International Journal of Biomedical Imaging

Volume 2012 (2012), Article ID 658101, 1 page

doi:10.1155/2012/658101

Erratum

Erratum to “Arterial Spin Labeling (ASL) fMRI: Advantages, Theoretical Constrains and Experimental Challenges in Neurosciences”

Ajna Borogovac and Iris Asllani

Department of Radiology, Columbia University, New York, NY 10032, USA

Received 31 May 2012; Accepted 5 June 2012

Copyright © 2012 Ajna Borogovac and Iris Asllani. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The old title in the original paper was “Arterial Spin Labeling (ASL) fMRI: Advantages, Theoretical Constrains and Experimental Challenges in Neurosciences” and it will be changed to “Arterial Spin Labeling (ASL) fMRI: Advantages, Theoretical Constraints, and Experimental Challenges in Neurosciences.”