International Journal of Corrosion
Volume 2019 (2019), Article ID 1206098, 6 pages
https://doi.org/10.1155/2019/1206098

Research Article

Effect of Oxidizing Decontamination Process on Corrosion Property of 304L Stainless Steel

Zhaohui Tian, Lijun Song, and Xinmin Li

Suzhou Nuclear Power Research Institute, Suzhou, Jiangsu 215004, China

Correspondence should be addressed to Lijun Song; songlijun1980@163.com

Received 22 March 2019; Revised 16 June 2019; Accepted 2 July 2019; Published 1 August 2019

Academic Editor: Ramazan Solmaz

Copyright © 2019 Zhaohui Tian et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Corrosion behaviors of 304L stainless steel (SS) and 304L SS with oxides film (preoxidation 304L SS) in 1 g/L potassium permanganate solution of various pH values were investigated by using mass loss, electrochemical measurement and scanning electron microscope (SEM) observation. The results showed that mass loss of 304L SS increases with the increase of sodium hydroxide or nitric acid concentration in 1 g/L potassium permanganate solution. The polarization curves of 304L SS in potassium permanganate solution show that passive zones are destroyed more easily in acid potassium permanganate solution than alkaline potassium permanganate solution. The corrosion ability of acid potassium permanganate (NP) decontamination solution used for 304L SS is more aggressive than alkaline potassium permanganate (AP) solution. The oxide film on the surface of preoxidation 304L SS can be removed completely in two oxidation reduction decontamination cycles, oxidizing solution of which comprised 0.4g/L sodium hydroxide and 1g/L potassium permanganate. The 304L SS and preoxidation 304L SS performed alkaline oxidation reduction decontamination of 3 cycles were reoxidation. The micromorphology of reoxidation specimens was similar to preoxidation 304L SS. Therefore the chemical decontamination of alkaline oxidizing and acid reducing steps had no negative effect on corrosion of 304L SS and reoxidation of 304L SS carried out decontamination.

1. Introduction

Corrosion products are generated in the steam generators, loop piping, and other reactor internal surfaces during reactor operation [1–3]. These corrosion products eventually comprise the source term of the crud in the reactor. Radioactive isotopes of the transition metals (Co⁶⁰, Mn⁵⁴, Cr⁵¹, etc.) also participate in oxides and contribute greatly to increasing the dose rate in circuit [4–6]. Chemical decontamination is an effective method to reduce occupational radiation exposure during large-scale maintenance tasks such as the overhaul of primary recirculation pumps and shroud replacement in in-service nuclear power plants (NPPs) [7]. Therefore, many different chemical decontamination methods have been developed [8–15], such as HP/CORD (Chemical Oxidation Reduction Decontamination), AP/CITROX (Citric plus Oxalic acids), and LOMI (Low Oxidation state Metal Ion). Each has its own merits and demerits. In most cases, the most crucial step for chemical decontamination to be successful is the removal of the Cr enriched layer of oxide. Especially in Pressurized Water Reactor (PWR) conditions, the decontamination process calls for oxidation of these Cr ions from trivalent to hexavalent, which form more easily soluble species. Among the various known pretreatment chemicals, the permanganate-based reagents are known to be the most efficient [13–15]. Resulting from a decontamination procedure performed, the corrosion rate of the metals may eventually be increased; therefore, to minimize the corrosion damage, the preparation of perfectly clean and passive surfaces in addition to a chemical decontamination is strongly recommended.

Austenitic stainless steels are widely used as construction material in PWRs all over the world. In this paper, the effect of oxidation decontamination steps on corrosion performance of 304L stainless steels (SS) was investigated. The pH of potassium permanganate solution is evaluated for the optimum removal of oxides and generating minimum corrosion of 304L SS.

2. Experimental Details

The chemical compositions of 304L SS used in this work are shown in Table 1. The dimension of sample used is 20 mm × 3 mm × 2 mm. The surfaces of samples were polished with a series of silicon carbide abrasive papers to a finish grit of 1200#. After that, samples were placed in an ultrasonic acetone bath for about five minutes and then air-dried.

Table 1: Chemical compositions of tested 304L SS (mass. %).

C
Si
Mn
S
P
Ni
Cr
Fe

0.024
0.33
1.30
0.001
0.015
8.19
18.22
71.92

The method is a multistage chemical decontamination composed of an oxidizing decontamination step and a reducing decontamination step. The alkaline potassium permanganate oxidizing and acid reducing steps are defined as AP-N, and acid potassium permanganate oxidizing and acid reducing steps are defined as NP-N. The compositions in oxidizing decontamination solution are shown in Table 2. Potassium permanganate solution is used as oxidizing agent, controlled to pH of 1~3 by addition of acidifying agent or 11.4~13.5 by addition of alkalizing agent. Ascorbic acid solution (1 g/L C₆H₈O₆) is used as reducing agent, controlled to pH by addition of 1 g/L nitric acid.

Table 2: Oxidizing decontamination solution.

Process decontamination cycles
NaOH (g/L)
HNO₃ (g/L)
KMnO₄ (g/L)
pH

Acid oxidizing step
1
0
0.05
1
3

2
0
0.2
1
2.5

3
0
0.65
1
2

4
0
2
1
1.5

5
0
6.5
1
1

Alkaline oxidizing step
1
0.1
0
1
11.4

2
0.4
0
1
12

3
1
0
1
12.5

4
4
0
1
13

5
10
0
1
13.5

Decontamination of the 304LSS specimens was performed by the oxidizing step and the reducing step. The 304L SS specimens were immersed into oxidizing decontamination solution for 8 h. Then specimens were washed by using deionized water and air-dried. After that, these specimens were immersed into reducing solutions for 5 h. The temperature of oxidizing solutions and reducing solutions was maintained at 80°C and the rotating speed of samples was 30r·min⁻¹. This multicycle chemical decontamination of 5 cycles had been carried out. The mass was measured by an XS105DU electric balance with an accuracy of 0.1 mg.

High-temperature high-pressure water immersion test was conducted in a 2.5 L autoclave made by Alloy 625. Corrosion tests were conducted at 300°C under a pressure of 15.5 MPa for time periods up to 1000 h. The tested solution is 800 mg/L B as well as 2.2 mg/L Li water solution which was prepared by H₃BO₃, LiOH, and deionized water. The purities of all chemicals were of analytical grade. The preoxidation 304L SS undergoing three AP-N (0.4 g/L NaOH + 1 g/L KMnO₄) decontamination cycles was placed into autoclave again for reoxidation.

The surface morphologies were observed using Quanta 400FEG SEM. Electrochemical tests were carried out using a Reference 600+ electrochemical workstation. The working electrode was the 304L SS alloy with a 1 cm² exposed area. All working electrodes were ground by emery papers down to 1200#. A saturated calomel electrode (SCE) and a platinum electrode were used as reference electrode and auxiliary electrode, respectively. The testing medium, at a temperature of 40 ± 1°C, was the deionization water with KMnO₄ and NaOH or HNO₃. The potentials range of polarization test was -0.2~1V (vs. OCP), with a scanning rate of 0.333 mV/s.

3. Results

3.1. Mass Loss of 304L SS

The mass loss of 304L SS after NP-N and AP-N is shown in Figures 1 and 2, respectively. It is obvious that the mass loss of 304L SS after NP-N and AP-N decontamination increases in both cases with decontamination cycles. Figure 1 shows the highest mass loss of 304L SS occurring in 1 g/L KMnO₄ + 6.5 g/L HNO₃ solution (pH=1). As may be seen from Figure 1, excessive HNO₃ gives rise to serious corrosion of 304L SS, which is consistent with literatures [16, 17]. Therefore, the alkaline oxidizing solution is more beneficial to reduce corrosion of 304L SS than acid oxidizing solution.

Figure 1: The mass loss of 304L SS carrying out NP-N decontamination.

Figure 2: The mass loss of 304L SS carrying out AP-N decontamination.

3.2. Mass Loss of Preoxidation 304L SS

Figure 3 shows the relationship of mass loss for preoxidation 304L SS and AP-N decontamination cycles. The mass loss of preoxidation 304L SS gradually decreases with the increase of decontamination cycles. The mass loss of preoxidation 304L SS in AP-N chemical decontamination of 1~5 cycles is 0.161 mg/cm², 0.256 mg/cm², 0.351 mg/cm², 0.354 mg/cm², and 0.358 mg/cm², respectively. The mass loss of preoxidation 304L SS in 3~5 chemical decontamination cycles has no obvious increase. The result shows that the oxides on the surface of 304L SS that had been completely removed only carried out AP-N chemical decontamination of 2 cycles.

Figure 3: Mass loss of preoxidation 304L SS carrying out AP-N chemical decontamination.

3.3. Electrochemical Behavior

The potentiodynamic polarization curves of 304L SS in 1 g/L KMnO₄ + X g/L HNO₃ (X = 0.05, 0.2, 0.6, 2, and 6.5) solution are shown in Figure 4. It can be seen from Figure 4 that the corrosion potential of 304L SS increases with increasing of HNO₃ concentration. There are no obvious passivation zones, when HNO₃ concentration reaches 2 ~ 6.5g/L (pH=1.5~1). The lower pH in acid oxidizing decontamination solution increases the corrosion of 304L SS.

Figure 4: The potentiodynamic polarization curves of 304L SS in acid KMnO₄ solution.

The potentiodynamic polarization curves of 304L SS in 1 g/L KMnO₄ + X g/L NaOH (X = 0.1, 0.4, 1, 4, and 10) solution are shown in Figure 5. It can be seen from Figure 5 that the range of passivation potential gradually reduces with the increase of NaOH concentration. The stable passivation zones of 304L SS in alkaline KMnO₄ solution are destroyed, when the NaOH concentration reaches 10g/L (pH=13.5). The cathodic polarization of 304L SS in alkaline KMnO₄ solution change and corrosion potential greatly increase, when the NaOH concentration reaches 4g/L (pH=13) and 10/L (pH=13.5). The corrosion potential of 304L SS in acid KMnO₄ solution is greater than alkaline KMnO₄ solution. The acid KMnO₄ solution is more harmful on corrosion of 304L SS than alkaline KMnO₄ solution.

Figure 5: The potentiodynamic polarization curve of 304L SS in alkaline KMnO₄ solution.

3.4. Surface Morphology

Figure 6 shows the morphologies of (a) preoxidation 304L SS and ((b), (c), and (d)) preoxidation 304L SS carrying out AP-N decontamination of 1~3 cycles. It can be seen that preoxidation 304L SS is covered with a layer of black oxide film, as shown in Figure 6(a). After the decontamination of 1 cycle, the surface of sample is brown. With the increase of decontamination cycles, the surface of preoxidation 304L SS turns into metal gray gradually. And the macromorphologies of preoxidation 304L SS carrying out decontamination of 2 and 3 cycles are similar.

(a)

(b)

(c)

(d)

Figure 6: The morphologies of (a) preoxidation 304L SS and ((b), (c), and (d)) preoxidation 304L SS carrying out AP-N decontamination of 1~3 cycles.

There are many large particles on the outer surface and small particles on the inside surface of preoxidation 304L SS shown in Figure 7(a). It can be seen from Figure 7(b1) that there are no oxides particles on the surface of preoxidation 304L SS carrying out decontamination of 1 cycle. Figure 7(b2) shows that there was much porous structure on the surface of preoxidation 304L SS carrying out decontamination of 2 cycles. The micromorphology of preoxidation 304L SS carrying out decontamination of 3 cycles is similar to 2 cycles. It is indicated that surface oxidation films were almost removed through AP-N decontamination of 2 cycles. Figure 7(c) shows a lot of oxide particles on the surface preoxidation 304L SS specimens carrying out AP-N decontamination of 3 cycles. And the micromorphology of reoxidation specimens is similar to preoxidation 304L SS.

Figure 7: The micromorphology of (a) preoxidation 304L SS, ((b1) (b2) and (b3)) preoxidation 304L SS carrying out AP-N decontamination of 1~3 cycles, respectively, and (c) reoxidation 304L SS carrying out AP-N decontamination of 3 cycles.

4. Conclusions

The mass loss of 304L SS carrying out oxidation reduction decontamination gradually increases with the increase of nitric acid or NaOH concentration. In the oxidizing decontamination solution, the acid KMnO₄ solution was more corrosive to the 304L SS than alkaline KMnO₄ solution. The passive zones of 304L SS were destroyed easily when acid or alkaline concentration in KMnO₄ solution is enough. The oxide films on the surface of preoxidation 304L SS have been totally removed after AP-N (0.4 g/L NaOH + 1 g/L KMnO₄) decontamination of 2 cycles and left lots of microspores on the surface. The macromorphology and micromorphology of preoxidation 304L SS were similar to reoxidation samples.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there are no conflicts of interest.

References

S. Sawochka and M. Leonard, Corrosion and Corrosion Product Release Rates of PWR Primary System Materials: A Research Assessment, Electric Power Research Institute, Palo Alto, Calif, USA, 2009.

H. Ocken, Corrosion-Product Release in Light Water Reactors, Electric Power Research Institute, Palo Alto, Calif, USA, 1984.

D. H. Lister, Water Chemical Nuclear Reactor System 6, vol. 6, BNES, London, UK, 1992.

C. Steinkuhler, K. Lenie, and R. Coomans, “Experience in chemical decontamination of PWR systems and components,” in Proceedings of the ASME 2009 12th International Conference on Environmental Remediation and Radioactive Waste Management, pp. 93–100, Liverpool, UK, 2009.

J. Fachinger, W. von Lensa, and T. Podruhzina, “Decontamination of nuclear graphite,” Nuclear Engineering and Design, vol. 238, no. 11, pp. 3086–3091, 2008.

S. Keny, A. Kumbhar, G. Venkateswaran, and K. Kishore, “Radiation effects on the dissolution kinetics of magnetite and hematite in EDTA- and NTA-based dilute chemical decontamination formulations,” Radiation Physics and Chemistry, vol. 72, no. 4, pp. 475–482, 2005.

D. García, V. Bruyère, R. Bordoni, A. Olmedo, and P. Morando, “Malonic acid: A potential reagent in decontamination processes for Ni-rich alloy surfaces,” Journal of Nuclear Materials, vol. 412, no. 1, pp. 72–81, 2011.

D. H. Lister, “Activity transport and corrosion processes in PWRs,” Nuclear Energy, vol. 32, no. 2, pp. 103–114, 1993.

K. Varga, P. Baradlai, G. Hirschberg et al., “Corrosion behaviour of stainless steel surfaces formed upon chemical decontamination,” Electrochimica Acta, vol. 46, no. 24-25, pp. 3783–3790, 2001.

Z. Németh, B. Baja, K. Radó et al., “Comparative study of the corrosion and surface chemical effects of the decontamination technologies,” Journal of Radioanalytical and Nuclear Chemistry, vol. 286, no. 3, pp. 815–821, 2010.

D. Bradbury, M. G. Segal, and R. M. Sellers, Development of LOMI Chemical Decontamination Technology, Calif, USA, 1983.

T. Swan, M. G. Segal, and W. J. Williams, LOMI Decontamination Reagents and Related Oxidation Processes, EPRI, Calif, USA, 1987.

M. Nagase, K. Ishida, N. Uetake et al., “Low corrosive chemical decontamination method using pH control, (I) basic system,” Journal of Nuclear Science and Technology, vol. 38, no. 12, pp. 1090–1096, 2012.

A. Szabó, K. Varga, Z. Németh et al., “Effect of a chemical decontamination procedure on the corrosion state of the heat exchanger tubes of steam generators,” Corrosion Science, vol. 48, no. 9, pp. 2727–2749, 2006.

M. G. Segal and W. J. Williams, “Kinetics of metal oxide dissolution. Oxidative dissolution of chromium(III) oxide by potassium permanganate,” Journal of the Chemical Society, Faraday Transactions 1: Physical Chemistry in Condensed Phases, vol. 82, no. 10, p. 3245, 1986.

H. Spychala, D. Noel, J. Gregoire, and D. Noeel, “Method for dissolving oxides deposited on a metal substrate,” WO9415001-A, 1994.

J. Manjanna and G. Venkateswaran, “Effect of oxidative pretreatment for the dissolution of Cr-substituted hematites/magnetites,” Industrial & Engineering Chemistry Research, vol. 41, no. 13, pp. 3053–3063, 2002.