International Journal of Antennas and Propagation
Volume 2017 (2017), Article ID 5638170, 1 page
https://doi.org/10.1155/2017/5638170

Corrigendum

Corrigendum to “Cylindrical Three-Dimensional Millimeter-Wave Imaging via Compressive Sensing”

Guoqiang Zhao, Shiyong Li, Bailing Ren, Qingwei Qiu, and Houjun Sun

Beijing Key Laboratory of Millimeter Wave and Terahertz Technology, Beijing Institute of Technology, Beijing 100081, China

Correspondence should be addressed to Shiyong Li; lisy_98@bit.edu.cn

Received 11 January 2017; Accepted 17 January 2017; Published 16 March 2017

Copyright © 2017 Guoqiang Zhao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Cylindrical Three-Dimensional Millimeter-Wave Imaging via Compressive Sensing” [1], an Acknowledgement should be added as follows.

Acknowledgments

The work in this paper was supported by the National Natural Science Foundation of China under Grant no. 61301191.

References

G. Zhao, S. Li, B. Ren, Q. Qiu, and H. Sun, “Cylindrical three-dimensional millimeter-wave imaging via compressive sensing,” International Journal of Antennas and Propagation, vol. 2015, Article ID 218751, 6 pages, 2015.