International Journal of Dentistry
Volume 2020 (2020), Article ID 7187159, 1 page
https://doi.org/10.1155/2020/7187159

Corrigendum

Corrigendum to “Evaluation of Some Mechanical Properties of a Maxillofacial Silicon Elastomer Reinforced with Polyester Powder”

Yagthan Mohammed Haider,1,2 Zainab Salih Abdullah,¹ Abdalbseet A. Fatalla,¹ Ghasak H. Jani,¹ and Norehan Mokhtar²

¹Department of Prosthodontics, College of Dentistry, University of Baghdad, Baghdad, Iraq
²Advanced Medical and Dental Institute, University Science Malaysia, George Town, Malaysia

Correspondence should be addressed to Yagthan Mohammed Haider; yaqthanhaiderz@yahoo.com

Received 22 July 2020; Accepted 22 July 2020; Published 28 September 2020

Copyright © 2020 Yagthan Mohammed Haider et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Evaluation of Some Mechanical Properties of a Maxillofacial Silicon Elastomer Reinforced with Polyester Powder” [1], Dr. Abdalbseet A. Fatalla was missing from the authors’ list. Dr. Fatalla shared his knowledge and experience during the study design and manuscript preparation and also provided the polyester particles used in the research. The corrected authors’ list is shown above.

References

Y. M. Haider, Z. S. Abdullah, G. H. Jani, and N. Mokhtar, “Evaluation of some mechanical properties of a maxillofacial silicon elastomer reinforced with polyester powder,” International Journal of Dentistry, vol. 2019, Article ID 2948457, 6 pages, 2019.