International Journal of Cell Biology

Volume 2013 (2013), Article ID 839329, 10 pages

http://dx.doi.org/10.1155/2013/839329

Review Article

Identification of Misfolded Proteins in Body Fluids for the Diagnosis of Prion Diseases

Francesca Properzi and Maurizio Pocchiari

Department of Cell Biology and Neurosciences, Istituto Superiore di Sanità, Viale Regina Elena 299, 00161 Rome, Italy

Received 21 May 2013; Revised 10 July 2013; Accepted 11 July 2013

Academic Editor: Alessio Cardinale

Copyright © 2013 Francesca Properzi and Maurizio Pocchiari. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Transmissible spongiform encephalopathy (TSE) or prion diseases are fatal rare neurodegenerative disorders affecting man and animals and caused by a transmissible infectious agent. TSE diseases are characterized by spongiform brain lesions with neuronal loss and the abnormal deposition in the CNS, and to less extent in other tissues, of an insoluble and protease resistant form of the cellular prion protein (), named . In man, TSE diseases affect usually people over 60 years of age with no evident disease-associated risk factors. In some cases, however, TSE diseases are unequivocally linked to infectious episodes related to the use of prion-contaminated medicines, medical devices, or meat products as in the variant Creutzfeldt-Jakob disease (CJD). Clinical signs occur months or years after infection, and during this silent period , the only reliable marker of infection, is not easily measurable in blood or other accessible tissues or body fluids causing public health concerns. To overcome the limit of detection, several highly sensitive assays have been developed, but attempts to apply these techniques to blood of infected hosts have been unsuccessful or not yet validated. An update on the latest advances for the detection of misfolded prion protein in body fluids is provided.

1. Introduction

There are several forms of Transmissible Spongiform Encephalopathy (TSE) diseases or prion diseases affecting humans and different species of farm and wild animals (i.e., sheep, cattle, and cervids). Some of them have an apparently spontaneous occurrence (i.e., sporadic and genetic TSEs; some forms of atypical bovine spongiform encephalopathy or scrapie), while others are linked to the consumption of prion-contaminated food as in the variant Creutzfeldt-Jakob disease (CJD) [1], feedstuff in bovine spongiform encephalopathy (BSE) [2], or medical and surgical devices in iatrogenic CJD [3]. Transmission of variant CJD via blood transfusion and possibly plasma-derived factor VIII from asymptomatic donors [4] indicates that prion infectivity is present in blood months or years before clinical onset. Thus, the occurrence of epidemics in farm animals and episodes of human cases linked to prion infection pose serious public health issues that are often difficult to solve [5]. An eloquent example is given by the yet unexplained discrepancy between mortality (176 death from 1995 to June 2013) [6] and estimated prevalence data (1 in 4,000 to 1 in 10,000 people) of variant CJD in the British population [7]. This incongruity is causing great concerns because healthy and infected donors who are not promptly identified might transmit disease by blood transfusion, surgical instruments, or plasma-derived products.

The only validated surrogate marker of infection is the abnormally misfolded isoform of the cellular prion protein (PrPC) despite intensive but disappointing search for the identification of other disease-specific biomarkers in easily accessible tissues or body fluids [8, 9]. Misfolded PrP (PrPTSE) accumulates in the CNS and other tissues of infected hosts assuming different conformations that are related to the strain of prions [10]. PrPTSE is easily detected by western blot or immunohistochemistry methods after removing the cellular isoform (PrPC). Most anti-PrP antibodies, in fact, do not distinguish between PrPTSE and PrPC requiring the removal of the cellular isoform for achieving disease-specific signals. This is usually realised by pretreating samples with proteases (usually proteinase K) that partially digest PrPTSE but completely remove PrPC. The use of proteinase K (PK), however, removes fractions of poorly aggregated misfolded PrPTSE that is usually present in blood [11] and likely other body fluids decreasing the chance of detection. Finally, it is still debated whether PrPTSE is unequivocally associated with prion infectivity as there are occasions in which PrPTSE is either not associated with infectivity [12] or absent in infected hosts [13]. Despite these limits, PrPTSE remains the best available choice for confirming the diagnosis of prion diseases and for the identification of prion-associated infectivity in tissues and body fluids. Moreover, the profile that assumes PrPTSE in western blot, reflecting different pathological conformations, is of great help for making a correct molecular diagnosis of sporadic CJD and for differentiating sporadic from variant CJD [14].

In the last 15 years several methods have been developed for increasing the sensitivity of PrPTSE detection with the aim of finding a reliable assay for an early diagnosis of prion diseases in easily accessible tissues or body fluids. An overview of these developments is the objective of this work.

2. Protein-Misfolding Cyclic Amplification (PMCA)

In 2001, Saborio and colleagues [15] developed a novel protocol for the in vitro amplification of the misfolded prion protein based on the principle that disaggregated PrPTSE incubated in the presence of a large excess of PrPC produces novel PrPTSE. Disaggregation of fibrils requires a sonication step, which can be repeated several times, in a cyclic process, to allow sensitive detection of the misfolded PrP of the original seed. The protein-misfolding cyclic amplification (PMCA) was originally developed using hamster brain homogenate and has since been shown to be an efficient method for the amplification of brain PrPTSE of other species including mouse, sheep, cattle, bank voles, cervids, and humans [16–23]. In human samples, the amplification of PrPTSE is strongly influenced by the correct matching of methionine/valine in the 129 residue of PrP, suggesting that this polymorphic site of the protein is important for the amplification of PrP misfolding by the PMCA assay [24–26].

Ten cycles of sonication are sufficient to increase the sensitivity of standard western blots from 6–12 picograms to 0.3–0.5 picograms of brain PrPTSE  and, with an improved automated protocol which enables a substantial increase in the number of amplification cycles, up to femtogram levels [27]. PMCA is therefore a promising platform for prion diagnosis in body fluids (blood, urine, and CSF) where the level of PrPTSE is estimated in the range of picograms per mL.

The group led by Soto reported the first successful identification of PrPTSE in blood (buffy coat) of scrapie affected hamsters with 89% sensitivity and 100% specificity [27] and positive signals in 50% of samples taken in the preclinical stage of disease as early as 20 days after intraperitoneal 263K scrapie injection [28]. The detection of PrPTSE in blood of preclinical scrapie-infected hamsters is consistent with data on infectivity detection in blood [8].

Since then, automated PMCA revealed the presence of PrPTSE in plasma fractions [29], urine [29–31], and cerebral spinal fluid (CSF) [32] of scrapie-diseased hamsters with sensitivity ranging from 50 (plasma) to 100 percent (CSF) (Table 1). In the CSF samples from scrapie-infected hamsters, PMCA was performed by using a further improved protocol (rPrP-PMCA) in which PrPC was replaced by recombinant PrP (recPrP), allowing a sensitivity greater than that observed with previous PMCA protocols [32].

Table 1: Detection of misfolded PrP in body fluids.

Assay¹
Species
Body fluid
Assay sensitivity (brain dilution)²
Inoculation route
Time (dpi)
Starting volume (mL)
Number of tested samples (treated/controls)
Sensitivity (%)
Specificity (%)
Reference

14
1
5/5
0
100

20
1
6/4
50
100

40
1
10/5
60
100

10⁻¹² (fg)
ip
60
1
5/4
40
100
[28]

Blood (bc)

70
1
5/5
20
100

80
1
5/5
0
100

Hamster

90 (c.s.)
1
10/10
80
100

10⁻¹² (fg)
ic
68 (c.s.)
1
18/12
89
100
[27]

10⁻¹² (fg)
ic
60
1.5
4/3
100
100
[29]

68 (c.s.)
1.5
3/3
100
100

Blood (plasma)
10⁻¹² (fg)
ic
60
1.5
4/5
50
100
[29]

68 (c.s.)
1.5
4/5
67
100

Urine
10⁻¹² (fg)
ic
68 (c.s.)
0.02
7/4
86
100
[29]

oi
155 (c.s.)
0.02
7/4
67
100

(—)
ip
90 (c.s.)
(—)
5/5
80
100
[30]

PMCA

CSF
(ag)
ic
68 (c.s.)
0.002
6/14
100
100
[32]

30
10⁴
1/2
0
100

60
10⁺⁴ (cells)
1/2
0
100

Blood (wbc)
10⁻⁸
oi
90
10⁺⁴ (cells)
1/2
100
100
[33]

130
10⁺⁴ (cells)
1/2
100
100

190 (c.s.)
10⁺⁴ (cells)
1/2
100
100

Sheep

10⁻⁹
ni
c.s.
10⁺⁷ (cells)
10/8
100
100³
[20]

Blood (plasma)
10⁻⁸
ni/oi⁴
b.c.s.
0.5
6/7
100
100
[34]

c.s.
0.5
9/7
100
100

Urine
10⁻⁸
ni/oi⁴
c.s.
0.5
4/4
100
100
[35]

Saliva
(fg)
ni
360
(—)
12/20
100
88
[36]

Cattle
Saliva
10⁻¹¹ (fg)
oi
c.s.
0.005
3/1
33
100
[37]

CSF
10⁻¹¹ (fg)
oi
c.s.
0.005
3/1
33
100

Blood (plasma)
10⁻⁸
oi
b.c.s.
0.5
2/1
100
100
[34]

Cervids
c.s.
0.5
3/1
100
100

Urine
10⁻⁸
oi
c.s.
0.5
5/2
100
100
[35]

CSF
10⁻⁵
ni
c.s.
0.025
4/31
75
100
[38]

10
0.5
1/11
100
100

Blood (plasma)
4 × 10⁻¹⁴ (ag)⁵
ic
30
0.5
3/11
100
100
[39]

Hamster

80 (c.s.)
0.5
9/11
100
100

CSF
10⁻⁹
ic
c.s.
0.002
2/2
100
100
[40]

Nasal lavage
10⁻⁹
ic
c.s.
0.004
8/2
100
100
[40]

Sheep
CSF
(fg)
ni
c.s.
0.005
1/1
100
100
[41]

QUIC

Spiked vCJD blood (plasma)
4 × 10⁻¹⁴ (ag)⁵
ni
c.s.
0.5
4/4
100
100
[39]

sCJD CSF
10⁻⁹ (fg)⁶
ni
c.s.
0.005
16/14
87.5
100
[42]

5 × 10⁻⁶ (0.1 pg)
ni
c.s.
0.015
67/51
87
100
[43]

Human
gCJD CSF (E200K)
10⁻⁹ (fg)⁶

22/1
87
100

gCJD CSF (V203I)
10⁻⁹ (fg)⁶
ni
c.s.
0.005
2/1
100
100
[44]

GSS CSF
10⁻⁹ (fg)⁶
20/1
78
100

FFI CSF
10⁻⁹ (fg)⁶

12/1
100
100

ICE
Human
CJD Blood (bc)
(—)
ni
c.s.
10
9/6
55
100
[45]

sFIDA
Sheep
Blood (plasma)
(—)
ni
c.s.
(—)
10/5
100
100
[46]

Cattle
CSF
(—)
oi
c.s.
0.02
6/6
50
100
[47]

Ligand-based IA

Blood (wbc)
(—)
ni
b.c.s.
5
23/129
56
100

Sheep
Blood (wbc)
(—)
ni
c.s.
5
80/129
55
100
[48]

Blood (wbc)
(—)
oi
c.s.
5
7/129
71
100

Metal matrix
Human
vCJD blood
10⁻¹⁰⁽⁵⁾
ni
c.s.
(—)
21/190
70
100
[49]

sCJD blood
27/190
0
100

EP-vCJD
Human
Spiked vCJD blood
5 × 10⁻⁷⁽⁵⁾
ni
c.s.
(—)
nd/1000
100
100
[50]

vCJD blood
ni
c.s.
(—)
3/20000
0
98
[51–53]

CDI
Human
vCJD blood
10⁻⁵⁽⁵⁾
ni
c.s.
(—)
7/4
100
100
[54]

sCJD blood (wbc)
0.5 pg
ni
c.s.
10⁺⁶ cells
24/27
0
100
[55]

MPD
Sheep
Blood (serum)

ni
c.s.
0.2
13/1
100
100
[54]

Primates
Blood (plasma)
1 ID/mL⁷
ni
c.s.
0.2
8/4
100
100
[56]

Human
sCJD Blood (plasma)

ni
c.s.
0.2
5/5
100
100

MDS
Hamster
Blood (plasma)
10⁻⁸
(—)
c.s.
0.078
9/9
100
100
[57]

The assay specification does not include protocol variations.

2Assay sensitivity is indicated as the end point dilution of scrapie brain homogenates. In brackets, estimates of the PrPTSE amount provided by the authors.

3Spontaneous formation of misfolded PrP was reported in some control samples after increased cycles of sonication.

4Authors used samples from both naturally and experimentally infected sheep.

5Dilution of variant CJD brain into healthy human blood.

6Dilution of sporadic CJD into artificial CSF.

7Measured on previously titered terminal plasma pool from mice experimentally infected with the Fukuoka-1 strain of GSS.

dpi: days postinoculation; fg: femtograms; ag: attograms; bc: buffy coat; wbc: white blood cells; c.s.: clinical symptoms; b.c.s.: before clinical symptoms; ic: intracerebral; ip: intraperitoneal; oi: oral inoculation; ni: natural infection; CSF: cerebral spinal fluid; CJD: Creutzfeldt-Jakob disease; GSS: Gerstmann-Sträussler-Scheinker syndrome; FFI: fatal familial insomnia.

Other than in hamster models, PrPTSE was amplified from blood leukocytes of both naturally [20, 34] and experimentally scrapie-infected sheep [33] where PrPTSE bands were detected as early as 90 days postinoculation and correlated with infectivity titres [33]. On leukocytes of naturally scrapie-infected sheep, PrPTSE was detected in all tested animals with 100% specificity by using an enhanced (i.e., addition of poly-A PMCA) protocol [20].

Attempts to detect PrPTSE in blood of other species such as cattle with BSE and cervids with CWD produced negative or controversial results [34, 37, 58]. In patients with various forms of prion diseases, the detection of PrPTSE by PMCA was not attempted (or results were not published) in sample of blood, blood derivatives, plasma, urine, or CSF despite amplification of PrPTSE was successfully reported in human brain samples taken from both sporadic and variant CJDs [16, 24–26].

Finally, PMCA amplification of PrPTSE in samples from body fluids, other than blood, taken from prion-infected hosts was successfully achieved in a variety of species and included saliva and urine in sheep with scrapie [36, 36];  saliva, urine, and CSF in cervids with CWD [38, 58]; and CSF and saliva in cattle with BSE [37]. A list of prion-infected body fluids analysed by PMCA with the obtained sensitivity and specificity is shown in Table 1.

In conclusion, PMCA has certainly been a breakthrough for detection of minute amount of PrPTSE that are likely present in body fluids and therefore is a candidate method for developing sensitive tests for the diagnosis of prion diseases in animals and humans. Moreover, the amplified product of PMCA retains the PrPTSE signature of the original seed allowing the molecular diagnosis of CJD in humans and scrapie in sheep with important public health implications. In the last 10 years, PMCA has frequently been modified by addition of poly-A [20] or sulfated dextrans [37], by the use of recombinant PrP instead of brain PrPC [32], or by coupling with sensitive immunoassays [34] that have on one side improved the sensitivity of PrPTSE detection but, on the other hand, made the comparison of data produced by different laboratories difficult. PMCA coamplifies infectivity together with PrPTSE [59, 60] mimicking the disease-specific pathogenic event but requiring safety precautions in diagnostic laboratories. Finally, PrPTSE bands may appear in control preparations after several PMCA cycles [61]. This finding, whether related to de novo formation of PrPTSE [20, 60, 61] or cross-contamination of samples [22], raised concern for the reliability of PMCA in diagnostic applications. This inconvenience, however, is easily settled by using low PMCA cycles and appropriate technical tips to avoid possible prion contamination [22].

3. Quacking Induced Conversion (QuIC)

A spin-off of the PMCA method was obtained by substituting sonication with automated tube shaking for the conversion of recPrP substrates [62]. The novel “quacking induced conversion” (QuIC) protocol enables the amplification of 1 femtogram of PrPTSE of scrapie hamster brain homogenate within one day, reducing the complexity and timing of misfolding amplification. Hamster recPrP promotes the conversion of brain misfolded proteins of other species such as sheep with scrapie and humans with sporadic and variant CJDs, regardless of the primary sequence of the PrPTSE seed [41]. Some spontaneous PK-resistant fragments of less than 12 kD are occasionally observed in unseeded control samples [32], but they wane out by reducing the incubation time of the reaction [41].

One of the most significant improvements of misfolding amplification methods was achieved when western blots were replaced by a real-time fluorescent colour reaction (real-time QuIC) [40, 42]. This novel read-out system, based on a fluorescent amyloid-sensitive thioflavin dye (ThT) [63], allowed the implementation of the whole QuIC procedure to a high-throughput 96-well format. The real-time QuIC (RT-QuIC) is an efficient quantitative method for the detection of minute amount of PrPTSE with estimates of the 50% seeding dose (SD₅₀) of hamster scrapie brain in the same order of magnitude of infectious doses (LD₅₀) [40].

RT-QuIC protocol has been adapted to the detection of brain PrPTSE of other species such as CWD-infected deer, scrapie-infected sheep, and sporadic CJD patients by using species-specific recPrP [40, 42, 64]. Full-length human recPrP and both truncated and full-length hamster recPrPs are efficient substrates for the amplification of PrPTSE in sporadic CJD brain irrespective of the 129 codon phenotypes [43, 64]. A note of disappointment is that the efficacy of variant CJD brain in seeding RT-QuIC reaction is consistently lower than sporadic CJD samples [64].

The presence of PrPTSE in the CSF by the QuIC assay was initially revealed by Atarashi and colleagues [62] in 263K-scrapie infected hamsters and Orrú and colleagues [41] in scrapie-infected sheep. In 2010, Wilham and colleagues [40] revealed the presence of PrPTSE in the CSF of 263K scrapie-infected hamsters by RT-QuIC and estimated a titre of about 10⁻² SD₅₀ per µL. CSF samples from control animals did not revealed any presence of PrPTSE indicating a high specificity of the assay. These encouraging results on the CSF of scrapie-infected host promoted further studies in patients with various forms of prion diseases. A blinded experiment was initially performed on 30 CSF samples of definite sporadic CJD patients provided by the Australian National CJD Registry and 155 controls (25 suspected CJD cases and 130 neurological controls) achieving 87.5% specificity and 100% sensitivity. CJD cases were positive irrespectively of 129 codon genotypes [42]. Similarly, McGuire and colleagues [43] screened CSF samples from sporadic CJD patients provided by the National Creutzfeldt-Jakob Disease Research & Surveillance Unit, Edinburgh, UK, including all three 129-codon genotype and obtaining 99% specificity and 94% sensitivity. In the same study, the specificity and sensitivity of the 14-3-3 protein, a surrogate marker currently used for the diagnosis of sporadic CJD, were 65% and 94%, respectively. An example of the RT-QuIC output in the CSF of a sporadic CJD patient is given in Figure 1.

Figure 1: RT-QuIC reactions seeded with 15 µL of human CSF samples from one Italian sporadic CJD patient (12076) and one non-CJD control (13004). 100 fg of 263K prion-infected hamster brain homogenate were used to seed positive control reactions. Each sample was processed in duplicate.

Finally, Sano and colleagues [44] reported that the RT-QuIC assay on the CSF of patients with genetic prion diseases has 78% sensitivity in GSS, 100% in FFI, 87% in E200K genetic CJD, and 100% in V203I genetic CJD, suggesting that the RT-QuIC assay for the detection of PrPTSE in the CSF might become a valid method for improving the diagnosis of patients with a clinical suspicion of human prion disease.

Besides CSF, the RT-QuIC assay revealed PrPTSE in nasal lavages from hamsters infected with the transmissible mink encephalopathy (TME) hyper strain [40] and, by using immunoaffinity beads coupled with the conformational 15B3 anti- PrPTSE antibody (enhanced QuIC), in plasma of scrapie-infected hamsters [39]. The assay showed 100% sensitivity and specificity and was able to detect a positive signal long before the appearance of clinical signs of scrapie.

Finally, the application of 15B3-conjugated beads to the QuIC protocol and the use of a hamster-sheep chimeric recPrP as substrate in the reaction increased the sensitivity (up to attogram levels) and the speed of detection (28 hrs) of variant CJD brain misfolded proteins spiked into human blood [39]. Despite this good achievement there is still no report on the use of the enhanced QuIC assay in human blood.

Overall, RT-QuIC methodology is a powerful platform for the detection and large-scale screening of misfolded PrP in both human and animals. Up to attogram levels of misfolded PrP can be detected and properly quantified within few hours by using high-throughput 96-well formats. The high levels of specificity obtained in a variety of tissues and species by using flexible recombinant substrates demonstrates the versatility of the novel method. It is of note that RT-QuIC PK-resistant products are reported to be noninfectious (quoted by [43]) and therefore likely more secure in large-scale screening diagnostic procedures. The two disadvantages of this assay are the relatively poor performance in amplifying PrPTSE from variant CJD tissues [64] and the failure to reproduce the original PrPTSE signature impeding the molecular diagnosis of sporadic CJD and the distinction between sporadic and variant CJDs.

4. Other Potential Assays for the Detection of Misfolded PrP in Blood

4.1. Immunocapillary Electrophoresis (ICE)

The assay, originally developed by Schmerr and colleagues [65] and based on a competitive immunoassay with PrP fluorescent peptides, was soon proven efficient for the detection of PrPTSE in blood of scrapie-infected sheep and elks with CWD [66]. However, these results were not confirmed in other laboratories using blood samples from CJD-infected chimpanzees or sporadic, iatrogenic, genetic, and variant CJD patients [45, 67]. It is therefore unlikely that this assay will be of any use for the diagnosis of human prion diseases.

4.2. Surface Fluorescence Intensity Distribution Analysis (Surface-FIDA)

This assay consists in the immobilization of single PrP aggregates on a capture antibody coated surface that are then visualized by the concomitant binding with two anti-PrP fluorescent antibodies and a double-laser beam scanning system (surface-FIDA). The method discriminates aggregated PrP forms from monomeric PrP without the use of the proteinase K (PK) digestion step and therefore recognizes both PK-resistant and PK-sensitive PrPTSE. Surface-FIDA enabled the counting of bovine and hamster PrP aggregates in brain homogenates and in bovine cerebrospinal fluid [47]. PrP aggregates were also blind-detected in blood of scrapie-infected sheep () with high specificity and sensitivity [46], although it remains unsettle whether the detection of PrP aggregates correlates with infectivity. It is of note that spiking of blood plasma with PrPTSE from brain was unsuccessful suggesting that the properties of PrPTSE from brain are different from endogenous blood misfolded PrP [46].

4.3. Ligand-Based Immunoassay

Terry and colleagues [48] reported the detection of PrPTSE in 55% of blood mononuclear cells (PBMC) obtained from scrapie-affected sheep () and 71% of experimentally BSE-affected sheep by a modified polyanionic ligand assay of the IDEXX HerdCheck methodology [68]. The assay resulted positive also in a subset of scrapie-infected sheep several months before the onset of clinical signs suggesting that PrPTSE can be detected in asymptomatic prion-infected hosts. However, the relatively low sensitivity observed in prion-infected sheep, the long timings of sample preparations, and the amount of blood volumes required for the purification of PBMC foretell that this assay would not be easily applicable to large-scale diagnostic scopes.

4.4. Solid-State Binding Matrix

The assay, based on the affinity that PrPTSE has for stainless steel particles [69, 70], was adapted for the detection of misfolded PrP in blood of patients with various forms of CJDs [49]. The selective absorption of PrPTSE on the metal matrix concentrates misfolded protein up to the point that the signal can be detected by an ELISA assay. Because of the selectivity of the metal matrix in binding only misfolded PrP, there is no need to pretreat samples with PK that likely removes a conspicuous fraction of PrPTSE in blood. This method was initially tested on human blood spiked with vCJD brain homogenate where misfolded particles in up to the 10⁻¹⁰ brain dilution were detected. Subsequently, blood of variant and sporadic CJD patients was analysed on a blinded experiment including samples from patients with other neurological diseases and controls. Only samples that were reactive in two separate assays were scored as positive. About two-third of blood samples from variant CJD but none from sporadic CJD patients and neurological or nonneurological controls yield positive signals in both assays resulting in 100% specificity for variant CJD [49].

4.5. EP-vCJD Blood Screening Assay

In 2003, Paramithiotis and colleagues [71] reported the manufacture of an antibody directed against PrP epitopes that are exposed only upon protein misfolding and therefore specific to PrPTSE. This conformational anti-PrPTSE antibody was then used for the epitope-protection (EP) vCJD-screening assay, which was later implemented by Amorfix. The high-throughput assay achieved 100% sensitivity and specificity on 1,000 blinded human plasma samples, which included samples that were spiked with variant CJD-infected and normal brains [50]. In 2009, the specificity of the method was ascertained on a large-scale screening initiated in France in over 20,000 human blood samples [51]. Results showed that on the first run 486 samples were positive (97.6% specificity), 20 of which were then confirmed positive on a second screening [51]. The repeat-reactive samples were finally considered negative on a third screening [51]. Subsequently, Amorfix tested three variant CJD blood samples provided by the National Institute for Biological Standards and Control (NIBSC, UK) that resulted negative [52]. The sensitivity of the test was therefore further improved for the detection of 1 : 5,000,000 dilution of variant CJD-infected brain spiked into blood [52]. However, despite this enhanced sensitivity, the test was still unable to detect prions in blood of variant CJD patients, and it was finally concluded that more research is required before the reevaluation of the assay [53].

4.6. Conformation-Dependent Immunoassay (CDI)

In 1998, Safar and colleagues [10] developed an ELISA-formatted, dissociation-enhanced time-resolved fluorescence detection system based on specific antibody binding to epitopes that are accessible in PrPC but that are unmasked only in denatured PrPTSE. This method does not require PK treatment and is able to recognize both sensitive and resistant PK misfolded proteins and different PrPTSE conformations. The assay, improved by incorporating a capture antibody, was able to discriminate PrPTSE signature in different molecular forms of sporadic CJDs, iatrogenic CJDs and genetic TSEs [72] and detect up to a 10⁻⁵ dilution of PrPTSE from variant CJD brain used for spiking human normal plasma [54, 73]. However, endogenous PrPTSE was undetectable in white blood cells of sporadic patients by CDI [55], but we are not aware of its use in variant CJD blood.

4.7. Misfolded Protein Diagnostic Assay (MPD)

This technique is based on a pyrene-labeled palindromic sequence of prion peptides that converts to β-sheets in the presence of PrPTSE [56, 74]. This process induces an excimeric signal from the conjugated pyrenes that propagates to other peptides with the final goal to amplify the PrPTSE signal. MPD assay detects PrPTSE in brain of 263K scrapie-infected hamsters during the preclinical and clinical stages of disease [74] and in small volumes of plasma from prion-infected mice and sheep with sensitivity up to 1 infectious dose per mL [56]. The same assay discriminated in blinded small-scale experiments control plasma from that of patients with sporadic CJD and squirrel monkeys with experimental CJD with 100% specificity and sensitivity [56].

4.8. Multimer Detection System (MDS)

This technique is a modified ELISA assay that recognizes only multimeric forms of PrPTSE without using any pretreatment with proteinases, which might remove PrPTSE forms likely present in body fluids [57]. This assay uses the same principle previously described by Pan and colleagues [75] and is based on the use of two monoclonal antibodies that share overlapping epitopes. Monomers (PrPC) are captured by an antibody attached to the surface of a plate and are not detected by the second antibody due to the absence of any exposed epitopes. On the other hand, multimers (PrPTSE) are easily recognized by the second antibody because they expose more copies of the same epitope. The assay was tested on plasma samples of nine scrapie-infected and nine control hamsters resulting in 100% specificity and sensitivity [57]. This simple assay, however, requires validation in other laboratories and more basic work for determining whether the multimeric forms detected by the MDS assay are related to infectivity.

5. Final Remarks

It is unquestionable that in the last 15 years there has been an outstanding progress in improving the detection of PrPTSE for developing sensitive and specific diagnostic assays. These sophisticated and highly sensitive methods successfully detect up to attogram levels of PrPTSE in body fluids of different species (Table 1). A major breakthrough is the development of the RT-QuIC technology for the detection of PrPTSE in the CSF of patients with sporadic [43, 64] and genetic [44] TSEs that as soon as is validated by other groups will change the diagnostic criteria of human prion diseases.

Endogenous PrPTSE has been identified in blood of scrapie-infected hamster by PMCA [27, 28] and RT-QuIC [39] assays and of patients with variant CJD by the solid-state binding matrix assay [49]. Despite these successful observations, however, there are no published reports on the application of either PMCA or enhanced RT-QuIC on blood samples of patients with any form of prion diseases suggesting that both assays still need substantial improvement before their use in the diagnostic setting. Although the development of the RT-QuIC technology for the detection of PrPTSE in blood samples is more recent than PMCA, an extra impediment of the RT-QuIC assay might come from the interference of blood molecules with the ThT reading. On the other hand, the solid-state binding matrix assay might be a valid alternative for the development of a blood test for variant CJD, but the relative low sensitivity (71%) and the finding that some control samples resulted positive in one of the two runs [49] make the use of this assay a remote ambition.

What remains elusive is the reproducible detection of endogenous PrPTSE in blood despite the successful identification of minute amounts of spiked brain PrPTSE into healthy blood. It becomes more and more evident that the properties of PrPTSE in brain are different from those in blood and that some components of blood both inhibit and interfere with PrPTSE detection causing false positive and negative results and compromising the reproducibility of the assay [46, 51, 76]. A clear example is given by the failure of the EP-vCJD assay that had excellent and reproducible performances on spiked blood but then completely failed to identify positive and negative human blood samples [50–53].

These findings pose the question on whether the criteria delineated by the National Institute for Biological Standards and Control (NIBSC, UK) [77] for prion diagnostic assay validation in terms of satisfactory sensitivity and specificity on spiked blood and for the request of variant CJD blood samples are still relevant for defining the best condition of success of potential prion test in blood.

We think that the principles for assay validation and accessibility to variant CJD blood samples should rather focus on reproducible and large scale blinded studies on blood taken from animal models of prion diseases, such as scrapie or BSE in sheep followed by a large scale screening of healthy blood donors to ascertain a sufficient level of specificity.

Finally, our impression is that the research on prion detection in blood does not really need further sensitive assays but rather requires further work aiming to the identification of interfering blood components and understanding prion metabolism in blood.

Acknowledgments

The authors thank Anna Ladogana, Anna Poleggi, and Michele Equestre for kindling provide them data on the detection of PrPTSE in the CSF of a patient with sporadic CJD by the RT-QuIC assay. Part of this work was supported by the Joint Program of Neurodegenerative Disease (JPND) research on “Optimisation, harmonisation and standardisation of CSF RT-QuIC analysis for the diagnosis of sporadic CJD”.

References

H. J. T. Ward, D. Everington, S. N. Cousens et al., “Risk factors for variant Creutzfeldt-Jakob disease: a case-control study,” Annals of Neurology, vol. 59, no. 1, pp. 111–120, 2006.

J. W. Wilesmith, G. A. Wells, M. P. Cranwell, and J. B. Ryan, “Bovine spongiform encephalopathy: epidemiological studies,” Veterinary Record, vol. 123, no. 25, pp. 638–644, 1988.

P. Brown, J. P. Brandel, T. Sato et al., “Iatrogenic Creutzfeldt-Jakob disease, final assessment,” Emerging Infectious Diseases, vol. 18, no. 6, pp. 901–907, 2012.

R. Knight, “The risk of transmitting prion disease by blood or plasma products,” Transfusion and Apheresis Science, vol. 43, no. 3, pp. 387–391, 2010.

A. Ladogana, M. Puopolo, D. Tiple, S. Graziano, and M. Pocchiari, “Creutzfeldt-Jakob disease: the public health perception,” European Journal of Neurodegenerative Diseases, vol. 1, no. 1, pp. 101–113, 2012.

The National CJD Research and Surveillance Unit, http://www.cjd.ed.ac.uk/documents/figs.pdf

Advisory Committee on Dangerous Pathogens, Annual Report for 2012, ACDP/100/P7a, 2013, http://www.hse.gov.uk/aboutus/meetings/committees/acdp/ar2012.pdf

P. Brown, “Blood infectivity, processing and screening tests in transmissible spongiform encephalopathy,” Vox Sanguinis, vol. 89, no. 2, pp. 63–70, 2005.

E. Campisi, F. Cardone, S. Graziano, R. Galeno, and M. Pocchiari, “Role of proteomics in understanding prion infection,” Expert Reviews in Proteomics, vol. 9, no. 6, pp. 649–666, 2012.

J. Safar, H. Wille, V. Itri et al., “Eight prion strains have PrP(Sc) molecules with different conformations,” Nature Medicine, vol. 4, no. 10, pp. 1157–1165, 1998.

P. Brown, L. Cervenáková, L. M. McShane, P. Barber, R. Rubenstein, and W. N. Drohan, “Further studies of blood infectivity in an experimental model of transmissible spongiform encephalopathy, with an explanation of why blood components do not transmit Creutzfeldt-Jakob disease in humans,” Transfusion, vol. 39, no. 11-12, pp. 1169–1178, 1999.

P. Piccardo, J. C. Manson, D. King, B. Ghetti, and R. M. Barron, “Accumulation of prion protein in the brain that is not associated with transmissible disease,” Proceedings of the National Academy of Sciences of the United States of America, vol. 104, no. 11, pp. 4712–4717, 2007.

C. I. Lasmézas, J. Deslys, O. Robain et al., “Transmission of the BSE agent to mice in the absence of detectable abnormal prion protein,” Science, vol. 275, no. 5298, pp. 402–405, 1997.

P. Gambetti, I. Cali, S. Notari, Q. Kong, W. Zou, and W. K. Surewicz, “Molecular biology and pathology of prion strains in sporadic human prion diseases,” Acta Neuropathologica, vol. 121, no. 1, pp. 79–90, 2011.

G. P. Saborio, B. Permanne, and C. Soto, “Sensitive detection of pathological prion protein by cyclic amplification of protein misfolding,” Nature, vol. 411, no. 6839, pp. 810–813, 2001.

C. Soto, L. Anderes, S. Suardi et al., “Pre-symptomatic detection of prions by cyclic amplification of protein misfolding,” FEBS Letters, vol. 579, no. 3, pp. 638–642, 2005.

Y. Murayama, M. Yoshioka, H. Horii et al., “Protein misfolding cyclic amplification as a rapid test for assessment of prion inactivation,” Biochemical and Biophysical Research Communications, vol. 348, no. 2, pp. 758–762, 2006.

T. D. Kurt, M. R. Perrott, C. J. Wilusz et al., “Efficient in vitro amplification of chronic wasting disease PrPRES,” Journal of Virology, vol. 81, no. 17, pp. 9605–9608, 2007.

C. Meyerett, B. Michel, B. Pulford et al., “In vitro strain adaptation of CWD prions by serial protein misfolding cyclic amplification,” Virology, vol. 382, no. 2, pp. 267–276, 2008.

L. Thorne and L. A. Terry, “In vitro amplification of PrPSc derived from the brain and blood of sheep infected with scrapie,” The Journal of General Virology, vol. 89, no. 12, pp. 3177–3184, 2008.

N. J. Haley, D. M. Seelig, M. D. Zabel, G. C. Telling, and E. A. Hoover, “Detection of CWD prions in urine and saliva of deer by transgenic mouse bioassay,” PLoS ONE, vol. 4, no. 3, Article ID e4848, 2009.

G. M. Cosseddu, R. Nonno, G. Vaccari et al., “Ultra-efficient PrPSc amplification highlights potentialities and pitfalls of PMCA technology,” PLoS Pathogens, vol. 7, no. 11, Article ID e1002370, 2011.

N. J. Haley, C. K. Mathiason, S. Carver, G. C. Telling, M. D. Zabel, and E. A. Hoover, “Sensitivity of protein misfolding cyclic amplification versus immunohistochemistry in ante-mortem detection of chronic wasting disease,” The Journal of General Virology, vol. 93, no. 5, pp. 1141–1150, 2012.

M. Jones, A. H. Peden, C. V. Prowse et al., “In vitro amplification and detection of variant Creutzfeldt-Jakob disease PrPSc,” Journal of Pathology, vol. 213, no. 1, pp. 21–26, 2007.

M. Jones, A. H. Peden, D. Wight et al., “Effects of human PrPSc type and PRNP genotype in an in-vitro conversion assay,” NeuroReport, vol. 19, no. 18, pp. 1783–1786, 2008.

M. Jones, A. H. Peden, H. Yull et al., “Human platelets as a substrate source for the in vitro amplification of the abnormal prion protein (PrPSc) associated with variant Creutzfeldt-Jakob disease,” Transfusion, vol. 49, no. 2, pp. 376–384, 2009.

J. Castilla, P. Saá, and C. Soto, “Detection of prions in blood,” Nature Medicine, vol. 11, no. 9, pp. 982–985, 2005.

P. Saá, J. Castilla, and C. Soto, “Presymptomatic detection of prions in blood,” Science, vol. 313, no. 5783, pp. 92–94, 2006.

Y. Murayama, M. Yoshioka, T. Yokoyama et al., “Efficient in vitro amplification of a mouse-adapted scrapie prion protein,” Neuroscience Letters, vol. 413, no. 3, pp. 270–273, 2007.

D. Gonzalez-Romero, M. A. Barria, P. Leon, R. Morales, and C. Soto, “Detection of infectious prions in urine,” FEBS Letters, vol. 582, no. 21-22, pp. 3161–3166, 2008.

B. Chen, R. Morales, M. A. Barria, and C. Soto, “Estimating prion concentration in fluids and tissues by quantitative PMCA,” Nature Methods, vol. 7, no. 7, pp. 519–520, 2010.

R. Atarashi, R. A. Moore, V. L. Sim et al., “Ultrasensitive detection of scrapie prion protein using seeded conversion of recombinant prion protein,” Nature Methods, vol. 4, no. 8, pp. 645–650, 2007.

C. Lacroux, D. Vilette, N. Fernández-Borges et al., “Prionemia and leukocyte-platelet-associated infectivity in sheep transmissible spongiform encephalopathy models,” Journal of Virology, vol. 86, no. 4, pp. 2056–2066, 2012.

R. Rubenstein, B. Chang, P. Gray et al., “A novel method for preclinical detection of PrPSc in blood,” The Journal of General Virology, vol. 91, no. 7, pp. 1883–1892, 2010.

R. Rubenstein, B. Chang, P. Gray et al., “Prion disease detection, PMCA kinetics, and IgG in urine from sheep naturally/experimentally infected with scrapie and deer with preclinical/clinical chronic wasting disease,” Journal of Virology, vol. 85, no. 17, pp. 9031–9038, 2011.

B. C. Maddison, H. C. Raes, C. A. Baker et al., “Prions are secreted into the oral cavity in sheep with preclinical scrapie,” Journal of Infectious Diseases, vol. 201, no. 11, pp. 1672–1676, 2010.

Y. Murayama, M. Yoshioka, K. Masujin et al., “Sulfated dextrans enhance in vitro amplification of bovine spongiform encephalopathy PrPSc and enable ultrasensitive detection of bovine PrPSc,” PLoS ONE, vol. 5, no. 10, Article ID e13152, 2010.

T. A. Nichols, T. R. Spraker, T. Gidlewski et al., “Detection of prion protein in the cerebrospinal fluid of elk (Cervus canadensis nelsoni) with chronic wasting disease using protein misfolding cyclic amplification,” Journal of Veterinary Diagnostic Investigation, vol. 24, no. 4, pp. 746–749, 2012.

C. D. Orrú, J. M. Wilham, L. D. Raymond et al., “Prion disease blood test using immunoprecipitation and improved quaking-induced conversion,” mBio, vol. 2, no. 3, pp. e00078–e00011, 2011.

J. M. Wilham, C. D. Orrú, R. A. Bessen et al., “Rapid end-point quantitation of prion seeding activity with sensitivity comparable to bioassays,” PLoS Pathogens, vol. 6, no. 12, Article ID e1001217, 2010.

C. D. Orrú, J. M. Wilham, A. G. Hughson et al., “Human variant Creutzfeldt-Jakob disease and sheep scrapie PrPres detection using seeded conversion of recombinant prion protein,” Protein Engineering, Design and Selection, vol. 22, no. 8, pp. 515–521, 2009.

R. Atarashi, K. Satoh, K. Sano et al., “Ultrasensitive human prion detection in cerebrospinal fluid by real-time quaking-induced conversion,” Nature Medicine, vol. 17, no. 2, pp. 175–178, 2011.

L. I. McGuire, A. H. Peden, C. D. Orrú et al., “Real time quaking-induced conversion analysis of cerebrospinal fluid in sporadic Creutzfeldt-Jakob disease,” Annals of Neurology, vol. 72, no. 2, pp. 278–285, 2012.

K. Sano, K. Satoh, R. Atarashi et al., “Early detection of abnormal prion protein in genetic human prion diseases now possible using real-time QUIC assay,” PLoS ONE, vol. 8, no. 1, Article ID e54915, 2013.

P. C. Lourenco, M. J. Schmerr, I. MacGregor, R. G. Will, J. W. Ironside, and M. W. Head, “Application of an immunocapillary electrophoresis assay to the detection of abnormal prion protein in brain, spleen and blood speciemens from patients with variant Creuzfeldt-Jakob disease,” The Journal of General Virology, vol. 87, no. 10, pp. 3119–3124, 2006.

O. Bannach, E. Birkmann, E. Reinartz et al., “Detection of prion protein particles in blood plasma of scrapie infected sheep,” PLoS ONE, vol. 7, no. 5, Article ID e36620, 2012.

E. Birkmann, F. Henke, N. Weinmann et al., “Counting of single prion particles bound to a capture-antibody surface (surface-FIDA),” Veterinary Microbiology, vol. 123, no. 4, pp. 294–304, 2007.

L. A. Terry, L. Howells, J. Hawthorn et al., “Detection of PrPsc in blood from sheep infected with the scrapie and bovine spongiform encephalopathy agents,” Journal of Virology, vol. 83, no. 23, pp. 12552–12558, 2009.

J. A. Edgeworth, M. Farmer, A. Sicilia et al., “Detection of prion infection in variant Creutzfeldt-Jakob disease: a blood-based assay,” The Lancet, vol. 377, no. 9764, pp. 487–493, 2011.

Amorfix Life Sciences, Press Release, “Amorfix vCJD assay achieves 100% sensitivity and 100% specificity on 1,000 fresh samples from uk blood donors,” 2008, http://www.amorfix.com/pdf_press/pr_2008/2008_10_17_AMF_vCJD_NIBSC_Fresh_Results.pdf

P. Guntz, C. Walter, P. Schosseler, P. Morel, J. Coste, and J. Cazenave, “Feasibility study of a screening assay that identifies the abnormal prion protein PrPTSE in plasma: Initial results with 20,000 samples,” Transfusion, vol. 50, no. 5, pp. 989–995, 2010.

Amorfix Life Sciences, Press Release, “Amorfix announces third quarter, 2010 results,” 2010, http://www.amorfix.com/pdf_press/pr_2010/2009_02_08_amf_q3_results_2010.pdf

Amorfix Life Sciences, Press Release, “Corporate update on vCJD test development,” 2010, http://www.amorfix.com/pdf_press/pr_2010/2010_05_31_corporate_update_on_vCJD.pdf

J. K. Cooper, K. Ladhani, and P. Minor, “Comparison of candidate vCJD in vitro diagnostic assays using identical sample sets,” Vox Sanguinis, vol. 102, no. 2, pp. 100–109, 2012.

E. M. Choi, M. D. Geschwind, C. Deering et al., “Prion proteins in subpopulations of white blood cells from patients with sporadic Creutzfeldt-Jakob disease,” Laboratory Investigation, vol. 89, no. 6, pp. 624–635, 2009.

T. Pan, J. Sethi, C. Nelsen et al., “Detection of misfolded prion protein in blood with conformationally sensitive peptides,” Transfusion, vol. 47, no. 8, pp. 1418–1425, 2007.

S. S. A. An, K. T. Lim, H. J. Oh et al., “Differentiating blood samples from scrapie infected and non-infected hamsters by detecting disease-associated prion proteins using multimer detection system,” Biochemical and Biophysical Research Communications, vol. 392, no. 4, pp. 505–509, 2010.

N. J. Haley, C. K. Mathiason, S. Carver, M. Zabel, G. C. Telling, and E. A. Hoover, “Detection of chronic wasting disease prions in salivary, urinary, and intestinal tissues of deer: potential mechanisms of prion shedding and transmission,” Journal of Virology, vol. 85, no. 13, pp. 6309–6318, 2011.

J. Castilla, P. Saá, C. Hetz, and C. Soto, “In vitro generation of infectious scrapie prions,” Cell, vol. 121, no. 2, pp. 195–206, 2005.

N. R. Deleault, B. T. Harris, J. R. Rees, and S. Supattapone, “Formation of native prions from minimal components in vitro,” Proceedings of the National Academy of Sciences of the United States of America, vol. 104, no. 23, pp. 9741–9746, 2007.

M. A. Barria, A. Mukherjee, D. Gonzalez-Romero, R. Morales, and C. Soto, “De novo generation of infectious prions in vitro produces a new disease phenotype,” PLoS Pathogens, vol. 5, no. 5, Article ID e1000421, 2009.

R. Atarashi, J. M. Wilham, L. Christensen et al., “Simplified ultrasensitive prion detection by recombinant PrP conversion with shaking,” Nature Methods, vol. 5, no. 3, pp. 211–212, 2008.

D. W. Colby, Q. Zhang, S. Wang et al., “Prion detection by an amyloid seeding assay,” Proceedings of the National Academy of Sciences of the United States of America, vol. 104, no. 52, pp. 20914–20919, 2007.

A. H. Peden, L. I. McGuire, N. E. J. Appleford et al., “Sensitive and specific detection of sporadic Creutzfeldt-Jakob disease brain prion protein using real-time quaking-induced conversion,” The Journal of General Virology, vol. 93, no. 2, pp. 438–449, 2012.

M. J. Schmerr, K. R. Goodwin, and R. C. Cutlip, “Capillary electrophoresis of the scrapie prion protein from sheep brain,” Journal of Chromatography A, vol. 680, no. 2, pp. 447–453, 1994.

M. J. Schmerr, A. L. Jenny, M. S. Bulgin et al., “Use of capillary electrophoresis and fluorescent labeled peptides to detect the abnormal prion protein in the blood of animals that are infected with a transmissible spongiform encephalopathy,” Journal of Chromatography A, vol. 853, no. 1-2, pp. 207–214, 1999.

L. Cervenakova, P. Brown, S. Soukharev et al., “Failure of immunocompetitive capillary electrophoresis assay to detect disease-specific prion protein in buffy coat from humans and chimpanzees with Creutzfeldt-Jakob disease,” Electrophoresis, vol. 24, no. 5, pp. 853–859, 2003.

European Food Safety Authority (EFSA), “Scientific report on the evaluation of rapid post mortem TSE tests intended for small ruminants,” EFSA Journal, vol. 49, pp. 1–16, 2005.

E. Zobeley, E. Flechsig, A. Cozzio, M. Enari, and C. Weissmann, “Infectivity of scrapie prions bound to a stainless steel surface,” Molecular Medicine, vol. 5, no. 4, pp. 240–243, 1999.

J. A. Edgeworth, G. S. Jackson, A. R. Clarke, C. Weissmann, and J. Collinge, “Highly sensitive, quantitative cell-based assay for prions adsorbed to solid surfaces,” Proceedings of the National Academy of Sciences of the United States of America, vol. 106, no. 9, pp. 3479–3483, 2009.

E. Paramithiotis, M. Pinard, T. Lawton et al., “A prion protein epitope selective for the pathologically misfolded conformation,” Nature Medicine, vol. 9, no. 7, pp. 893–899, 2003.

J. G. Safar, M. D. Geschwind, C. Deering et al., “Diagnosis of human prion disease,” Proceedings of the National Academy of Sciences of the United States of America, vol. 102, no. 9, pp. 3501–3506, 2005.

A. Bellon, W. Seyfert-Brandt, W. Lang, H. Baron, A. Gröner, and M. Vey, “Improved conformation-dependent immunoassay: suitability for human prion detection with enhanced sensitivity,” The Journal of General Virology, vol. 84, no. 7, pp. 1921–1925, 2003.

A. Grosset, K. Moskowitz, C. Nelsen, T. Pan, E. Davidson, and C. S. Orser, “Rapid presymptomatic detection of PrPSc via conformationally responsive palindromic PrP peptides,” Peptides, vol. 26, no. 11, pp. 2193–2200, 2005.

T. Pan, B. Chang, P. Wong et al., “An aggregation-specific enzyme-linked immunosorbent assay: detection of conformational differences between recombinant PrP protein dimers and PrPSc aggregates,” Journal of Virology, vol. 79, no. 19, pp. 12355–12364, 2005.

M. H. Tattum, S. Jones, S. Pal, A. Khalili-Shirazi, J. Collinge, and G. S. Jackson, “A highly sensitive immunoassay for the detection of prion-infected material in whole human blood without the use of proteinase K,” Transfusion, vol. 50, no. 12, pp. 2619–2627, 2010.

National Institute for Biological Standards and Control (NIBSC), “Flow chart for the evaluation of potential tests for CJD for access to rare samples (such as plasma) from vCJD patients,” http://www.nibsc.org/pdf/CJDtest-draft1.pdf