International Journal of Food Science
Volume 2018 (2018), Article ID 9243549, 8 pages
https://doi.org/10.1155/2018/9243549

Research Article

Drying Rate and Product Quality Evaluation of Roselle (Hibiscus sabdariffa L.) Calyces Extract Dried with Foaming Agent under Different Temperatures

Mohamad Djaeni, Andri Cahyo Kumoro, Setia Budi Sasongko, and Febiani Dwi Utari

Department of Chemical Engineering, Faculty of Engineering, Diponegoro University, Jl. Prof. H. Soedarto, SH, Tembalang, Semarang 50275, Indonesia

Correspondence should be addressed to Mohamad Djaeni; moh.djaeni@live.undip.ac.id

Received 4 September 2017; Accepted 10 February 2018; Published 20 March 2018

Academic Editor: Marie Walsh

Copyright © 2018 Mohamad Djaeni et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The utilisation of roselle (Hibiscus sabdariffa L.) calyx as a source of anthocyanins has been explored through intensive investigations. Due to its perishable property, the transformation of roselle calyces into dried extract without reducing their quality is highly challenging. The aim of this work was to study the effect of air temperatures and relative humidity on the kinetics and product quality during drying of roselle extract foamed with ovalbumin and glycerol monostearate (GMS). The results showed that foam mat drying increased the drying rate significantly and retained the antioxidant activity and colour of roselle calyces extract. Shorter drying time was achieved when higher air temperature and/or lower relative humidity was used. Foam mat drying produced dried brilliant red roselle calyces extract with better antioxidant activity and colour qualities when compared with nonfoam mat drying. The results showed the potential for retaining the roselle calyces extract quality under suggested drying conditions.

1. Introduction

Roselle (Hibiscus sabdariffa L.) is commercially cultivated in some countries like India, Indonesia, Malaysia, Sudan, Egypt, and Mexico [1]. The roselle calyx is brilliant red in colour due to the existence of anthocyanins, such as cyanidin-3-sambubioside, cyanidin-3-glucoside, and delphinidin-3-glucoside [2]. The calyx is usually used to prepare jam, jelly, cakes, ice cream, preserves, and herbal beverage [3]. The consumption of roselle calyx tea has been reported to promote health benefits, which mainly functions as an antioxidant [4]. The relationship between antioxidant activity and anthocyanin of roselle calyx has been reported in the literatures [5, 6]. The total anthocyanin content of roselle calyces is 2.52 g/100 g expressed as delphinidin-3-glucoside [7]. Besides, the roselle extracts also contain ascorbic acid. Wang et al. observed that anthocyanins have many times more antioxidant activity than ascorbic acid [8]. Therefore, the antioxidant activity of roselle extract is predominantly contributed by anthocyanins. However, the use of anthocyanins in food products experienced problems related to their instability during processing and storage caused by direct exposure to heat, oxygen, and light [9]. Mazza and Miniati observed that thermal degradation of anthocyanin of roselle extract was fast at temperatures above 100°C [10].

Microencapsulation technique is one of the methods to maintain anthocyanins stability by entrapping them inside a coating material to reduce direct interactions with external factors, such as temperature, light, moisture, and oxygen. Although spray drying and freeze drying are the most common microencapsulation methods applied in the food and pharmaceutical industries, freeze drying is 30 to 50 times more costly than that of spray drying [11]. However, extreme moisture loss during spray drying may trigger shrinking and deformation of dried particles [12].

Foam mat drying is carried out by transforming liquid and semisolid materials into stable foam by incorporation of air and a foaming agent. It is a good option to shorten drying time and to retain product quality [13]. Ovalbumin is usually chosen as a foaming agent due to the ability of its proteins to generate a dense film around the air bubbles, reducing the surface tension instability and retaining the entrapped air [14]. In addition, glycerol monostearate (GMS) and methyl cellulose (MC) are the other common foaming agents [13, 15]. With the agents, the surface area of product becomes greater for mass and heat transfer. These conditions allow higher drying rates [13].

The foam mat drying can be a potential option for roselle extract drying. However, the application cannot be straightforward. As far as literature survey is being done, no studies have been carried out to investigate the degradation of the anthocyanins, colour, and antioxidant activity as a function of temperature, relative humidity, and time during foam mat drying of roselle extract. This study aimed to study the effect of air temperatures and relative humidity on the kinetics and product quality during foam drying of roselle extract. As indicators, the drying time and the quality of roselle extract in terms of antioxidant activity and colour were evaluated. The results were also compared with conventional convective drying without foaming agent.

2. Materials and Methods

2.1. Plant Materials and Chemicals

Traditionally dried brilliant red roselle (Hibiscus sabdariffa Linn.) calyces, with average size and with no bruises, were obtained from an herbal medicine market in Solo, Indonesia. 2,2-Diphenyl-1-picrylhydrazyl (DPPH) and ethanol were of analytical grade and purchased from Merck (Darmstadt, Germany).

2.2. Roselle Extract Preparation

The calyces were ground using a blender (Panasonic MX-895 M, Japan) and sieved carefully to obtain powder with 0.25 mm in size. The roselle was extracted using water as solvent as previously suggested by Chumsri et al. [16]. One hundred grams of roselle calyces powder was mixed with water in a beaker glass at a mass to volume ratio (gmL⁻¹) of 1 : 10 at 50°C under continuous agitation for 1 hour. The extract was then filtered through a nylon filter to obtain brilliant red colour liquid extract.

2.3. Foam Drying Process

Foam drying was used to reduce the moisture content of the roselle extract [13]. The drying system is depicted in Figure 1. The roselle extract (100 ml) was mixed with 4.23 grams of ovalbumin as the foaming agent and 0.423 grams of GMS as foam stabiliser. After complete mixing, the solution was whipped in a domestic mixer (360 W power) at maximum speed for 20 min to provide the mechanical incorporation of air (the density of foam was 17.73 kg/m³). After whipping, the foam was placed on aluminium beds (length 20 cm, width 15 cm and thickness of 0.2 cm). The beds were then put in the dryer which used ambient air as drying medium. Before entering the dryer, the ambient air with relative humidity of 80%, temperature range of 30–32°C, and superficial velocity of 0.22 m s⁻¹ was heated up to certain inlet drying temperature (40°C, 50°C, and 60°C) using an electric heater equipped with thermocontroller. So, the relative humidity of ambient air decreased corresponding to the inlet drying temperatures. Because of water releases during drying process, the foam thickness is usually reduced to about 5% of its initial condition. The moisture loss was determined gravimetrically by weighing the samples every 10 min on an electronic scale. In addition, antioxidant activity and colour of the dried extract were also determined accordingly. The experiments were terminated after 120-minute drying times. As a comparison, the roselle extract was also dried without addition of foaming agent and stabiliser (control sample).

Figure 1: The schematic overview of the tray drying equipment ((1) blower; (2) valve; (3) temperature and relative humidity sensor (T-RH); (4) temperature and velocity sensor (T-V); (5) heater; (6) thermocontroller; (7) drying chamber).

2.4. Determination of Moisture Content

The moisture content in roselle extract-ovalbumin-glycerol monostearate mixture was measured referring to AOAC method [17]. Briefly, 1 gram of dried extract sample was heated at the temperature of 105°C in the oven until a constant weight was obtained. In this case, the initial moisture content in the extract before drying was 95% (wet basis) or 19 grams of moisture per gram of dry extract (dry basis).

2.5. Modelling of Foam Drying

Referring to thin layer drying model, the correlation between moisture ratios with time can be represented by the following [18]:

where was the moisture content at time , was the initial moisture content, and was the equilibrium moisture content of the foam, all of them in dry basis (g g⁻¹). The equilibrium moisture content in roselle extract with the foaming agent was estimated by considering the composition of the mixture and both equilibrium moistures in roselle and ovalbumin as expressed by [19]

where was the mass fraction of roselle and ovalbumin, referred to components (roselle and ovalbumin), and was the equilibrium moisture content (g water per g dry solid). The equilibrium moisture of roselle and ovalbumin was influenced by relative humidity or water activity and temperature [19, 20]. Langová et al. suggested that the equilibrium moisture of roselle can be extended as follows [19]:

where , , and were the constant in equilibrium moisture content equation and was the drying temperatures (40°C, 50°C, and 60°C). Using the same principles, Christ et al. suggested that the equilibrium moisture of ovalbumin can be satisfactorily predicted using [20]

The drying rate (DR) was estimated based on the moisture ratio (dimensionless moisture) reduction as a function of time as suggested by Franco et al. [18].

where and were the moisture contents at times and , respectively. Based on literature surveys, the thin layer model (Newton model) accuracy has been proven to predict the rate of foam drying process [21, 22]. According to Newton model, the drying time for rosella extract can be estimated by

Here, was the drying rate constant (minute⁻¹). The dependency of on temperature can be correlated using Arrhenius like equation as shown by

where was the preexponential factor (minute⁻¹), was the activation energy (J mol⁻¹), and was the gas constant (8.32 J mol⁻¹ K⁻¹).

The mass diffusion coefficient can be calculated using the analytical solution for a flat plate, which was previously used by Franco et al. [18].

where was the mass diffusion coefficient (m2 min⁻¹), was the drying time (minute), and was the thickness of the foam .

2.6. Mass and Heat Transfer Analysis

The mass and heat convective transfer coefficients, and , were determined by (9) and (10) using dimensionless numbers obtained from (11) to (14) which were previously used by Franco et al. [18].

where Re, Nu, Sc, and Sh were the Reynold, Nusselt, Schmidt, and Sherwood number, respectively, whereas , and were, respectively, the thermal conductivity (Wm⁻¹K⁻¹), pressure (atm), temperature (°C), density (kgm⁻³), velocity (ms⁻¹), and viscosity (Pa s) of air. In addition, was the material length (m) and was the diffusivity of water in air (m²s⁻¹).

2.7. DPPH Free Radical-Scavenging Activity Assay

The capacity of roselle extracts to inhibit the sequestration activity of 2,2-diphenyl-1-picrylhydrazyl (DPPH) free radical was observed according to the method of Brand-Williams et al. [23]. Precisely, 100 μL of ethanolic extract solutions was added to 1.4 mL DPPH radical ethanolic solution (10⁻⁴ mol L⁻¹) in a test tube. The content of the test tube was shaken vigorously and let to react at room temperature for 30 minutes in the dark. The absorbance at 517 nm was then measured against a blank (100 μL of ethanol in 1.4 mL of DPPH radical solution) using a spectrophotometer. The antioxidant activity was calculated as percentage inhibition (%) of DPPH radical formation, as follows:

where was absorbance of control blank and was absorbance of sample extract. All determinations were conducted in triplicate.

2.8. Colour Measurement

The colour changes of dried roselle extract were observed by measuring , and values using a Chroma Meter (CR-300, Minolta Co., Ltd., Osaka, Japan) as previously used by Kumar et al. [6]. The total colour degradation during drying process was evaluated based on the changes of total colour ratio (TCR) as suggested by Ahmed et al. [24] and the value was calculated using

where , , and were the measured on a sample at a given time, while , , and were measured on raw roselle extract (before the drying process). All determinations were conducted in triplicate.

2.9. Total Anthocyanin Content Measurement

The total anthocyanin content was observed with the method referring to Anuar et al. [25]. The samples (fresh and dried roselle extract) were diluted in 0.025 M KCl buffer (pH 1) and 0.4 M CH3COONa (pH 4.5). The absorbance of the solution was measured at 520 nm and 700 nm using UV-Vis Spectrophotometer (UVmini-1240, Shimadzu, Japan). The total anthocyanin content (TAC), as cyanidin-3-glucoside was calculated using the following [25]:

where was the absorbance, MW was molecular weight of anthocyanin rounding 449.2 g/mol, DF was the dilution factor, was the molar absorptivity (26900), and was the cuvette length (1 cm). Absorbance was calculated using [25]

2.10. Kinetics of Antioxidant Activity and Colour Degradation

Kinetics of antioxidant activity and colour degradations were assumed to follow the first-order reaction. First-order reaction approach has been successfully used in describing the colour degradation of food products [24]. Since the antioxidant activity was linearly correlated to anthocyanins content, then the antioxidant activity degradation should obey the following equation:

Similarly, the colour degradation can be described by

and were the constant rate of antioxidant activity and colour degradations (minute⁻¹). and were antioxidant activity of the sample at time 0 and , while and were total colour ratio at time 0 and . All the constants were obtained numerically with the help of Excel solver.

3. Results and Discussion

3.1. Effect of the Presence of Foaming Agent

The roselle extract was dried with foaming agent and without foaming agent (nonfoam drying) at 40°C and 60°C. This step was expected to obtain dried product with moisture content of 0.11 gram of moisture per gram of dried product. The drying curves in the form of moisture ratio versus time were depicted in Figure 2. In all cases, the foaming agent played important role in speeding up water evaporation. As seen in Figure 2, the moisture ratio in product with foam reduced drastically. As expected, the foam drying had faster moisture evaporation leading to shorter drying time than that of nonfoam drying. During foam drying, the total surface area that was necessary for mass and heat transfer increased drastically as the honeycomb structure was formed through the destruction of the surface area of product into a plenty of smaller units. With this larger surface area, the moisture evaporation rate increased significantly [13]. Even, the drying rates of roselle extract with foam was 3 times higher than that of without foam (see Figure 3). The results were more significant compared with foam mat drying applied to the other food products using foam. Rajkumar et al. found a reduction of about 35 minutes to 40 minutes drying time during foam drying of mango pulp [21]. Meanwhile, Kandasamy et al. spent a half of drying time usually required for nonfoam drying of papaya pulp [15]. With shorter drying time or higher drying rate, foam mat drying offered a promising potential to save energy consumption.

Figure 2: Moisture ratio of foam and nonfoam roselle extract drying at different air temperatures.

Figure 3: Drying rate of foam and nonfoam roselle extract drying at different air temperatures.

3.2. Effect of Air Temperature and Relative Humidity

Table 1 presented the fact that the use of higher temperature shortened the drying time of roselle extract without foam. Similarly, Table 2 also showed that the drying time was shorter when higher temperatures were applied on foam drying. This behaviour can be explained by the increased drying rate caused by larger temperature gradient between drying air and foam which promote faster water evaporation rate [13, 15, 21].

Table 1: Predicted drying time of roselle extract without foam at various air conditions.

Aw/RH
Drying time (minutes)

30°C
40°C
50°C
60°C
70°C
80°C

0.0
572.6
410.4
256.8
214.9
153.6
116.9

0.2
587.2
419.7
261.9
218.4
155.4
117.7

0.4
656.0
451.7
275.9
226.0
158.5
118.8

0.6
nd
nd
377.0
247.2
164.5
120.5

0.8
nd
nd
nd
nd
178.6
123.2

: not dried (equilibrium moisture of the product was upper 10% wet basis).

Table 2: Predicted drying time of roselle extract with foam at various air conditions.

Aw/RH
Drying time (minutes)

30°C
40°C
50°C
60°C
70°C
80°C

0.0
163.0
131.6
93.3
84.9
66.9
55.5

0.2
167.6
134.9
95.4
86.5
67.8
56.0

0.4
184.6
145.3
101.0
90.0
69.7
56.9

0.6
nd
nd
187.7
101.5
73.9
58.8

0.8
nd
nd
nd
nd
99.1
63.6

: not dried (equilibrium moisture of the product was upper 10% wet basis).

Tables 1 and 2 showed that, at all temperatures studied, the use of low air relative humidity significantly reduced the drying time of both foam and nonfoam drying. With low air relative humidity, the driving force for moisture transfer was larger due to the lower equilibrium moisture content of the product. Hence, the roselle extract can be dried to even lower moisture content. Djaeni et al. reported that the use of low air relative humidity reduced the drying time of carrageenan significantly, especially for drying at low or medium temperatures (40 to 60°C) [26].

The drying rate constants were estimated using Newton model (see (5) and (6)), and the results were tabulated in Table 3. The model agreed well with the experimental data as indicated by high values of . This simple empirical model was chosen due to its simplicity and versatility for application in various drying experiments with different materials [21, 22]. The higher drying rate constants were achieved at higher temperature for both foam and nonfoam dryings. Ambekar et al. observed that the drying rate constant at 70°C was 2 times higher than at 50°C during foam drying of passion fruit pulp [27].

Table 3: The constants of roselle extract drying at different temperature.

T (°C)
Nonfoam
Foam

(min⁻¹)
0⁹ 
(m² min⁻¹)

Ea
(kJ mol⁻¹)

(min⁻¹)
0⁹ 
(m² min⁻¹)

Ea
(kJ mol⁻¹)

40
0.017
3.13
0.90
2.38
29.77
0.052
8.56
0.92
3.12
19.92

50
0.026
4.28
0.86
0.071
11.69
0.93

60
0.030
4.94
0.87
0.076
12.51
0.87

Arrhenius like model was used to describe the correlation between the drying rate constant () and temperatures (see (7)). The value of Arrhenius constants were listed in Table 3. Using these constants, the drying rate and drying time for roselle extract at the desired drying temperatures can be well predicted. Based on the mass and heat convective transfer coefficients shown in Table 4, the Sherwood (Sh) number confirmed that mass convective flow was superior over the moisture diffusion and that moisture diffusion coefficients were significantly depending on the air temperature. Since the foam had a high porosity, it was expected that the internal motion of moisture was slower than its evaporation into the flowing air. Further, the Nusselt number (Nu) also confirmed that the convective heat transfer was faster than thermal diffusion because the high porosity of the food might hinder the heat conduction. Similar result was reported by Franco et al. in foam drying of yacon juice [18].

Table 4: Heat and mass transfer coefficients.

T  
(°C)
0⁻⁵   
(m²s⁻¹)

k  
(W m⁻¹K⁻¹)

(W m⁻¹K⁻¹)
0⁻⁴ 
 (ms⁻¹)

40
2.77
25.63
113483.61
2.81
27.15
3.01
408.05
3.903

50
2.96
24.62
83114.76
2.70
28.80
2.94
409.19
3.996

60
3.15
22.99
77646.68
2.55
28.59
2.84
406.49
4.028

: Reynold number, : Schmidt number, : Sherwood number, and : Nusselt number.

3.3. Antioxidant Activity Degradation

In this work, the antioxidant activity of roselle extract was expressed as percentage of inhibition (I%) to DPPH solution [23]. Degradation of antioxidant activity of dried roselle extract obtained from foam and nonfoam dryings at different air temperature is depicted in Figure 4. The dried roselle extracts experienced significant reduction of percentage of inhibition (I%) at both higher air temperature and longer drying time for all drying methods. In general, the antioxidant activity of roselle extracts obtained from foam drying was slightly higher than that of nonfoam drying indicating their higher total antioxidant content. Since the antioxidant activity of dried roselle extracts was mainly contributed by anthocyanins, which were sensitive to heat, then lower percentage of inhibition (I%) of dried roselle extract might be due to its lower anthocyanins content [6].

Figure 4: The antioxidant activity degradation at various drying conditions.

The antioxidant degradation rate constants at various temperatures were calculated using (20), while their dependence on temperature was estimated using Arrhenius model (analog with (7)). The results were presented in Table 5. The higher value of indicates that antioxidant degradation rate for nonfoam drying was faster than that of foam drying.

Table 5: The Arrhenius parameters for antioxidant activity degradation.

T (°C)
Nonfoam
Foam

(min⁻¹)

0⁶
Ea
(kJ mol⁻¹)

(min⁻¹)

0¹
Ea
(kJ mol⁻¹)

40
0.00094
0.85
5.9
58.42
0.0009
0.93
3.1
27.34

50
0.0025
0.94
0.001
0.97

60
0.0036
0.90
0.0017
0.89

3.4. Colour Degradation

The dried roselle extracts obtained from nonfoam drying were all darker than those obtained from foam drying at the same drying conditions. With longer drying time, the sugar contained in the roselle extract may experience caramelisation and lead to giving browning effect on nonfoam drying products [28]. The stable foam available along the foam drying promoted faster moisture evaporation rate and resulted in shorter drying time, by which the product quality can be maintained [29].

Colour degradation in the form or was observed during the drying process as seen in Figure 5. Increase in drying temperatures led to reduction in the colour quality of the roselle extract during the drying process as indicated by darker colour. These phenomena can be explained by the formation of brown pigment during drying. In addition, the browning process also increased with an increase in drying temperature [30]. Reyes and Cisneros-Zevallos also reported that the degradation rate constant of colour of anthocyanins increased with temperatures as can be seen in the case of aqueous extracts of purple and red-flesh potatoes. The constant rate of the colour degradation at 50°C was 9.5 times higher than at 25°C [31].

Figure 5: The colour degradation at various drying conditions.

During the drying process, anthocyanin content in roselle extract decreased with the increase of temperature (Table 6). In this case, by increasing drying temperatures 10°C the anthocyanin content can decrease about 15% ( mg/100 gram at 40°C to  mg/100 gram at 50°C). The decrease of anthocyanin content caused the colour to change significantly as formulated by Cao et al. [32].

Table 6: The total Anthocyanin content (TAC) of roselle extract drying with foam.

Variable
TAC (mg/L)

Mixture of roselle extract with foaming agent
83.49 ± 3.34

Dried product, 40°C
58.71 ± 1.52

Dried product, 50°C
46.85 ± 1.25

Dried product, 60°C
41.76 ± 0.47

The colour degradation rate constants at various temperatures were calculated using (21), while their dependence on temperature was estimated using Arrhenius like correlation (analog with (7)). The Arrhenius-like constants obtained in this study were listed in Table 7. It was clear that the colour degradation was faster for foam drying due to dual degradation effect by caramelisation and Maillard reactions. Addition of ovalbumin as foaming agent, which was rich in amino acids in its protein, led to the occurrence of Maillard reaction.

Table 7: The Arrhenius parameters for colour degradation.

T (°C)
Nonfoam
Foam

(min⁻¹)

0⁶
Ea
(kJ mol⁻¹)

(min⁻¹)

0²
Ea
(kJ mol⁻¹)

40
0.0012
0.82
2.4
55.55
0.0030
0.92
4.4
30.86

50
0.0030
0.86
0.0048
0.93

60
0.0043
0.87
0.0061
0.87

4. Conclusion

Roselle extract drying has been successfully performed with ovalbumin and glycerol mono stearate as foaming agent and foam stabiliser at various drying air conditions. The experiment results showed that the drying time of roselle extract with foaming agent was three times shorter than that of conventional drying without foam. Furthermore, drying time became shorter at higher air temperature and lower air relative humidity. With this condition, the antioxidant activity and colour can be well retained. The mathematical models have been also developed to represent the foam drying kinetics as well as antioxidant and colour degradation kinetics of the roselle extract. These model parameters were validated by experimental data. Therefore, the models can be used to estimate drying time for different drying temperature.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This study was supported by Research and Community Service Centre, Diponegoro University, under Research and International Publication Grant 2016-2017.

References

T. Chewonarin, T. Kinouchi, K. Kataoka et al., “Effects of roselle (Hibiscus sabdariffa Linn.), a Thai medicinal plant, on the mutagenicity of various known mutagens in Salmonella typhimurium and on formation of aberrant crypt foci induced by the colon carcinogens azoxymethane and 2-amino-1-methyl-6-phenylimidazo[4,5-b]pyridine in F344 rats,” Food and Chemical Toxicology, vol. 37, no. 6, pp. 591–601, 1999.

A. Castañeda-Ovando, M. de Lourdes Pacheco-Hernández, M. Elena Páez-Hernández, J. A. Rodríguez, and C. A. Galán-Vidal, “Chemical studies of anthocyanins: a review,” Food Chemistry, vol. 113, pp. 859–871, 2009.

V. Hirunpanich, A. Utaipat, N. P. Morales et al., “Hypocholesterolemic and antioxidant effects of aqueous extracts from the dried calyx of Hibiscus sabdariffa L. in hypercholesterolemic rats,” Journal of Ethnopharmacology, vol. 103, no. 2, pp. 252–260, 2006.

H.-H. Lin, J.-H. Chen, and C.-J. Wang, “Chemopreventive properties and molecular mechanisms of the bioactive compounds in hibiscus sabdariffa linne,” Current Medicinal Chemistry, vol. 18, no. 8, pp. 1245–1254, 2011.

P.-J. Tsai, J. McIntosh, P. Pearce, B. Camden, and B. R. Jordan, “Anthocyanin and antioxidant capacity in Roselle (Hibiscus sabdariffa L.) extract,” Food Research International, vol. 35, no. 4, pp. 351–356, 2002.

S. S. Kumar, P. Manoj, N. P. Shetty, and P. Giridhar, “Effect of different drying methods on chlorophyll, ascorbic acid and antioxidant compounds retention of leaves of Hibiscus sabdariffa L.,” Journal of the Science of Food and Agriculture, vol. 95, no. 9, pp. 1812–1820, 2015.

P. Wong, S. Yusof, H. M. Ghazali, and Y. B. Che Man, “Physico‐chemical characteristics of roselle (Hibiscus sabdariffa L.),” Nutrition & Food Science, vol. 32, no. 2, pp. 68–73, 2002.

H. Wang, G. Cao, and R. L. Prior, “Oxygen radical absorbing capacity of anthocyanins,” Journal of Agricultural and Food Chemistry, vol. 45, no. 2, pp. 304–309, 1997.

H.-H. Chen, P.-J. Tsai, S.-H. Chen, Y.-M. Su, C.-C. Chung, and T.-C. Huang, “Grey relational analysis of dried roselle (Hibiscus sabdariffa L.),” Journal of Food Processing and Preservation, vol. 29, no. 3-4, pp. 228–245, 2005.

G. Mazza and E. Miniati, Anthocyanins in fruits, vegetables, and grains, CRC Press, Boca Raton, Fl, USA, 1993.

F. D. Sßnchez, E. M. S. L, S. F. Kerstupp et al., “Colorant extraction from a red prickly pear (Opuntialasiacantha) for food application,” Electronic Journal of Environmental, Agricultural and Food Chemistry, vol. 5, no. 2, pp. 1330–1337, 2006.

R. V. Tonon, C. Brabet, and M. D. Hubinger, “Influence of drying air temperature and carrier agent concentration on the physicochemical properties of açai juice powder,” Ciência e Tecnologia de Alimentos, vol. 29, no. 2, pp. 444–450, 2009.

M. Djaeni, A. Prasetyaningrum, S. B. Sasongko, W. Widayat, and C. L. Hii, “Application of foam-mat drying with egg white for carrageenan: drying rate and product quality aspects,” Journal of Food Science and Technology, vol. 52, no. 2, pp. 1170–1175, 2013.

K. Lomakina and K. Míková, “A study of the factors affecting the foaming properties of egg white - A review,” Czech Journal of Food Sciences, vol. 24, no. 3, pp. 110–118, 2006.

P. Kandasamy, N. Varadharaju, S. Kalemullah, and D. Maladhi, “Optimization of process parameters for foam-mat drying of papaya pulp,” Journal of Food Science and Technology, vol. 51, no. 10, pp. 2526–2534, 2012.

P. Chumsri, A. Sirichote, and A. Itharat, “Studies on the optimum conditions for the extraction and concentration of roselle (Hibiscus sabdariffa Linn.) extract,” Songklanakarin Journal of Science and Technology, vol. 30, no. 1, pp. 133–139, 2008.

AOAC, Official Methods of Analysis of AOAC International. AOAC International, USA, 2005.

T. S. Franco, C. A. Perussello, L. D. S. N. Ellendersen, and M. L. Masson, “Foam mat drying of yacon juice: Experimental analysis and computer simulation,” Journal of Food Engineering, vol. 158, pp. 48–57, 2015.

J. Langová, D. Jaisut, R. Thuwapanichayanan et al., “Modelling the moisture sorption isotherms of roselle (hibiscus sabdariffa l.) in the temperature range of 5-35°c,” Acta Universitatis Agriculturae et Silviculturae Mendelianae Brunensis, vol. 61, no. 6, pp. 1769–1777, 2013.

D. Christ, R. L. da Cunha, F. C. Menegalli, K. P. Takeuchi, S. R. M. Coelho, and L. H. P. Nóbrega, “Sorption isotherms of albumen dried in a spout fluidised bed,” Journal of Food, Agriculture and Environment (JFAE), vol. 10, no. 2, pp. 151–155, 2012.

P. Rajkumar, R. Kailappan, R. Viswanathan, and G. S. V. Raghavan, “Drying characteristics of foamed alphonso mango pulp in a continuous type foam mat dryer,” Journal of Food Engineering, vol. 79, no. 4, pp. 1452–1459, 2007.

R. A. Wilson, D. M. Kadam, S. Chadha, and M. Sharma, “Foam Mat Drying Characteristics of Mango Pulp,” International Journal of Food Science and Nutrition Engineering, vol. 2, no. 4, pp. 63–69, 2012.

W. Brand-Williams, M. E. Cuvelier, and C. Berset, “Use of a free radical method to evaluate antioxidant activity,” LWT - Food Science and Technology, vol. 28, no. 1, pp. 25–30, 1995.

J. Ahmed, U. S. Shivhare, and G. S. V. Raghavan, “Thermal degradation kinetics of anthocyanin and visual colour of plum puree,” European Food Research and Technology, vol. 218, no. 6, pp. 525–528, 2004.

N. Anuar, A. F. Mohd Adnan, N. Saat, N. Aziz, and R. Mat Taha, “Optimization of extraction parameters by using response surface methodology, purification, and identification of anthocyanin pigments in melastoma malabathricum fruit,” The Scientific World Journal, vol. 2013, Article ID 810547, 10 pages, 2013.

M. Djaeni, S. B. Sasongko, A. Prasetyaningrum A, X. Jin, and A. J. Van Boxtel, “Carrageenan drying with dehumidified air: Drying characteristics and product quality,” International Journal of Food Engineering, vol. 8, no. 3, 2012.

S. A. Ambekar, S. V. Gokhale, and S. S. Lele, “Process optimization for foam mat-tray drying of passiflora edulis flavicarpa pulp and characterization of the dried powder,” International Journal of Food Engineering, vol. 9, no. 4, pp. 433–443, 2013.

E. Abbasi and M. Azizpour, “Evaluation of physicochemical properties of foam mat dried sour cherry powder,” LWT- Food Science and Technology, vol. 68, pp. 105–110, 2016.

T. Kudra and C. Ratti, “Foam-mat drying: Energy and cost analyses,” Canadian Biosystems Engineering, vol. 48, pp. 27–32, 2006.

I. Karabulut, A. Topcu, A. Duran, S. Turan, and B. Ozturk, “Effect of hot air drying and sun drying on color values and β-carotene content of apricot (Prunus armenica L.),” LWT- Food Science and Technology, vol. 40, no. 5, pp. 753–758, 2007.

L. F. Reyes and L. Cisneros-Zevallos, “Degradation kinetics and colour of anthocyanins in aqueous extracts of purple- and red-flesh potatoes (Solanum tuberosum L.),” Food Chemistry, vol. 100, no. 3, pp. 885–894, 2007.

S.-Q. Cao, L. Liu, and S.-Y. Pan, “Thermal degradation kinetics of anthocyanins and visual color of blood orange juice,” Agricultural Sciences in China, vol. 10, no. 12, pp. 1992–1997, 2011.