International Journal of Biomedical Imaging
Volume 2017 (2017), Article ID 3247974, 1 page
https://doi.org/10.1155/2017/3247974

Corrigendum

Corrigendum to “Automated Feature Extraction in Brain Tumor by Magnetic Resonance Imaging Using Gaussian Mixture Models”

Ahmad Chaddad,¹ Markus Luedi,¹ Pascal O. Zinn,² and Rivka Colen¹

¹Department of Diagnostic Radiology, University of Texas MD Anderson Cancer Center, 1400 Pressler Street, Houston, TX 77030, USA
²Baylor College of Medicine, 1 Baylor Plaza, Houston, TX 77030, USA

Correspondence should be addressed to Ahmad Chaddad; ahmad.chaddad@univ-lorraine.fr

Received 10 April 2017; Accepted 19 April 2017; Published 13 August 2017

Copyright © 2017 Ahmad Chaddad et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Automated Feature Extraction in Brain Tumor by Magnetic Resonance Imaging Using Gaussian Mixture Models” [1], Markus Luedi, Pascal Zinn, and Rivka Colen were missing from the authors’ list. The corrected authors’ list is shown above.

References

A. Chaddad, “Automated feature extraction in brain tumor by magnetic resonance imaging using gaussian mixture models,” International Journal of Biomedical Imaging, vol. 2015, Article ID 868031, 11 pages, 2015.