International Journal of Microbiology
Volume 2016 (2016), Article ID 2418902, 8 pages
http://dx.doi.org/10.1155/2016/2418902

Research Article

Pattern of Bacterial Pathogens and Their Susceptibility Isolated from Surgical Site Infections at Selected Referral Hospitals, Addis Ababa, Ethiopia

Walelign Dessie,¹ Gebru Mulugeta,¹ Surafael Fentaw,² Amete Mihret,² Mulu Hassen,¹ and Engida Abebe³

¹Department of Medical Laboratory Science, College of Health Science, Addis Ababa University, P.O. Box 1176, Addis Ababa, Ethiopia
²Ethiopian Public Health Institute, P.O. Box 1242, Addis Ababa, Ethiopia
³St. Paul’s Specialized Hospital Millennium Medical College, P.O. Box 1271, Addis Ababa, Ethiopia

Received 7 March 2016; Revised 22 April 2016; Accepted 6 June 2016

Academic Editor: Barbara H. Iglewski

Copyright © 2016 Walelign Dessie et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. The emergence of multidrug resistant bacterial pathogens in hospitals is becoming a challenge for surgeons to treat hospital acquired infections. Objective. To determine bacterial pathogens and drug susceptibility isolated from surgical site infections at St. Paul Specialized Hospital Millennium Medical College and Yekatit 12 Referral Hospital Medical College, Addis Ababa, Ethiopia. Methods. A cross-sectional study was conducted between October 2013 and March 2014 on 107 surgical site infected patients. Wound specimens were collected using sterile cotton swab and processed as per standard operative procedures in appropriate culture media; and susceptibility testing was done using Kirby-Bauer disc diffusion technique. The data were analyzed by using SPSS version 20. Result. From a total of 107 swabs collected, 90 (84.1%) were culture positive and 104 organisms were isolated. E. coli (24 (23.1%)) was the most common organism isolated followed by multidrug resistant Acinetobacter species (23 (22.1%)). More than 58 (75%) of the Gram negative isolates showed multiple antibiotic resistance (resistance ≥ 5 drugs). Pan-antibiotic resistance was noted among 8 (34.8%) Acinetobacter species and 3 (12.5%) E. coli. This calls for abstinence from antibiotic abuse. Conclusion. Gram negative bacteria were the most important isolates accounting for 76 (73.1%). Ampicillin, amoxicillin, penicillin, cephazoline, and tetracycline showed resistance while gentamicin and ciprofloxacin were relatively effective antimicrobials.

1. Introduction

Surgical site infection (SSI) is defined as a proliferation of pathogenic microorganisms which develops in an incision site either within the skin and subcutaneous fat (superficial) and musculofascial layers (deep) or in an organ or cavity, if opened during surgery [1].

Hospital acquired surgical site infections (HAIs) are one of the major health problems throughout the world and are a serious complication affecting hospitalized patients [2, 3]. Pathogens that are able to survive in the hospital environment for long period and resist disinfection are particularly more important for HAIs [2]. SSIs account for a high proportion of the total number of HAIs and have a great impact on patients health care cost, morbidity, and mortality worldwide [3, 4]. SSIs account for 20% to 25% of all hospital acquired infections worldwide [5]. Globally, surgical site infection rates have been reported to range from 2.5% to 41.9% [5]. The risk of acquiring hospital infection on hospitalized patients in relation to surgery is high, since about 77% of death of patients with hospital acquired infections was reported to be related with postoperative infections [3]. The rate of HAIs is markedly higher in many developing countries [2, 3]. The number of surgical patients in developing countries is also increasing but surgical care given to the patients is poor [3].

HAIs are further complicated by an increasing prevalence of multidrug resistant organisms like methicillin resistant Staphylococcus aureus (MRSA), methicillin resistant coagulase negative staphylococci (MRCoNS), vancomycin resistant enterococci (VRE) species, multidrug resistance Escherichia coli, and Acinetobacter spp. [2, 6–8].

The battle between bacteria and their susceptibility to drugs is yet problematic among public, researchers, clinicians, and drug companies who are looking for effective drugs. In addition, SSI by resistant bacteria worsens the condition and it has become serious problem in developing countries like Ethiopia owing to poor infection prevention program, crowding hospital environment, widespread uses of antibiotics, and irrational prescription of antimicrobial agents. Furthermore, recent studies assessing the bacterial isolates of SSIs and their susceptibility pattern in Ethiopia are scarce. Therefore, identification of a microbe and determining susceptibility pattern are beneficial to the patient and assist in selection of chemotherapy to avoid emergence of multidrug resistance organisms in hospital [3, 4]. It is also essential to take appropriate steps to control the spread of infection within the unit. Furthermore, the information gathered helps in planning antibiotic usage policy for SSI. Thus, the aim of this study was to assess bacterial pathogens and drug susceptibility pattern of surgical site infections at selected referral hospitals in Addis Ababa, Ethiopia.

2. Materials and Methods

2.1. Study Setting and Period

A hospital based cross-sectional study was undertaken at St. Paul’s Hospital Millennium Medical College and Yekatit 12 Hospital Medical College in Addis Ababa, Ethiopia, from October 2013 to March 2014. These hospitals are tertiary referral hospitals directly under the Federal Ministry of Health. They is also a teaching hospital for the Medical College and it gives service to the patients under different clinical disciplines which include surgery, orthopedics, obstetrics, gynecology, pediatrics, internal medicine, and ENT.

2.2. Study Subjects

Information and clinical sample which are relevant to the study were collected from the study subjects during the study period. A total of 107 patients who developed SSI during the study period were included in the study. All eligible surgical patients were subjected to daily surveillance for the development of infection. This was done according to the clinical criteria for surgical site infection development in CDC SSI classification system (superficial incisional SSI, deep incisional SSI, and organ/space SSI) [1, 9, 10]. Patients who were involuntary to give consent were excluded.

2.3. Data and Specimen Collection

Wound swabs were taken from consented surgical site infected patients for microbiological analysis before wound dressing time to avoid skin flora contamination. The wound swab was collected by trained data collectors using sterile cotton swab on a separate sterile test tube or nutrient broth media. Patient specific sociodemographic characteristics and medical histories and all the other required information were collected using the structured questionnaire from the patient medical record and the responsible surgeon, when necessary [10].

2.4. Processing of Specimens Culture and Identification

Pus specimens were transported immediately following collection by placing each swab in sterile nutrient broth media to the microbiology laboratory. All the specimens were inoculated onto blood agar, mannitol salt agar, and MacConkey’s agar within one hour of collection. The agar plates were incubated at 35–37°C aerobically and examined for the presence of any growth after 24 hours. Those plates showing no growth were incubated for another 24 hours. The isolates were identified by colonial morphology, Gram’s stain, and conventional biochemical tests such as catalase, coagulase, oxidase, and mannitol fermentation for Gram positive bacteria and urease, indole, citrate, and sugar utilization tests for Gram negative bacteria [3, 11].

2.5. Antimicrobial Susceptibility Testing

Antibiotic susceptibility pattern of the isolates was studied by using Kirby-Bauer technique according to the criteria of the Clinical Laboratory Standards Institute (CLSI) by disc diffusion method. From a pure culture 3–5 pure colonies of bacteria were taken and transferred to a tube containing 5 mL sterile nutrient broth (Oxoid) and they were mixed gently until the turbidity of the suspension become adjusted to a 0.5 McFarland standard. Using sterile cotton swab, the bacteria were seeded evenly over the entire surface of Mueller-Hinton agar (pH 7.2–7.4) (Oxoid). The plates were left at room temperature to dry for 3–5 minutes and antibiotic discs (Oxoid) with the recommended concentrations were placed on the surface of a Muller-Hinton agar plate. Finally, the plates were incubated at 35–37°C for 18–24 hours. Diameters of growth inhibition around the discs were measured and interpreted as sensitive, intermediate, or resistant as per the standard protocol [2, 3, 12]. The following antimicrobial agents were used with their respective concentration. Gentamicin (CN, 10 μg), ciprofloxacin (CIP, 5 μg), and tetracycline (TTC, 30 μg) were used for both Gram positive and Gram negative bacteria. Penicillin (P, 10 units), erythromycin (E, 15 μg), cefoxitin (FOX, 30 μg), and sulfamethoxazole-trimethoprim (SXT, 1.25 μg) were used for Gram positive bacteria while amoxicillin/clavulanic acid (AMC, 20 μg), ampicillin (AMP, 30 μg), chloramphenicol (C, 30 μg), ceftriaxone (CRO, 30 μg), ceftazidime (CAZ, 30 μg), cefuroxime sodium (CXM, 30 μg), cephazoline (KZ, 30 μg), and cefotaxime (CTX, 30 μg) were used for Gram negative bacteria.

2.6. Quality Assurance

The reliability of the study findings was guaranteed by implementing quality control (QC) measures throughout the whole processes of the laboratory works. All materials, equipment, and procedures were adequately controlled, and each procedures were aseptically performed. Culture media were tested for sterility and performance. International Control bacteria strains, E. coli ATCC 25922, P. aeruginosa ATCC 27853, and S. aureus ATCC 25923, were included in controlling the tests carried out in this study according to the CLSI. To standardize the inoculums density of bacterial suspension for the susceptibility test, a barium sulfate (BaSO4) turbidity standard, equivalent to a 0.5 McFarland standard, was used [2, 3, 11–13].

2.7. Statistical Analysis

The sociodemographic, clinical, and antimicrobial data were obtained from the patient’s card and were extracted using a structured questionnaire. The patient’s microbiology report was linked to the questionnaire with a code and was documented for each patient on the questionnaire. The information retrieved was used to analyze the rate of surgical site infection and the bacterial isolates and their susceptibility pattern. Data were analyzed using Statistical Package for Social Sciences (SPSS) version 20. Study findings were explained in words, percentage, and tables.

2.8. Ethical Considerations

The study was approved after it was ethically reviewed by the research ethical review committee of Department of Medical Laboratory Sciences, Addis Ababa University. Then permission was obtained from the institutional review board of Saint Paul’s Hospital Millennium Medical College and Yekatit 12 Referral Hospital Medical College. Written informed consent was obtained from operated patients who developed infection prior to sampling by respective ward nurses. For each confirmed infection by the laboratory analysis, the responsible clinician of the subjects was informed and treatment was started as per the guideline in the hospital. Information obtained at each course of the study was kept confidential.

3. Result

A total of 1088 operations were done during the study period. Of these, 107 (9.8%) patients developed surgical site infection. The median age of the study population was 30 years (8–80 years), and the majority (56 (52.3%)) of the study cases were females. Fifty-eight patients (54.2%) were from rural areas, 49 (45.8%) completed primary education, and 33 (30.8%) were farmers. About sixty-two percent of the study population underwent emergency surgery and the most common surgical procedure was laparotomy (34 (31.8%)), followed by debridement (29 (27.1%)). Of the 107 patients studied, 101 (94.4%) received antimicrobial therapy. Twenty-two patients (20.5%) received preoperative antimicrobial therapy, 100 (93.4%) received postoperative antimicrobial therapy, and 6 (5.6%) have not received any antimicrobial therapy (Table 1). There was no significant difference between antimicrobial classes used during the preoperative period and those used during the postoperative period.

Table 1: Sociodemographic and clinical characteristics of study subjects ().

Characteristics
Frequency
Percentage

Sex

    Female
56
52.3

    Male
51
47.7

Age group

    <10
2
1.9

    10–20
18
16.8

    21–30
36
33.6

    31–40
23
21.5

    41–50
9
8.4

    >50
19
17.8

Residence

    Urban
49
45.8

    Rural
58
54.2

Educational status

    Illiterate
29
27.1

    Primary
49
45.8

    Secondary
14
13.1

    College/university and above
15
14

Occupations

    Farmer
33
30.8

    Employer
17
15.9

    Student
13
12.1

    Daily wage laborer
14
13.1

    Housewife
16
15

    Merchant
6
5.6

    Jobless
5
4.7

    Driver
3
2.8

Case type

    Emergency
66
61.7

    Elective
41
38.3

Surgical procedure

    Laparotomy
34
31.8

    Debridement
29
27.1

    Appendectomy
3
2.8

    Drainage
9
8.4

    Incision
5
4.7

    Cesarean section
14
13.1

    Colostomy
8
7.5

    Lithotomy
3
2.8

    Mastectomy
2
1.9

SSI class

    Superficial
45
42.1

    Deep tissue or organ/space
62
57.9

Antimicrobial therapy received

    Preoperative
22
20.5

    Postoperative
100
93.4

    Not at all
6
5.6

3.1. Bacterial Isolates

A total of 107 pus specimens were collected and processed during the study period. A total of one hundred and four organisms were isolated from 90 (84.1%) culture positive cases. Seventy-six specimens yielded growth of single organism while two isolates were present in rest of the fourteen cases. The remaining 17 (15.9%) had no bacterial growth. Among the Gram positive isolates, S. aureus (19 (18.3%)) was predominant while E. coli (23.1%), Acinetobacter species (22.1%), and K. pneumoniae (9.6%) were the most common isolates of the Gram negative rods. The other isolates were Pseudomonas, Proteus species, K. ozaenae, Citrobacter, coagulase negative Staphylococcus, and group B streptococci (Table 2).

Table 2: Bacterial pathogens isolated from postoperative surgical site infection.

Bacterial isolate
Frequency
Percent

Gram positive
28
26.9

    S. aureus
19
18.3

    CoNS
4
3.8

    Group B streptococci spp.
5
4.8

Gram negative
76
73.1

    E. coli
24
23.1

    Acinetobacter spp.
23
22.1

    K. pneumoniae
10
9.6

    K. ozaenae
3
2.9

    P. aeruginosa
6
5.8

    P. vulgaris
6
5.8

    P. mirabilis
1
0.9

    Morganella spp.
1
0.9

    Citrobacter spp.
2
1.9

Total
104
100

CoNS: coagulase negative staphylococci; spp.: species.

Both Gram positive and Gram negative bacterial isolates were identified in superficial and deep tissue or organ/space SSI (Table 3). Acinetobacter spp. and S. aureus were found to be the most prevalent organisms in superficial SSI which account for 13 (26.5%) and 11 (22.4%), respectively, while E. coli was the most prevalent organism in deep tissue or organ/space SSI which accounts for 15 (27.3%).

Table 3: Bacterial distribution based on SSI class.

Bacterial isolate
Superficial SSI: number (%)
Deep tissue or organ/space SSI: number (%)
Total

S. aureus
11 (22.4)
8 (14.5)
19 (18.3)

CoNS
4 (8.2)
0 (0)
4 (3.8)

Group B streptococci spp.
2 (4.1)
3 (5.5)
5 (4.8)

E. coli
9 (18.4)
15 (27.3)
24 (23.1)

Acinetobacter spp.
13 (26.5)
10 (18.2)
23 (22.1)

K. pneumoniae
3 (6.1)
7 (12.7)
10 (9.9)

K. ozaenae
1 (0.2)
2 (3.6)
3 (2.9)

P. aeruginosa
2 (4.1)
4 (7.3)
6 (5.8)

P. vulgaris
3 (6.1)
3 (5.5)
6 (5.8)

P. mirabilis
0 (0)
1 (1.8)
1 (0.9)

Morganella spp.
0 (0)
1 (1.8)
1 (0.9)

Citrobacter spp.
1 (0.2)
1 (1.8)
2 (1.9)

Total
49
55
104

CoNS: coagulase negative staphylococci; spp.: species.

3.2. Antimicrobial Susceptibility Pattern

S. aureus strains were resistant to penicillin (18 (94.7%)). Cases of resistance to gentamicin and ciprofloxacin were 3 (15.8%) for each and cefoxitin/MRSA were 2 (10.5%). More than 75% of CoNS were resistant to sulfamethoxazole-trimethoprim, cefoxitin, ciprofloxacin, gentamicin, penicillin, and erythromycin. More than 80% of group B streptococci species were susceptible to all of the antibiotics tested for Gram positive bacteria except penicillin and cefoxitin which showed 80% and 60% resistance, respectively (Table 4).

Table 4: Antibiotic susceptibility pattern of Gram positive bacterial isolates in postoperative surgical site infected patients in selected referral hospitals of Addis Ababa.

Bacterial isolate
Pattern
Antimicrobial agents

CN
CIP
TE
PE
SXT
FOX
E

S. aureus
S
16 (84.2)
16
15 (78.9)
1 (5.3)
15 (78.9)
17 (89.5)
15 (78.9)

R
3 (15.8)
3 (15.8)
4 (21.1)
18 (94.7)
4 (21.1)
2 (10.5)
4 (21.1)

CoNS
S
1 (25)
0 (0)
3 (75)
1 (25)
1 (25)
0 (0)
1 (25)

R
3 (75)
4 (100)
1 (25)
3 (75)
3 (75)
4 (100)
3 (75)

Group B streptococci spp.
S
5 (100)
—
5 (100)
1 (20)
5 (100)
2 (40)
4 (80)

R
0 (0)
0 (0)
4 (80)
0 (0)
3 (60)
1 (20)

E = erythromycin, SXT = sulfamethoxazole-trimethoprim, FOX = cefoxitin, P = penicillin.

Gram negative rods isolated were considered to be highly resistant to most of the antibiotics tested. Of the isolates, 72 (94.7%), 68 (89.5%), 60 (78.9%), 57 (75%), 56 (73.7%), 50 (65.8%), 38 (50%), and 35 (46.1%) were found to be resistant to ampicillin, cephazoline, cefuroxime sodium, amoxicillin/clavulanic acid, cefotaxime and ceftriaxone (each), ceftazidime, tetracycline, and ciprofloxacin in their respective order, while chloramphenicol (39 (51.3%)), gentamicin (37 (48.7%)), and ciprofloxacin (35 (46.1%)) were relatively effective against Gram negative bacterial isolates (Table 5).

Table 5: Antibiotic susceptibility pattern of Gram negative bacterial isolates in postoperative surgical site infected patients in selected referral hospitals of Addis Ababa.

Bacterial isolate
Pat
Antimicrobial agents, (%)

CTX
C
CN
AMP
AMC
CRO
CAZ
KZ
CIP
CXM
TE

E. coli
S
4 (16.7)
18 (75)
11 (45.8)
1 (4.2)
3 (12.5)
4 (16.7)
4 (16.7)
2 (8.3)
8 (33.3)
3 (12.5)
4 (16.7)

I
0 (0)
0 (0)
0 (0)
0 (0)
4 (16.7)
0 (0)
1 (4.1)
0 (0)
0 (0)
0 (0)
0 (0)

R
20 (83.3)
6 (25)
13 (54.2)
23 (95.8)
17 (70.8)
20 (83.3)
19 (79.2)
22 (91.7)
16 (66.7)
21 (87.5)
20 (83.3)

Acinetobacter spp.
S
5 (21.7)
6 (26)
6 (26.1)
0 (0)
3 (13)
5 (21.7)
4 (17.4)
0 (0)
8 (34.8)
0 (0)
14 (60.9)

I
0 (0)
0 (0)
4 (17.4)
0 (0)
1 (4.3)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)

R
18 (78.3)
17 (74)
13 (56.5)
23 (100)
19 (82.6)
18 (78.3)
19 (82.6)
23 (100)
15 (65.2)
23 (100)
9 (39.1)

K. pneumoniae
S
1 (10)
6 (60)
6 (60)
0 (0)
0 (0)
1 (0)
2 (20)
1 (10)
8 (80)
4 (40)
7 (70)

R
7 (70)
4 (40)
4 (40)
10 (100)
10 (100)
9 (90)
8 (80)
9 (90)
2 (20)
6 (60)
3 (30)

K. ozaenae
S
0 (0)
3 (100)
2 (66.7)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
3 (100)
0 (0)
2 (66.7)

R
3 (100)
0 (0)
1 (33.3)
3 (100)
3 (100)
3 (100)
3 (100)
3 (100)
0 (0)
3 (100)
1 (33.3)

P. aeruginosa
S
0 (0)
1 (16.7)
5 (83.3)
0 (0)
0 (0)
1 (16.7)
4 (66.7)
0 (0)
4 (66.7)
0 (0)
3 (50)

I
0 (0)
2 (33.3)
1 (16.7)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)

R
6 (100)
3 (50)
0 (0)
6 (100)
6 (100)
5 (83.3)
2 (33.3)
6 (100)
2 (33.3)
6 (100)
3 (50)

P. vulgaris
S
3 (75)
1 (25)
4 (100)
0 (0)
2 (50)
3 (75)
4 (100)
2 (50)
4 (100)
3 (75)
0 (0)

R
1 (25)
3 (75)
0 (0)
4 (100)
2 (50)
1 (25)
0 (0)
2 (50)
0 (0)
1 (25)
4 (100)

P. mirabilis
S
1 (100)
1 (100)
1 (100)
1 (100)
1 (100)
1 (100)
1 (100)
1 (100)
—
—
0 (0)

R
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
1 (100)

Morganella spp.
S
1 (100)
1 (100)
—
0 (0)
0 (0)
1 (100)
1 (100)
0 (0)
—
—
0 (0)

R
0 (0)
0 (0)
1 (100)
1 (100)
0 (0)
0 (0)
1 (100)
1 (100)

Citrobacter spp.
S
2 (100)
2 (100)
2 (100)
0 (0)
0 (0)
2 (100)
1 (50)
0 (0)
—
—
2 (100)

R
0 (0)
0 (0)
0 (0)
2 (100)
2 (100)
0 (0)
1 (50)
2 (100)
0 (0)

S = sensitive, I = intermediate, R = resistant, TE = tetracycline, CIP = ciprofloxacin, AMP = ampicillin, AMC = amoxicillin/clavulanic acid, CTX = cefotaxime, CAZ = ceftazidime, KZ = cephazoline, CXM = cefuroxime sodium, C = chloramphenicol, CN = gentamicin, CRO = ceftriaxone.

Among the Gram negatives, the isolates of the predominant organism E. coli were resistant to tetracycline and cefotaxime (20 (83.3%) each), ampicillin (23 (95.8%)), cephazoline (22 (91.7%)), cefuroxime sodium (21 (87.5%)), ceftriaxone (20 (83.3%)), amoxicillin/clavulanic acid and ceftazidime (17 (70.8%) each), and ciprofloxacin (16 (66.7%)). Chloramphenicol (18 (75%)) was effective against E. coli. Acinetobacter species also showed high level of resistance to ampicillin, cephazoline, and cefuroxime sodium (100% each), amoxicillin and ceftazidime (19 (82.6%) each), cefotaxime and ceftriaxone (18 (78.3%) each), and chloramphenicol 17 (74%). Tetracycline (60.9%) was relatively effective against Acinetobacter species. Klebsiella species demonstrated high level of resistance to ampicillin and amoxicillin (10 (100%) each), cephazoline and ceftriaxone (9 (90%) each), ceftazidime (8 (80%)), cefotaxime (7 (70%)), and cefuroxime sodium (6 (60%)). Relatively ciprofloxacin (8 (80%)), tetracycline (7 (70%)), and chloramphenicol and gentamicin (6 (60%) each) were effective against Klebsiella species. P. aeruginosa demonstrated high level of resistance to ampicillin, amoxicillin, cephazoline, cefuroxime sodium, and cefotaxime (100% each) and ceftriaxone (5 (83.3%)). This organism was susceptible to gentamicin (100%) and ciprofloxacin (2 (66.7%)). Citrobacter species isolates were resistant to ampicillin, amoxicillin, and cephazoline (100% each) whereas they were susceptible to ciprofloxacin, ceftriaxone, cefotaxime, gentamicin, and tetracycline (100% each). Proteus vulgaris was resistant to ampicillin (100%) and chloramphenicol (3 (75%)), whereas ciprofloxacin, ceftazidime, and gentamicin (100% each) were effective against this species. P. mirabilis were susceptible to all the antibiotics tested except tetracycline.

3.3. Multidrug Resistance Pattern of Bacterial Isolates

More than 75% of the Gram negative isolates demonstrated evidences of multiple antibiotics resistance (resistance ≥ 5 drugs). Pan-antibiotic resistance was noted among 8 (34.8%) Acinetobacter species and 3 (12.5%) E. coli. Twenty-two (95.7%) of Acinetobacter species were resistant to at least five of the antibiotics tested. Twenty (83.3%) of E. coli, 4 (66.7%) of P. aeruginosa, and 6 (60%) of K. pneumoniae were resistant to more than five of the antibiotics tested. Among the Gram negative isolates, 1 (4.2%) E. coli was susceptible to all of the antibiotics tested.

In contrast, 50% of Gram positive isolates were resistant to at least one of the antibiotics tested. Twelve (63.2%), 5 (26.3%), and 1 (5.3%) of the S. aureus isolates were found to be resistant to one, two, and at least five of the antibiotics tested, respectively. One isolate was susceptible to all of the antibiotics tested. Half of CoNS were resistant to at least five of the antibiotics (Table 6). Pan-antibiotic resistance was not observed in Gram positive bacteria.

Table 6: Multidrug resistance pattern of bacterial isolates.

Bacterial isolate
Total number (%)
Number (%) of antimicrobial patterns

≥

Gram negative
76 (73.1)
1 (1.3)
1 (1.3)
3 (3.9)
6 (7.6)
7 (9.2)
58 (76.3)

    E. coli
24 (23.1)
1 (4.2)
0 (0)
0 (0)
1 (4.2)
2 (8.3)
20 (83.3)

    Acinetobacter
23 (22.1)
0 (0)
0 (0)
0 (0)
1 (4.3)
0 (0)
22 (95.7)

    K. pneumoniae
10 (9.6)
0 (0)
0 (0)
2 (20)
1 (10)
1 (10)
6 (60)

    K. ozaenae
3 (2.9)
0 (0)
0 (0)
0 (0)
0 (0)
0 (0)
3 (100)

    P. aeruginosa
6 (5.8)
0 (0)
0 (0)
0 (0)
1 (16.7)
1 (16.7)
4 (66.7)

    P. vulgaris
6 (5.8)
0 (0)
0 (0)
1 (16.7)
2 (33.3)
1 (16.7)
2 (33.3)

    P. mirabilis
1 (0.9)
0 (0)
1 (100)
0 (0)
0 (0)
0 (0)
0 (0)

    Morganella spp.
1 (0.9)
0 (0)
0 (0)
0 (0)
0 (0)
1 (100)
0 (0)

    Citrobacter spp.
2 (1.9)
0 (0)
0 (0)
0 (0)
0 (0)
1 (50)
1 (50)

Gram positive
28 (26.9)
2 (7.1)
14 (50)
7 (25)
1 (3.6)
0 (0)
4 (14.3)

    S. aureus
19 (18.3)
1 (5.3)
12 (63.2)
5 (26.3)
0 (0)
0 (0)
1 (5.3)

    CoNS
4 (3.8)
0 (0)
0 (0)
1 (25)
1 (25)
0 (0)
2 (50)

    Group B streptococci spp.
5 (4.8)
1 (20)
2 (40)
1 (20)
1 (20)
0 (0)
0 (0)

: no resistance, : resistance to one drug, : resistance to two drugs, : resistance to three drugs, : resistance to four drugs, ≥: resistance to five or more drugs.

4. Discussion

Successful management of patients with bacterial infection depends on early identification of bacterial pathogens and selection of an effective antibiotic against the organism. Antibiotics are one of the pillars of modern medical care and play a major role as both the prophylaxis and treatment of infectious diseases. The issues of their availability, selection, and proper use are of critical importance to the global community [2, 3].

The overall SSI rate (9.8%) was found to be higher than the rates obtained by studies conducted by Amare et al. [3] which were 3.5%, while it is comparable to Amenu et al. [14], Gelaw et al. [2], and Khan et al. [9] who reported prevalence of 11.4%, 7.3%, and 9.3%, respectively, in surgical patients. Other studies also reported similar findings in different countries at different time [15, 16].

The current findings showed 73.1% and 28.9% of Gram negative and Gram positive bacteria, respectively, which is comparable with a study done by Gelaw et al. [2] on surgical hospital acquired infections which reported 69.4% Gram negative bacteria and 30.6% Gram positive bacteria. Predominance of Gram negative organisms in SSI is also reported in some other recent studies [2, 3, 8, 15, 17].

However, other previous studies showed a higher proportion of Gram positive organisms, specially S. aureus, associated with SSI in different countries [7, 13, 18–23]. According to CDC, S. aureus, CoNS, and E. coli were the most prevalent organisms associated with surgical wound infections [24]. This difference in the pattern of distribution of bacterial isolates in different setups may be due to diversity of the study population and local antimicrobial use pattern which results in the emergence of pathogens that have the potential to resist antibiotics used currently. Another reason for the predominance of Gram negative organisms may be the fact that most of the infected patients in our study had undergone abdominal surgery and Gram negatives are predominantly reported to be involved in intra-abdominal procedures [15].

The profiles of bacterial isolates highly associated with the infections in this study were E. coli, S. aureus, Klebsiella species, P. aeruginosa, and Proteus species which is consistent with previous studies in Ethiopia, Vietnam, Nigeria, and India [3, 4, 7, 25].

In contrast to previous studies in Ethiopia, multidrug resistant Acinetobacter species was isolated from 22.1% of the patients which is comparable to a study conducted by Bibi et al. (25.3%) [15]. This finding is again reported in previous studies in Pakistan, Vietnam, and Brazil [13, 17, 26]. This is due to its environmental desiccation survival for weeks, a characteristic that promotes transmission through common hospital sources of contamination [27].

From the total isolated bacteria, 94.4% were isolated from patients who received antibiotic therapy before and after surgery which is in agreement with similar study reported from Gondar and Addis Ababa [3, 28]. The present study showed relatively frequent isolation among patients who received antibiotic prophylaxis and the most commonly prescribed drug for prophylaxis was ceftriaxone alone or in combination with other antibiotics such as gentamicin, chloramphenicol, and amoxicillin. This shows some antibiotics alone or in combination require periodic evaluation and the establishment of antibiotics policy for prophylaxis and treatment guidelines in the Ethiopian setting.

Antimicrobial sensitivity testing of the isolates showed higher rates of multidrug resistant (MDR) strains of these organisms in SSI. More than 18 (90%) isolates of S. aureus showed resistance to penicillin. This finding is in agreement with previous studies [3, 14]. Above 75% of CoNS were resistant to sulfamethoxazole-trimethoprim, cefoxitin, ciprofloxacin, gentamicin, penicillin, and erythromycin which is comparable to a study conducted in Gondar [3]. Almost all group B streptococci species were susceptible to all of the antibiotics tested for Gram positive bacteria, but penicillin and cefoxitin showed resistance.

Majority of Gram negative bacteria showed very high resistance to ampicillin, cephazoline, ceftriaxone, cefuroxime sodium, amoxicillin/clavulanic acid, cefotaxime, ceftazidime, and tetracycline which is in agreement with different studies worldwide [3, 4, 6, 13–15, 19]. The high rate of bacterial resistance against ceftriaxone, ampicillin, and amoxicillin is likely due to frequent use of these antibiotics both within hospital and outside.

E. coli, Acinetobacter species, K. pneumoniae, P. aeruginosa, and P. vulgaris showed higher resistance to amoxicillin, ampicillin, cefotaxime, cefuroxime sodium, and ceftriaxone (β-lactam antibiotics). This high resistance of organisms to the most commonly used antibiotics (β-lactam antibiotics) was reported from many studies [2, 3, 6, 14, 22] in Ethiopia. Similarly, a study in Pakistan and India reported the high resistance of Acinetobacter species and P. aeruginosa isolated from surgical wounds [15, 25].

Pan-antibiotic resistance was noted among 8 (34.8%) of Acinetobacter species. Resistance is due to mechanisms that are expressed frequently in hospital acquired strains of Acinetobacter including β-lactamases, alterations in cell-wall channels (porins), and efflux pumps [27].

The resistance rates for E. coli isolate were as follows: tetracycline and cefotaxime: 20 (83.3%) each, ampicillin: 23 (95.8%), cephazoline: 22 (91.7%), ceftriaxone and cefuroxime sodium: 21 (87.5%) each, amoxicillin and ceftazidime 17 (70.8%) each, and ciprofloxacin: 16 (66.7%). Chloramphenicol was active against E. coli.

Gentamicin and ciprofloxacin were relatively effective antibiotics against Gram negative organisms associated with SSI which is in agreement with previous study conducted in Ethiopia [17]. The frequency of single as well as multiple drug resistance was alarmingly high. This might be a sign of inappropriate use of antimicrobials and lack of performing antimicrobial susceptibility test.

Due to limited laboratory facilities and expertise, we were unable to investigate anaerobic bacterial and fungal agents. Therefore, future studies should be conducted to include these organisms that require special media and environment for growth.

5. Conclusion and Recommendation

Gram negative organisms with multiple drug resistance were commonly associated with postoperative surgical site infection. Rational antimicrobial use and continuing surveillance of bacterial antimicrobial sensitivity tests at local level are necessary to reduce emergence and spread of resistant bacterial isolates. The practice of aseptic technique during and after surgery should be the primary support rather than overreliance on antibiotics to reduce emergence and spread of resistant pathogens. It is also recommended that gentamicin and ciprofloxacin should be used in preference to ceftriaxone and amoxicillin for treatment of postoperative surgical site infections. Pan-antibiotic resistant Acinetobacter species needs special implementation and monitoring of antibiotics.

Abbreviations

CDC: | Center for Disease Control and Prevention
CLSI: | Clinical Laboratory Standard Institute
ENT: | Ear nose and throat
HAIs: | Hospital acquired infections
MRSA: | Methicillin resistant Staphylococcus aureus
QC: | Quality control
SOPs: | Standard operative procedures
SPSS: | Statistical Package for Social Sciences
SSI: | Surgical site infection
VRE: | Vancomycin Resistant.

Competing Interests

All authors declare that they have no conflict of interests associated with the publication of this paper.

Authors’ Contributions

Walelign Dessie, Gebru Mulugeta, and Engida Abebe conceived and designed the study. Walelign Dessie and Engida Abebe collected sociodemographic data and clinical sample from hospitals. Walelign Dessie, Surafael Fentaw, Amete Mihret, and Mulu Hassen investigated laboratory and interpreted data. All authors helped in drafting the paper and critically reviewed it. All authors read and approved the final paper.

Acknowledgments

The authors are very grateful to the staff of St. Paul’s and Yekatit 12 Specialized Hospital Health Office for their cooperation during screening of patients during the study period. More than ever, they would like to thank Ethiopian Public Health Institute (EPHI) microbiology staff for their invaluable support during laboratory processing. They are also indebted to patients who were participants of the study. Finally, their heartfelt gratitude goes to Addis Ababa University, College of Health Science, School of Allied Health Science, Department of Medical Laboratory Science, for their financial support for the completion of this work.

References

N. M. Bagnall, S. Vig, and P. Trivedi, “Surgical-site infection,” Surgery, vol. 27, no. 10, pp. 426–430, 2009.

A. Gelaw, S. Gebre Selassie, M. Tiruneh, and M. Fentie, “Antimicrobial susceptibility patterns of bacterial isolates from patients with postoperative surgical site infection, health professionals and environmental samples at a tertiary level hospital, North West Ethiopia,” International Journal of Pharmaceutical Sciences Review and Research, vol. 3, no. 1, pp. 1–9, 2013.

B. Amare, Z. Abdurrahman, B. Moges, and J. Ali, “Postoperative surgical site bacterial infections and drug susceptibility patterns at Gondar University Teaching Hospital, Northwest Ethiopia,” Journal of Bacteriology & Parasitology, vol. 2, no. 8, 2011.

L. T. A. Thu, A. H. Sohn, N. P. Tien et al., “Microbiology of surgical site infections and associated antimicrobial use among Vietnamese orthopedic and neurosurgical patients,” Infection Control and Hospital Epidemiology, vol. 27, no. 8, pp. 855–862, 2006.

B. Mawalla, S. E. Mshana, P. L. Chalya, C. Imirzalioglu, and W. Mahalu, “Predictors of surgical site infections among patients undergoing major surgery at Bugando Medical Centre in Northwestern Tanzania,” BMC Surgery, vol. 11, article 21, 2011.

W. Mulu, G. Kibru, G. Beyene, and M. Damtie, “Postoperative nosocomial infections and antimicrobial resistance pattern of bacteria isolates among patients admitted at Felege Hiwot Referral Hospital, Bahirdar, Ethiopia,” Ethiopian Journal of Health Sciences, vol. 22, no. 1, pp. 7–18, 2012.

A. Adegoke, T. Mvuyo, A. I. Okoh, and J. Steve, “Studies on multiple antibiotic resistant bacterial isolated from surgical site infection,” Scientific Research and Essays, vol. 5, no. 24, pp. 3876–3881, 2010.

R. D. Wolcott, Y. A. Zischakau, and S. E. Dowd, “Bacterial diversity in surgical site infections: not just aerobic cocci any more,” Journal of Wound Care, vol. 18, no. 8, pp. 317–323, 2009.

M. Khan, J. Khalil, Rooh-ul-Muqim et al., “Rate and risk factors for surgical site infection at a tertiary care facility in Peshawar, Pakistan,” Journal of Ayub Medical College, Abbottabad, vol. 23, no. 1, pp. 15–18, 2011.

D. E. Reichman and J. A. Greenberg, “Reducing surgical site infections: a review,” Reviews in Obstetrics & Gynecology, vol. 2, no. 4, pp. 212–221, 2009.

M. Cheesbrough, District Laboratory Practice in Tropical Countries, Cambridge University Press, Cambridge, UK, 2001.

B. R. Reddy, “Management of culture negative surgical site infections in India,” Medical & Allied Sciences, vol. 2, no. 1, pp. 2–6, 2012.

A. Mahmood, “Bacteriology of surgical site infections and antibiotic susceptibility pattern of the isolates at a tertiary care hospital in Karachi,” Journal of the Pakistan Medical Association, vol. 50, no. 8, pp. 256–259, 2000.

D. Amenu, T. Belachew, and F. Araya, “Surgical site infection rate and risk factors among obstetric cases of Jimma University Specialized Hospital, Southwest Ethiopia,” Ethiopian Journal of Health Sciences, vol. 21, no. 2, 2011.

S. Bibi, G. A. Channa, T. R. Siddiqui, and W. Ahmed, “Pattern of bacterial pathogens in postoperative wounds and their sensitivity patterns in Karachi, Pakistan,” Journal of Surgery Pakistan, vol. 17, no. 4, pp. 164–167, 2012.

B. Suchitra Joyce and N. Lakshmidevi, “Surgical site infections: assessing risk factors, outcomes and antimicrobial sensitivity patterns,” African Journal of Microbiology Research, vol. 3, no. 4, pp. 175–179, 2009.

S. R. P. E. Dantas, R. H. Kuboyama, M. Mazzali, and M. L. Moretti, “Nosocomial infections in renal transplant patients: risk factors and treatment implications associated with urinary tract and surgical site infections,” Journal of Hospital Infection, vol. 63, no. 2, pp. 117–123, 2006.

I. Onche and O. Adedeji, “Microbiology of post-operative wound infection in implant surgery,” Nigerian Journal of Surgical Research, vol. 6, no. 1-2, pp. 37–40, 2010.

A. Shriyan, R. Sheetal, and N. Nayak, “Aerobic micro-organisms in post-operative wound infections and their antimicrobial susceptibility patterns,” Journal of Clinical and Diagnostic Research, vol. 4, no. 6, pp. 3392–3396, 2010.

R. A. Sani, S. A. Garba, O. A. Oyewole, and A. Ibrahim, “Antibiotic resistance profile of gram positive bacteria isolated from wound infections in Minna, Bida, Kontagora and Suleja Area of Niger State,” Journal of Health Sciences, vol. 2, no. 3, pp. 19–22, 2012.

M. A. Wassef, A. Hussein, E. M. Abdul Rahman, and R. H. El-Sherif, “A prospective surveillance of surgical site infections: study for efficacy of preoperative antibiotic prophylaxis in Egypt,” African Journal of Microbiology Research, vol. 6, no. 12, pp. 3072–3078, 2012.

M. Mama, A. Abdissa, and T. Sewunet, “Antimicrobial susceptibility pattern of bacterial isolates from wound infection and their sensitivity to alternative topical agents at Jimma University Specialized Hospital, South-West Ethiopia,” Annals of Clinical Microbiology and Antimicrobials, vol. 13, article 14, 2014.

L. Dessalegn, T. Shimelis, E. Tadesse, and S. Gebre-Selassie, “Aerobic bacterial isolates from post-surgical wound and their antimicrobial susceptibility pattern: a hospital based cross-sectional study,” E3 Journal of Medical Research, vol. 3, no. 2, pp. 18–23, 2014.

National Nosocomial Infections Surveillance (NNIS) System, “National Nosocomial Infections Surveillance (NNIS) report, data summary from October 1986–April 1996, issued May 1996,” American Journal of Infection Control, vol. 24, no. 5, pp. 380–388, 1996.

A. Sikka, J. K. Mann, Deep, M. G. Vashist, U. Chaudhary, and A. Deep, “Prevalence and antibiotic sensitivity pattern of bacteria isolated from nosocomial infections in a surgical ward,” Indian Journal of Clinical Practice, vol. 22, no. 10, 2012.

A. H. Sohn, F. M. Parvez, T. Vu et al., “Prevalence of surgical-site infections and patterns of antimicrobial use in a large tertiary-care hospital in Ho Chi Minh City, Vietnam,” Infection Control and Hospital Epidemiology, vol. 23, no. 7, pp. 382–387, 2002.

L. S. Munoz-Price and R. A. Weinstein, “Acinetobacter infection,” The New England Journal of Medicine, vol. 358, no. 12, pp. 1214–1281, 2008.

T. Abula and M. Kedir, “The pattern of antibiotic usage in surgical in-patients of a teaching hospital, northwest Ethiopia,” Ethiopian Journal of Health Development, vol. 18, no. 1, pp. 35–38, 2004.