International Journal of Cell Biology
Volume 2019 (2019), Article ID 9598038, 1 page
https://doi.org/10.1155/2019/9598038

Corrigendum

Corrigendum to “Targeting HIF-1α to Prevent Renal Ischemia-Reperfusion Injury: Does It Work?”

Kapil Sethi,1,2 Kenny Rao,1,2 Arthur Shulkes,¹ Graham Baldwin,¹ Damien Bolton,1,2 Oneel Patel,¹ and Joseph Ischia1,2

¹Department of Surgery, Austin Health, University of Melbourne, Heidelberg, VIC, Australia
²Urology Unit, Austin Health, Heidelberg, VIC, Australia

Correspondence should be addressed to Kapil Sethi; drkapilsethi@gmail.com

Received 18 March 2019; Accepted 20 March 2019; Published 10 April 2019

Copyright © 2019 Kapil Sethi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Targeting HIF-1α to Prevent Renal Ischemia-Reperfusion Injury: Does It Work?” [1], Drs. Arthur Shulkes and Graham Baldwin were missing from the authors’ list who contributed in the formulation of the research goals and the guidance in appropriate areas to focus on the review. In addition, they critically appraised the literature review, edited initial drafts and provided valuable feedback. Finally, they approved the final version of the article. The corrected authors’ list is shown above.

References

K. Sethi, K. Rao, D. Bolton, O. Patel, and J. Ischia, “Targeting HIF-1α to prevent renal ischemia-reperfusion injury: does it work?” International Journal of Cell Biology, vol. 2018, Article ID 9852791, 7 pages, 2018.