International Journal of Dentistry

Volume 2013 (2013), Article ID 372864, 2 pages

http://dx.doi.org/10.1155/2013/372864

Erratum

Erratum to “Short Implants in Partially Edentulous Maxillae and Mandibles: A 10 to 20 Years Retrospective Evaluation”

Diego Lops,¹ Eriberto Bressan,² Gianluca Pisoni,¹ Niccolò Cea,¹ Boris Corazza,² and Eugenio Romeo³

¹Department of Prosthodontics, S. Paul Hospital Dental Clinic, School of Dentistry, University of Milan, 20142 Milan, Italy

²Department of Implant Dentistry, Padova University Institute of Clinical Dentistry, 35020 Padova, Italy

³Department of Implant Dentistry, S. Paul Hospital Dental Clinic, School of Dentistry, University of Milan, 20142 Milan, Italy

Received 31 March 2013; Accepted 29 May 2013

Copyright © 2013 Diego Lops et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

There were some modifications in Tables 1 and 4.

Table 1: Implant distribution by diameter, length, and type.

Length
Diameter
Number

8 mm
3.3 mm
21

4.1 mm
66

4.8 mm
21

108

10 mm
3.3 mm
33

4.1 mm
89

4.8 mm
37

149

Table 4: Short and standard implants distribution: compliances and failures.

Site
Implant size (mm)
Type of prosthesis
Cause of compliance
Cause of failure

24
3.3 × 8
FCD
—
Mobility due to severe peri-implantitis

36
4.1 × 8
FPD
—
Mobility due to severe peri-implantitis

16
4.1 × 8
FPD
—
Mobility due to severe peri-implantitis

15
4.1 × 8
FPD
—
Mobility due to severe peri-implantitis

46
4.8 × 8
ST
Pathologic peri-implant bone resorption
—

35
4.1 × 8
FPD
Successfully treated peri-implantitis
—

24
4.1 × 8
ST
Successfully treated peri-implantitis
—

15
4.1 × 8
FPD
Successfully treated peri-implantitis
—

25
4.1 × 8
ST
Successfully treated peri-implantitis
—

24
4.1 × 8
FCD
Pathologic peri-implant bone resorption
—

16
4.1 × 8
ST
Pathologic peri-implant bone resorption
—

24
4.1 × 8
FPD
Successfully treated peri-implantitis
—

45
4.1 × 8
FPD
Pathologic peri-implant bone resorption
—

16
4.8 × 10
ST
—
Mobility due to severe peri-implantitis

24
4.1 × 10
FCD
—
Mobility due to severe peri-implantitis

25
3.3 × 10
FPD
—
Mobility due to severe peri-implantitis

36
4.1 × 10
FPD
—
Mobility due to severe bone resorption

37
4.1 × 10
FPD
Successfully treated peri-implantitis
—

14
4.1 × 10
FPD
Pathologic peri-implant bone resorption
—

25
4.8 × 10
FPD
Successfully treated peri-implantitis
—

16
4.1 × 10
ST
Successfully treated peri-implantitis
—

46
4.1 × 10
FPD
Successfully treated peri-implantitis
—

25
4.1 × 10
FPD
Successfully treated peri-implantitis
—

35
4.1 × 10
ST
Pathologic peri-implant bone resorption
—

25
4.1 × 10
ST
Pathologic peri-implant bone resorption
—

34
4.1 × 10
FPD
Pathologic peri-implant bone resorption
—

16
4.8 × 10
FPD
Pathologic peri-implant bone resorption
—

44
4.1 × 10
FPD
Successfully treated peri-implantitis
—

Tooth numbers: 14 = maxillary right first premolar, 15 = maxillary right second premolar, 16 = maxillary right first molar, 24 = maxillary left first premolar, 25 = maxillary left second premolar, 35 = mandibular right second premolar, 36 = mandibular left first molar, 37 = mandibular left second molar 44 = mandibular right first premolar, and 46 = mandibular right first molar.

ST = single tooth prosthesis, FCD = fixed complete dentures, PFD = partial fixed dentures.