International Journal of Dentistry

Volume 2014 (2014), Article ID 586537, 1 page

http://dx.doi.org/10.1155/2014/586537

Erratum

Erratum to “A Proposed New Index for Clinical Evaluation of Interproximal Soft Tissues: The Interdental Pressure Index”

Luigi Checchi,¹ Marco Montevecchi,¹ Gianluca Marucci,² and Vittorio Checchi³

¹Department of Periodontology & Implantology, DIBINEM, Alma Mater Studiorum-University of Bologna, Via San Vitale 59, 40100 Bologna, Italy

²Section of Pathology, Department of Haematology and Oncological Sciences, Bellaria Hospital, University of Bologna, Via Altura 3, 40100 Bologna, Italy

³Department of Medical Sciences, University of Trieste, Piazza dell’Ospitale 1, 34100 Trieste, Italy

Received 16 June 2014; Accepted 24 June 2014; Published 9 July 2014

Copyright © 2014 Luigi Checchi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors’ names were incorrectly listed as Checchi Luigi, Montevecchi Marco, Marucci Gianluca, and Checchi Vittorio; this error is corrected here.