International Journal of Hypertension
Volume 2015 (2015), Article ID 983928, 2 pages
http://dx.doi.org/10.1155/2015/983928

Corrigendum

Corrigendum to “Reference Values of Pulse Wave Velocity in Healthy People from an Urban and Rural Argentinean Population”

Alejandro Díaz,¹ Cintia Galli,² Matías Tringler,¹ Agustín Ramírez,² and Edmundo Ignacio Cabrera Fischer²

¹School of Health Sciences, National University of the Center of Buenos Aires Province, 4 de Abril 618, 7000 Tandil, Buenos Aires Province, Argentina
²Favaloro University (AIDUF-CONICET), Buenos Aires, Argentina

Received 22 September 2014; Accepted 23 October 2014

Copyright © 2015 Alejandro Díaz et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Reference Values of Pulse Wave Velocity in Healthy People from an Urban and Rural Argentinean Population” there was an error in Figure 1. The correct value of is =0.616. In this erratum we report corrected Figure 1 where the mentioned mistake has been replaced with the corrected value.

Figure 1: Scatter graph showing the relationship between mean PWV (mean and CI 95%) and age in the study population ().

In the paper entitled “Reference Values of Pulse Wave Velocity in Healthy People from an Urban and Rural Argentinean Population” a mistake was introduced in Figure 3. In this erratum we report modified Figure 3.

Figure 3: Mean values of pulse wave velocity (PWV: in meters per second) showing significant differences between young subjects (≤50 years) and subjects > 50 years included in the study. There were no significant differences of PWV in relation to gender for the same age group.