International Journal of Corrosion
Volume 2017 (2017), Article ID 6080843, 2 pages
https://doi.org/10.1155/2017/6080843

Corrigendum

Corrigendum to “A Study of N,N-Diethylammonium O,O′-Di(p-methoxyphenyl)dithiophosphate as New Corrosion Inhibitor for Carbon Steel in Hydrochloric Acid Solution”

Chuan Lai,1,2,3 Bin Xie,2,3 Changlu Liu,¹ Wan Gou,¹ Lvshan Zhou,¹ Xiulan Su,¹ and Like Zou2,3

¹School of Chemistry and Chemical Engineering, Sichuan University of Arts and Science, Dazhou 635000, China
²Institute of Functional Materials, Sichuan University of Science and Engineering, Zigong 643000, China
³Material Corrosion and Protection Key Laboratory of Sichuan Province, Sichuan University of Science and Engineering, Zigong 643000, China

Correspondence should be addressed to Bin Xie; xiebinsuse@163.com

Received 7 April 2016; Accepted 26 July 2016; Published 9 January 2017

Copyright © 2017 Chuan Lai et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The article titled “A Study of N,N-Diethylammonium O,O′-Di(p-methoxyphenyl)dithiophosphate as New Corrosion Inhibitor for Carbon Steel in Hydrochloric Acid Solution” [1] contained an error in Section , Adsorption Isotherm. The text reading “In general, the values of around −20 kJ  or less negative are associated with an electrostatic interaction between charged inhibitor molecules and charged metal surface (physisorption) and those of −40 kJ  or more negative involve charge sharing or transfer of electrons from the inhibitor molecules to the metal surface to form a coordinate type bond (chemisorption). Based on (), the value of for EAPP on carbon steel in HCl solution at different temperatures is 33.11 kJ . It indicates that the adsorption of EAPP on carbon steel surface in 0.5 M HCl is chemical adsorption” should be updated as follows:

“Generally, it is usually accepted that the value of around −20 kJ  or less negative indicates that the adsorption is physisorption in which the inhibition action is due to the electrostatic interaction between the charged molecules and the charged metal [29–35]. On the other hand, the values which around −40 kJ  or more negative indicates that is corresponding to chemisorption process, which is attributed to the charge sharing or transfer processes from the inhibitor molecules to the metal surface in order to forming a sort of covalent or coordinate bonds [29–35]. The of EAPP on carbon steel in HCl solution is −33.11 kJ , which between −20 kJ  and −40 kJ , suggesting that the adsorption of EAPP molecules on carbon steel surface is not merely physisorption or chemisorption. It includes that a complex comprehensive kind of interaction, involving both physisorption and chemisorption (mixed adsorption), are taking place for carbon steel in HCl solution”.

As a result, the following references should be added:

[29] H. M. A. El-Lateef, “Experimental and computational investigation on the corrosion inhibition characteristics of mild steel by some novel synthesized imines in hydrochloric acid solutions,” Corrosion Science, vol. 92, pp. 104–117, 2015.[30]S. Ghareba, and S. Omanovic, “12-Aminododecanoic acid as a corrosion inhibitor for carbon steel,” Electrochimica Acta, vol. 56, no. 11, pp. 3890–3898, 2011.[31]G. Q. Xia, X. H. Jiang, L. M. Zhou, Y. W. Liao, M. Duan, H. Wang, Q. Pu, and J. Zhou, “Synergic effect of methyl acrylate and N-cetylpyridinium bromide in N-cetyl-3-(2-methoxycarbonylvinyl) pyridinium bromide molecule for X70 steel protection,” Corrosion Science, vol. 94, pp. 224–236, 2015.[32]P. Mourya, P. Singh, A. K. Tewari, R. B. Rastogi, and M. M. Singh, “Relationship between structure and inhibition behavior of quinolinium salts for mild steel corrosion: Experimental and theoretical approach,” Corrosion Science, vol. 95, pp. 71–87, 2015.[33]I. Lozano, E. Mazario, C. O. Olivares-Xometl, N. V. Likhanova, and P. Herrasti, “Corrosion behaviour of API 5LX52 steel in HCl and H2SO4 media in the presence of 1,3-dibencilimidazolio acetate and 1,3-dibencilimidazolio dodecanoate ionic liquids as inhibitors,” Materials Chemistry and Physics, vol. 147, pp. 191–197, 2014.[34]A. E. Bribria, M. Tabyaouia, B. Tabyaoui, H. E. Attaric, and F. Bentiss, “The use of Euphorbia falcata extract as eco-friendly corrosion inhibitor of carbon steel in hydrochloric acid solution” Materials Chemistry and Physics, vol. 141, pp. 240–247, 2013.[35]L. Wang, M. J. Zhu, F. C. Yang, and C. W. Gao, “Study of a triazole derivative as corrosion inhibitor for mild steel in phosphoric acid solution,” International Journal of Corrosion, vol. 2012, pp. 1–6, 2012.

The authors would like to apologize for any inconvenience caused.

References

C. Lai, B. Xie, C. Liu et al., “A study of N,N-diethylammonium O,O′-di(p-methoxyphenyl)dithiophosphate as new corrosion inhibitor for carbon steel in hydrochloric acid solution,” International Journal of Corrosion, vol. 2016, Article ID 1907634, 8 pages, 2016.