International Journal of Biomedical Imaging
Volume 2016 (2016), Article ID 7462014, 17 pages
http://dx.doi.org/10.1155/2016/7462014

Review Article

Insight into the Molecular Imaging of Alzheimer’s Disease

Abishek Arora¹ and Neeta Bhagat²

¹Amity Institute of Biotechnology, Amity University Uttar Pradesh, Noida 201303, India
²Amity Institute of Biotechnology, Amity University Uttar Pradesh, Room No. 312, J3 Block, III Floor, Noida 201303, India

Received 30 September 2015; Accepted 16 December 2015

Academic Editor: Jyh-Cheng Chen

Copyright © 2016 Abishek Arora and Neeta Bhagat. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Alzheimer’s disease is a complex neurodegenerative disease affecting millions of individuals worldwide. Earlier it was diagnosed only via clinical assessments and confirmed by postmortem brain histopathology. The development of validated biomarkers for Alzheimer’s disease has given impetus to improve diagnostics and accelerate the development of new therapies. Functional imaging like positron emission tomography (PET), single photon emission computed tomography (SPECT), functional magnetic resonance imaging (fMRI), and proton magnetic resonance spectroscopy provides a means of detecting and characterising the regional changes in brain blood flow, metabolism, and receptor binding sites that are associated with Alzheimer’s disease. Multimodal neuroimaging techniques have indicated changes in brain structure and metabolic activity, and an array of neurochemical variations that are associated with neurodegenerative diseases. Radiotracer-based PET and SPECT potentially provide sensitive, accurate methods for the early detection of disease. This paper presents a review of neuroimaging modalities like PET, SPECT, and selected imaging biomarkers/tracers used for the early diagnosis of AD. Neuroimaging with such biomarkers and tracers could achieve a much higher diagnostic accuracy for AD and related disorders in the future.

1. Introduction

A range of syndromes result in the destruction and loss of cells of the nervous system giving rise to various insidious but lethal neuropathies like Parkinsonism, Alzheimer’s disease, Dementias, and Multiple Sclerosis. Such conditions are encompassed as neurodegenerative disorders [1]. The manifestation of such syndromes results in the degeneration of neurons, which ultimately culminates in the irreversible loss of neural function in the affected region of the brain [2, 3]. Neurodegenerative diseases induce characteristic impairments in the brain of the affected individual. These help in the characterisation and identification of specific neuropathies [4].

Advancements in the fields of clinical neuroscience have helped us in developing a deeper understanding of the induction as well as progression of neurodegenerative diseases [5]. The aggregation of misfolded proteins in various regions of the brain has been implicated in a majority of such neuropathies [6]. Despite various advancements in diagnostic techniques and the detailed study of molecules and subcellular process underlying such conditions, the neurological disorders are not well understood.

Conventionally, neurodegenerative disorders and allied syndromes were conclusively characterised at a late stage or via postmortem analysis [7]. The use of noninvasive techniques in medicine over the previous decade is popular owing to their ease of execution and increased patient well-being [8]. Molecular imaging has provided an alternative noninvasive tool for the diagnosis of neurological syndromes with high specificity in comparison to previous modalities [9]. The key advantage of molecular imaging modalities is due to its ability to elucidate sophisticated biological phenomenon at the cellular and molecular level, linking investigations to specific pathologies [10]. Also, molecular imaging makes it possible to provide information about changes before the pathological manifestation, which aids in the early diagnosis of neurological syndromes thereby allowing the timely implementation of appropriate therapeutic strategies [11].

There are various imaging modalities like magnetic resonance imaging (MRI) and Computerised Tomography (CT); however PET and SPECT are latest molecular imaging techniques that are extensively used in the diagnosis of neurological disorders [9, 12]. The molecular imaging procedure involves an imaging device and an imaging agent, or probe.

A variety of molecular probes are used to visualize the cellular activity and chemical processes involved in metabolism, oxygen distribution, or blood flow. Radiotracer atom or isotopes are also used for imaging the body. The imaging agent is introduced into the body, it accumulates at the target site, and its distribution is scanned, thus providing information about the changes taking place in the tissues and organs [13]. Commonly probes are used in the range of pico- to femtomoles per gram.

In the past decade, PET and SPECT were used to elucidate the neurochemical changes such as the role of neurotransmitters including dopamine, serotonin, and acetylcholine in neurodegenerative disorders. Recent technological advancements have enabled the use of these two techniques to probe a wide variety of intra- and extracellular proteins with impaired function and expression related to brain diseases. These advancements have enabled PET and SPECT to have applications from neurochemical imaging to molecular imaging, thereby elucidating various molecular pathophysiological processes of brain diseases.

The complete mechanism of neurodegenerative conditions has not yet been fully elucidated. Intense research in this field has identified as many as 500 novel molecular targets [14]. Novel molecular imaging agents like small molecules peptides, hormones, antibodies, aptamers, affibodies, transporter substrate nanoparticles, drugs, and oligonucleotides are used for the localization of such targets [15]. The use of novel compounds in PET and SPECT methods helps in diagnosing and understanding the pathophysiology involved in specific molecular changes that occur during the early stages of neurodegenerative disorders. In the present review, the applications of two imaging modalities, namely PET and SPECT, have been discussed in the molecular imaging of AD.

2. Pathophysiology and Biomarkers of Alzheimer Disease (AD)

Alzheimer’s disease is an age-dependent neurodegenerative disorder that involves multiple molecular mechanisms. AD manifests as significant cognitive deficits, behavioural changes, sleep disorders, and loss of functional autonomy. The number of patients suffering from AD is growing rapidly worldwide. AD represents the foremost cause of Dementia and has become a major public health issue.

AD is a complex disorder which has many different pathophysiological features like impairment of cognitive domains, a characteristic pathological cortical and hippocampal atrophy, histological feature of senile plaques comprising of amyloid deposits and neurofibrillary tangles consisting of intraneuronal tau fibrillary tangles, and a resultant decrease in neurons. It is also accompanied by biochemical changes like abnormalities of cholesterol metabolism, inflammation, oxidative damage, and lysosomal dysfunction. Clinical diagnosis of AD remains difficult in initial stages. Current methods for diagnosing AD involve a detailed history and neuropsychological testing to establish the presence of Dementia. Other investigations must then be conducted to distinguish AD from other forms of Dementias such as Vascular Dementia (VaD), Frontotemporal Dementia (FTD), and Lewy Body Disease (LBD) [16, 17].

In AD, it is currently not possible to directly measure the number of remaining cortical neurons in vivo and, therefore, alternative approaches are required. Clinical assessments in AD using scales to measure cognitive impairment, disability, quality of life, or global disease severity are tarnished by symptomatic effects of therapy and are unable to differentiate this effect from disease-modification, at least in the short term. There is a dire need of AD biomarkers for both an early and accurate diagnosis and prediction of disease progression. Many candidate biomarkers for disease progression in AD have also been studied.

Several proteins like total tau (t-tau) and phosphorylated tau (p-tau) are “AD Signatures” which show marked increase in the cerebrospinal fluid (CSF). Other protein markers associated with AD are Aβ42, resistin, and thrombospondin-1 [18]. Mitochondrial dysfunction with degeneration of mitochondria in neurons [19], inflammatory mechanisms, oxidative stress [20], vascular homeostasis, altered lipid metabolism [21], and antioxidant defence system are some of the targets used for the diagnosis of AD. CSF proteome of AD patients shows altered levels of α-1-antitrypsin, α-1b glycoprotein, APOA-I, APOE, retinol binding protein, vitamin D-binding protein, prostaglandin H2 D isomerase, and transthyretin (TTR) [22–27]. CSF biomarkers of inflammation that showed increased levels in AD are TNF-α [28], monocyte chemotactic protein-1 [29], interferon γ-inducible protein 10, IL-8 [30], IL-6 [31], transforming growth factor-β (TGFβ) [32], and vascular endothelial growth factor (VEGF) [31].

Several evidences have documented that cholesterol metabolism plays a role in AD [33]. Total serum cholesterol may be a marker of AD because high concentration of serum cholesterol is involved in tau phosphorylation and is caused due to the dysfunction of protein kinase C (PKC). The PKC function is involved in memory processes in animal models [34] and appears altered in red blood cells and lymphocytes of AD patients [35]. By inhibiting GSK3β, PKC reduces tau phosphorylation and neurofibrillary tangles formation [36] making it a potential target for drugs and the most promising marker in AD diagnosis. As many as 98 different proteins involved in oxidation reduction [37], glycolysis [38], transport [38], metabolic processes [16], protein folding [39], the response to unfolded proteins [40], and cell proliferation [40] have been reported to be associated with AD [41]. These proteins showed quantitative differences in AD and 56 of them are cytoplasmic, 28 mitochondrial, 20 nuclear, and 16 cytosolic proteins. Finally, three of them are synaptic proteins (synaptosomal-associated protein-25 (SNAP-25), synaptotagmin, and syntaxin-binding protein) which present altered expression or modification [42]. A decrease in the number of neurons, formation of amyloid plaques, and the generation of neurofibrillary tangles, which results in neuronal dysfunction, act as hallmarks of AD. Such recognition of CSF biological markers for AD gives an accurate “molecular” diagnosis and subsequent follow-up of the disease.

Biochemical biomarkers like arachidonic acid (AA) and docosahexaenoic acid (DHA), an omega-6 and omega-3 polyunsaturated fatty acid (PUFA), respectively, are very important constituents of phospholipids in cell membranes and contribute extensively to cell signalling in the brain. The CNS response to injury and to the onset (and progression) of neurodegeneration involves the release of free DHA and AA along with the synthesis of stereospecific docosanoid derivatives and prostanoids, respectively [43, 44]. Phospholipases, for example, PLA2, contribute to the conversion of AA into inflammatory molecules such as prostaglandin E2 (PGE2) by the cyclooxygenase (COX) 1 and 2 enzymes [45].

Protein biomarkers in the (CSF) such as a reduced amyloid or an elevated tau concentration have been used to diagnose early AD [38]. Lumbar puncture is an invasive procedure and may not be practically favourable for conducting large-scale studies on AD. Noninvasive neuroimaging methods such as positron emission tomography (PET) to measure amyloid in the brain or magnetic resonance imaging (MRI) to measure atrophy of medial temporal structures have also proved useful [46, 47].

However, PET is expensive and not readily available in many places, while brain atrophy, as measured by MRI, requires specialized facilities and is less specific to AD. The use of blood-based biomarkers is therefore an attractive alternative given the easy accessibility of blood [48]. Yet, there is a complex relationship between the different biomarkers. Putative biomarkers which are used in the diagnosis and prognosis of AD are positron emission tomography (PET) neuroimaging of β-amyloid (Aβ) protein deposition and magnetic resonance imaging (MRI) of hippocampal volume and other brain structures [49].

With the advent of high throughput techniques including transcriptome analysis and next generation sequencing methods, protein markers present in CSF and blood (i.e., plasma and serum) can be quantified accurately for diagnosis of AD. Extracellular plaques (Aβ42) and intracellular neurofibrillary tangles (tau) can be identified histopathologically and morphologically [50]. Aβ42, the main constituent of amyloid precursor protein (APP), is generated by sequential actions of β-secretase and γ-secretase on APP through an amyloidogenic pathway and there are several truncated Aβ isoforms in the brain [51].

Protein biomarkers involved in pathogenesis of AD are also identified by two-dimensional gel electrophoresis (2-DE) and matrix-assisted laser desorption/ionization combined with time of flight MS (MALDI-TOF-MS) and liquid chromatography combined with electrospray ionization (LC-ESIMS). In recent years, many new diagnostic tools like surface enhanced laser desorption ionization (SELDI-TOF-MS) which provides a high throughput protein expression profile analysis have evolved [52]. Isotope tagged relative and absolute quantitation (iTRAQ) [53], tandem mass tag (TMT) [54], isotope coded affinity tag (ICAT) [55], and isotope coded protein label (ICPL) [56] have been used for identification and quantification of proteins. Antibody array is another high throughput method to analyse multiple biomarkers [57].

The main tests for biomarkers classes used in the diagnosis and prognosis of AD are positron emission tomography (PET) neuroimaging of Aβ protein deposition and magnetic resonance imaging (MRI) of hippocampal volume and other brain structures [58]. These brain-imaging techniques are often used for studying the neuropathological processes and morphological and functional changes occurring in AD. Neuroimaging methods like PET and SPECT are helpful not only in the early diagnosis but also in differentiating AD from other neurodegenerative diseases.

3. Positron Emission Tomography (PET) in AD

Positron emission tomography (PET) is a nuclear medicine based molecular imaging technique that utilises a range of specially developed radiopharmaceuticals, which function as tracers. The technique is used to detect the rate of uptake of such tracers in specifically targeted cells throughout the body of the patient. The technique relies on the quantification of the radiotracer’s decay, during which a positron is emitted, thereby generating a photon [7].

PET/CT thus functions as an in vivo imaging procedure that enables the study of systemic pathophysiological phenomenon, especially concerning neurodegenerative syndromes under its applications in the field of neurology [59]. The PET scanner detects pairs of energetic γ-rays that are indirectly emitted by the decay of the radiotracer that is administered to the patient. The radiotracer enters the brain via the blood brain barrier when administered intravenously. The radiotracer then accumulates in specific regions of the brain in accordance with the physiological condition that is being scrutinised [60]. The positrons emitted from the radiotracer transverse a few millimetres through the tissues in the vicinity of the neural vasculature transporting the radiotracer. This is accompanied with a rapid loss of kinetic energy of the traversing positrons. Further, the positrons travel slowly and interact with the electrons present in the neuronal cells to generate two 511 keV γ-rays travelling at an angle of approximately 180° to each other. This phenomenon is termed as annihilation [61]. The radiotracer utilised for the purpose of PET consists of a radiolabelled biologically active molecule that emits positrons at the time of undergoing decay [62]. The γ emissions of this radiotracer, followed by annihilation, are detected by the PET scanner, which generates three-dimensional views of the tracer localization within the patient’s body (Figure 1).

(a)

(b)

(c)

Figure 1: Schematic representation of (a) PET/CT scanner along with operational depiction of individual, (b) CT Module, and (c) PET Module of the scanning apparatus.

The production of radiotracers utilised in PET requires the setting up of a specialised centre equipped with a significantly large cyclotron [63]. The production centre may be outsourced or on site depending on the half-life of the radiotracer being synthesised. Radiotracers that are used for PET based studies having extensive utilisation are labelled with ¹⁸F ( minutes), ¹¹C ( minutes), or ¹⁵O ( minutes) [64]. The latter two must be produced at an on-site cyclotron owing to their short half-life. Generator based synthesis of radiotracers may also be done for labelling an active molecule with ⁶⁸Ga ( minutes) and ⁸²Rb ( minutes) [7].

Modern versions of the scanner are a hybrid between PET and CT technologies. The integration of functional imaging with structural imaging modalities plays a major role in attenuating the lacunae of anatomical acuity in the case of a simple PET based analysis. The PET/CT scanner is thus capable of generating anatomically augmented functional images of the brain [9]. By virtue of its high performance nature, PET has a wide variety of applications in the field of oncology, neurology, and cardiology [9]. The imaging modality has an extremely high sensitivity of nearly 10⁻¹¹ to 10⁻¹² mol/L and has an infinite depth of penetration [64]. The images obtained after the scan consist of PET and CT fusion images that show anatomical features along with a qualitative and quantitative distribution of the radiotracer in the brain. CT is helpful in the process of attenuation correction for accurate quantification and greater result reproducibility [65].

For the general process of image acquisition, the patient is asked to lie still in supine position on the scanner bed. The first step in image acquisition involves the initial action of performing a scout. Based on the protocol selected following the scout, a CT scan is performed which is followed by a PET scan of the defined region [66]. A brain PET/CT is performed for duration of 10 minutes without the administration of any IV contrast, which may be otherwise used in other investigations. An important pharmacological criterion that is applied in brain PET/CT based studies is that of binding potential (BP). The BP evaluates the density of neuronal receptors occupied by the radiotracer. Such an understanding aids in the characterisation of deviations in receptor localization which may further be pertinent for a particular neurological syndrome [67].

4. Single Photon Emission Computed Tomography (SPECT) in AD

Single Photon Emission Computed Tomography (SPECT) is a nuclear medicine modality that is related to PET in terms of utilising a radioactive tracer in order to elucidate the uptake of the radiotracer in the patient. However, unlike PET, the radiotracers used in SPECT directly emit γ-rays [68].

The radiotracers used in SPECT emit a single γ-ray at the time of each decay, which is directly detected by the γ camera of the SPECT scanner. The γ camera is rotated around the patient in order to record the emitted projections [7]. Depending on the configuration of the machine, it may consist of either a single headed or a double headed γ camera.

The γ camera is fitted with collimators in order to guide the emissions towards the γ cameras of the scanner [69]. The collimator that is used is composed of lead or tungsten, which rejects any emissions that are not propagated at right angles to the reference axis as specified at the time of the scan. This is important to detect the point of origin of the emission for accurate representation in the output image [70]. The collimator used in brain SPECT imaging is a low-energy high-resolution (LEHR) collimator.

The radiotracers that are extensively used in the SPECT based investigation of neural function are labelled with ¹²³I ( hours) and ( hours). The active molecule may also be labelled with ⁶⁷Ga ( days) and ¹¹¹In ( days) depending on the nature of analysis of the active molecule [71]. The principle of BP as discussed in PET/CT also applies to SPECT based molecular imaging. In lieu of the longer half-life of radiotracers utilised in SPECT, there is no requirement for an on-site cyclotron and a specialised radiochemistry facility. Such radiotracers are produced at a commercial scale. Owing to this, the lower expense of radiotracer generation for SPECT in comparison to PET/CT allows a wider and easily accessible utilisation of the scanning modality by patients. Brain SPECT image acquisition is performed by making the patient lie on the scanner bed in supine position. Appropriate positioning of the scanner bed and the γ cameras are done such that the collimators are in close proximity to the patient’s head, while also allowing ease of movement for the γ cameras. The images obtained after the scan consist of SPECT images that show computed differential anatomical features along with a quantitative distribution of the radiotracer in the brain (Figure 2).

(a)

(b)

Figure 2: Schematic representation of (a) SPECT scanner along with depiction of (b) gamma camera placement and detection of emissions from a reference point at the time of a brain SPECT scan.

5. Radiotracers Used in PET and SPECT

A radiotracer used for neurological diagnostics must have optimal uptake, specific binding, and efficient clearance of the radiotracer [72]. The radiotracer being designed for diagnostics purposes must be of nontoxic and lipophilic nature [73]. It should have a low molecular weight so that it may easily transverse the blood brain barrier in order to enter the brain [74]. The radiotracer should be designed to reduce the incidences of nonspecific binding, should not get metabolised, and should be rapidly cleared from the blood [75]. The binding to its target must be specific and reversible in nature. The uptake of the radiotracer by the brain may further depend on a range of factors like permeability of the blood brain barrier, cerebral blood flow, plasma concentration of the radiotracer, and the noninteracting fractions of the radiotracer in the plasma and brain [74]. Furthermore, the selectivity of a particular neurological molecular imaging radiotracer is dependent on the concentration of vacant interaction site (Table 1) [73].

Table 1: List of radiotracers designed for the PET as well as SPECT based analysis of AD pathophysiology.

Radiotracer

Emission
Modality
Specificity
Condition

¹¹C-PIB
20 minutes
Positron
PET
Aβ
AD

¹¹C-AZD2184
20 minutes
Positron
PET
Aβ
AD

¹⁸F-FDDNP
110 minutes
Positron
PET
Aβ and Tau
AD

¹⁸F-AV-45
110 minutes
Positron
PET
Aβ
AD

¹⁸F-BAY94-9172
110 minutes
Positron
PET
Aβ
AD

¹⁸F-GE067
110 minutes
Positron
PET
Aβ
AD

¹⁸F-AZD4694
110 minutes
Positron
PET
Aβ
AD

¹¹C-BF-227
20 minutes
Positron
PET
Aβ
AD

¹¹C-SB-13
20 minutes
Positron
PET
Aβ
AD

¹²³I-SB-13
13.2 hours
Gamma
SPECT
Aβ
AD

¹⁸F-THK523
110 minutes
Positron
PET
Tau
Tauopathies

¹⁸F-THK5105
110 minutes
Positron
PET
Tau
Tauopathies

¹⁸F-THK5107
110 minutes
Positron
PET
Tau
Tauopathies

¹⁸F-T807
110 minutes
Positron
PET
Tau
Tauopathies

¹⁸F-T808
110 minutes
Positron
PET
Tau
Tauopathies

¹¹C-PBB3
20 minutes
Positron
PET
Tau
Tauopathies

¹¹C-PK11195
20 minutes
Positron
PET
PBR-TSPO
Neuroinflammation

¹²³I-PK11195
13.2 hours
Gamma
SPECT
PBR-TSPO
Neuroinflammation

¹¹C-DPA713
20 minutes
Positron
PET
PBR-TSPO
Neuroinflammation

¹¹C-CLINME
20 minutes
Positron
PET
PBR-TSPO
Neuroinflammation

¹⁸F-DPA714
110 minutes
Positron
PET
PBR-TSPO
Neuroinflammation

¹⁸F-PBR111
110 minutes
Positron
PET
PBR-TSPO
Neuroinflammation

¹²³I-CLINDE
13.2 hours
Gamma
SPECT
PBR-TSPO
Neuroinflammation

¹¹C-DED
20 minutes
Positron
PET
I₂BS
Neuroinflammation

¹¹C-FTIMD
20 minutes
Positron
PET
I₂BS
Neuroinflammation

¹¹C-AA
20 minutes
Positron
PET
AA analogue
Lipid metabolism

¹¹C-DHA
20 minutes
Positron
PET
DHA analogue
Lipid metabolism

¹¹C-Enzastaurin
20 minutes
Positron
PET
PKC
Neuroprotection

¹¹C-MeDAS
20 minutes
Positron
PET
Myelin
Neuroprotection

¹²⁴I-pQHNIG70
4.18 days
Positron
PET
HSF-1/HSP-70
Neuroprotection

¹¹C-Verapamil
20 minutes
Positron
PET
P-gp
Neuroprotection

6. Radiotracers for Amyloid Imaging

The development of suitable radiotracers for the imaging of Aβ aggregates has been taking place over the previous decades [76]. Out of the various categories of the amyloid radiotracers undergoing trial at different stages, small molecule based radiotracers have been the most successful [77] (Figure 3). In the recent years, radiotracers having high specificity have been generated using Aβ antibodies and peptide fragments that have been labelled with a suitable radioactive moiety [78]. The further development of radiotracers based on stilbene, thioflavin [79], and acridine [80] aims to revolutionize Aβ molecular imaging strategies. Aβ specific neuroimaging radiotracers are of essential importance in the diagnosis of AD [81]. This may be attributed to the presence of moderate to severe aggregates of Aβ in the form of amyloid plaques in all patients of AD [82]. The amyloid plaques are known to develop several years prior to the actual manifestation of cognitive decline and amnesia that are characteristic for AD [83].

Figure 3: Structural representation of radiotracers for amyloid imaging.

6.1. ¹¹C-PIB

[¹¹C]-2-[4-(Methylamino)phenyl]-1,3-benzothiazol-6-ol, also known as Pittsburgh Compound B, is the first PET based radiotracer that has been developed for specifically binding with fibrillar amyloid plaques [84] (Figure 3). Initial studies of the radiotracer in mice showed rapid uptake in the brain upon intravenous administration. The radiotracer also showed rapid clearance from healthy neuronal tissue while showing retention in cortex of AD brain [85]. The thioflavin-T derived lipophilic structural moiety of ¹¹C-PIB is able to enter the brain via the blood brain barrier and displays sufficient specificity and high affinity to Aβ aggregates found in senile plaques [86]. In studies of diseased versus healthy controls, the localization of ¹¹C-PIB after administration was found to be greater in the temporal, parietal, and frontal lobes. These findings were verified based on postmortem analysis of the same patient cohort. The areas where ¹¹C-PIB accumulated in diseased patients corresponded with areas known to have higher Aβ concentrations [87]. The utilisation of ¹¹C-PIB is helpful in the differential diagnosis of AD and other types of Dementias. Comparative studies have shown that patients with Frontotemporal Dementia show normal ¹¹C-PIB uptake in a majority of clinical cases [81]. Patients that have been diagnosed with mild cognitive impairment show increased ¹¹C-PIB uptake, which is comparable to the levels of ¹¹C-PIB that have been observed in AD patients [88]. Likewise, a significant number of patients diagnosed with DLB also demonstrate an increase uptake of ¹¹C-PIB [89]. ¹¹C has a half-life of 20 minutes, limiting the utilisation of this radiotracer only in facilities that are equipped with an on-site cyclotron [90].

6.2. ¹¹C-AZD2184

¹¹C-AZD2184, [¹¹C]-2-[6-(methylamino)pyridin-3-yl]-1,3-benzothiazol-6-ol, is another analogue of ¹¹C-PIB, which has been synthesized by replacing the 2-phenyl moiety with a pyridine (Figure 3). The radiotracer binds to Aβ aggregates in amyloid plaques with considerable affinity and demonstrates decreased levels of nonspecific binding [91]. The structure of ¹¹C-AZD2184 has a lower lipophilicity as compared to ¹¹C-PIB [92]. Such a property further decreases the chances of nonspecific interactions of the radiotracer in the white matter of the brain in contrast to ¹¹C-PIB [93].

6.3. ¹⁸F-FDDNP

2-[1-[6-[2-[¹⁸F]Fluoranylethyl(methyl)amino]naphthalen-2-yl]ethylidene]propanedinitrile (¹⁸F-FDDNP) is a PET imaging radiotracer developed for the visualization of senile plaques in AD [94] (Figure 3). The radiotracer is a small molecule that has affinity to amyloid plaques as well as neurofibrillary tangles in patients diagnosed with AD [95]. ¹⁸F-FDDNP is the first known radiotracer used in molecular imaging that has the ability to bind in vivo with amyloid plaques and NFTs, thereby making it possible to localize such aggregates in a noninvasive manner [96]. The first human brain PET images using ¹⁸F-FDDNP were obtained in an 82-year-old female who had been clinically diagnosed with AD [97]. The examination showed relative radiotracer clearance in different regions of the brain. However, the key findings were that the radiotracer had an affinity towards regions of significant Aβ as well as hyperphosphorylated tau aggregations, which were confirmed following an autopsy of the patient [98]. Another group indicated that ¹⁸F-FDDNP upon administration to AD patients in comparison to healthy controls has a higher residence time in the regions of the hippocampus, frontal lobe, parietal lobe, temporal lobe, and the occipital lobe [95]. Based on such findings it may be stated that the clearance time of ¹⁸F-FDDNP in various regions of the brain may be inversely correlated with the degree of cognitive impairment in patients that have been clinically diagnosed with AD [99].

6.4. ¹⁸F-AV-45 or ¹⁸F-Florbetapir

4-[(E)-2-[6-[2-[2-(2-[¹⁸F]Fluoranylethoxy)ethoxy]ethoxy]pyridin-3-yl]ethenyl]-N-methylaniline (¹⁸F-AV-45 or ¹⁸F-Florbetapir) is the first ¹⁸F labelled PET radiotracer that has been approved by the US Food and Drug Association for the clinical evaluation of patients suspected with AD and other allied syndromes of cognitive deterioration [100] (Figure 3).

¹⁸F-Florbetapir applications have been able to significantly replicate imaging findings that have been examined using ¹¹C-PIB as an amyloid specific radiotracer [101, 102]. Additionally, an analysis of PET images that were obtained using ¹⁸F-Florbetapir in Phase 3 clinical trials has shown a significant correlation with Aβ distributions based on postmortem follow-ups of the trial patients [103].

6.5. ¹⁸F-BAY94-9172 or ¹⁸F-Florbetaben

4-[(E)-2-[4-[2-[2-(2-[¹⁸F]Fluoranylethoxy)ethoxy]ethoxy]phenyl]ethenyl]-N-methylaniline (¹⁸F-BAY94-9172 or ¹⁸F-Florbetaben) is an ¹⁸F labelled radiotracer used in PET based examinations of Aβ aggregates in AD and other forms of Dementia [104] (Figure 3). The cortical distribution of ¹⁸F-Florbetaben is considerably similar to that of ¹¹C-PIB [105]. In a study that has attempted to differentiate AD from Dementia with Lewy Bodies (DLB) based on ¹⁸F-Florbetaben localization, the radiotracer demonstrated a lower overall retention in DLB patients in spite of a similar involvement of Aβ in the pathophysiology of DLB [83]. ¹⁸F-Florbetaben thus may play a substantial role in the differential diagnosis of Frontotemporal Dementia (FTD), Vascular Dementia (VaD), and Parkinson’s disease (PD), in lieu of the absence of abnormal Aβ aggregations in such syndromes [89].

6.6. ¹⁸F-GE067 or ¹⁸F-Flutemetamol

2-[3-[¹⁸F]Fluoranyl-4-(methylamino)phenyl]-1,3-benzothiazol-6-ol (¹⁸F-Flutemetamol) is an amyloid radiotracer that is a structural analogue of ¹¹C-PIB [91] (Figure 3). Initial studies in human subjects have shown that ¹⁸F-Flutemetamol has similar neuronal uptake as well as affinity to Aβ aggregates as seen in studies using ¹¹C-PIB [106, 107]. ¹⁸F labelled Aβ specific radiotracers however showcase a higher nonspecific uptake in the white matter, which may also be visualized in the PET images of healthy controls [108]. The key disadvantage of such a class of amyloid imaging radiotracers is that they generate greater levels of nonspecific background noise in comparison to ¹¹C-PIB [87].

6.7. ¹⁸F-AZD4694

2-[2-[¹⁸F]Fluoro-6-(methylamino)-3-pyridinyl]-1-benzofuran-5-ol (¹⁸F-AZD4694) has been developed so as to overcome the limitations of using ¹¹C-AZD2184 as an amyloid specific radiotracer. On the basis of chemical characterisation, ¹⁸F-AZD4694 is an aromatic pyridinylbenzofuran that has undergone fluorosubstitution [74] (Figure 3). The uptake and distribution of ¹⁸F-AZD4694 are comparable with that of ¹¹C-PIB [109]. By virtue of the shared structural similarity with ¹¹C-PIB, ¹⁸F-AZD4694 thereby demonstrates similar pharmacodynamics as well as pharmacokinetics as ¹¹C-PIB while at the same time overcoming the shortcomings of using ¹¹C labelled radiotracers [110].

6.8. ¹¹C-BF-227

[¹¹C]2-(2-[2-Dimethylaminothiazol-5-yl]ethenyl)-6-(2-[fluoro]ethoxy)benzoxazole (¹¹C-BF-227) is an optimized benzoazide derivative that is being analysed as a diagnostic radiotracer for β-amyloid aggregates [111] (Figure 3). ¹¹C-BF-227 has demonstrated a good binding affinity for Aβ accompanied with efficient neurological uptake [112]. ¹¹C-BF-227 localize in the frontal, temporal, lateral temporal, temporooccipital, anterior and posterior cingulate cortices, striatum, and the occipital areas of the brain where amyloid aggregates occur [111].

6.9. ¹¹C-SB-13 or ¹²³I-SB-13

[¹¹C] 4-N-Methylamino-4-hydroxystilbene (¹¹C-SB-13) is a stilbene-based derivative (Figure 3) that has selective affinity towards Aβ aggregates that are as previously mentioned observed as a constituent part of senile plaques in AD [113]. The radiotracer has similar in vivo properties as demonstrated by ¹¹C-PIB, used for the diagnosis as well as prognosis of AD [114]. In human trials of the radiotracer initially conducted, ¹¹C-SB-13 demonstrated significant levels of localization in known regions of Aβ accumulation as a part of AD pathogenesis [115]. This was possible due to efficient transport of the radiotracer across the blood brain barrier [116]. Rather, studies have indicated that the relative cortical uptake of ¹¹C-SB-13 is greater than that of ¹¹C-PIB [117]. ¹¹C-SB-13 is more likely to interact with fibrillar Aβ; however further studies are required to establish the same [115]. Furthermore, the shape as well as dimensions of amyloid plaques determines the degree of penetration of the radiotracer [118]. A variant of the same radiotracer has been labelled with ¹²³I. ¹²³I-SB-13 has demonstrated effective SPECT applications in human trials; however its use warrants further analysis [119].

7. Radiotracers for Tau Imaging

The successful molecular imaging of Aβ using various developed radiotracers has given impetus to the development of tau specific radiotracers. The accumulation of hyperphosphorylated tau gives rise to neurofibrillary tangles (NFTs) [120]. However, such an aggregation occurs intracellularly among the nerve terminals [121]. This is in complete contrast to the extracellular formation of amyloid plaques [122]. In the NFTs, tau exists in the form of paired helical filaments (PHFs) [123]. The designing of tau specific radiotracers thus targets the PHF tau aggregates [124]. By virtue of the intracellular localization of PHF tau in affected neurons, it is difficult to generate tau specific radiotracers without certain affinity for Aβ [125]. Such an affinity towards tau may be incorporated in the radiotracer by introducing large hydrophilic moieties that may prevent interactions with Aβ [126]. A lot of initial work was focused on benzothiazole, pyrimidazole, and imadazothiazole derivatives as tau specific radiotracers [127]. Further onwards, efforts were made to characterise the use of oxindole, styryl benzimidazole, and thiohydantoin based tau radiotracers [128].

7.1. ¹⁸F-THK523

2-(4-Aminophenyl)-6-(2-([¹⁸F]fluoroethoxy))quinoline (¹⁸F-THK523) is a quinolone-derived radiotracer (Figure 4) used in PET based examinations of PHF tau aggregates. Studies in the tau transgenic mouse model have shown that the radiotracer is able to enter the brain via the blood brain barrier and is able to bind with PHF tau aggregates [129]. Initial in vivo studies in humans have indicated greater levels of interaction of the radiotracer with PHF tau in comparison to Aβ [130].

Figure 4: Structural representation of radiotracers for tau imaging.

In vivo examinations have demonstrated greater retention of the radiotracer in the orbitofrontal, parietal, hippocampal, lateral, and temporal regions in patients diagnosed with AD [131]. Furthermore, ¹⁸F-THK523 retention is not found to be associated with that of amyloid radiotracers of the likes of ¹¹C-PIB [132]. Therefore, ¹⁸F-THK523 has selective affinity to tau aggregates. However, the localization of ¹⁸F-THK523 is lower in the grey matter in comparison to the white matter; this makes it difficult to examine such findings only based on visual inputs [131].

7.2. ¹⁸F-THK5105 and ¹⁸F-THK5117

6-[(3-¹⁸F-Fluoro-2-hydroxy)propoxy]-2-(4-dimethylaminophenyl)quinoline (¹⁸F-THK5105) and 6-[(3-¹⁸F-fluoro-2-hydroxy)propoxy]-2-(4-methylaminophenyl)quinoline (¹⁸F-THK5117) are 2-arylquinoline derivatives that have been labelled with ¹⁸F for PET based tau imaging [133] (Figure 4). These have been developed by further streamlining the binding and pharmacokinetics of ¹⁸F-THK523 [134].

Autoradiography based studies using ¹⁸F-THK5105 and ¹⁸F-THK5117 has shown their localization in the grey matter of the temporal lobe which correlates with the localization of PHF tau aggregates in the form of NFTs [133]. Human examinations using ¹⁸F-THK5105 via PET imaging have shown retention of the radiotracer in the lateral as well as mesial temporal lobes, which are otherwise known to have higher concentrations of tau aggregates in pathological cases [135]. Furthermore, the degree of retention of the radiotracer is significantly associated with the severity of Dementia and the degree of neuronal atrophy [135]. ¹⁸F-THK5117 is still a newer addition to the class of tau specific radiotracers and is being thoroughly analysed at various levels of function [136].

7.3. ¹⁸F-T807 and ¹⁸F-T808

The 7-(6-[¹⁸F]Fluoropyridin-3-yl)-5H-pyrido(4,3-b)indole (¹⁸F-T807) and 2-[4-(2-[¹⁸F]fluoranylethyl)piperidin-1-yl]pyrimido[1,2-a]benzimidazole (¹⁸F-T808) radiotracers were introduced after extensive autoradiography based studies of more than 900 compounds [137] (Figure 4). These radiotracers are mainly derivatives of benzimidazole that have a high affinity to PHF tau [138]. ¹⁸F-T807 PET based studies in AD patients have shown cortical localization of the radiotracer that is consistent with the known distribution of PHF tau in the brain [139]. Such findings are significantly coherent with postmortem features that correlate PHF tau distribution with the degree of disease severity [140]. Studies using ¹⁸F-T808 have shown faster pharmacokinetics as well as delayed defluorination of the radiotracer in comparison to ¹⁸F-T807 [141].

7.4. ¹¹C-PBB3

The most recent member joining the ranks of other PHF tau specific radiotracers is 2-((1E,3E)-4-(6-(¹¹C-methylamino)pyridin-3-yl)buta-1,3-dienyl)benzo[d]thiazol-6-ol (¹¹C-PBB3), a phenyl/pyridinyl-butadienyl-benzothiazoles/benzothiazolium derivative (Figure 4). ¹¹C-PBB3 demonstrated better visualization of tau aggregates in comparison to its predecessor ¹¹C-PBB2 in mice models of AD, by virtue of which further work was carried out using ¹¹C-PBB3 [142]. A human study using ¹¹C-PBB3 demonstrated high affinity of the radiotracer to PHF tau aggregates [143]. However, significant localization of ¹¹C-PBB3 was also noted in the venous sinuses of the subjects taking part in the same study [142]. This study also indicated that ¹¹C-PBB3 has a low affinity to Aβ as the subjects involved in the study were also imaged with ¹¹C-PIB. The localization patterns of both the radiotracers were consistently different such that individual correlations could be made with the known regions of aggregation of Aβ and PHF tau [143].

8. Radiotracers for Neuroinflammation

Neuroinflammation is a well-documented ageing associated phenomenon [144]. Neuroinflammation is a key player in the progression of neurodegenerative conditions and is known to occur during the early stages of onset of such syndromes [145]. The inflammation may be correlated with the activation of microglial cells in response to neuronal degradation in conditions including AD [146]. The molecular imaging of neuroinflammation may thus contribute to the characterisation of AD while also taking into consideration specific markers of AD pathophysiology [147].

8.1. ¹¹C-PK11195 and ¹²³I-Iodo-PK11195

The most successful radiotracer for PET based neuroinflammation studies is [¹¹C]N-butan-2-yl-1-(2-chlorophenyl)-N-methylisoquinoline-3-carboxamide (¹¹C-PK11195) (Figure 5). ¹¹C-PK11195 specifically binds to the 18 kDa translocator protein (TSPO) also known as the peripheral benzodiazepine receptor (PBR) [148]. In normal physiological conditions, TSPO has only a basal expression in the microglial cells [149]. However, when the microglia undergo inflammatory activation, PBR-TSPO expression is upregulated, thereby functioning as a putative biomarker for neuroinflammation [150].

Figure 5: Structural representation of radiotracers for neuroinflammation and neuroprotection imaging.

As per an initial study conducted to look into the clinical validation of ¹¹C-PK11195 as a radiotracer for neuroinflammation, there was notably high localization of the radiotracer in the cingulate cortex, amygdala, fusiform gyrus, and the temporoparietal cortex of AD patients in contrast to similarly aged healthy controls [151]. ¹²³I-Iodo-PK11195 is a modification of ¹¹C-PK11195 for use in SPECT based imaging protocols. It functions as a high affinity ligand for PBR-TSPO [152]. As per a SPECT based study that was undertaken using this radiotracer, an increased retention of the radiotracer was observed in the temporal, parietal, occipital, and frontal lobes, wherein such findings were in tandem with AD induced neuroinflammation [153]. However, the use of PK11195 is limited for neuroinflammation imaging due to its increased incidences of nonspecific binding and lower neuronal bioavailability [154].

8.2. ¹¹C-DPA713 and ¹¹C-CLINME

[¹¹C](N,N-Diethyl-2-[2-(4-methoxyphenyl)-5,7-dimethylpyrazolo[1,5-a]pyrimidin-3-yl]acetamide) (¹¹C-DPA713) and [¹¹C](2-[6-chloro-2-(4-iodophenyl)-imidazo[1,2-α]pyridine-3-yl]-N-ethyl-N-methyl-acetamide) (¹¹C-CLINME) are new radiotracers that have been developed for the imaging of mild neuroinflammation [155] (Figure 5). Both the radiotracers have demonstrated a lower likelihood of nonspecific neuronal interactions and are sensitive to even low levels of TSPO expression due to their high affinity to the receptor [156]. ¹¹C-DPA713 and ¹¹C-CLINME were further optimized by labelling the ligands with ¹⁸F, thereby enhancing the half-life of the radiotracer. ¹⁸F-DPA714 is the successor of ¹¹C-DPA713, showcasing better affinity and pharmacokinetics than PK11195 [157]. ¹⁸F-PBR111 is the fluorinated analogue of ¹¹C-CLINME sharing properties that are inherent of the original radiotracer [158]. Such findings have found their basis in neuroinflammation studies that have been carried out in animal models of glioma and Multiple Sclerosis [159, 160]. ¹²³I-CLINDE is another SPECT based radiotracer that has shown promising results in the preclinical examination of neuroinflammation [161]. The radiotracer retention appreciably correlates with the variations in TSPO that are observed at the onset and progression of neuroinflammation [162]. Another prominent feature of neuroinflammation and neurodegeneration is the phenomenon of astrocytosis [163]. Astrocytosis results in increased expression of imidazoline 2 binding sites (I₂BS) [164]. Radiotracers that have been developed for the imaging of I₂BS include ¹¹C-DED and ¹¹C-FTIMD. Current studies using ¹¹C-DED in AD patients have shown increased radiotracer localization throughout the brain [165]. It has also been suggested that astrocytosis is a key feature of AD that functions as an intermediate between amyloidosis and neurodegeneration [166]. In case of ¹¹C-FTIMD, animal model based studies have demonstrated that ¹¹C-FTIMD has a high affinity to I₂BS and has the ability to quantitate I₂BS expression [167].

9. Other Molecular Radiotracers for Molecular Imaging

9.1. ¹¹C-Enzastaurin

PKC as an enzyme is one of the most important initial elements involved in the induction of the previously mentioned α-secretases, ADAM-10 and 17, which are involved in neuroprotection. A potent and selective protein kinase C (PKC) inhibitor, Enzastaurin (LY317615), was recently labelled with ¹¹C, thereby generating the radiotracer (3-(1-[¹¹C]methyl-1H-indol-3-yl)-4-[1-[1-(2-pyridinylmethyl)-4-piperidinyl]-1H-indol-3-yl]-1H-pyrrole-2,5-dione), for PET imaging applications [168, 169] (Figure 5).

9.2. ¹¹C-MeDAS

[¹¹C]N-Methyl-4,4-diaminostilbene (¹¹C-MeDAS) is a radiotracer, which can be used as a myelin-imaging marker for the early monitoring of myelin degeneration in vivo, and is a potentially useful development for the investigation of neurodegeneration [170] (Figure 5).

9.3. ¹²⁴I-pQHNIG70

Impaired function of heat shock proteins HSP70, HSF1, and cathepsin proteins may facilitate the progression of neurodegeneration. The ¹²⁴I-pQHNIG70 PET reporter system for imaging specific gene includes an inducible HSP70 promoter which can be used to image and monitor the activation of the heat shock factor 1 (HSF1)/HSP70 transcription factor on exposure to drug treatment 17-allylaminodemethoxygeldanamycin [171].

9.4. ¹¹C-Verapamil

P-glycoprotein (P-gp) is a known BBB active efflux transporter involved in neuroprotection. Onset of PD and AD is characterised by its dysfunction [172]. The radiolabelled P-gp substrate 2-(3,4-dimethoxyphenyl)-5-[2-(3,4-dimethoxyphenyl)ethyl-[¹¹C]methyl-amino]-2-propan-2-yl-pentanenitrile (¹¹C-Verapamil) is used in PET studies of AD [173] (Figure 5).

9.5. ¹¹C-AA and ¹¹C-DHA

¹¹C-Arachidonic acid (¹¹C-AA) is incorporated in brain regions with neuroinflammation [174]. ¹¹C-AA could thus be a novel marker of activated microglia to be used in studies of neurodegenerative disorders. Radiolabelled ¹¹C-docosahexaenoic acid (¹¹C-DHA) tracer is used to map the regional and global human brain DHA metabolism in relation to health and disease [175]. The quantitative imaging of DHA incorporation from plasma into the brain can be used as an in vivo biomarker of brain DHA metabolism and neurotransmission [176]. This may help to monitor DHA consumption in vivo in patients with disorders such as depression and AD, in which DHA supplementation may be helpful [177].

10. Conclusion

PET and SPECT with molecular probes are useful and reliable tools for clinical molecular neuroimaging. The methods have enabled in vivo assessment of molecular pathogenesis of CNS disorders. With these techniques, Aβ deposition, tau fibrillar mass, neurotransmitter turnover, and metabolism can be monitored accurately to better understand the pathological mechanisms underlying CNS diseases. In comparison to PET, SPECT is a more practical routine procedure for the detection of AD. But sensitivity, spatial resolution, and quantification of SPECT are limited. Improvements in a variety of molecular probes available for PET and SPECT will further help in identifying the biomarkers for biochemical processes underlying CNS diseases. In the forthcoming years, further advancements in imaging techniques promise to improve upon the early and accurate diagnosis, prognosis, and treatment of neurodegenerative diseases.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

D. P. Chapman, S. M. Williams, T. W. Strine, R. F. Anda, and M. J. Moore, “Dementia and its implications for public health,” Preventing Chronic Disease, vol. 3, no. 2, article A34, 2006.

D. C. Mash, D. D. Flynn, and L. T. Potter, “Loss of M2 muscarine receptors in the cerebral cortex in Alzheimer’s disease and experimental cholinergic denervation,” Science, vol. 228, no. 4703, pp. 1115–1117, 1985.

J. D. Gazewood, D. R. Richards, and K. Clebak, “Parkinson disease: an update,” American Family Physician, vol. 87, no. 4, pp. 267–273, 2013.

J. Massano, “Cognitive impairment and dementia—an update,” Frontiers in Neurology, vol. 3, article 153, 2012.

V. Kljajevic, “Overestimating the effects of healthy aging,” Frontiers in Aging Neuroscience, vol. 7, article 164, 2015.

B. Frost and M. I. Diamond, “Prion-like mechanisms in neurodegenerative diseases,” Nature Reviews Neuroscience, vol. 11, no. 3, pp. 155–159, 2010.

F. M. M. Lu and Z. Yuan, “PET/SPECT molecular imaging in clinical neuroscience: recent advances in the investigation of CNS diseases,” Quantitative Imaging in Medicine and Surgery, vol. 5, no. 3, pp. 433–447, 2015.

J. F. Jiménez Bonilla and J. M. Carril Carril, “Molecular neuroimaging in degenerative dementias,” Revista Espanola de Medicina Nuclear e Imagen Molecular, vol. 32, no. 5, pp. 301–309, 2013.

P. A. Apurva, P. M. Bipin, and P. M. Kirti, “Role of PET scan in clinical practice,” Gujarat Medical Journal, vol. 68, no. 2, pp. 19–22, 2013.

R. Weissleder and U. Mahmood, “Molecular imaging,” Radiology, vol. 219, no. 2, pp. 316–333, 2001.

E. Kim, O. D. Howes, and S. Kapur, “Molecular imaging as a guide for the treatment of central nervous system disorders,” Dialogues in Clinical Neuroscience, vol. 15, no. 3, pp. 315–328, 2013.

S. P. Mueller, J. F. Polak, M. F. Kijewski, and B. L. Holman, “Collimator selection for SPECT brain imaging: the advantage of high resolution,” Journal of Nuclear Medicine, vol. 27, no. 11, pp. 1729–1738, 1986.

L. Jiang, Y. Tu, H. Shi, and Z. Cheng, “PET probes beyond ¹⁸F-FDG,” Journal of Biomedical Research, vol. 28, no. 6, pp. 435–446, 2014.

W. Mier and D. Mier, “Advantages in functional imaging of the brain,” Frontiers in Human Neuroscience, vol. 9, p. 249, 2015.

T. Varghese, R. Sheelakumari, J. S. James, and P. S. Mathuranath, “A review of neuroimaging biomarkers of Alzheimer’s disease,” Neurology Asia, vol. 18, no. 3, pp. 239–248, 2013.

K. Blennow, M. J. de Leon, and H. Zetterberg, “Alzheimer’s disease,” The Lancet, vol. 368, no. 9533, pp. 387–403, 2006.

Alzheimer’s Association, “2010 Alzheimer’s disease facts and figures,” Alzheimer’s and Dementia, vol. 6, no. 2, pp. 158–194, 2010.

W. T. Hu, A. Chen-Plotkin, S. E. Arnold et al., “Novel CSF biomarkers for Alzheimer’s disease and mild cognitive impairment,” Acta Neuropathologica, vol. 119, no. 6, pp. 669–678, 2010.

L. Devi and H. K. Anandatheerthavarada, “Mitochondrial trafficking of APP and alpha synuclein: relevance to mitochondrial dysfunction in Alzheimer’s and Parkinson’s diseases,” Biochimica et Biophysica Acta (BBA)—Molecular Basis of Disease, vol. 1802, no. 1, pp. 11–19, 2010.

C. Mancuso, G. Scapagnini, D. Currò et al., “Mitochondrial dysfunction, free radical generation and cellular stress response in neurodegenerative disorders,” Frontiers in Bioscience, vol. 12, no. 3, pp. 1107–1123, 2007.

H. W. Querfurth and F. M. LaFerla, “Alzheimer’s disease,” The New England Journal of Medicine, vol. 362, no. 4, pp. 329–344, 2010.

P. Davidsson, A. Westman-Brinkmalm, C. L. Nilsson et al., “Proteome analysis of cerebrospinal fluid proteins in Alzheimer patients,” NeuroReport, vol. 13, no. 5, pp. 611–615, 2002.

M. A. Korolainen, T. A. Nyman, P. Nyyssönen, E. S. Hartikainen, and T. Pirttilä, “Multiplexed proteomic analysis of oxidation and concentrations of cerebrospinal fluid proteins in Alzheimer disease,” Clinical Chemistry, vol. 53, no. 4, pp. 657–665, 2007.

H. Zetterberg, U. Rüetschi, E. Portelius et al., “Clinical proteomics in neurodegenerative disorders,” Acta Neurologica Scandinavica, vol. 118, no. 1, pp. 1–11, 2008.

C. Sihlbom, P. Davidsson, M. Sjögren, L.-O. Wahlund, and C. L. Nilsson, “Structural and quantitative comparison of cerebrospinal fluid glycoproteins in Alzheimer’s disease patients and healthy individuals,” Neurochemical Research, vol. 33, no. 7, pp. 1332–1340, 2008.

M. Puchades, S. F. Hansson, C. L. Nilsson, N. Andreasen, K. Blennow, and P. Davidsson, “Proteomic studies of potential cerebrospinal fluid protein markers for Alzheimer’s disease,” Molecular Brain Research, vol. 118, no. 1-2, pp. 140–146, 2003.

C. Hesse, C. L. Nilsson, K. Blennow, and P. Davidsson, “Identification of the apolipoprotein E4 isoform in cerebrospinal fluid with preparative two-dimensional electrophoresis and matrix assisted laser desorption/ionization-time of flight-mass spectrometry,” Electrophoresis, vol. 22, no. 9, pp. 1834–1837, 2001.

E. Tarkowski, K. Blennow, A. Wallin, and A. Tarkowski, “Intracerebral production of tumor necrosis factor-α, a local neuroprotective agent, in Alzheimer disease and vascular dementia,” Journal of Clinical Immunology, vol. 19, no. 4, pp. 223–230, 1999.

I. Blasko, W. Lederer, H. Oberbauer et al., “Measurement of thirteen biological markers in CSF of patients with Alzheimer’s disease and other dementias,” Dementia and Geriatric Cognitive Disorders, vol. 21, no. 1, pp. 9–15, 2005.

D. Galimberti, N. Schoonenboom, P. Scheltens et al., “Intrathecal chemokine synthesis in mild cognitive impairment and Alzheimer disease,” Archives of Neurology, vol. 63, no. 4, pp. 538–543, 2006.

E. Gómez-Tortosa, I. Gonzalo, S. Fanjul et al., “Cerebrospinal fluid markers in dementia with Lewy bodies compared with Alzheimer disease,” Archives of Neurology, vol. 60, no. 9, pp. 1218–1222, 2003.

E. Rota, G. Bellone, P. Rocca, B. Bergamasco, G. Emanuelli, and P. Ferrero, “Increased intrathecal TGF-β1, but not IL-12, IFN-γ and IL-10 levels in Alzheimer’s disease patients,” Neurological Sciences, vol. 27, no. 1, pp. 33–39, 2006.

R. M. Evans, S. Hui, A. Perkins, D. K. Lahiri, J. Poirier, and M. R. Farlow, “Cholesterol and APOE genotype interact to influence Alzheimer disease progression,” Neurology, vol. 62, no. 10, pp. 1869–1871, 2004.

M.-K. K. Sun, J. Hongpaisan, and D. L. Alkon, “Postischemic PKC activation rescues retrograde and anterograde long-term memory,” Proceedings of the National Academy of Sciences of the United States of America, vol. 106, no. 34, pp. 14676–14680, 2009.

J. de Barry, C. M. Liégeois, and A. Janoshazi, “Protein kinase C as a peripheral biomarker for Alzheimer’s disease,” Experimental Gerontology, vol. 45, no. 1, pp. 64–69, 2010.

T. Isagawa, H. Mukai, K. Oishi et al., “Dual effects of PKNα and protein kinase C on phosphorylation of tau protein by glycogen synthase kinase-3β,” Biochemical and Biophysical Research Communications, vol. 273, no. 1, pp. 209–212, 2000.

H. Zetterberg, K. Blennow, and E. Hanse, “Amyloid β and APP as biomarkers for Alzheimer’s disease,” Experimental Gerontology, vol. 45, no. 1, pp. 23–29, 2010.

H. Zetterberg, U. Andreasson, O. Hansson et al., “Elevated cerebrospinal fluid BACE1 activity in incipient alzheimer disease,” Archives of Neurology, vol. 65, no. 8, pp. 1102–1107, 2008.

J. A. Hardy and G. A. Higgins, “Alzheimer’s disease: the amyloid cascade hypothesis,” Science, vol. 256, no. 5054, pp. 184–185, 1992.

T. L. Spires-Jones, W. H. Stoothoff, A. de Calignon, P. B. Jones, and B. T. Hyman, “Tau pathophysiology in neurodegeneration: a tangled issue,” Trends in Neurosciences, vol. 32, no. 3, pp. 150–159, 2009.

M. A. Korolainen, T. A. Nyman, T. Aittokallio, and T. Pirttilä, “An update on clinical proteomics in Alzheimer’s research,” Journal of Neurochemistry, vol. 112, no. 6, pp. 1386–1414, 2010.

S. Davinelli, M. Intrieri, C. Russo et al., “The “Alzheimer’s disease signature’: potential perspectives for novel biomarkers,” Immunity and Ageing, vol. 8, article 7, 2011.

S. Dassati, A. Waldner, and R. Schweigreiter, “Apolipoprotein D takes center stage in the stress response of the aging and degenerative brain,” Neurobiology of Aging, vol. 35, no. 7, pp. 1632–1642, 2014.

S. Lorente-Cebrián, A. G. G. Costa, S. Navas-Carretero et al., “An update on the role of omega-3 fatty acids on inflammatory and degenerative diseases,” Journal of Physiology and Biochemistry, vol. 71, no. 2, pp. 341–349, 2015.

X. Li, K. S. Montine, C. D. Keene, and T. J. Montine, “Different mechanisms of apolipoprotein E isoform-dependent modulation of prostaglandin E2 production and triggering receptor expressed on myeloid cells 2 (TREM2) expression after innate immune activation of microglia,” The FASEB Journal, vol. 29, no. 5, pp. 1754–1762, 2015.

L. K. Ferreira and G. F. Busatto, “Neuroimaging in Alzheimer’s disease: current role in clinical practice and potential future applications,” Clinics, vol. 66, supplement 1, pp. 19–24, 2011.

R. C. Barber, “Biomarkers for early detection of Alzheimer disease,” Journal of the American Osteopathic Association, vol. 110, no. 9, pp. S10–S15, 2010.

L. Zhang, R. C.-C. Chang, L.-W. W. Chu, and H. K.-F. Mak, “Current neuroimaging techniques in Alzheimer’s disease and applications in animal models,” American Journal of Nuclear Medicine and Molecular Imaging, vol. 2, no. 3, pp. 386–404, 2012.

K. J. Anstey, R. Eramudugolla, D. E. Hosking, N. T. Lautenschlager, and R. A. Dixon, “Bridging the translation gap: from dementia risk assessment to advice on risk reduction,” Journal of Prevention of Alzheimer’s Disease, vol. 2, no. 3, pp. 189–198, 2015.

T. L. Spires-Jones and B. Hyman, “The intersection of amyloid β and tau at synapses in Alzheimer’s disease,” Neuron, vol. 82, no. 4, pp. 756–771, 2014.

M. Tabaton, X. Zhu, G. Perry, M. A. Smith, and L. Giliberto, “Signaling effect of amyloid-β ₄₂ on the processing of AβPP,” Experimental Neurology, vol. 221, no. 1, pp. 18–25, 2010.

W. Qin, L. Ho, J. Wang, E. Peskind, and G. M. Pasinetti, “S100A7, a novel Alzheimer’s disease biomarker with non-amyloidogenic α-secretase activity acts via selective promotion of ADAM-10,” PLoS ONE, vol. 4, no. 1, Article ID e4183, 2009.

P. L. Ross, Y. N. Huang, J. N. Marchese et al., “Multiplexed protein quantitation in Saccharomyces cerevisiae using amine-reactive isobaric tagging reagents,” Molecular and Cellular Proteomics, vol. 3, no. 12, pp. 1154–1169, 2004.

A. Thompson, J. Schäfer, K. Kuhn et al., “Tandem mass tags: a novel quantification strategy for comparative analysis of complex protein mixtures by MS/MS,” Analytical Chemistry, vol. 75, no. 8, pp. 1895–1904, 2003.

S. P. Gygi, B. Rist, S. A. Gerber, F. Turecek, M. H. Gelb, and R. Aebersold, “Quantitative analysis of complex protein mixtures using isotope-coded affinity tags,” Nature Biotechnology, vol. 17, no. 10, pp. 994–999, 1999.

A. Schmidt, J. Kellermann, and F. Lottspeich, “A novel strategy for quantitative proteomics using isotope-coded protein labels,” Proteomics, vol. 5, no. 1, pp. 4–15, 2005.

C. Tian, D. Liu, W. Xiang et al., “Analyses of the similarity and difference of global gene expression profiles in cortex regions of three neurodegenerative diseases: sporadic Creutzfeldt-Jakob disease (sCJD), fatal familial insomnia (FFI), and Alzheimer’s disease (AD),” Molecular Neurobiology, vol. 50, no. 2, pp. 473–481, 2014.

G. M. McKhann, D. S. Knopman, H. Chertkow et al., “The diagnosis of dementia due to Alzheimer’s disease: recommendations from the National Institute on Aging-Alzheimer’s Association workgroups on diagnostic guidelines for Alzheimer’s disease,” Alzheimer’s & Dementia, vol. 7, no. 3, pp. 263–269, 2011.

M. Benadiba, G. Luurtsema, L. Wichert-Ana, C. A. Buchpigel, and G. B. Filho, “New molecular targets for PET and SPECT imaging in neurodegenerative diseases,” Revista Brasileira de Psiquiatria, vol. 34, no. 2, pp. S125–S148, 2012.

H. Shim, M. J. Ly, and S. K. Tighe, “Brain imaging in the differential diagnosis of young-onset dementias,” Psychiatric Clinics of North America, vol. 38, no. 2, pp. 281–294, 2015.

M. E. Phelps, “Positron emission tomography provides molecular imaging of biological processes,” Proceedings of the National Academy of Sciences of the United States of America, vol. 97, no. 16, pp. 9226–9233, 2000.

R. Dann, D. Christman, J. Fowler, B. MacGregor, and A. Wolf, “Metabolic mapping of functional activity in human subjects with the [18F] fluorodeoxyglucose technique,” Science, vol. 212, no. 4495, pp. 678–680, 1981.

K. Strijckmans, “The isochronous cyclotron: principles and recent developments,” Computerized Medical Imaging and Graphics, vol. 25, no. 2, pp. 69–78, 2001.

C. Halldin, B. Gulyás, O. Langer, and L. Farde, “Brain radioligands—state of the art and new trends,” Quarterly Journal of Nuclear Medicine, vol. 45, no. 2, pp. 139–152, 2001.

D. W. Townsend, “Dual-modality imaging: combining anatomy and function,” Journal of Nuclear Medicine, vol. 49, no. 6, pp. 938–955, 2008.

J. M. Kofler, D. D. Cody, and R. L. Morin, “CT protocol review and optimization,” Journal of the American College of Radiology, vol. 11, no. 3, pp. 267–270, 2014.

M. Laruelle, M. Slifstein, and Y. Huang, “Positron emission tomography: imaging and quantification of neurotransporter availability,” Methods, vol. 27, no. 3, pp. 287–299, 2002.

A. Baert, Encyclopedia of Diagnostic Imaging, Springer, Berlin, Germany, 2008.

I. Buvat, S. Laffont, J. Le Cloirec, P. Bourguet, and R. Di Paola, “Importance of the choice of the collimator for the detection of small lesions in scintimammography: a phantom study,” Physics in Medicine and Biology, vol. 46, no. 5, pp. 1343–1355, 2001.

B. Palumbo, T. Buresta, S. Nuvoli et al., “SPECT and PET serve as molecular imaging techniques and in Vivo biomarkers for brain metastases,” International Journal of Molecular Sciences, vol. 15, no. 6, pp. 9878–9893, 2014.

S. L. Pimlott and A. Sutherland, “Molecular tracers for the PET and SPECT imaging of disease,” Chemical Society Reviews, vol. 40, no. 1, pp. 149–162, 2011.

V. L. Villemagne, M. T. Fodero-Tavoletti, K. E. Pike, R. Cappai, C. L. Masters, and C. C. Rowe, “The ART of loss: aβ imaging in the evaluation of Alzheimer’s disease and other dementias,” Molecular Neurobiology, vol. 38, no. 1, pp. 1–15, 2008.

M. Laruelle, M. Slifstein, and Y. Huang, “Relationships between radiotracer properties and image quality in molecular imaging of the brain with positron emission tomography,” Molecular Imaging & Biology, vol. 5, no. 6, pp. 363–375, 2003.

V. W. Pike, “PET radiotracers: crossing the blood-brain barrier and surviving metabolism,” Trends in Pharmacological Sciences, vol. 30, no. 8, pp. 431–440, 2009.

W. M. Pardridge, “Drug and gene delivery to the brain: the vascular route,” Neuron, vol. 36, no. 4, pp. 555–558, 2002.

J. E. Maggio, E. R. Stimson, J. R. Ghilardi et al., “Reversible in vitro growth of Alzheimer disease β-amyloid plaques by deposition of labeled amyloid peptide,” Proceedings of the National Academy of Sciences of the United States of America, vol. 89, no. 12, pp. 5462–5466, 1992.

R. P. Friedland, R. E. Majocha, J. M. Reno, L. R. Lyle, and C. A. Marotta, “Development of an anti-Aβ monoclonal antibody for in vivo imaging of amyloid angiopathy in Alzheimer’s disease,” Molecular Neurobiology, vol. 9, no. 1–3, pp. 107–113, 1994.

H. J. Lee, Y. Zhang, C. Zhu, K. Duff, and W. M. Pardridge, “Imaging brain amyloid of Alzheimer disease in vivo in transgenic mice with an Abeta peptide radiopharmaceutical,” Journal of Cerebral Blood Flow Metabolism, vol. 22, no. 2, pp. 223–231, 2002.

C. A. Mathis, Y. Wang, D. P. Holt, G.-F. F. Huang, M. L. Debnath, and W. E. Klunk, “Synthesis and evaluation of ¹¹C-labeled 6-substituted 2-arylbenzothiazoles as amyloid imaging agents,” Journal of Medicinal Chemistry, vol. 46, no. 13, pp. 2740–2754, 2003.

Z.-P. P. Zhuang, M.-P. P. Kung, A. Wilson et al., “Structure-activity relationship of imidazo[1,2-a]pyridines as ligands for detecting β-amyloid plaques in the brain,” Journal of Medicinal Chemistry, vol. 46, no. 2, pp. 237–243, 2003.

H. Engler, A. F. Santillo, S. X. Wang et al., “In vivo amyloid imaging with PET in frontotemporal dementia,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 1, pp. 100–106, 2008.

G. D. Rabinovici, H. J. Rosen, A. Alkalay et al., “Amyloid vs FDG-PET in the differential diagnosis of AD and FTLD,” Neurology, vol. 77, no. 23, pp. 2034–2042, 2011.

V. L. Villemagne, K. Ong, R. S. Mulligan et al., “Amyloid imaging with (18)F-florbetaben in Alzheimer disease and other dementias,” Journal of Nuclear Medicine, vol. 52, no. 8, pp. 1210–1217, 2011.

W. E. Klunk, H. Engler, A. Nordberg et al., “Imaging brain amyloid in Alzheimer’s disease with Pittsburgh compound-B,” Annals of Neurology, vol. 55, no. 3, pp. 306–319, 2004.

B. J. Bacskai, G. A. Hickey, J. Skoch et al., “Four-dimensional multiphoton imaging of brain entry, amyloid binding, and clearance of an amyloid-β ligand in transgenic mice,” Proceedings of the National Academy of Sciences of the United States of America, vol. 100, no. 21, pp. 12462–12467, 2003.

C. C. Rowe, S. Ng, U. Ackermann et al., “Imaging β-amyloid burden in aging and dementia,” Neurology, vol. 68, no. 20, pp. 1718–1725, 2007.

C. C. Rowe, K. A. Ellis, M. Rimajova et al., “Amyloid imaging results from the Australian Imaging, Biomarkers and Lifestyle (AIBL) study of aging,” Neurobiology of Aging, vol. 31, no. 8, pp. 1275–1283, 2010.

A. Forsberg, H. Engler, O. Almkvist et al., “PET imaging of amyloid deposition in patients with mild cognitive impairment,” Neurobiology of Aging, vol. 29, no. 10, pp. 1456–1465, 2008.

P. Edison, C. C. Rowe, J. O. Rinne et al., “Amyloid load in Parkinson’s disease dementia and Lewy body dementia measured with [¹¹C]PIB positron emission tomography,” Journal of Neurology, Neurosurgery and Psychiatry, vol. 79, no. 12, pp. 1331–1338, 2008.

M. A. Mintun, G. N. Larossa, Y. I. Sheline et al., “[11C]PIB in a nondemented population: potential antecedent marker of Alzheimer disease,” Neurology, vol. 67, no. 3, pp. 446–452, 2006.

N. S. Mason, C. A. Mathis, and W. E. Klunk, “Positron emission tomography radioligands for in vivo imaging of Aβ plaques,” Journal of Labelled Compounds and Radiopharmaceuticals, vol. 56, no. 3-4, pp. 89–95, 2013.

A. E. Johnson, F. Jeppsson, J. Sandell et al., “AZD2184: a radioligand for sensitive detection of β-amyloid deposits,” Journal of Neurochemistry, vol. 108, no. 5, pp. 1177–1186, 2009.

S. Nyberg, M. E. Jönhagen, Z. Cselényi et al., “Detection of amyloid in Alzheimer’s disease with positron emission tomography using [¹¹C]AZD2184,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 36, no. 11, pp. 1859–1863, 2009.

A. Nordberg, “PET imaging of amyloid in Alzheimer’s disease,” The Lancet Neurology, vol. 3, no. 9, pp. 519–527, 2004.

K. Shoghi-Jadid, G. W. Small, E. D. Agdeppa et al., “Localization of neurofibrillary tangles and β-amyloid plaques in the brains of living patients with alzheimer disease,” The American Journal of Geriatric Psychiatry, vol. 10, no. 1, pp. 24–35, 2002.

P. W. Thompson, L. Ye, J. L. Morgenstern et al., “Interaction of the amyloid imaging tracer FDDNP with hallmark Alzheimer’s disease pathologies,” Journal of Neurochemistry, vol. 109, no. 2, pp. 623–630, 2009.

E. D. Agdeppa, V. Kepe, K. Shoghi-Jadid et al., “In vivo and in vitro labeling of plaques and tangles in the brain of an Alzheimer’s disease patient: a case study,” Journal of Nuclear Medicine, vol. 42, no. 5, p. 65, 2001.

L. M. Smid, V. Kepe, H. V. Vinters et al., “Postmortem 3-D brain hemisphere cortical tau and amyloid-β pathology mapping and quantification as a validation method of neuropathology imaging,” Journal of Alzheimer’s Disease, vol. 36, no. 2, pp. 261–274, 2013.

G. W. Small, E. D. Agdeppa, V. Kepe, N. Satyamurthy, S.-C. Huang, and J. R. Barrio, “In vivo brain imaging of tangle burden in humans,” Journal of Molecular Neuroscience, vol. 19, no. 3, pp. 321–327, 2002.

H. Barthel and O. Sabri, “Florbetaben to trace amyloid-β in the Alzheimer brain by means of PET,” Journal of Alzheimer’s Disease, vol. 26, no. 3, pp. 117–121, 2011.

S. R. Choi, G. Golding, Z. Zhuang et al., “Preclinical properties of 18F-AV-45: a PET agent for Abeta plaques in the brain,” Journal of Nuclear Medicine, vol. 50, no. 11, pp. 1887–1894, 2009.

D. F. Wong, P. B. Rosenberg, Y. Zhou et al., “In vivo imaging of amyloid deposition in Alzheimer disease using the radioligand ¹⁸F-AV-45 (flobetapir F 18),” Journal of Nuclear Medicine, vol. 51, no. 6, pp. 913–920, 2010.

C. M. Clark, J. A. Schneider, B. J. Bedell et al., “Use of florbetapir-PET for imaging β-amyloid pathology,” Journal of the American Medical Association, vol. 305, no. 3, pp. 275–283, 2011.

C. C. Rowe, U. Ackerman, W. Browne et al., “Imaging of amyloid β in Alzheimer’s disease with 18F-BAY94-9172, a novel PET tracer: proof of mechanism,” The Lancet Neurology, vol. 7, no. 2, pp. 129–135, 2008.

S. Shokouhi, D. Claassen, and W. Riddle, “Imaging brain metabolism and pathology in Alzheimer’s disease with positron emission tomography,” Journal of Alzheimer’s Disease & Parkinsonism, vol. 4, no. 2, article 143, 2014.

N. Nelissen, K. Van Laere, L. Thurfjell et al., “Phase 1 study of the Pittsburgh compound B derivative ¹⁸F-flutemetamol in healthy volunteers and patients with probable Alzheimer disease,” Journal of Nuclear Medicine, vol. 50, no. 8, pp. 1251–1259, 2009.

R. Vandenberghe, K. Adamczuk, P. Dupont, K. V. Laere, and G. Chételat, “Amyloid PET in clinical practice: its place in the multidimensional space of Alzheimer’s disease,” NeuroImage: Clinical, vol. 2, no. 1, pp. 497–511, 2013.

C. C. Rowe and V. L. Villemagne, “Brain amyloid imaging,” Journal of Nuclear Medicine, vol. 52, no. 11, pp. 1733–1740, 2011.

Z. Cselényi, M. E. Jönhagen, A. Forsberg et al., “Clinical validation of ¹⁸F-AZD4694, an amyloid-β-specific PET radioligand,” Journal of Nuclear Medicine, vol. 53, no. 3, pp. 415–424, 2012.

A. Juréus, B.-M. M. Swahn, J. Sandell et al., “Characterization of AZD4694, a novel fluorinated Aβ plaque neuroimaging PET radioligand,” Journal of Neurochemistry, vol. 114, no. 3, pp. 784–794, 2010.

Y. Kudo, N. Okamura, S. Furumoto et al., “2-(2-[2-Dimethylaminothiazol-5-yl]ethenyl)-6- (2-[fluoro]ethoxy)benzoxazole: a novel PET agent for in vivo detection of dense amyloid plaques in Alzheimer’s disease patients,” Journal of Nuclear Medicine, vol. 48, no. 4, pp. 553–561, 2007.

Y. Kudo, “Development of amyloid imaging PET probes for an early diagnosis of Alzheimer’s disease,” Minimally Invasive Therapy and Allied Technologies, vol. 15, no. 4, pp. 209–213, 2006.

M. Ono, A. Wilson, J. Nobrega et al., “¹¹C-labeled stilbene derivatives as Aβ-aggregate-specific PET imaging agents for Alzheimer’s disease,” Nuclear Medicine and Biology, vol. 30, no. 6, pp. 565–571, 2003.

W. E. Klunk, H. Engler, A. Nordberg et al., “Imaging the pathology of Alzheimer’s disease: amyloid-imaging with positron emission tomography,” Neuroimaging Clinics of North America, vol. 13, no. 4, pp. 781–789, 2003.

N. P. L. G. Verhoeff, A. A. Wilson, S. Takeshita et al., “In-vivo imaging of Alzheimer disease β-amyloid with [¹¹C]SB-13 PET,” American Journal of Geriatric Psychiatry, vol. 12, no. 6, pp. 584–595, 2004.

M. C. Hong, Y. K. Kim, J. Y. Choi et al., “Synthesis and evaluation of stilbene derivatives as a potential imaging agent of amyloid plaques,” Bioorganic and Medicinal Chemistry, vol. 18, no. 22, pp. 7724–7730, 2010.

K. R. Eun and X. Chen, “Development of Alzheimer’s disease imaging agents for clinical studies,” Frontiers in Bioscience, vol. 13, no. 2, pp. 777–789, 2008.

C. Wu, V. W. Pike, and Y. Wang, “Amyloid imaging: from benchtop to bedside,” Current Topics in Developmental Biology, vol. 70, pp. 171–213, 2005.

M.-P. Kung, C. Hou, Z.-P. Zhuang, D. Skovronsky, and H. F. Kung, “Binding of two potential imaging agents targeting amyloid plaques in postmortem brain tissues of patients with Alzheimer’s disease,” Brain Research, vol. 1025, no. 1-2, pp. 98–105, 2004.

F. Hernández and J. Avila, “Tauopathies,” Cellular and Molecular Life Sciences, vol. 64, no. 17, pp. 2219–2233, 2007.

K. Arima, “Ultrastructural characteristics of tau filaments in tauopathies: immuno-electron microscopic demonstration of tau filaments in tauopathies,” Neuropathology, vol. 26, no. 5, pp. 475–483, 2006.

P. J. Muchowski, “Protein misfolding, amyloid formation, and neurodegeneration: a critical role for molecular chaperones?” Neuron, vol. 35, no. 1, pp. 9–12, 2002.

M. G. Spillantini and M. Goedert, “Tau pathology and neurodegeneration,” The Lancet Neurology, vol. 12, no. 6, pp. 609–622, 2013.

N. S. Honson, R. L. Johnson, W. Huang, J. Inglese, C. P. Austin, and J. Kuret, “Differentiating Alzheimer disease-associated aggregates with small molecules,” Neurobiology of Disease, vol. 28, no. 3, pp. 251–260, 2007.

K. N. Schafer, S. Kim, A. Matzavinos, and J. Kuret, “Selectivity requirements for diagnostic imaging of neurofibrillary lesions in Alzheimer’s disease: a simulation study,” NeuroImage, vol. 60, no. 3, pp. 1724–1733, 2012.

A. Taghavi, S. Nasir, M. Pickhardt et al., “N′-benzylidene-benzohydrazides as novel and selective tau-PHF ligands,” Journal of Alzheimer’s Disease, vol. 27, no. 4, pp. 835–843, 2011.

S. J. Kemp, L. J. Storey, J. Storey, and J. Rickard, “Ligands for aggregated tau molecules,” US Patent, 2014

V. L. Villemagne and N. Okamura, “In vivo tau imaging: obstacles and progress,” Alzheimer’s & Dementia, vol. 10, no. 3, supplement, pp. S254–S264, 2014.

M. T. Fodero-Tavoletti, N. Okamura, S. Furumoto et al., “¹⁸F-THK523: a novel in vivo tau imaging ligand for Alzheimer’s disease,” Brain, vol. 134, part 4, pp. 1089–1100, 2011.

R. Harada, N. Okamura, S. Furumoto, T. Tago et al., “Comparison of the binding characteristics of [¹⁸F] THK-523 and other amyloid imaging tracers to Alzheimer’s disease pathology,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 40, no. 1, pp. 125–132, 2013.

V. L. Villemagne, S. Furumoto, M. T. Fodero-Tavoletti et al., “In vivo evaluation of a novel tau imaging tracer for Alzheimer’s disease,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 41, no. 5, pp. 816–826, 2014.

M. T. Fodero-Tavoletti, S. Furumoto, L. Taylor et al., “Assessing THK523 selectivity for tau deposits in Alzheimer’s disease and non Alzheimer’s disease tauopathies,” Acta Veterinaria Scandinavica, vol. 6, article 11, 2014.

N. Okamura, S. Furumoto, R. Harada et al., “Novel 18F-labeled arylquinoline derivatives for noninvasive imaging of tau pathology in Alzheimer disease,” Journal of Nuclear Medicine, vol. 54, no. 8, pp. 1420–1427, 2013.

E. R. Zimmer, A. Leuzy, S. Gauthier, and P. Rosa-Neto, “Developments in tau PET imaging,” The Canadian Journal of Neurological Sciences, vol. 41, no. 05, pp. 547–553, 2014.

N. Okamura, S. Furumoto, M. T. Fodero-Tavoletti et al., “Non-invasive assessment of Alzheimer’s disease neurofibrillary pathology using ¹⁸F-THK5105 PET,” Brain, vol. 137, no. 6, pp. 1762–1771, 2014.

Y. Li, W. Tsui, H. Rusinek et al., “Cortical laminar binding of PET amyloid and tau tracers in Alzheimer disease,” Journal of Nuclear Medicine, vol. 56, no. 2, pp. 270–273, 2015.

W. Zhang, J. Arteaga, D. K. Cashion et al., “A highly selective and specific PET tracer for imaging of tau pathologies,” Journal of Alzheimer’s Disease, vol. 31, no. 3, pp. 601–612, 2012.

S. Förster, T. Grimmer, I. Miederer et al., “Regional expansion of hypometabolism in Alzheimer’s disease follows amyloid deposition with temporal delay,” Biological Psychiatry, vol. 71, no. 9, pp. 792–797, 2012.

D. T. Chien, S. Bahri, A. K. Szardenings et al., “Early clinical PET imaging results with the novel PHF-tau radioligand [F-18]-T807,” Journal of Alzheimer’s Disease, vol. 34, no. 2, pp. 457–468, 2013.

M. Mintun, A. Schwarz, A. Joshi et al., “Exploratory analyses of regional human brain distribution of the PET tau tracer F18-labeled T807 (AV-1541) in subjects with normal cognitive function or cognitive impairment thought to be due to Alzheimer’s disease,” Alzheimer’s & Dementia, vol. 9, no. 4, p. P842, 2013.

D. T. Chien, A. K. Szardenings, S. Bahri et al., “Early clinical PET imaging results with the novel PHF-tau radioligand [F18]-T808,” Journal of Alzheimer’s Disease, vol. 38, no. 1, pp. 171–184, 2014.

M. Maruyama, H. Shimada, T. Suhara et al., “Imaging of tau pathology in a tauopathy mouse model and in alzheimer patients compared to normal controls,” Neuron, vol. 79, no. 6, pp. 1094–1108, 2013.

G. W. Small, V. Kepe, L. M. Ercoli et al., “PET of brain amyloid and tau in mild cognitive impairment,” The New England Journal of Medicine, vol. 355, no. 25, pp. 2652–2663, 2006.

J. Stefaniak and J. O’Brien, “Imaging of neuroinflammation in dementia: a review,” Journal of Neurology, Neurosurgery & Psychiatry, vol. 87, pp. 21–28, 2016.

V. Pizza, A. Agresta, C. W. D’Acunto, M. Festa, and A. Capasso, “Neuroinflammation and ageing: current theories and an overview of the data,” Reviews on Recent Clinical Trials, vol. 6, no. 3, pp. 189–203, 2011.

R. M. Ransohoff and J. El Khoury, “Microglia in health and disease,” Cold Spring Harbor Perspectives in Biology, 2015.

D. G. Walker and L. F. F. Lue, “Immune phenotypes of microglia in human neurodegenerative disease: challenges to detecting microglial polarization in human brains,” Alzheimer’s Research & Therapy, vol. 7, no. 1, p. 56, 2015.

Z. Su, F. Roncaroli, P. F. Durrenberger et al., “The 18-kDa mitochondrial translocator protein in human gliomas: an 11C- (R)PK11195 PET imaging and neuropathology study,” Journal of Nuclear Medicine, vol. 56, no. 4, pp. 512–517, 2015.

P. Gut, M. Zweckstetter, and R. B. Banati, “Lost in translocation: the functions of the 18-kD translocator protein,” Trends in Endocrinology & Metabolism, vol. 26, no. 7, pp. 349–356, 2015.

M.-K. K. Chen and T. R. R. Guilarte, “Translocator protein 18 kDa (TSPO): molecular sensor of brain injury and repair,” Pharmacology and Therapeutics, vol. 118, no. 1, pp. 1–17, 2008.

A. Cagnin, D. J. Brooks, A. M. Kennedy et al., “In-vivo measurement of activated microglia in dementia,” The Lancet, vol. 358, no. 9280, pp. 461–467, 2001.

S. Chalon, C. Pellevoisin, S. Bodard, M.-P. Vilar, J.-C. Besnard, and D. Guilloteau, “Iodinated PK 11195 as an ex vivo marker of neuronal injury in the lesioned rat brain,” Synapse, vol. 24, no. 4, pp. 334–339, 1996.

J. J. Versijpt, F. Dumont, K. J. Van Laere et al., “Assessment of neuroinflammation and microglial activation in Alzheimer’s disease with radiolabelled PK11195 and single photon emission computed tomography: a pilot study,” European Neurology, vol. 50, no. 1, pp. 39–47, 2003.

S. Venneti, C. A. Wiley, and J. Kofler, “Imaging microglial activation during neuroinflammation and Alzheimer’s disease,” Journal of Neuroimmune Pharmacology, vol. 4, no. 2, pp. 227–243, 2009.

A. S. C. Ching, B. Kuhnast, A. Damont, D. Roeda, B. Tavitian, and F. Dollé, “Current paradigm of the 18-kDa translocator protein (TSPO) as a molecular target for PET imaging in neuroinflammation and neurodegenerative diseases,” Insights into Imaging, vol. 3, no. 1, pp. 111–119, 2012.

H. Boutin, F. Chauveau, C. Thominiaux et al., “¹¹C-DPA-713: a novel peripheral benzodiazepine receptor PET ligand for in vivo imaging of neuroinflammation,” Journal of Nuclear Medicine, vol. 48, no. 4, pp. 573–581, 2007.

H. Boutin, C. Prenant, R. Maroy et al., “[¹⁸F]DPA-714: direct comparison with [¹¹C]PK11195 in a model of cerebral ischemia in rats,” PLoS ONE, vol. 8, no. 2, Article ID e56441, 2013.

N. Van Camp, R. Boisgard, B. Kuhnast et al., “In vivo imaging of neuroinflammation: a comparative study between [¹⁸F]PBR111, [¹¹C]CLINME and [¹¹C]PK11195 in an acute rodent model,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 37, no. 5, pp. 962–972, 2010.

G. Abourbeh, B. Thézé, R. Maroy et al., “Imaging microglial/macrophage activation in spinal cords of experimental autoimmune encephalomyelitis rats by positron emission tomography using the mitochondrial 18 kDa translocator protein radioligand [¹⁸F]DPA-714,” The Journal of Neuroscience, vol. 32, no. 17, pp. 5728–5736, 2012.

D. Tang, M. R. Hight, E. T. McKinley et al., “Quantitative preclinical imaging of TSPO expression in glioma using N,N-diethyl-2-(2-(4-(2- 18F-fluoroethoxy) phenyl)-5,7- dimethylpyrazolo[1,5-a]pyrimidin-3-yl)acetamide,” Journal of Nuclear Medicine, vol. 53, no. 2, pp. 287–294, 2012.

N. Arlicot, A. Katsifis, L. Garreau et al., “Evaluation of CLINDE as potent translocator protein (18 kDa) SPECT radiotracer reflecting the degree of neuroinflammation in a rat model of microglial activation,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 12, pp. 2203–2211, 2008.

F. Mattner, D. L. Bandin, M. Staykova et al., “Evaluation of [123I]-CLINDE as a potent SPECT radiotracer to assess the degree of astroglia activation in cuprizone-induced neuroinflammation,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 8, pp. 1516–1528, 2011.

I. López-González, E. Aso, M. Carmona et al., “Neuroinflammatory gene regulation, mitochondrial function, oxidative stress, and brain lipid modifications with disease progression in tau P301S transgenic mice as a model of frontotemporal lobar degeneration-tau,” Journal of Neuropathology & Experimental Neurology, vol. 74, no. 10, pp. 975–999, 2015.

J. A. García-Sevilla, P. V. Escribá, and J. Guimón, “Imidazoline receptors and human brain disorders,” Annals of the New York Academy of Sciences, vol. 881, pp. 392–409, 1999.

S. F. Carter, M. Schöll, O. Almkvist et al., “Evidence for astrocytosis in prodromal Alzheimer disease provided by ¹¹C-deuterium-L-deprenyl: a multitracer PET paradigm combining ¹¹C-Pittsburgh compound B and ¹⁸F-FDG,” Journal of Nuclear Medicine, vol. 53, no. 1, pp. 37–46, 2012.

A. F. Santillo, J. P. Gambini, L. Lannfelt et al., “In vivo imaging of astrocytosis in Alzheimer’s disease: an 11C-L-deuteriodeprenyl and PIB PET study,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 12, pp. 2202–2208, 2011.

K. Kawamura, Y. Kimura, J. Yui et al., “PET study using [¹¹C]FTIMD with ultra-high specific activity to evaluate I₂-imidazoline receptors binding in rat brains,” Nuclear Medicine and Biology, vol. 39, no. 2, pp. 199–206, 2012.

M. Wang, L. Xu, M. Gao, K. D. Miller, G. W. Sledge, and Q. H. H. Zheng, “[11C]enzastaurin, the first design and radiosynthesis of a new potential PET agent for imaging of protein kinase C,” Bioorganic & Medicinal Chemistry Letters, vol. 21, no. 6, pp. 1649–1653, 2011.

M.-K. K. Sun and D. L. Alkon, “The ‘memory kinases’: roles of PKC isoforms in signal processing and memory formation,” Progress in Molecular Biology and Translational Science, vol. 122, pp. 31–59, 2014.

C. Wu, C. Wang, D. C. Popescu et al., “A novel PET marker for in vivo quantification of myelination,” Bioorganic & Medicinal Chemistry, vol. 18, no. 24, pp. 8592–8599, 2010.

M. Doubrovin, J. T. Che, I. Serganova et al., “Monitoring the induction of heat shock factor 1/heat shock protein 70 expression following 17-allylamino-demethoxygeldanamycin treatment by positron emission tomography and optical reporter gene imaging,” Molecular Imaging, vol. 11, no. 1, pp. 67–76, 2012.

C. Chiu, M. C. Miller, R. Monahan, D. P. Osgood, E. G. Stopa, and G. D. Silverberg, “P-glycoprotein expression and amyloid accumulation in human aging and Alzheimer’s disease: preliminary observations,” Neurobiology of Aging, vol. 36, no. 9, pp. 2475–2482, 2015.

G. Luurtsema, J. Verbeek, M. Lubberink et al., “Carbon-11 labeled tracers for in vivo imaging P-glycoprotein function: kinetics, advantages and disadvantages,” Current Topics in Medicinal Chemistry, vol. 10, no. 17, pp. 1820–1833, 2010.

G. Esposito, G. Giovacchini, J.-S. S. Liow et al., “Imaging neuroinflammation in Alzheimer’s disease with radiolabeled arachidonic acid and PET,” Journal of Nuclear Medicine, vol. 49, no. 9, pp. 1414–1421, 2008.

M. Singh, “Essential fatty acids, DHA and human brain,” Indian Journal of Pediatrics, vol. 72, no. 3, pp. 239–242, 2005.

S. I. Rapoport, E. Ramadan, and M. Basselin, “Docosahexaenoic acid (DHA) incorporation into the brain from plasma, as an in vivo biomarker of brain DHA metabolism and neurotransmission,” Prostaglandins& Other Lipid Mediators, vol. 96, no. 1–4, pp. 109–113, 2011.

J. A. Conquer, M. C. Tierney, J. Zecevic, W. J. Bettger, and R. H. Fisher, “Fatty acid analysis of blood plasma of patients with Alzheimer’s disease, other types of dementia, and cognitive impairment,” Lipids, vol. 35, no. 12, pp. 1305–1312, 2000.