International Journal of Biomaterials
Volume 2016 (2016), Article ID 9138945, 5 pages
http://dx.doi.org/10.1155/2016/9138945

Research Article

Fracture Resistance of Endodontically Treated Maxillary Premolars Restored by Various Direct Filling Materials: An In Vitro Study

Jozef Mincik,¹ Daniel Urban,² Silvia Timkova,³ and Renata Urban⁴

¹Private Dental Practice, Vystavby 3, 040 11 Kosice, Slovakia
²Mint Dental, Private Dental Practice, Ostravska 8, 040 11 Kosice, Slovakia
³Department of Dentistry and Maxillofacial Surgery, Faculty of Medicine, Pavol Jozef Safarik University, Rastislavova 43, 040 11 Kosice, Slovakia
⁴First Department of Dentistry, Faculty of Medicine, Pavol Jozef Safarik University, Trieda SNP 1, 040 11 Kosice, Slovakia

Received 14 June 2016; Revised 1 August 2016; Accepted 15 August 2016

Academic Editor: Feng-Huei Lin

Copyright © 2016 Jozef Mincik et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The aim of this study is to compare the effect of various restorative materials on fracture resistance in maxillary premolars. Premolars () with no restorations or cracks were selected. MOD cavities were prepared considering the buccolingual width to be equal to half of the intercuspal distance. The specimens were randomly divided into 8 groups, 8 specimens each: group A intact teeth, group B unfilled cavity, group C composite made by oblique layering technique, group D composite with 2 mm cusp coverage, group E bulk-filled posterior composite, group F glass-ionomer, group G amalgam, and group H composite with proximal boxes. The specimens were subjected to an axial compression load with the mean values of fracture resistance in group A: 1289 N, group B: 181.75 N, group C: 445.38 N, group D: 645.88 N, group E: 355.13 N, group F: 352.00 N, group G: 191.38 N, and group H: 572.00 N. There was no significant difference between groups B and G, between C and D, E, and F, and between group D and H. All other measurements were statistically significant. We conclude that composite restoration with cusp coverage is the most ideal nonprosthetic solution for endodontically treated teeth. Cusp coverage increases the fracture resistance compared to the conventional cavity design.

1. Introduction

Together with dental caries and periodontal disease, tooth fracture is the most common cause of tooth loss. Fractures are even more frequent in root-filled teeth. Excessive removal of coronal and radicular dentin during the root canal treatment (RCT) and lower residual moisture reduce the strength and increase tooth’s fragility. Loss of axial walls, quite common in teeth that require RCT, also significantly weakens the hard dental tissues [1]. Study conducted by Joynt et al. [2] claims that occlusal cavity preparation may reduce mechanical resistance of the remaining dental tissues by 20%. A need for removal of the marginal ridges widens the cavity even further into the interproximal space. Resistance of dental structures reduces by 2.5-fold. This results in an overall 46% reduction in its mechanical resistance. In case when both marginal ridges are affected, the resistance decreases by 63%. Dalpino et al. [3] showed that mesio-occluso-distal (MOD) cavity design measuring half of the intercuspal distance, rounded internal angles, and either convergent or divergent angulation of internal walls weakens the remaining tooth structure. Relatively wide MOD cavities restored with amalgam frequently develop cusp fractures due to continuous functional occlusal forces. This is mainly caused by the inability of amalgam to strengthen weakened cusps [4]. Studies investigating this matter raised hope for recognizing the elements that can reinforce the remaining tooth structure. This can be accomplished by the application of adhesive restorative materials. However, some questions still require more evidence in order to provide conclusive answers. What restorative technique should be used to better reinforce the remaining tooth structure? How important is the role of adhesive agents that bond the restorative material to the tooth? Is it possible to reproduce the initial resistance of the tooth after the preparation? Ever improving quality of advanced dental materials and progress in manufacturing of bonding agents make the reinforcement of tooth structures possible [5]. The aim of our study is to compare the fracture resistance of endodontically treated maxillary premolars. These were restored by direct MOD fillings using various restorative materials. We investigated what impact might the cavity design (cusp preservation, cusp reduction, and proximal cavity), filling material (composite, glass-ionomer, and amalgam), and filling technique (incremental, bulk-fill) have on the overall mechanical resistance.

2. Materials and Methods

We selected a total of 64 human caries-free premolar teeth with no restorations or cracks. Buccolingual dimension of selected teeth varied between 8.12 and 10.03 mm. Each tooth was examined under a 10x magnification and those presenting visible enamel cracks or fractures were rejected. Teeth had been extracted within the previous 3 months for orthodontic reasons. Following the extraction, teeth were stored in 100 percent humidity throughout the study period. Maxillary premolars were selected since they are appropriate for evaluation of the efficacy of materials to increase their fracture resistance. Their anatomy, function, crown size, and crown/root ratio may make them more prone to fracture than other posterior teeth. Moreover, considering their location in the dental arch, they are subjected to both compressive and shear forces.

The premolars were embedded in an acrylic cylinder (external diameter 20.0 mm, height 20.0 mm) up to 2.0 mm below the cementoenamel junction (CEJ) using self-curing acrylic resin. MOD cavities were prepared using a high-speed handpiece and a diamond bur with continuous water cooling. Cavity preparation was initiated by an occlusal approach with a spherical diamond bur. Removal of the pulp chamber roof and reduction of mesial and distal walls were achieved with a cylindrical diamond bur, creating a 4 mm deep interproximally extended cavity. The buccolingual width of the isthmus was approximately one half of the intercuspal distance. Group D received a further 2.0 mm reduction of both buccal and palatal cusps. The cavity dimensions were carefully assessed with a digital caliper for proper standardization (Mitutoyo 500 173 Digimatic Caliper 300 mm/12 in, Mitutoyo Europe GmbH).

The specimens were randomly divided into 8 groups with 8 teeth each: group A (control) included intact teeth, group B included teeth with unfilled MOD cavity, group C had teeth restored with nanohybrid composite (GrandioSO®, VOCO GmbH) using oblique layering technique, group D contained teeth restored with composite (GrandioSO, VOCO GmbH) with 2 mm cusp reduction (Figure 1), group E included teeth bulk-filled with hybrid posterior composite (X-tra fil®, VOCO GmbH), group F included premolars restored with fast setting glass-ionomer restorative (IonoStar Plus®, VOCO GmbH), group G had teeth restored with amalgam material (Tytin®, Kerr Corporation), and finally group H had teeth restored with composite (GrandioSO, VOCO GmbH) while the cavity was prepared to simulate the treatment of a vital tooth with mesial and distal boxes.

(a)

(b)

Figure 1: Specimens without (a) and with (b) cusp reduction as described by Lia Mondelli et al. [6].

The floor of the exposed pulp chamber was treated with a layer of glass-ionomer cement. Preparation was completed and all surfaces were washed and air-dried using water and compressed air. Specimens in groups C, D, E, and H were conditioned with bonding agent (Futurabond M, VOCO), a single-component, light-curing, self-etching agent reinforced with nanoparticles.

Specimens in group H received the occlusal isthmus of 4 mm buccolingually with pulpal floor 2 mm deep. The buccolingual widths of mesial and distal boxes were 4 mm wide, comparable to the width of the occlusal isthmus. Each interproximal box had a gingival floor depth of 2 mm mesiodistally and axial wall height of 4 mm. Margins were prepared with 90° cavosurface angle.

3. Testing Conditions

After 48 hours of storage, the specimens were mounted in an universal testing machine (LR5k, Lloyd Instruments) and subjected to an axial compressive load applied parallel to the long axis of the tooth and to the slopes of the cusps. A steel sphere (4 mm wide) loaded the buccal and lingual cusps of the tested specimens at a crosshead speed of 0.5 mm/min, until fracture occurred. The load required to inflict fracture was expressed in N (newton) as registered by the machine (Figure 2).

Figure 2: Mounted tooth in the acrylic cylinder under the LR5k testing machine.

Statistical analysis was performed using STATA/IC statistical software package (version 13.1 for Mac, StataCorp, USA).

4. Results

The measurements were analyzed by the Shapiro-Wilk test for normality () and Kolmogorov-Smirnov test for equal distribution (). Data were normally and uniformly distributed; parametric tests were used for further analysis. Descriptive statistics provided the mean fracture resistance values for each group with the value of standard deviation (SD) and maximal and minimal values as shown in Table 1.

Table 1: The comparison of the average values for resistance between the groups.

A
B
C
D
E
F
G
H

Mean
1289.00
181.75
445.38
645.88
355.13
352.00
191.38
572.00

SD
257.75
57.98
23.75
38.43
37.23
26.34
60.98
61.82

Min
972
113
405
584
300
326
124
475

Max
1700
267
468
688
404
404
277
617

variance ratio) = 100,034798,  P < 0,0001

A (intact), B (unfilled), C (composite oblique layering), D (composite cusp coverage), E (bulk fill), F (glass-ionomer), G (amalgam), H (proximal box cavity).

One-way analysis of variance was used to evaluate the significance of differences between groups at a level of difference of 0.0001 (Table 2).

Table 2: One-way analysis of variance of differences between groups.

Source of variation
Sum squares
DF
Mean square

Between groups
7130092.75
7
1018584.678571

Within groups
570209
56
10182.303571

Corrected total
7700301.75
63

The Tukey multiple comparisons test revealed significant differences among groups. Significant differences were found between the specimens of group D (cusp coverage) and others, except for group H. There was no significant difference between group C (oblique layering) specimens and both groups E (bulk composite) and F (GI filling). In addition, no statistically significant difference was found between group G (amalgam) and group B (unfilled MOD cavity). All other comparisons between the groups show statistically significant differences. Higher level of significance was present in comparison to amalgam fillings. The results of the measurements made between selected groups are shown in Table 3.

Table 3: Tukey multiple comparisons test between selected groups.

Group comparison
MD (95% CI)
L/SE (L)
Significance

B versus G
−9.625
0.269788
NS ()

C versus D
200.5
5.62
HS ( )

C versus F
93.375
2.617294
NS ()

C versus E
90.25
2.529701
NS ()

D versus E
290.75
8.149701
HS ( )

D versus H
73.875
2.070711
NS ()

E versus F
3.125
0.087594
NS ()

Mean difference (MD), confidence interval (CI), high significance (HS), no significance (NS), B (unfilled), C (composite oblique layering), D (composite cusp coverage), E (bulk fill), F (glass-ionomer), G (amalgam), group H (proximal box cavity).

5. Discussion

Main reason for the selection of premolars in this study lies in their morphology. Cuspal inclination of premolars renders them more susceptible to cusp fracture under occlusal force. MOD cavities were designed in order to mimic a situation that may often be seen in clinical settings. Comparable situation has also been extensively reproduced in other clinical studies (Table 4). This in vitro study investigated the fracture resistance of premolars with weakened class 2 MOD cavities. Teeth were restored using different restorative materials. The most severe consequence of poor mechanical resistance is a cusp fracture. Since tooth fracture is a common occurrence in clinics, study of this pathology remains relevant. Several studies have examined the incidence of dental fractures. They have established that the incidence of fractures is more frequent in premolars [7, 8]. Other authors investigated the relation between various direct restorations and their ability to reinforce the MOD cavities in premolars after the root canal treatment (Table 4). The mechanical resistance of sound teeth in other studies with the values varying from 825 N [9] to 1514 N [6] is comparable to the values found in our measurements. When comparing resistance of unfilled MOD cavities, deviations presented in selected papers are greater: from 171 [10] to 565 [11]. This deviation may be explained by different means of cavity preparation and different testing equipment. The diameters of testing sticks vary from 4.0 to 8.0 mm. In our work the diameter was 4.0 mm which translates into relatively higher loading pressure to which the tested specimen is exposed. It is our opinion that the differences in absolute values may be adjusted using relative difference between the resistance of the unfilled cavity and restored cavities.

Table 4: Summary of other studies testing the mechanical resistance on premolars.

Author (reference)
UP
UF
MOD
CC
CO
AMG

Javaheri et al. [16]
1139

919

705

Atiyah and Baban [17]
1123
545
687

672 SI

Lia Mondelli et al. [6]
1514

605
1419

BX

Moosavi et al. [18]

803

754 BF
BX

Ragauska et al. [19]
1218

941

1407 IY
BX

Santos and Bezerra [20]
1138
490
1054

Shafiei et al. [21]
1101
228

699

772 AC

Kikuti et al. [22]
940
460
780

520 SI

Torabzadeh et al. [12]
1051

791
1148
800 OY

Xie et al. [13]
1131

904
1085

Yamada et al. [9]
825

700

Shivanna and Gopeshetti [10]
1098
171
440

524 FRC

Fahad and Majeed [23]
1182
556
879

855 BF

Panahandeh and Johar [14]

873
1499
750 1CC
BX

Sharma et al. [24]
1193
248
867

501

Sarabi et al. [25]
1196

962

Pradeep et al. [11]
1139
565
778

818

Joshi et al. [26]
1005
221
720

841 FRC
BX

Unprepared tooth (UP), unfilled cavity (UF), cusp coverage (CC), one cusp coverage (1CC), composite other (CO), bulk-fill (BF), Siloran (SI), inlay (IY), onlay (OY), box preparation (BX), fibre-reinforced composite (FRC), amalgam capping (AC).

Our results show that the best means for increasing the mechanical resistance of the cavity is to include cusp coverage (capping). Cusp coverage may be a safe option for restoring teeth weakened by root canal treatment. The values of resistance in our study were significantly higher in comparison to the majority of studies with the exception of group H. Specimens in group H were prepared in order to mimic the preservation of tooth’s vitality. Similar results were found in the works of Torabzadeh et al. [12], Lia Mondelli et al. [6], Xie et al. [13], and Panahandeh and Johar [14].

Amalgam restorations had the lowest fracture resistance. Mechanical resistance values of amalgam restoration in our study are on average only 10 N higher than that of an unfilled cavity. This corresponds with the fact that the amalgam has no adhesion to the cavity walls. In this case Shafiei et al. advocate the use of cuspal coverage with combined composite-amalgam in endodontically treated maxillary premolars [15]. Results of glass-ionomer restorations were very promising. The mechanical resistance of GIC is comparable and statistically insignificant in comparison to the composite fillings (GI mean 352 N, composite mean 445 N). However, it may be important to consider that the mechanical resistance of GIC decreases rapidly after two years. Thus the GIC may be recommended as a relatively long term temporary filling material. It can be indicated for MOD cavities in case when immediate permanent restoration is not feasible. Cavity design that utilizes the interproximal box preparation shows minimal improvement of mechanical resistance values compared to conventional MOD cavities. This may support the evidence claiming that marginal ridge conservation (tunnel preparation) could be in some instances more beneficial technique. Bulk-fill composites show similar resistance values compared to conventional composite resins (445 N and 352 N, resp.).

6. Conclusion

Our results show that a composite restoration with cusp coverage is in fact the most ideal nonprosthetic solution for endodontically treated teeth. Such restorations withstand occlusal forces that are 200.5 N stronger than restorations made by oblique layering technique and 454.5 N stronger than amalgam restorations. Buccal and lingual cusp coverage in extensive MOD cavities of maxillary premolars significantly increases the fracture resistance compared to the more conventional cavity design. Modern fast setting glass-ionomer cement with mechanical parameters similar to that of composites may be recommended as a long term temporary fillings. Clinical success is determined by the application of sound biomechanical principles adapted to the specific tooth and specific clinical situation.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this paper.

References

S. G. Ellis, J. F. McCord, and F. J. Burke, “Predisposing and contributing factors for complete and incomplete tooth fractures,” Dental Update, vol. 26, no. 4, pp. 150–158, 1999.

R. B. Joynt, G. Wieczkowski Jr., R. Klockowski, and E. L. Davis, “Effects of composite restorations on resistance to cuspal fracture in posterior teeth,” The Journal of Prosthetic Dentistry, vol. 57, no. 4, pp. 431–435, 1987.

P. H. P. Dalpino, C. E. Francischone, A. Ishikiriama, and E. B. Franco, “Fracture resistance of teeth directly and indirectly restored with composite resin and indirectly restored with ceramic materials,” American Journal of Dentistry, vol. 15, no. 6, pp. 389–394, 2002.

J. G. Bell, M. C. Smith, and J. J. de Pont, “Cuspal failures of MOD restored teeth,” Australian Dental Journal, vol. 27, no. 5, pp. 283–287, 1982.

P. Ausiello, A. J. De Gee, S. Rengo, and C. L. Davidson, “Fracture resistance of endodontically-treated premolars adhesively restored,” American Journal of Dentistry, vol. 10, no. 5, pp. 237–241, 1997.

R. F. Lia Mondelli, S. K. Ishikiriama, O. de Oliveira Filho, and J. Mondelli, “Fracture resistance of weakened teeth restored with condensable resin with and without cusp coverage,” Journal of Applied Oral Science, vol. 17, no. 3, pp. 161–165, 2009.

W. T. Cavel, W. P. Kelsey, and R. J. Blankenau, “An in vivo study of cuspal fracture,” The Journal of Prosthetic Dentistry, vol. 53, no. 1, pp. 38–42, 1985.

W. S. Eakle, “Increased fracture resistance of teeth: comparison of five bonded composite resin systems,” Quintessence international, vol. 17, no. 1, pp. 17–20, 1986.

Y. Yamada, Y. Tsubota, and S. Fukushima, “Effect of restoration method on fracture resistance of endodontically treated maxillary premolars,” International Journal of Prosthodontics, vol. 17, no. 1, pp. 94–98, 2004.

V. Shivanna and P. B. Gopeshetti, “Fracture resistance of endodontically treated teeth restored with composite resin reinforced with polyethylene fibres,” Endodontology, vol. 24, pp. 73–79, 2013.

P. Pradeep, V. S. Kumar, S. R. Bantwal, and G. S. Gulati, “Fracture strength of endodontically treated premolars: an in-vitro evaluation,” Journal of International Oral Health, vol. 3, no. 6, pp. 9–17, 2013.

H. Torabzadeh, A. Ghasemi, A. Dabestani, and S. Razmavar, “Fracture resistance of teeth restored with direct and indirect composite restorations,” Journal of Dentistry, vol. 10, no. 5, pp. 417–425, 2013.

K. X. Xie, X. Y. Wang, X. J. Gao, C. Y. Yuan, J. X. Li, and C. H. Chu, “Fracture resistance of root filled premolar teeth restored with direct composite resin with or without cusp coverage,” International Endodontic Journal, vol. 45, no. 6, pp. 524–529, 2012.

N. Panahandeh and N. Johar, “Effect of different cusp coverage patterns on fracture resistance of maxillary premolar teeth in MOD composite restorations,” Journal of Islamic Dental Association of Iran, vol. 25, no. 4, pp. 228–232, 2014.

F. Shafiei, M. Memarpour, and M. Doozandeh, “Three-year clinical evaluation of cuspal coverage with combined composite-amalgam in endodontically-treated maxillary premolars,” Operative Dentistry, vol. 35, no. 6, pp. 599–604, 2010.

M. Javaheri, L. Bahmani-Zanjani, V. Rakhshan, and M. Foroozia, “Vertical fracture resistance of endodontically treated teeth restored with four sets of obturation and filling materials,” Journal of Dental Sciences, vol. 7, no. 2, pp. 130–136, 2012.

A. H. Atiyah and L. M. Baban, “Fracture resistance of endodontically treated premolars with extensive MOD cavities restored with different composite restorations: an in vitro Study,” Journal of Baghdad College of Dentistry, vol. 26, no. 1, pp. 7–15, 2014.

H. Moosavi, M. Zeynali, and Z. H. Pour, “Fracture resistance of premolars restored by various types and placement techniques of resin composites,” International Journal of Dentistry, vol. 2012, Article ID 973641, 5 pages, 2012.

A. Ragauska, P. Apse, V. Kasjanovs, and L. Berzina-Cimdina, “Influence of ceramic inlays and composite fillings on fracture resistance of premolars in vitro,” Stomatologija, vol. 10, no. 4, pp. 121–126, 2008.

M. J. M. C. Santos and R. B. Bezerra, “Fracture resistance of maxillary premolars restored with direct and indirect adhesive techniques,” Journal of the Canadian Dental Association, vol. 71, no. 8, p. 585, 2005.

F. Shafiei, M. Memarpour, and F. Karimi, “Fracture resistance of cuspal coverage of endodontically treated maxillary premolars with combined composite-amalgam compared to other techniques,” Operative Dentistry, vol. 36, no. 4, pp. 439–447, 2011.

W. Y. Kikuti, F. O. Chaves, V. D. Hipólito, F. P. Rodrigues, and P. H. P. D'Alpino, “Fracture resistance of teeth restored with different resin-based restorative systems,” Brazilian Oral Research, vol. 26, no. 3, pp. 275–281, 2012.

F. Fahad and M. A. Majeed, “Fracture resistance of weakened premolars restored with sonically-activated composite, bulk-filled and incrementally-filled composites (A comparative in vitro study),” Journal of College of Dentistry of Uinversity of Baghdad, vol. 26, no. 4, pp. 22–27, 2014.

V. Sharma, S. Kumar, and P. Monga, “Comparison of fracture resistance of endodontically treated teeth using different coronal restorative materials: an in vitro study,” Journal of Conservative Dentistry, vol. 12, no. 4, pp. 154–159, 2009.

N. Sarabi, H. Taji, J. Jalayer, and N. Ghaffari, “Fracture resistance and failure mode of endodontically treated premolars restored with different adhesive restorations,” Journal of Dental Materials and Techniques, vol. 4, no. 1, pp. 13–20, 2015.

C. Joshi, M. Patel, P. Desai, and P. Patel, “Comparative analysis of fracture resistance of maxillary premolars with class II MOD cavities restored with novel nanocomposites including fibre reinforced composite restorative system: a step ahead in composite dentistry,” Advances in Human Biology, vol. 4, no. 2, pp. 14–21, 2014.