International Journal of Computer Games Technology
Volume 2019 (2019), Article ID 9325869, 1 page
https://doi.org/10.1155/2019/9325869

Corrigendum

Corrigendum to “Usability Assessments for Augmented Reality Motor Rehabilitation Solutions: A Systematic Review”

Virgínia C. Cavalcanti,1,2 Maria I. de Santana,2,3 Alana E. F. Da Gama,2,3 and Walter F. M. Correia1,2

¹Departamento de Design,Universidade Federal de Pernambuco, Recife 50670-901, Brazil
²Voxar Labs, Centro de Informática, Universidade Federal de Pernambuco, Recife 50670-901, Brazil
³Rehabilitation Engineering Research Group, Departamento de Engenharia Biomédica, Universidade Federal de Pernambuco, Recife 50670-901, Brazil

Correspondence should be addressed to Virgínia C. Cavalcanti; virginiacarrazzone@gmail.com

Received 10 December 2018; Accepted 16 December 2018; Published 21 January 2019

Copyright © 2019 Virgínia C. Cavalcanti et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Usability Assessments for Augmented Reality Motor Rehabilitation Solutions: A Systematic Review” [1], there was a missing affiliation for all authors. The corrected authors’ list and affiliations are shown above.

References

V. C. Cavalcanti, M. I. Santana, A. E. Gama, and W. F. Correia, “Usability Assessments for Augmented Reality Motor Rehabilitation Solutions: A Systematic Review,” International Journal of Computer Games Technology, vol. 2018, Article ID 5387896, 18 pages, 2018.