International Journal of Biomaterials
Volume 2015 (2015), Article ID 320547, 1 page
http://dx.doi.org/10.1155/2015/320547

Corrigendum

Corrigendum to “Determination of Oxidative Stress Related Toxicity on Repeated Dermal Exposure of Hydroxyapatite Nanoparticles in Rats”

Parayanthala Valappil Mohanan,¹ Santhakumar Syama,¹ and Arumugam Sabareeswaran²

¹Toxicology Division, Biomedical Technology Wing, Sree Chitra Tirunal Institute for Medical Sciences and Technology, Thiruvananthapuram, Kerala 695 012, India
²Histopathology Laboratory, Biomedical Technology Wing, Sree Chitra Tirunal Institute for Medical Sciences and Technology, Thiruvananthapuram, Kerala 695 012, India

Received 21 March 2015; Accepted 9 April 2015

Copyright © 2015 Parayanthala Valappil Mohanan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Determination of Oxidative Stress Related Toxicity on Repeated Dermal Exposure of Hydroxyapatite Nanoparticles in Rats,” the first and last names of all the authors were reversed. The correct names in order (first name, last name) have been shown above.