International Journal of Distributed Sensor Networks

Volume 2013 (2013), Article ID 529489, 10 pages

http://dx.doi.org/10.1155/2013/529489

Research Article

ALRD: AoA Localization with RSSI Differences of Directional Antennas for Wireless Sensor Networks

Jehn-Ruey Jiang, Chih-Ming Lin, Feng-Yi Lin, and Shing-Tsaan Huang

Department of Computer Science and Information Engineering, National Central University, Jhongli 32001, Taiwan

Received 30 September 2012; Revised 22 January 2013; Accepted 1 February 2013

Academic Editor: Chengdong Wu

Copyright © 2013 Jehn-Ruey Jiang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In this paper, we fit RSSI values into a parabola function of the AoA between 0° and 90° by applying quadratic regression analysis. We also set up two-directional antennas with perpendicular orientations at the same position and fit the difference of the signal RSSI values of the two antennas into a linear function of the AoA between 0° and 90° by linear regression analysis. Based on the RSSI-fitting functions, we propose a novel localization scheme, called AoA Localization with RSSI Differences (ALRD), for a sensor node to quickly estimate its location with the help of two beacon nodes, each of which consists of two perpendicularly orientated directional antennas. We apply ALRD to a WSN in a  m indoor area with two beacon nodes installed at two corners of the area. Our experiments demonstrate that the average localization error is 124 cm. We further propose two methods, named maximum-point minimum-diameter and maximum-point minimum-rectangle, to reduce localization errors by gathering more beacon signals within 1 s for finding the set of estimated locations of maximum density. Our results demonstrate that the two methods can reduce the average localization error by a factor of about 29%, to 89 cm.

1. Introduction

A wireless sensor network (WSN) consists of tiny sensor nodes equipped with computational, communication, and sensing capabilities, whereby each sensor node can collect data about the environment, such as temperature, vibration levels, light, electromagnetic strength, and humidity. The sensed data is then transmitted to the sink node through a chain of multiple intermediate nodes that help forward the data. Due to their capabilities and versatility, WSNs have been widely used in many areas, such as military affairs, healthcare, and environmental monitoring. In many applications, apart from sensed data, the location information of the deployed sensor node is also desirable as it can be used to improve routing efficiency. Hence, the discovery of the locations or positions of sensor nodes is one of the most critical issues for WSNs.

Localization is the process of determining the absolute or relative physical location of a specific node or the target node. Although a global positioning system (GPS) [1] can provide precise location information, the costly hardware and large size make it unsuitable for WSNs. Furthermore, a GPS can only be used outdoors since it depends on signals directly received from satellites for localization. Besides the GPS, numerous localization methods [2–27] have also been proposed. Most of these deploy some beacon (or anchor) nodes, which periodically broadcast beacon signals containing their own locations to help other sensor nodes with the localization.

Localization schemes can be classified as range based or range-free. In range-free schemes, the sensor node location is estimated solely on network connectivity. Such schemes need no extra hardware, but their accuracy is too low, and they usually rely on a large deployment of beacon nodes to improve the accuracy. Conversely, range-based schemes usually have better accuracy. They measure the time of arrival (ToA) [2, 3], time difference of arrival (TDoA) [4–6], angle of arrival (AoA) [2, 4, 15, 17, 18, 20, 21, 27], and received signal strength indicator (RSSI) [3, 7–14, 16, 20, 21] to estimate the distances or angles between pairs of nodes, which in turn are used to calculate the locations of nodes. Most kinds of measurement are taken with extra auxiliary hardware. For example, ToA and TDoA are very sensitive to timing errors, and, hence, their measurement relies on highly accurate synchronized timers. The AoA, which is defined as the angle between the propagation direction of an incident RF wave and a reference direction, can be measured by an array of antennas. Unlike the previously mentioned three kinds of measurement, RSSI can be outputted by most commercial off-the-shelf sensor nodes.

RSSI-based localization methods can be further classified into groups, such as propagation model [8, 9], proximity [10–12] or fingerprinting [13, 14, 28]. Propagation model localization methods analyze the relationship between RSSI values and distances to learn parameters such as the path loss exponent of the propagation path-loss model in the calibration phase. The calibrated propagation model is then applied to convert the signal strength to the estimated distance between transmitter and receiver in the localization phase. In proximity localization methods, an unknown node broadcasts a localization packet to initiate the localization process. Nearby location-known reference nodes then report the RSSI values measured from the packet to a nominated node. The order of reported RSSI values is then used to determine the location of the unknown node. Fingerprinting localization methods measure RSSI values from a set of static nodes during a calibration phase at several locations. The measured RSSI values at a particular location are then used to fingerprint the location. In the localization phase, a node measures RSSI values from the same static nodes and then estimates its location by finding the fingerprinting that is the closest match with the measured RSSI values.

In this paper, based on the concept of integrating AoA Localization and fingerprinting localization for reducing errors, we propose a novel localization scheme, called AoA Localization with RSSI Differences (ALRD). It estimates the AoA for localization in 0.1 s by comparing the RSSI values of beacon signals received from two perpendicularly oriented directional antennas installed at the same place. In the proposed ALRD, we fit RSSI values received from a directional antenna into a parabola function of an AoA between 0° and 90°. We also set up a beacon node with two perpendicularly oriented directional antennas and fit the difference of the signal RSSI values of the two antennas into a linear function of the absolute value of one AoA between 0° and 90°. With the parabola and linear functions, a sensor node can then self-localize itself quickly (within 0.1 s) by observing RSSI values of the beacon signals emitted by the two beacon nodes. The fitting functions can easily be stored in a WSN node, despite their limited storage space, and their inverse functions can be used to speed up the localization process. Hence, ALRD is suitable for mobile sensing and actuating applications in an open and stable environment since it allows a sensor node to fast localize itself with small localization errors. Our experiments demonstrate that the average localization error is 124 cm when deployed in a 10 × 10 m indoor area.

We further propose two methods, namely maximum-point minimum-diameter and maximum-point minimum-rectangle, to reduce ALRD localization errors by gathering more beacon signals within 1 s for finding the set of estimated locations of maximum density. Such estimated locations are then averaged to obtain the final location estimation. Experimental results obtained demonstrate that the two methods can reduce the average localization error by a factor of about 29%, to 89 cm. Hence, ALRD is suitable for mobile sensing and actuating applications, as it allows a sensor node to quickly localize itself with lower localization errors.

The rest of this paper is organized as follows. We review some AoA determination schemes in Section 2. In Section 3, we describe the proposed localization scheme, ALRD, in detail. Section 4 shows our experimental results. Then, we describe improvements to ALRD and compare it with other schemes in Section 5. Finally, we conclude the paper in Section 6.

2. Related Works

In this section, we review some research that determines AoAs for localization. Amundson et al. developed the RIMA system that uses radio interferometry measurements to estimate the AoA [15]. RIMA estimates the AoA by measuring the TDoA of an interference signal generated by a antenna array. The system consists of a beacon node and a target node. The beacon node is formed by grouping three sensor nodes to form an antenna array. The three sensor nodes are arranged in a manner such that their antennas are mutually orthogonal. Two of the sensor nodes transmit a pure sinusoidal signal at slightly different frequencies to create a low-frequency interference signal. The other sensor node and the target node both measure the phase of the low-frequency signal. The difference in the phase readings measured by these two nodes is then used to estimate the AoA from the beacon node to the target node. Although RIMA can accurately measure the AoA within 1 s, it requires very accurate time synchronization between the beacon node and the target node, which is very difficult to achieve.

Two methods, Estimating Direction-of-Arrival (EDoA) [5] and Rotatable Antenna Localization (RAL) [16], utilize the property of directional antennas to estimate the AoA of a signal. EDoA estimates the AoA of an incoming signal by using a mechanically actuated parabolic reflector. The receiver, which is fixed to a parabolic reflector rotated by a step motor, is used to observe the RSSI values of signals emitted from a transmitter. When the orientation of the reflector is aligned with the direction from the receiver to the transmitter, the receiver will observe the highest RSSI value. Hence, the AoA can be obtained by searching for the reflector orientation in which the highest RSSI value is observed. Their experimental results show that the error in measuring the AoA has a mean of about 4° and a standard deviation of about 8° in both indoor and outdoor environments. However, EDoA needs to take a long time to rotate the reflector for searching the highest RSSI value. In RAL, a beacon node is equipped with a rotatable directional antenna. It regularly rotates its antenna to emit beacon signals in different directions. A sensor node determines the angle from the beacon node to itself by observing the RSSI values of the received beacon signals, which contain the location of the beacon node and the current orientation of its antenna. Similar to EDoA, RAL can determine the AoA by determining the strongest signal. By using the estimated AoAs and locations of two distinct beacon nodes, a sensor node can then calculate its own location with a localization error of 76 cm within a 10 × 10-meter indoor area. Two enhanced methods were further proposed to reduce the localization error by a factor of 10% [16]. EDoA and RAL both need a long time to rotate the antenna or the reflector for observing the variation of the RSSI values while estimating the AoA. Therefore, EDoA and RAL are only suitable for localizing static sensor nodes.

3. The Proposed Scheme

Existing localization schemes using AoAs may take a long time to finish the localization or need very accurate time synchronization. In this section, we propose ALRD that finish localization quickly by learning how the RSSI values vary with the AoA in advance without the need of time synchronization between the anchor node and the target node.

3.1. Preliminary

As shown in Figure 1, we define the AoA as the angle from the propagation direction of an incident RF wave to the orientation of the directional antenna emitting the RF wave. The AoA is positive if it is counterclockwise and negative otherwise. Figure 2 shows a plot of RSSI values over AoA; we observe that if the distance between the sensor node and the directional antenna is fixed, the RSSI varies like a parabolic function of AoA, referenced to the orientation of the directional antenna, between −90° and 90° with a an axis of symmetry at AoA = 0°. Furthermore, we set up two perpendicularly oriented directional antennas installed at the same location (seen in Figure 3). From the results obtained (as shown in Figure 4), we also observe that the difference of the signal RSSI values received by a sensor node, localizing between the orientations of two-directional antennas, varies like a linear function of the absolute value of the AoA between 0° and 90°. It can be noted that absolute values of AoAs are used and that when one absolute AoA value is , the other absolute AoA value is . We then take only one absolute AoA value as the representative without ambiguity.

Figure 1: AoA of a sensor node and a directional antenna.

Figure 2: RSSI values of signals received from a directional antenna.

Figure 3: AoAs relative to directional antennas with perpendicular orientations.

Figure 4: Difference of the signal RSSI values received from two-directional antennas with perpendicular orientations.

3.2. RSSI Gathering and Analyzing

Before deployment, ALRD needs to gather and analyze RSSI values of the signals that a sensor node receives from a directional antenna at different distances and angles. The measured RSSI values are then analyzed to generate the fitting functions. These fitting functions are then stored into the storage of each sensor node for localization. For better accuracy, the RSSI gathering and analyzing tasks are needed to execute at each new system deployment location, since the environment changes may make the measured RSSI values have some differences. The tasks are described as follows.

(1)Gathering RSSI values: as shown in Figure 5, we set up a directional antenna that can be rotated by an angle from the -axis (or the east direction) (0°) to the -axis (or the north direction) (90°) and transmits beacon signals containing the rotating angle for every degree. A sensor is placed at the -axis at a distance of meters for receiving signals emitted from the antenna for several times (e.g., 100), where and are specified values (e.g., ). The received signal RSSI values are averaged and stored. The gathered RSSI average values are denoted by , where , and .(2)Performing quadratic regression: for each distance , the gathered RSSI values are fitted approximately into a quadratic function of the rotating angle , by quadratic regression analysis. (3)Calculating RSSI differences: for each distance , the RSSI difference at angle is obtained by calculating . In practice, is approximately the difference of RSSI values between two signals that a sensor node receives from two perpendicularly oriented directional antennas installed at the same location.(4)Performing linear regression: for each distance , the RSSI difference at angle is approximately fitted into a linear function by linear regression analysis.(5)Storing functions: the quadratic and linear approximation functions are loaded into the storage of the sensor nodes before they are deployed.

Figure 5: The setup for gathering and analyzing RSSI values.

3.3. ALRD Setup

Figure 6 shows the setup for ALRD. We assume that all sensor nodes are randomly deployed in a planar square area of interest. Two beacon nodes, and , are deployed in the lower left and lower right corners of the area, respectively. Each beacon node is equipped with two-directional antennas with perpendicular orientations. The antennas of the beacon node in the lower left (or right) corner have either an upright or a horizontal to the right (or left) orientation. The antenna with the upright orientation is called the vertical antenna, whereas, the antenna with the left or right orientation is called the horizontal antenna. Each beacon node is assumed to know its location and orientations of the two antennas. The beacon nodes transmit beacon signals via the two-directional antennas regularly and alternately. The beacon signal contains the orientation of the antenna and the location of the beacon node, which are expected to reach the whole area of interest.

Figure 6: Setup for ALRD.

Note that the setup in Figure 5 can be the basic building block for deploying ALRD in a large indoor localization environment. Figure 7 shows a deployment instance of beacon nodes in a large area. The beacon nodes consist of 1, 2, or 4 pairs of perpendicularly oriented directional antennas. Any two adjacent beacon nodes are D units away from each other in the horizontal direction and 2D units away from each other in the vertical direction. Based on the setup of Figure 6, we can see that any two adjacent beacon nodes in the horizontal direction can properly localize target nodes within an area of D by D units. For example, in Figure 7, the beacon nodes X and Y can properly localize target nodes within the shaded area. Hence, ALRD can help localize sensor nodes in a large area by installing a lot of beacon nodes.

Figure 7: Deployment instance of beacon nodes in a large area.

3.4. Localization Procedure

In ALRD, a sensor node executes the following steps to estimate its location.

(1)Receiving beacon signals: in order to localize itself, the sensor node needs to collect the signal RSSI values and of the horizontal and vertical antennas of beacon node . It also needs to collect the signal RSSI values and of the horizontal and vertical antennas of beacon node .(2)Estimating distance: for each distance , for , two absolute values of AoAs, and , corresponding to the horizontal and vertical antennas of the beacon node are obtained by calculating and , for and . Here, is an inverse function of the quadratic function obtained in RSSI gathering and analysis. As shown in Figure 6, should ideally be . Therefore, the sensor node can obtain a rough estimate of the distance from itself to the beacon node , by finding for , such that is closest to . Let the discovered be denoted by . Similarly, by and , the sensor node can find such that is closest to , where and are two absolute values of AoAs (where and ) corresponding to the horizontal and vertical antennas of the beacon node and and . Let the discovered be denoted by . (3)Estimating AoA: the distance estimate obtained in Step 2 is used to choose a proper linear approximation function for estimating the AoA of the sensor node corresponding to the beacon node . The AoA corresponding to the horizontal antenna of is calculated as , where is the inverse function of the linear function obtained in the RSSI gathering and analysis stage. Similarly, by and (), the AoA corresponding to the horizontal antenna of the beacon node can be calculated as .(4)Calculating location: after obtaining the AoAs (or for short) and (or for short) corresponding to the horizontal antennas of the two beacon nodes and , the sensor node can determine its location by calculating

where is the known distance of and . Note that we can also calculate this by using only and . However, our experiments show that using and results in locations that are more accurate. This explains why ALRD uses , , , and to calculate and , uses and to calculate and , and then uses and to calculate the location.

4. Experiment Results

In this section, we describe the implementation of ALRD and the results of the experiments using the implementation.

4.1. Implementation

The sensor nodes and the beacon nodes of the proposed ALRD scheme are implemented in nesC with TinyOS support on the Moteiv BAT mote sensor. The BAT mote sensor has a Texas Instruments MSP430 F1611 microcontroller running at 8 MHz with 10 kB RAM and 48 kB flash memory. It is equipped with the Chipcon CC2420 IEEE 802.15.4 compliant wireless transceiver using the 2.4 GHz band with a 250 kbps data rate. With an integrated onboard omnidirectional antenna, the BAT mote sensor has a maximum transmission range of 50 m (indoor) or 125 m (outdoor).

The beacon node used for RSSI gathering and analysis is also attached with a Maxim AP-12 panel antenna, which is rotated by a Fastech Ezi-Servo 28 L step motor, as shown in Figure 8(a). The beacon node used in localization is attached with two AP-12 panel antennas with perpendicular antennas, as shown in Figure 8(b). Its horizontal and vertical beamwidths are and , respectively.

(a)

(b)

Figure 8: (a) The beacon nodes used in RSSI gathering and analysis. (b) The beacon node used in localization.

4.2. Experimental Setup

We installed the ALRD setup in a  m region of an indoor basketball court for conducting experiments as shown in Figures 9 and 10. Two beacon nodes were set up at two ends of the edge of the experiment area, and the localization accuracy was tested at 81 grid points (as arranged in Figure 10). Since the largest distance between a measurement point and a beacon node is about 12.73 m, we gathered and analyze the RSSI values of signals emitted at distances of  m for every degree from to . The RSSI value for each distance and each degree was obtained by averaging 100 measurements.

Figure 9: The ALRD experimental setup.

Figure 10: The ALRD experimental setup and 81 grid points for testing.

The gathered RSSI values are shown in Figure 11. The interval for gathering the RSSI values is set as 1 m because the RSSI values will be indistinguishable if the interval is too small. To reduce the gathering time and space used for storing the approximation functions, we only measured RSSI values for one of the four antennas of the same type of the two beacon nodes in our experiments. The coefficients of determination, , of all the approximation functions are shown in Figure 12. We note that the coefficients of determination are high and all exceed 0.96. Therefore, the approximation functions are very suitable for expressing the measured RSSI values and RSSI differences.

Figure 11: The gathered RSSI values.

Figure 12: The coefficients of determination, , of the quadratic () and linear () approximation functions for different distances.

4.3. Localization Errors

The localization accuracy is tested at the 81 grid points shown in Figure 10. The beacon nodes transmit beacon signals via each of their antennas 10 times per second. Therefore, a sensor node can localize itself 10 times per second. We take the average of 10 localization results and plot the cumulative distribution in Figure 13. The average localization error of the localization experiment is 124 cm. In Figure 14, we use different colors to represent the localization errors of the test points. The brighter color indicates the smaller localization error. As Figure 13 shows, the test points that lie in the middle of the region have smaller localization errors. This can be explained by Figure 4, in which the curves almost look like straight lines in the middle.

Figure 13: Cumulative distribution function of the localization error.

Figure 14: The localization error distribution.

5. Improvement

As the results show, ALRD can let sensor nodes localize themselves by measuring RSSI values of signals from two beacon nodes in a short time (0.1 s). However, the measured RSSI values may be influenced by environmental interferences so the estimated location may deviate from the real location and has a localization error. Thus, if a node spends more time measuring more RSSI values, then more location estimations can be made, which in turn can reduce the deviations. Based on the concepts introduced in [28], we propose two methods, namely, maximum-point minimum-diameter (MPMD) and maximum-point minimum-rectangle (MPMR), to remove some estimated location from a set of estimated locations for the purposes of reducing the localization error.

Assuming that is the set of estimated locations, MPMD and MPMR remove some locations by finding a subset with the largest density. The density of a set of estimated locations is defined as follows:

where is the cardinality of the set, Dia is the diameter of the locations in the set, and Area is the area of the smallest axis-parallel rectangle containing all locations in the set. The diameter Dia of a set of locations can be obtained by finding a pair of locations with the longest distance between them. The Area of a set of locations can be obtained by finding the four extremes (i.e., the leftmost, rightmost, highest, and lowest extremes) and calculating the area of the rectangle bounded by them.

The following steps are executed by a sensor node to apply MPMD or MPMR to obtain a subset of a set of locations such that has the largest density.

Step 1. If , then return .

Step 2. Derive subset of by removing the location with the maximum summation of the distances from itself to other locations in , and calculate the density of .

Step 3. If , then return ; otherwise, set and go to Step 1.

By using the set of estimated locations with the maximum density returned by MPMD and MPMR, we can then calculate the average of all locations to derive a new estimated location with a small localization error. Table 1 shows the average of the localization errors after applying MPMD and MPMR to 10 localization results collected by a sensor node within 1 second. Figure 15 shows the cumulative distributions of the ALRD localization errors and those improved by MPMD and MPMR. As shown, MPMD is more suitable than MPMR for sensor nodes because it makes similar improvements as MPMR but has less computational overheads.

Table 1: Comparisons of localization errors.

ALRD
ALRD + MPMD
ALRD + MPMR

Localization errors (cm)
124
90
89

Improvement
—
28%
28.8%

Figure 15: Cumulative distributions of localization errors.

Table 2 compares ALRD with other three localization schemes, namely, EDoA [4], RAL [13], and RIMA [15]. As we have mentioned previously, EDoA and RAL take a long time to localize sensor nodes because they have to rotate the antennas or the reflector. RIMA is able to accurately localize a target node in a short time, but it requires time synchronization between the beacon node and the target node. By contrast, ALRD can localize sensor nodes in a short time and provides relatively low localization errors without the need for time synchronization.

Table 2: Comparison of localization schemes.

Method
#BN
#Antenna
SYN
Time
AE
LE

ALRD
2
2/BN
N
<1 s
6°–8°
89 cm

RIMA
1
3/BN
Y
1.6 s
3°
—

EDoA
—
1/SN
N
200 s
4°–8°
—

RAL
2
2/BN
N
180 s
4°–8°
76 cm

#BN: the number of beacon nodes. #Antenna: the number of antennas per beacon node (BN) or per sensor node (SN).AE: angle error.LE: localization error.SYN: time synchronization requirement.

6. Conclusion

In this paper, we proposed AoA Localization with RSSI Differences (ALRD) to estimate angle of arrival (AoA) by comparing the received signal strength indicator (RSSI) values of beacon signals received from two perpendicularly oriented directional antennas installed at the same place. We have implemented and installed ALRD in a  m indoor environment. Our experimental results showed that a sensor node can estimate its location by using only four beacon signals within 0.1 s with an average localization error of 124 cm. Hence, ALRD conserves the time and energy spent on localization. Furthermore, we proposed two methods, namely, maximum-point minimum-diameter (MPMD) and maximum-point minimum-rectangle (MPMR), to reduce ALRD localization errors by gathering more beacon signals within 1 s to find the set of estimated locations of maximum density. The results demonstrated that MPMD and MPMR can reduce the localization error by a factor of about 29% to 89 cm. Thus, as ALRD allows a sensor node to quickly localize itself with lower errors; it is suitable for mobile sensing and actuating applications.

As our experiments show, it is sufficient to gather RSSI values for only one of four antennas of the same type to achieve sufficient localization accuracy. By equipping antennas of the same type to all beacon nodes, the sensor nodes merely need to store the quadratic and linear approximation functions of one antenna. In the future, we will focus on applying ALRD to realize a large-area localization system. Moreover, we will also try to apply different types of directional antennas and their combinations to ALRD in the hope of further reducing localization error.

References

B. Hofmann-Wellenhof, H. Lichtenegger, and J. Collins, Global Positioning System: Theory and Practice, Springer, Berlin, Germany, 1997.

T. Y. Chen, C. C. Chiu, and T. C. Tu, “Mixing and Combining with AOA and TOA for Enhanced accuracy of mobile location,” in Proceedings of the 5th European Personal Mobile Communications Conference, pp. 276–280, 2003.

N. Patwari and A. O. Hero III, “Location estimation accuracy in wireless sensor networks,” in Proceedings of the 36th Asilomar Conference on Signals Systems and Computers, pp. 1523–1527, November 2002.

C. Li and Z. Weihua, “Hybrid TDOA/AOA mobile user location for wideband CDMA cellular systems,” IEEE Transactions on Wireless Communications, vol. 1, no. 3, pp. 439–447, 2002.

F. Gustafsson and F. Gunnarsson, “Positioning using time-difference of arrival measurements,” in Proceedings of the IEEE International Conference on Accoustics, Speech, and Signal Processing, pp. 553–556, April 2003.

W. Xiao, Y. Weng, and L. Xie, “Total least squares method for robust source localization in sensor networks using TDOA measurements,” International Journal of Distributed Sensor Networks, vol. 2011, Article ID 172902, 8 pages, 2011.

P. Bahl and V. N. Padmanabhan, “RADAR: an in-building RF-based user location and tracking system,” in Proceedings of the 19th IEEE International Conference on Computer Commmunications (IFOCOM '00), pp. 775–784, 2000.

P. K. Sahoo and I. Hwang, “Collaborative localization algorithms forwireless sensor networks with reduced localization error,” Sensors, vol. 11, no. 10, pp. 9989–10009, 2011.

J. Shirahama and T. Ohtsuki, “RSS-based localization in environments with different path loss exponent for each link,” in Proceedings of the IEEE Vehicular Technology Conference-Spring, VTC, pp. 1509–1513, May 2008.

J. Lee, W. Chung, and E. Kim, “A new range-free localization method using quadratic programming,” Computer Communications, vol. 34, no. 8, pp. 998–1010, 2011.

Z. Liu and J. Chen, “A new sequence-based iterative localization in wireless sensor networks,” in Proceedings of the International Conference on Information Engineering and Computer Science (ICIECS '09), December 2009.

K. Yedavalli and B. Krishnamachari, “Sequence-based localization in wireless sensor networks,” IEEE Transactions on Mobile Computing, vol. 7, no. 1, pp. 81–94, 2008.

S. Fang and T. Lin, “A dynamic system approach for radio location fingerprinting in wireless local area networks,” IEEE Transactions on Communications, vol. 58, no. 4, pp. 1020–1025, 2010.

P. M. Scholl, S. Kohlbrecher, V. Sachidananda, and K. Van Laerhoven, “Fast Indoor Radio-Map Building for RSSI-based Localization Systems,” in Proceedings of the 9th International Conference on Networked Sensing System, pp. 1–2, 2012.

I. Amundson, J. Sallai, X. Koutsoukos, and A. Ledeczi, “Radio interferometric angle of arrival estimation,” Lecture Notes in Computer Science, vol. 5970, pp. 1–16, 2010.

S. J. Halder and W. Kim, “A fusion approach of RSSI and LQI for indoor localization system using adaptive smoothers,” Journal of Computer Networks and Communications, Article ID 790374, 10 pages, 2012.

I. Amundson, J. Sallai, X. Koutsoukos, and A. Ledeczi, “Mobile sensor navigation via RF-based angle of arrival localization,” International Journal of Distributed Sensor Networks, vol. 2012, Article ID 842107, 15 pages, 2012.

I. Amundson, J. Sallai, X. Koutsoukos, and A. Ledeczi, “Mobile sensor navigation using rapid RF-based angle of arrival localization,” in Proceedings of the 17th IEEE Real-Time and Embedded Technology and Applications Symposium, pp. 316–325, Chicago, Ill, USA, 2011.

A. Cenedese, G. Ortolan, and M. Bertinato, “Low-density wireless sensor networks for localization and tracking in critical environments,” IEEE Transactions on Vehicular Technology, vol. 59, no. 6, pp. 2951–2962, 2010.

B. N. Hood and P. Barooah, “Estimating DoA from radio-frequency rssi measurements using an actuated reflector,” IEEE Sensors Journal, vol. 11, no. 2, pp. 413–417, 2011.

J. R. Jiang, C. H. Lin, and Y. J. Hsu, “Localization with Rotatable directional antennas for wireless sensor networks,” in Proceedings of the 39th International Conference on Parallel Processing Workshops (ICPPW '10), pp. 542–548, September 2010.

T. Kim, M. Shon, M. Kim, D. S. Kim, and H. Choo1, “Anchor-node-based distributed localization with error correction in wireless sensor networks,” International Journal of Distributed Sensor Networks, vol. 2012, Article ID 975147, 14 pages, 2012.

Y. Liu, X. Yi, and Y. He, “A novel centroid localization for wireless sensor networks,” International Journal of Distributed Sensor Networks, vol. 2012, Article ID 829253, 8 pages, 2012.

A. Nasipuri and K. Li, “Experimental evaluation of an angle based indoor localization system,” in Proceedings of the 5th International Symposium on Modeling and Optimization in Mobile, Ad Hoc and Wireless Networks, pp. 1–9, 2006.

D. Niculescu and B. Nath, “DV based positioning in ad hoc networks,” Telecommunication Systems, vol. 22, no. 1, pp. 267–280, 2003.

C. H. Ou, “A localization scheme for wireless sensor networks using mobile anchors with directional antennas,” IEEE Sensors Journal, vol. 11, no. 7, pp. 1607–1616, 2011.

R. Peng and M. L. Sichitiu, “Angle of arrival localization for wireless sensor networks,” in Proceedings of the 3rd Annual IEEE Communications Society on Sensor and Ad hoc Communications and Networks (Secon '06), pp. 374–382, September 2006.

R. Atanassov, P. Bose, M. Couture et al., “Algorithms for optimal outlier removal,” Journal of Discrete Algorithms, vol. 7, no. 2, pp. 239–248, 2009.