was deployed in simulation to determine the optimal antenna parameters and an antenna prototype was subsequently fashioned and experimented. The simulated beamwidths in the - and -planes at  dB were equally 67° and at  dB equally 137°, while the measured beamwidths at  dB were equally 65° and at  dB equally 135° in the - and -planes. The simulation and measured results are in good agreement. The simulated and measured antenna gains are, respectively, 8.25 dBi and 9.17 dBi. The findings confirm the applicability of the antenna as the prime feed for rotationally symmetric parabolic reflectors. In addition, the proposed antenna is light, inexpensive, and of low profile.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this paper.

References

P. S. Henry and H. Luo, “WiFi: what's next?” IEEE Communications Magazine, vol. 40, no. 12, pp. 66–72, 2002.

K.-L. Du and M. N. S. Swamy, Wireless Communication System: From RF Subsystems to 4G Enabling Technologies, Cambridge University Press, Cambridge, UK, 2010.

C. A. Balanis, Antenna Theory Analysis and Design, John Wiley & Sons, New York, NY, USA, 1997.

R. S. Elliott, Antenna Theory and Design, John Wiley & Sons, New York, NY, USA, 2003.

R. Gardelli, G. La Cono, and M. Albani, “A low-cost suspended patch antenna for WLAN access points and point-to-point links,” IEEE Antennas and Wireless Propagation Letters, vol. 3, no. 1, pp. 90–93, 2004.

Z. N. Chen, X. Qing, T. S. P. See, and W. K. Toh, “Antennas for WiFi connectivity,” Proceedings of the IEEE, vol. 100, no. 7, pp. 2322–2329, 2012.

V. F. Fusco, Foundations of Antenna Theory and Techniques, Pearson Education, The Queens University of Belfast, 2007.

S. Rao, L. Shafai, and S. Sharma, Handbook of Reflector Antennas and Feed Systems. Volume 3: Applications of Reflectors, Artech House, Norwood, Mass, USA, 2013.

K.-R. Chou, T.-D. Wu, H.-N. Lin, T.-S. Liao, and K.-K. Tiong, “Design and simulation of a C-band pyramidal horn antenna for water-level radar sensors,” Journal of Marine Science and Technology, vol. 23, no. 2, pp. 220–224, 2015.

O. Xu, “Diagonal horn gaussian efficiency enhancement by dielectric loading for submillimeter wave application at 150 GHz,” Progress in Electromagnetics Research, vol. 114, pp. 177–194, 2011.

R. C. Johnson, Antenna Engineering Handbook, Georgia Institute of Technology, Atlanta, Ga, USA; McGraw-Hill, New York, NY, USA, 1993.

P. J. B. Clarricoats and A. D. Olver, Corrugated Horns for Microwave Antenna, vol. 18 of Electromagnetic Waves, Perter Peregrinus, 1984.

M. V. Gohil, B. J. Makwana, and R. B. Ambaliya, “Corrugated horn antennas: a review,” International Journal of Advanced Technology & Engineering Research (IJATER), vol. 4, no. 2, pp. 27–29, 2014.

T. Salimi, A. Maghoul, and A. A. Abbasid, “Design of a compact Gaussian profiled corrugated horn antenna for low sidelobe-level applications,” International Journal of Computer Theory and Engineering, vol. 5, no. 2, pp. 223–226, 2013.

J. E. McKay, D. A. Robertson, P. A. S. Cruickshank et al., “Compact Wideband corrugated feedhorns with ultra-low sidelobes for very high performance antennas and quasi-optical systems,” IEEE Transactions on Antennas and Propagation, vol. 61, no. 4, pp. 1714–1721, 2013.

J. Teniente, R. Gonzalo, C. del Rio et al., “Corrugated horn antenna for low-power testing of the quasioptical transmission lines at TJ-II stellerator,” International Journal of Infrared and Millimeter Waves, vol. 20, no. 10, pp. 1757–1767, 1999.

J. Teniente, R. Gonzalo, and C. del-Río, “Innovative high-gain corrugated horn antenna combining horizontal and vertical corrugations,” IEEE Antennas and Wireless Propagation Letters, vol. 5, no. 1, pp. 380–383, 2006.

J. Teniente, A. Martínez, B. Larumbe, A. Ibáñez, and R. Gonzalo, “Design guidelines of horn antennas that combine horizontal and vertical corrugations for satellite communications,” IEEE Transactions on Antennas and Propagation, vol. 63, no. 4, pp. 1314–1323, 2015.

M. Bersanelli, M. Bensadoun, G. De Amici et al., “Construction technique and performance of a 2 GHz rectangular corrugated horn,” IEEE Transactions on Antennas and Propagation, vol. 40, no. 9, pp. 1107–1109, 1992.

A. I. Zaghloul and T. Anthony, “E-plane flared rectangular corrugated horn for tapered aperture,” in Proceedings of the IEEE International Symposium on Antennas and Propagation and USNC/URSI National Radio Science Meeting (APSURSI '08), pp. 1–4, San Diego, Calif, USA, July 2008.

R. E. Collin, Field Theory of Guided Waves, IEEE Press, Piscastaway, NJ, USA, 2nd edition, 1992.

J.-M. Lee and J.-M. Woo, “Design of array synthesis horn antenna for high power microwave applications,” in Proceedings of the PIERS, Moscow, Russia, August 2012.

R. Jordan and C. T. Abdallah, “Wireless communications and networking: an overview,” IEEE Antennas and Propagation Magazine, vol. 44, no. 1, pp. 185–193, 2002.

K. Saeed, R. D. Pollard, and I. C. Hunter, “Substrate integrated waveguide cavity resonators for complex permittivity characterization of materials,” IEEE Transactions on Microwave Theory and Techniques, vol. 56, no. 10, pp. 2340–2347, 2008.

Y. Li and J. Papapolymerou, “A novel high-Q cavity resonator for reconfigurable WPAN applications at 60 GHz,” in Proceedings of the 39th European Microwave Conference, Rome, Italy, 2009.

S. Adhikari, Y.-J. Ban, and K. Wu, “Magnetically tunable ferrite loaded substrate integrated waveguide cavity resonator,” IEEE Microwave and Wireless Components Letters, vol. 21, no. 3, pp. 139–141, 2011.

D.-A. Srimoon, C. Phongcharoenpanich, and M. Krairiksh, “Probe-fed rectangular ring antenna with a cross-strip for low cross-polarization,” IEEE Transactions on Antennas and Propagation, vol. 54, no. 5, pp. 1586–1591, 2006.

M. Miao and C. Nguyen, “A novel multilayer aperture-coupled cavity resonator for millimeter-wave CMOS RFICs,” IEEE Transactions on Microwave Theory and Techniques, vol. 55, no. 4, pp. 783–787, 2007.

T. Moreno, Microwave Transmission Design Data by Theodore Moreno, 1948.

W. W. S. Lee and E. K. N. Yung, “The input impedance of a coaxial line fed probe in a cylindrical waveguide,” IEEE Transactions on Microwave Theory and Techniques, vol. 42, no. 8, pp. 1468–1473, 1994.