International Journal of Biomedical Imaging
Volume 2018 (2018), Article ID 1657073, 1 page
https://doi.org/10.1155/2018/1657073

Corrigendum

Corrigendum to “Recent Advances in Microwave Imaging for Breast Cancer Detection”

Sollip Kwon and Seungjun Lee

Department of Electronics Engineering, Ewha Womans University, Seoul, Republic of Korea

Correspondence should be addressed to Seungjun Lee; slee@ewha.ac.kr

Received 12 February 2018; Accepted 18 February 2018; Published 2 May 2018

Copyright © 2018 Sollip Kwon and Seungjun Lee. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Recent Advances in Microwave Imaging for Breast Cancer Detection” [1], Figure has been replaced and Figure has been blanked as the copyright permissions to use them were not obtained. Also, the legends of Figures , , , 4, , , , , , , , , , , , , , , , , , , , , , , , and have been corrected in place to include the copyright permission.

References

S. Kwon and S. Lee, “Recent Advances in Microwave Imaging for Breast Cancer Detection,” International Journal of Biomedical Imaging, vol. 2016, Article ID 5054912, 25 pages, 2016.