International Journal of DentistryVolume 2012 (2012), Article ID 278623, 5 pagesdoi:10.1155/2012/278623

Research Article

Microtensile Bond Strength of Self-Adhesive Luting Cements to Ceramics

Tomoko Abo,¹ Shigeru Uno,² Masahiro Yoshiyama,³ Toshimoto Yamada,² and Nobuhiro Hanada¹

¹Department of Translational Research, Tsurumi University School of Dental Medicine, 2-1-3, Tsurumi, Tsurumi-ku, Yokohama 230-8501, Japan²Department of Dentistry, Toranomon Hospital, 2-2-2 Toranomon, Minato-ku, Tokyo 105-8570, Japan³Department of Operative Dentistry, Okayama University Graduate School of Medicine, Dentistry and Pharmaceutical Sciences, 2-5-1 Shikata-cho, Okayama 700-8525, Japan

Received 30 November 2011; Revised 31 January 2012; Accepted 7 February 2012

Academic Editor: Cornelis H. Pameijer

Copyright © 2012 Tomoko Abo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The purpose of this paper was to compare the bond strengths of the self-adhesive luting cements between ceramics and resin cores and examine their relation to the cement thickness. Three self-adhesive luting cements (Smartcem, Maxcem, and G-CEM) and a resin cement (Panavia F 2.0) for control were used in the paper. The thickness of the cements was controlled in approximately 25, 50, 100, or 200 μm. Each 10 specimens were made according to the manufacturers’ instructions and stored in water at 37°C. After 24 hours, microtensile bond strength (μTBS) was measured. There were significant differences in cements. Three self-adhesive cements showed significantly lower μTBSs than control that required both etching and priming before cementation (Tukey, ). The cement thickness of 50 or 100 μm tended to induce the highest μTBSs for each self-adhesive luting cements though no difference was found.

1. Introduction

Esthetic dentistry, including ceramic restorations, is now a great demand from the patients. CAD/CAM technology in dentistry has also become popular. One of the technologies, CEREC system, since its development in 1985, has improved the software and hardware for easier operation and better adaptation. The current CEREC 3 system can fabricate more precise inlays, onlays, crowns, and veneers. In a review on the CEREC restorations, Fasbinder summarized the postoperative sensitivity, restoration fracture, color match, margin adaptation, clinical longevity, and clinical performance [1]. However, the CAD/CAM system still has a problem with the fitting quality of the restorations. Mörmann and Schug compared the precision of fit between the CEREC 1 and CEREC 2 systems [2]. They reported that the mean marginal interface was  μm for CEREC 1-generated inlays and  μm for CEREC 2-generated inlays. Nakamura et al. reported a marginal gap of 53 to 67 μm for CEREC 3-generated crowns [3].

Vitablocs Mark II (Vita Zahnfabrik, Germany), conventional feldspathic ceramic, is generally used in the CEREC system. The ceramic restorations are usually cemented with resin-based composite luting agent, after surface treatments necessary for the bonding. In the CEREC restoration, the luting material may be charged of two functions as a luting material and a restorative material to adhere between the tooth substrates and CEREC restoration with good mechanical properties and reliable bond capacity [4]. Therefore, the failure of the luting material at the margin may affect the longevity of restorations. In other words, proper selection of a luting agent is a last important decision in a series of steps that require meticulous execution and will determine the long-term success of fixed restorations [5].

Recently, newly developed resin luting cements called “self-adhesive luting cements” have been commercialized from several manufacturers. These materials feature that the adhesion is possibly achieved to various surfaces without surface pretreatment such as air-abrasion and/or HF-etching. However, there is little information on the performance of self-adhesive luting cements in the CEREC restorations without surface pretreatment.

In vitro bonding efficacy is often evaluated by measuring bond strength as well as morphological structures at the bonding interface. Therefore, the purpose of this study was to compare the bond strengths of the self-adhesive luting cements with different cement thickness, simulating the luting between ceramics and resin abutments without surface pretreatment.

2. Material and Methods

2.1. Specimen Preparation

Commercial 3 self-adhesive luting cements (Smartcem, Maxcem, and G-CEM) and a control cement (Panavia F 2.0) were used to bond two selected adherends, a ceramic block and resin core in this study (Table 1). Feldspathic ceramic blocks (Vitablocs Mark II; Vita Zahnfabrik, Germany) were horizontally cut with a low-speed diamond saw (Isomet; Buehler, Lake Bluff, IL, USA) and ground with #600 SiC paper to standardize the surface roughness. For preparation of the resin core blocks (Figure 1), core resin (Clearfil DC Core Automix; Kuraray Medical, Tokyo, Japan) was filled into a silicon mold (area:  mm²; height: 5 mm) as a bulk. The resin was irradiated from both opposing sides for 40 sec each with Optilux 501 (700 mW/cm²; SDS Kerr, Danbury, CT, USA), then post-cured for 5 min within a box of -Light (Morita, Tokyo, Japan). The core resin blocks were ground with # 600 SiC paper after 24 h storage at 37°C.

Table 1: Composition of the commercial resin-based composite luting cement.

Product name (Shade)
Lot no.
Composition
Manufacturer

Smartcem (Natural)
R0707B1
Base Paste: HEMA, 4-MET, PEM-F, Initiator, Inhibitor, others Catalyst Paste: 1,3-Butanediol dimethacrylate, Sulfuric acid salt, Tertiary amine, Inhibitor, others
DENTSPLY-Sankin, Tochigi, Japan

Maxcem (Clear)
2855305
Base Paste: UDMA, Camphorquinone, Fluoroaluminosilicate glass, others Catalyst Paste: Bis-GMA, TEGDMA, Glycerophosphatedimethacrylate, Barium aluminoborosilicate glass, others
SDS Kerr, Orange, USA

G-CEM (A2)
0702061
Powder: Fluoroaluminosilicate glass, Initiator, Pigment Liquid: 4-MET, Phosphoric acid ester monomer, UDMA, Dimethacrylate, water, Silicon dioxide, Initiator, Inhibitor
GC, Tokyo, Japan

Panavia F 2.0 Paste (Brown)
0293AB, 0155AA
Paste A: MDP, Methacrylate monomer, Filler, Initiator Paste B: Methacrylate monomer, Filler, NaF, Initiator, Pigment
Kuraray Medical, Tokyo, Japan

HEMA: 2-hydroxyethyl methacrylate; 4-MET: 4-methacryloxyethyl trimellitate; PEM-F: 5-methacryloxyethyloxy cyclophosphazene monofluoride; UDMA: urethane dimethacrylate; Bis-GMA: bisphenol-A-glycidyl dimethacrylate; TEGDMA: triethyleneglycol dimethacrylate; MDP: 10-methacryloyloxydecyl dihydrogen phosphate.

Before cementation with Panavia F 2.0, specimens were etched with K-etchant and silanated with Clearfil SE primer and Porcelain Bond Activator.

Figure 1: Schematic illustration of the procedure for core resin preparation.

2.2. Microtensile Bond Strength (μTBS) Test

The surface of the core resin block was covered with masking tapes (transparent tape with a circular hole, 6 mm in diameters) to standardize cement thickness: 25, 50, 100, and 200 μm. A pilot study confirmed the thickness variation was ±1 μm for each group. Three self-adhesive luting cements were mixed according to the manufacturers’ instructions and filled into the hole of the tape without surface treatment (Table 2). Then, a ceramic block was put on it with mild finger pressure. Before cementation with Panavia F 2.0, both adherend blocks were etched with K-etchant Gel (Kuraray Medical, Tokyo, Japan) and silanated with the mixture of Clearfil SE primer (Kuraray Medical, Tokyo, Japan) and Clearfil Porcelain Bond Activator (Kuraray Medical, Tokyo, Japan) according to the manufacturer’s instructions (Table 2). The cement was laterally irradiated from 2 opposing sides under each irradiation condition. The specimens were sectioned into  mm beams ( groups) after 24 h storage in water at 37°C. Individual beams were then attached to a Ciucchi’s device [6] with cyanoacrylate glue (Model Repair II Blue; Dentsply-Sankin, Tochigi, Japan), and μTBSs were measured using a universal testing machine (EZ Test; Shimadzu, Kyoto, Japan) at a crosshead speed of 1.0 mm/min (Figure 2).

Table 2: The procedures for each resin-based composite luting cement.

Smartcem
Maxcem
G-CEM
Panavia F 2.0

hand-mixed for 20 sec
auto-mixed
hand-mixed for 20 sec

cemented and held for 2 min
cemented and held for 90 sec
cemented and held for 90 sec
hand-mixed for 20 sec

irradiated for 30 sec
irradiated for 20 sec
irradiated for 10 sec
cemented and held for 2 min

irradiated for 20 sec

Figure 2: Schematic illustration of the procedure for μTBS measurement.

2.3. Failure Analysis

After measuring μTBSs, the specimens were examined using Scanning Electron Microscope (SEM; DS-750, Topcon, Japan) to determine the failure modes. Failure modes were categorized as follows: adhesive failure at the interface between ceramic/core resin and cement, cohesive failure within cement, or mixed failure.

2.4. Statistical Analyses

The results of the μTBS test were analyzed with two-way ANOVA with variables of cements and cement thickness. Multiple comparisons were performed with Tukey’s HSD test. The statistical analyses were carried out at 5% level of significance.

3. Results

The means and standard deviations (SD) of μTBSs were given in Table 3. Two-way ANOVA showed an interactive influence between the cements and cement thickness (). The multiple comparisons by Tukey’s HDS test revealed significant differences between cements ().

Table 3: Microtensile bond strength (MPa).

Smartcem
Maxcem
G-CEM
Panavia F 2.0

25 μm
15.38 (4.06)a, b, c, d
13.75 (5.91)a, b, c, d
12.53 (8.68)a, b, c
45.32 (8.72)e

50 μm
17.85 (5.64)b, c, d
16.38 (6.17)a, b, c, d
22.60 (6.40)d
46.35 (7.76)e

100 μm
9.55 (2.38)a, b
20.16 (1.90)c, d
16.98 (3.53)a, b, c, d
43.72 (6.16)e

200 μm
8.70 (2.63)a
16.41 (3.88)a, b, c, d
13.72 (2.74)a, b, c, d
39.39 (9.21)e

Mean (SD). Same letters denote no significant difference ().

Panavia F 2.0 gave the stable and higher μTBSs than the other 3 cements regardless of the cement thicknesses (). In 3 self-adhesive luting cements, there was no significant difference in μTBSs among cement thickness, while the highest μTBS was to be given between 50 μm (Smartcem and G-CEM) and 100 μm (Maxcem) (Table 3).

SEM analysis revealed that fracture mode was dominantly cohesive failure in the cement regardless of the type of cement and cement thickness.

4. Discussion

In this study, adhesion between ceramics and core resin was examined, simulating the luting between CEREC restorations and resin abutments.

Mazzitelli et al. concluded that the predominance of acid-base reactions or radical polymerization might explain the different responses to substrate wetness and raise concerns regarding their universal application both on vital and pulpless teeth [7]. Also, μTBSs is commonly affected by the properties of the adherends. Therefore, μTBSs in this study were measured using uniform substrates as fundamental indexes to reduce the individual difference of the adherends. Also, the cement line was irradiated from 2 opposing sides after the cementation of two kinds of blocks because several self-etching resin cements were to be used in the dual-cure mode under optimal polymerization condition [8].

Ceramic surface is usually sandblasted or abraded with diamond bar, and/or etched (e.g., phosphoric acid or hydrofluoric acid) prior to silane treatment [9, 10]. However, for Panavia F 2.0, etching and priming were required before cementation, but hydrofluoric acid etching not always necessary for ceramics surface. In a usual clinical way, the pretreatment with phosphoric acid and saline-coupling agent before cementation is simple and effective [11]. Besides, newly developed self-adhesive luting cements are featured on the reducible treatment. Actually, one-step approach with self-adhesive luting cements seemed to be simpler and less technique-sensitive than the conventional resin cements. This study focused on the effect of cement thickness on the bond between core resins and ceramic surface. The bond strength is attributed to a lot of variables involved. The reduced factors might facilitate to understand the bond performance. Thus, the pretreatment with hydrofluoric acid was not carried out in this study. The further study would make clear the effect of surface pretreatment such as a hydrofluoric acid etching. Kamada et al. reported the dual-cured resin luting agents provided much higher early bond strength to ceramic blocks for CEREC than chemically cured resin luting agents and maintained durable bond strength even after 20,000 thermocycles [12]. In this study, all 4 materials were dual-cure luting cements. Three self-adhesive luting cements showed relatively lower μTBSs than the control material, Panavia F 2.0. The surface pretreatment might be one of the reasons for the different bond performance between self-adhesive luting cements and control, Panavia F.

All self-adhesive luting cement used in the study contains phosphoric ester monomer. Besides, 4-MET is added in both Smartcem and G-CEM. These functional acidic monomers possibly contribute to the adhesion. Further, The dominant fracture mode, that is, cohesive failure within the cement regardless of the bland of the cements, indicates that tensile stress concentrated to the cement body rather than the bonding interfaces. This implies that the mechanical property of the resin matrix mainly contributes to the bonding performance of the cements.

Han et al. reported that the pH values of 3 self-adhesive luting cements, Smartcem, Maxcem, and G-CEM, were lower than 4 at 90 seconds after mixing; G-CEM was the lowest (pH 1.8) and Smartcem was the highest (pH 3.6) [13]. They also stated that the low pH might have an etching effect but an adverse influence on the adhesion if the low pH were left too long. Several self-etch cements tend to show high initial acidity and gradual rise of pH during setting [8]. In this study, Smartcem showed relatively lower μTBSs than the others, and G-CEM showed slightly higher μTBSs than Smartcem. These differences may be due to the etching effect by the different pH.

The results of the study also suggested that the thickness of cements affected the μTBSs for all self-adhesive luting cement. Filler size and consistency of the luting composites affect the film thickness [14, 15]. Filler particle size in all 3 self-adhesive cements was less than 5 μm. Two cements except Smartcem contain angular-shaped inorganic fillers [13]. The filler shape of Smartcem may be a powerful variable for the cement thickness though its diffusion in the resin matrix.

G-CEM contains UDMA as a cross-linking monomer, owing to a lower molecular weight and to the greater flexibility of the urethane linkage [16]. Maxcem is mainly composed of base monomers, UDMA, Bis-GMA, and TEGDMA. Asmussen and Peutzfeldt reported that varying the relative amounts of UDMA, Bis-GMA, and TEGDMA had a significant effect on the mechanical properties of the resin composition [16]. Therefore, it can be speculated that base monomers have a large influence on the μTBSs of the different cement thicknesses. Moreover, the ratio of base monomers and functional acidic monomers could be associated with the mechanical properties of the cement.

Usually, there is a relatively large discrepancy between a CEREC restoration and cavity walls due to the accuracy of the optical impression and milling. The space must be filled with luting cement. Therefore, the varied bond strength by the cement thickness could be disadvantageous for the longevity of the restoration.

Further study should be carried out to investigate the between mechanical properties of the self-adhesive luting cements and their bonding capacity, and also longevity of the bonding.

5. Conclusion

Three self-adhesive luting cements showed lower μTBSs than Panavia F 2.0 that required surface treatments for the bonding. There were significant differences between cements; Smartcem showed the lowest and Panavia F 2.0 the highest μTBSs (Tukey’s HDS, ). Panavia F 2.0 gave the stable μTBSs regardless of the cement thickness. The results suggested that the cement thickness might have an influence on μTBSs, for the self-adhesive luting cements.

Acknowledgment

The authors appreciates DENTSPLY-Sankin (Tochigi, Japan), Sybron Dental Specialties Japan (Tokyo, Japan), GC (Tokyo, Japan), and Kuraray Medical (Tokyo, Japan) for supplying them with the materials used in this paper.

References

D. J. Fasbinder, “Clinical performance of chairside CAD/CAM restorations,” Journal of the American Dental Association, vol. 137, no. 9, pp. 22S–31S, 2006.

W. H. Mörmann and J. Schug, “Grinding precision and accuracy of fit of CEREC 2 CAD-CIM inlays,” Journal of the American Dental Association, vol. 128, no. 1, pp. 47–53, 1997.

T. Nakamura, N. Dei, T. Kojima, and K. Wakabayashi, “Marginal and internal fit of Cerec 3 CAD/CAM all-ceramic crowns,” International Journal of Prosthodontics, vol. 16, no. 3, pp. 244–248, 2003.

S. Uno, T. Tanaka, C. Kawamoto, J. Konishi, and H. Sano, “Microtensile bond strength to dentin and cavity adaptation of Cerec 2 inlay restoration,” American Journal of Dentistry, vol. 13, no. 2, pp. 59–63, 2000.

C. H. Pameijer, “A review of luting cements,” International Journal of Dentistry. In press

D. H. Pashley, R. M. Carvalho, H. Sano, M. Nakajima, M. Yoshiyamae, and Y. Shono, “The microtensile bond test: a review,” Journal of Adhesive Dentistry, vol. 1, no. 4, pp. 299–309, 1999.

C. Mazzitelli, F. Monticelli, R. Osorio, A. Casucci, M. Toledano, and M. Ferrari, “Effect of simulated pulpal pressure on self-adhesive cements bonding to dentin,” Dental Materials, vol. 24, no. 9, pp. 1156–1163, 2008.

E. Saskalauskaite, L. E. Tam, and D. McComb, “Flexural strength, elastic modulus, and pH profile of self-etch resin luting cements,” Journal of Prosthodontics, vol. 17, no. 4, pp. 262–268, 2008.

D. M. Wolf, J. M. Powers, and K. L. O'Keefe, “Bond strength of composite to porcelain treated with new porcelain repair agents,” Dental Materials, vol. 8, no. 3, pp. 158–161, 1992.

J. F. Roulet, K. J. Söderholm, and J. Longmate, “Effects of treatment and storage conditions on ceramic/composite bond strength,” Journal of Dental Research, vol. 74, no. 1, pp. 381–387, 1995.

K. Kamada, K. Yoshida, and M. Atsuta, “Effect of ceramic surface treatments on the bond of four resin luting agents to a ceramic material,” Journal of Prosthetic Dentistry, vol. 79, no. 5, pp. 508–513, 1998.

K. Kamada, K. Yoshida, and M. Atsuta, “Early bond strength and durability of bond between a ceramic material and chemically-cured or dual-cured resin luting agent,” American Journal of Dentistry, vol. 14, no. 2, pp. 85–88, 2001.

L. Han, A. Okamoto, M. Fukushima, and T. Okiji, “Evaluation of physical properties and surface degradation of self-adhesive resin cements,” Dental Materials Journal, vol. 26, no. 6, pp. 906–914, 2007.

S. Inokoshi, G. Willems, B. Van Meerbeek, P. Lambrechts, M. Braem, and G. Vanherle, “Dual-cure luting composites: part I: filler particle distribution,” Journal of Oral Rehabilitation, vol. 20, no. 2, pp. 133–146, 1993.

B. Van Meerbeek, S. Inokoshi, C. L. Davidson et al., “Dual cure luting composites–part II: clinically related properties,” Journal of Oral Rehabilitation, vol. 21, no. 1, pp. 57–66, 1994.

E. Asmussen and A. Peutzfeldt, “Influence of UEDMA, BisGMA and TEGDMA on selected mechanical properties of experimental resin composites,” Dental Materials, vol. 14, no. 1, pp. 51–56, 1998.