International Journal of Antennas and Propagation
Volume 2016 (2016), Article ID 9674742, 5 pages
http://dx.doi.org/10.1155/2016/9674742

Research Article

High Gain Slot Array with Fabry-Perot Cavity Feeding Circuit

Halim Boutayeb¹ and Mourad Nedil²

¹Ecole Polytechnique de Montréal, 2500 Ch. de Polytechnique, Montréal, QC, Canada H3T 1J4
²Université du Québec en Abitibi-Témiscamingue, Val-d’Or, QC, Canada J9P 1Y3

Received 11 January 2016; Accepted 13 June 2016

Academic Editor: Paolo Burghignoli

Copyright © 2016 Halim Boutayeb and Mourad Nedil. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A new approach for designing slot arrays using a Fabry-Perot cavity for the feeding circuit is presented. The proposed array has simpler and smaller feeding circuit compared to conventional feeding networks that have multiple dividers or combiners. The dividers and combiners are usually sources of losses. In addition, the profile of the proposed array is not limited by the half-wavelength resonance condition that exists for Fabry-Perot resonator antennas based on partially reflecting surfaces. The operating frequency is not sensitive to the profile of the antenna. A small profile can be achieved without the utilization of an artificial magnetic conductor or a substrate with high dielectric constant. To validate the proposed approach, full-wave numerical results are presented at 5.8 GHz showing good impedance matching, a high gain of about 22 dB, and an efficiency of 76%.

1. Introduction

Low-cost single-feed directive antennas are essential to several wireless communication systems, such as satellites, various point-to-point links, and high-speed wireless LANs. Their single-feed system allows increasing the gain with low complexity and less loss compared to feeding networks used in conventional antenna arrays.

Among single-feed directive antennas, Fabry-Perot resonator antennas have attracted significant attention, in the past few years, in microwave and millimeter wave domains. This is because these antennas have a number of interesting properties, such as low profile, low complexity, low loss, high directivity, and conformal deployment capability [1–4]. These types of antennas can be analyzed using different models: ray tracing/ray launching, Electromagnetic Band Gap (EBG) defect, leaky-wave, transmission line, and refractive lens models [5–7].

In a Fabry-Perot resonator antenna, the cavity can be mainly filled with air [8–11], or it can be fully filled with a planar single-layer dielectric slab [12–14]. The latter structure with full dielectric integration poses several design challenges, particularly for high-permittivity substrates, including increased dielectric loss, lowered directivity caused by small-volume antennas, poor surface-wave efficiency, and narrow 3 dB gain bandwidth compared with the air-filled Fabry-Perot resonator antenna. Nevertheless, such an antenna configuration is still considered a promising candidate, due to its smaller volumetric occupation compared with other substrate-lens designs [15]. It also presents a number of other advantages, such as low profile and low cost, mechanical robustness, good integration, and stable fabrication and installation. Fabry-Perot cavity antennas with a very small distance between the planar feed and the partially reflecting surface (PRS) have been reported in [16, 17]. However, the design suffers from a tiny gap between the two closely apprised substrates, and a resonance frequency shift could thus present an ineluctable problem. In [18], a Fabry-Perot resonator cavity antenna made of a high-permittivity substrate and excited by a planar leaky-wave slit has been proposed as an alternative.

Another interesting solution for designing a high gain antenna without a feeding network consists in using a single patch having a rectangular profile and a genetic algorithm optimization to replace the array [19, 20].

In this work, a new technique for designing high gain antenna is proposed. The excitation structure is composed of a Fabry-Perot cavity and the radiators are slots. The proposed array has simpler and smaller feeding circuit compared to conventional feeding networks that have multiple dividers or combiners, which are causing losses. Also, the profile of the array is not limited by the half-wavelength resonance condition that exists for Fabry-Perot resonator antennas based on partially reflecting surfaces. A small profile can be achieved without the utilization of a high-permittivity substrate or an artificial magnetic conductor.

The paper is organized as follows. First, the actual prototype of the antenna is described. Second, full-wave numerical results are presented to validate the design. Finally, concluding remarks are given.

2. Antenna Design

Figure 1 presents the main views of the antenna array that is used to validate the proposed concept. This antenna is made of a parallel plate waveguide excited by a probe connected to coaxial line; cross-slots are on one wall of the parallel plate waveguide and a Fabry-Perot cavity made of metallic wires is used in order to distribute the fields equally in phase and amplitude in the radiating slots disposed in the same column.

(a)

(b)

Figure 1: Slot array excited by using a Fabry-Perot cavity feeding circuit: (a) top view; (b) side view.

The following are the main parameters of the array. is the width of the Fabry-Perot cavity and is the period for the metallic wires. is the distance between two adjacent cross-slots that are on each side of the cavity. is the periodic distance in direction between other adjacent cross-slots. is the period between adjacent cross-slots in direction. and are the positions of short-circuits of the waveguide in and direction, respectively. and are dimensions in plane. is the height of the parallel plate waveguide.

Figure 2 presents in more detail the probe excitation, the position of the cross-slots, and the cross-slots parameters. is the diameter of the wires of the Fabry-Perot cavity. and are the diameter and the height of the probe, respectively. is the length of the slots, is the slot width, and − are the angles of rotation of the slots, and is the shift distance between two rectangular slots that belongs to the same cross-slot.

(a)

(b)

(c)

Figure 2: Details of the proposed antenna: (a) probe excitation; (b) Fabry-Perot cavity and position of cross-slots; (c) cross-slot design details.

controls the resonance of the Fabry-Perot cavity (about half wavelength), whereas plays a role in the cross-polarization discrimination. is about one wavelength distance and is about half wavelength. At the resonance of the Fabry-Perot cavity, cross-slots that are in the same coordinate receive fields with the same phase [5]. The wavelength size of allows for the radiating slots to radiate fields at the same phase when the wave propagates in the direction, such as a traveling wave antenna array. The dimensions of the antenna parameters were obtained using a quasi-Newton optimization algorithm for maximising the gain with good impedance matching.

3. Full-Wave Numerical Results

The proposed antenna was simulated with a full-wave simulator (ANSYS HFSS). The following are the chosen values of the antenna parameters for operating at 5.8 GHz: = 10 mm, = 437 mm, = 400 mm, = 1 mm, = 6 mm, = 4.6 mm, = 20.5 mm, = 54 mm, = 20.5 mm, = 50 mm, = 26.5 mm, = 14 mm, = 41.5 mm, = 25 mm, = 2 mm, = 4 mm, and = 70°.

Figure 3 illustrates the simulated reflection coefficient of the antenna. A matching bandwidth ( < −10 dB) from 5.6 GHz to 6.04 GHz (a fractional bandwidth of 7.6%) is achieved. The simulated broadside gain versus frequency of the antenna is shown in Figure 4 for -polarization and -polarization. A maximum gain of 22 dB is achieved around 5.85 GHz (the radiation efficiency is about 76%). The 3 dB gain bandwidth is about 2.05%. This bandwidth needs to be increased to obtain a broadband high gain antenna. For this, different approach will be discussed later. The maximum cross-polarization gain of the antennas is approximately 45 dB below one of the copolarization values.

Figure 3: Simulated return loss of the antenna array. Bandwidth for < −10 dB is shown.

Figure 4: Simulated -component (copolarization) and -component (cross-polarization) of total gain versus frequency. 3 dB gain bandwidth is shown.

The 3D pattern of the simulated antenna gain at 5.85 GHz is shown in Figure 5, whereas Figures 6 and 7 show the gain patterns at 5.85 GHz of the antenna, in and planes, respectively. In plane, the directivity is due to the travelling wave radiation, whereas in plane, the directivity is due to the Fabry-Perot cavity.

Figure 5: Simulated 3D total gain pattern of the antenna at 5.85 GHz.

Figure 6: Simulated gain in plane at 5.85 GHz.

Figure 7: Simulated gain in plane at 5.85 GHz.

To illustrate further the directivity mechanism, Figure 8 shows the electric current distribution at the surface of the slots. From this figure, it can be seen that the current distribution along plane is similar to the field distribution observed in a PRS of a Fabry-Perot resonator antenna [7].

Figure 8: Electric current distribution at the surface of the slot array at 5.85 GHz.

In planes the field distribution is due to the functionality of the Fabry-Perot cavity with a quasi-uniform distribution. In the plane, the energy is radiated by the slots in the manner of a travelling wave antenna except there is no metallic wall like in usual waveguides. By using different synthesis techniques, the field distribution could be optimized for reducing the side lobes observed in both planes (Figures 6 and 7).

It should be noted that the proposed concept can be used with other types of sources, for example, a substrate integrated waveguide with a transition from a microstrip line, in order to design the antenna with a single layer. Furthermore, the same principles as those used in [21–23] for a nonperiodic PRS or with multiple PRSs could be used for feeding a slot array. These techniques could be used to increase the gain bandwidth and the efficiency of the antenna. Finally, the slots along the direction can be designed using more advanced techniques that are usually used for travelling-wave antennas, such as in [24].

4. Conclusion

A new slot array with a Fabry-Perot cavity feeding circuit has been proposed and analyzed. The proposed concept has been validated with full-wave simulations. This type of antenna can be integrated with other printed and/or lumped passive and active components on the same board and therefore proposes a promising solution for RF/microwave and millimeter wave technologies.

Competing Interests

The authors declare that they have no competing interests.

References

G. von Trentini, “Partially reflecting sheet arrays,” IRE Transactions on Antennas and Propagation, vol. 4, no. 4, pp. 666–671, 1956.

A. P. Feresidis and J. C. Vardaxoglou, “High gain planar antenna using optimised partially reflective surfaces,” IEE Proceedings: Microwaves, Antennas and Propagation, vol. 148, no. 6, pp. 345–350, 2001.

H. Boutayeb, K. Mahdjoubi, A.-C. Tarot, and T. A. Denidni, “Directivity of an antenna embedded inside a Fabry-Perot cavity: analysis and design,” Microwave and Optical Technology Letters, vol. 48, no. 1, pp. 12–17, 2006.

Z.-G. Liu and Y.-X. Guo, “Effect of primary source location on fabry-perot resonator antenna with PEC or PMC ground plate,” Journal of Infrared, Millimeter, and Terahertz Waves, vol. 31, no. 9, pp. 1022–1031, 2010.

H. Boutayeb, “Comparison between two semi-analytical methods for computing the radiation characteristics of a Fabryperot cavity,” Microwave and Optical Technology Letters, vol. 48, no. 8, pp. 1654–1656, 2006.

Z.-G. Liu, “Fabry-perot resonator antenna,” Journal of Infrared, Millimeter, and Terahertz Waves, vol. 31, no. 4, pp. 391–403, 2010.

H. Boutayeb, “Comparison between ray tracing and ray launching semianalytical methods for computing the radiation characteristics of a Fabry-Perot cavity,” Microwave and Optical Technology Letters, vol. 57, no. 1, pp. 13–15, 2015.

H. Ostner, E. Schmidhammer, J. Detlefsen, and D. R. Jackson, “Radiation from dielectric leaky-wave antennas with circular and rectangular apertures,” Electromagnetics, vol. 17, no. 5, pp. 505–535, 1997.

Y. Lee, X. Lu, Y. Hao, S. Yang, J. R. G. Evans, and C. G. Parini, “Low-profile directive millimeter-wave antennas using free-formed three-dimensional (3-D) electromagnetic bandgap structures,” IEEE Transactions on Antennas and Propagation, vol. 57, no. 10, pp. 2893–2903, 2009.

H. Liu, S. Lei, X. Shi, and L. Li, “Study of antenna superstrates using metamaterials for directivity enhancement based on Fabry-Perot resonant cavity,” International Journal of Antennas and Propagation, vol. 2013, Article ID 209741, 10 pages, 2013.

S. A. Hosseini, F. Capolino, and F. De Flaviis, “Gain enhancement of a V-band antenna using a Fabry-Perot cavity with a self-sustained all-metal cap with FSS,” IEEE Transactions on Antennas and Propagation, vol. 63, no. 3, pp. 909–921, 2015.

S. A. Hosseini, F. Capolino, and F. De Flaviis, “A 44 GHz single-Feed Fabry-Pérot Cavity antenna designed and fabricated on quartz,” in Proceedings of the IEEE International Symposium on Antennas and Propagation and USNC/URSI National Radio Science Meeting (APSURSI '11), pp. 1285–1288, Spokane, Wash, USA, July 2011.

T. K. Nguyen and I. Park, “Compact slit antenna incorporated with frequency selective surface,” in Proceedings of the IEEE Global Symposium on Millimeters Waves (GSMM '14), pp. 30–31, Seoul, Republic of Korea, 2014.

S. A. Hosseini, F. Capolino, and F. De Flaviis, “Q-band single-layer planar Fabry-Pérot cavity antenna with single integrated-feed,” Progress In Electromagnetics Research C, vol. 52, pp. 135–144, 2014.

O. M. Haraz, A. R. Sebak, and S. Alshebeili, “Study the effect of using low-cost dielectric lenses with printed log-periodic dipole antennas for millimeter-wave applications,” International Journal of Antennas and Propagation, vol. 2015, Article ID 209430, 7 pages, 2015.

Y. Sun, Z. N. Chen, Y. Zhang, H. Chen, and T. S. P. See, “Subwavelength substrate-integrated Fabry-Pérot cavity antennas using artificial magnetic conductor,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 1, pp. 30–35, 2012.

L. Li, S. Lei, and C.-H. Liang, “Ultra-low profile high-gain Fabry-Perot resonant antennas with fishnet superstrate,” Journal of Electromagnetic Waves and Applications, vol. 26, no. 5-6, pp. 806–816, 2012.

T. K. Nguyen and I. Park, “Design of a substrate-integrated Fabry-Pérot cavity antenna for K-band applications,” International Journal of Antennas and Propagation, vol. 2015, Article ID 373801, 12 pages, 2015.

J. W. Jayasinghe, J. Anguera, D. N. Uduwawala, and A. Andújar, “Nonuniform overlapping method in designing microstrip patch antennas using genetic algorithm optimization,” International Journal of Antennas and Propagation, vol. 2015, Article ID 805820, 8 pages, 2015.

J. W. Jayasinghe, J. Anguera, and D. Uduwawala, “Genetic algorithm optimization of a high-directivity microstrip patch antenna having a rectangular profile,” Radioengineering, vol. 22, no. 3, pp. 700–707, 2013.

H. Boutayeb, T. A. Denidni, and M. Nedil, “Bandwidth widening techniques for directive antennas based on partially reflecting surfaces,” Progress In Electromagnetics Research, vol. 74, pp. 407–419, 2007.

H. Boutayeb, K. Mahdjoubi, and A.-C. Tarot, “Multi-layer crystals of metallic wires: analysis of the transmission coefficient for outside and inside excitation,” Progress in Electromagnetics Research, vol. 59, pp. 267–297, 2006.

H. Boutayeb and T. A. Denidni, “Analysis and design of a high-gain antenna based on metallic crystals,” Journal of Electromagnetic Waves and Applications, vol. 20, no. 5, pp. 599–614, 2006.

H. Boutayeb and K. Wu, “Analysis and design of millimeter-wave circularly polarized substrate integrated travelling-wave antennas,” Progress in Electromagnetics Research C, vol. 49, pp. 67–77, 2014.