International Journal of Antennas and Propagation
Volume 2018 (2018), Article ID 2595968, 1 page
https://doi.org/10.1155/2018/2595968

Corrigendum

Corrigendum to “A Compact Frequency Reconfigurable Hybrid DRA for LTE/Wimax Applications”

Sajid Aqeel,¹ M. R. Kamarudin,² Aftab Ahmad Khan,¹ Jawad Saleem,¹ Jamal Nasir,¹ Jalil-ur-Rehman Kazim,¹ and Owais Owais¹

¹Comsats Institute of IT, Abbottabad, Pakistan
²Centre for Electronic Warfare, Information and Cyber (EWIC), Cranfield Defence and Security, Cranfield University, Defence Academy of the United Kingdom, Shrivenham SN6 8LA, UK

Correspondence should be addressed to Sajid Aqeel; sajidaqeel@ciit.net.pk

Received 8 July 2018; Accepted 11 July 2018; Published 9 August 2018

Copyright © 2018 Sajid Aqeel et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Compact Frequency Reconfigurable Hybrid DRA for LTE/Wimax Applications” [1], the Acknowledgments section was added by mistake. Thus, it should be removed.

References

S. Aqeel, M. R. Kamarudin, A. A. Khan et al., “A compact frequency reconfigurable hybrid DRA for LTE/Wimax applications,” International Journal of Antennas and Propagation, vol. 2017, Article ID 3607195, 13 pages, 2017.