International Journal of Otolaryngology
Volume 2016 (2016), Article ID 4958074, 5 pages
http://dx.doi.org/10.1155/2016/4958074

Clinical Study

Flexible Fiber Optic Carbon-Dioxide Laser Assisted Stapedotomy in Otosclerosis

Sertac Yetiser

Anadolu Medical Center, Department of ORL & HNS, 41400 Kocaeli, Turkey

Received 27 March 2016; Accepted 22 August 2016

Academic Editor: Srdjan M. Vlajkovic

Copyright © 2016 Sertac Yetiser. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. The aim of this study is to analyze the hearing and vestibular outcome of patients with otosclerosis who have been operated on by fiber optic flexible CO₂ laser. Study Design. A preliminary and retrospective study was conducted in 30 patients with otosclerosis. Results. Comparative analysis of average air conduction thresholds ( dB versus  dB) and air-bone gaps ( dB versus  dB) before and after the surgery were statistically significant (<0.001). Air-bone gap closed within 10 dB or less in 50% of the cases and within 20 dB or less in 90% of the cases. Average bone conduction threshold after the surgery ( dB) was better than that before the surgery (). However, no statistically significant difference was found (). One patient had tinnitus after surgery. None of the patients had severe sickness or vomiting due to surgery. Eleven patients (36.6%) had very mild nystagmus beating toward the counter-lateral side. All patients were stable at 10 days after surgery. Conclusion. The results indicate that fiber optic flexible CO₂ laser provides the surgeon with a very safe and precise surgical instrumentation even in cases with extensive and obliterative otosclerosis.

1. Introduction

Laser stapedotomy was introduced to the otological practice more than 30 years ago [1]. Saccular damage and decrease in cochlear microphonics due to warming of perilymph were major concerns in the early 80s [2–4]. However, the heat in the vestibule has been reported to be harmless if shots with short pulse and low energy are selected and if the shooting is not continuous and the time interval between the shots is longer [5, 6]. One shot of carbon-dioxide laser leads to only 0.3°C increase of heat in the vestibule [7]. Lesinski and Stein reported their first experience about CO₂ laser surgery in patients with otosclerosis [8]. Thermal effect in CO₂ is lower and perforation of the oval window is safer due to less tissue penetrance and much absorbance as compared to Argon and KTP [9, 10]. Carbon-dioxide laser has been used for years with a micro manipulator mounted on the microscope under the guidance of a visible light which raised some questions since the surgeon had to use micro mirrors to direct the invisible laser beams to the desired area under the guidance of an aiming beam. Accidental facial paralysis was one of the deleterious effects of the misguided beam [11]. However, introduction of fiber optic CO₂ laser to the operating field provided significant advance in instrumentation. More accurate shooting was possible by bringing the tip of the applicator over the target area. First experience with fiber-enabled CO₂ laser has been reported recently [12]. Hand-held laser may provide several practical advantages especially in difficult anatomic conditions like extensive and obliterative otosclerosis.

The aim of this study is to present the preliminary results in auditory and vestibular function in patients with otosclerosis who have been treated with fiber optic flexible carbon-dioxide laser.

2. Material and Methods

Thirty patients with otosclerosis who have been operated on between 2009 and 2014 were reviewed. A signed informed consent was obtained from each patient. The procedures were in accordance with the ethical standards of the declaration of Helsinki and of the institutional review board. Diagnosis of otosclerosis was based on the history of progressive conductive hearing loss in the presence of intact tympanic membrane and normal middle ear ventilation. However, footplate fixation was confirmed during surgery. All patients were primary cases. The procedure was performed under general anaesthesia. Classical endomeatal incision was used to elevate the tympanomeatal flap. Flexible fiber optic hand-held carbon-dioxide laser was used (Omni-Guide, Inc., Cambridge, MA, USA) during small fenestra stapedotomy. First, tendon and posterior crus were cut and then penetration of footplate was processed by laser (Figure 1). The power of laser was ranging between 1 and 5 W with pulsed shooting. Shooting time was 0.1 seconds for the tendon and it was ranging between 0.1 and 0.05 seconds for the footplate. None of the shots was exceeding 0.1 seconds. There was an interval of minimum 15 seconds between every shooting. An average of 2-3 shots for the tendon, 4–7 shots for the crus, and footplate were used. Nonoverlapping shooting was used (rosette-fashion) at the footplate. The fenestra was sealed with small pieces of adipose tissue taken from auricular lobule. All patients were subjected to a tinnitus questionnaire, tunning fork test, and nystagmus evaluation a few hours after surgery. Balance was tested the day after surgery and one week later. All patients were discharged on the second postoperative day.

Figure 1: Laser shooting of the footplate.

Audiograms taken within two weeks before the surgery were included. Postoperative hearing was tested at one month and every six months after surgery. The most recent hearing test after surgery was included. The follow-up time was maximum 76 and minimum 14 months. Hearing results were described according to the guidelines of the American Committee on Hearing and Equilibrium. Air conduction thresholds at 250, 500, 1000, 2000, 4000, and 6000 Hz and bone conduction thresholds at 500, 1000, 2000, and 4000 Hz were measured. Average air and bone conduction hearing thresholds were calculated as the average of thresholds at 500, 1000, 2000, and 4000 Hz. Air-bone gap at 500, 1000, 2000, and 4000 Hz was calculated as the difference of air and bone conduction thresholds and average air-bone gap was calculated as the average of air-bone gap at those frequencies. Speech reception thresholds and speech discrimination scores were measured before and after surgery. Patients with air-bone gap closure after surgery were grouped as those within 0–10 dB, 11–20 dB, and 21–30 dB. All data obtained before and after surgery were statistically analyzed. “SPSS 15.0 for windows” was used for statistical analysis. Mean values and standard deviations (±) were measured. The one-way ANOVA and Chi-square “goodness of fit” tests were used for comparative analysis of the groups. Statistical significance was set at .

3. Results

There were 30 patients (16 males and 14 females) with the average age of 43.1 years (ranging from 21 to 56). The followed-up average time was 25 months (ranging from 14 to 76 months). Surgical intervention was on the left side in 11 and on the right side in 19 patients. 16.6% of patients had tinnitus (number 5) and 6.6% had balance problem before the surgery (number 2). Small fenestra stapedotomy technique was used in all patients and four patients had reverse stapedotomy with preservation of stapedial tendon when there is adequate anatomical access (Figures 1 and 2). Microdrill associated with laser had to be used in 3 patients with extensive obliterative otosclerosis. Maximum number of footplate shot was six. Prosthesis either made of Teflon (number 15) or titanium (number 15) of 0.6 mm diameter was used. The length was ranging between 4 and 4.75 mm. All patients demonstrated hearing improvement and air-bone gap closure after surgery. Comparative analysis of hearing data before and after the surgery is presented in Table 1. Average air conduction threshold and air-bone gap of patients before surgery were  dB and  dB, respectively. Twenty patients had pure conductive hearing loss with normal bone conduction before the surgery. Ten patients had 25 dB or worse bone conduction threshold at least at 3 frequencies (mixed type hearing loss). Of those, it was over 30 dB at 3 frequencies in 2 patients (cochlear otosclerosis). Average bone conduction threshold was  dB before the surgery.

Table 1: Comparative analysis of hearing results of patients with laser stapedotomy before and after surgery.

Preoperative
Postoperative

Min
Max

Min
Max

AC threshold

    250 Hz
58.96 ± 12.63
35
95
28.79 ± 9.60
10
45
<0.001

    500 Hz
56.37 ± 12.31
35
85
26.55 ± 11.26
10
55
<0.001

    1000 Hz
52.93 ± 12.78
30
85
25.68 ± 12.79
10
60
<0.001

    2000 Hz
49.13 ± 14.58
20
75
28.27 ± 13.84
5
65
<0.001

    4000 Hz
50.34 ± 23.67
15
95
37 ± 4120.64
5
90
<0.001

    6000 Hz
54.65 ± 29.04
10
110
46.37 ± 21.95
15
95
0.225

Average ACT
53.41 ± 11.81
32
80
26.37 ± 11.04
10
60
<0.001

BC threshold

    500 Hz
17.62 ± 10.08
0
40
13.72 ± 9.19
0
35
0.129

    1000 Hz
15.62 ± 9.01
0
30
14.27 ± 10.84
0
40
0.612

    2000 Hz
22.06 ± 13.29
5
50
19.48 ± 13.81
0
60
0.473

    4000 Hz
21.20 ± 19.42
0
65
21.37 ± 21.10
0
70
1.000

Average BCT
20.13 ± 8.59
5
32
16.68 ± 12.00
0
60
0.213

SRT
60.68 ± 12.86
30
85
34.34 ± 12.49
20
75
<0.001

SDS
87.65 ± 19.66
80
96
88.89 ± 21.88
76
96
0.303

Air-bone gap

    500 Hz
38.44 ± 11.73
15
60
12.96 ± 7.56
0
30
<0.001

    1000 Hz
37.93 ± 9.86
25
55
12.20 ± 7.27
0
30
<0.001

    2000 Hz
27.41 ± 11.22
5
45
9.13 ± 6.50
0
30
<0.001

    4000 Hz
29.48 ± 13.90
5
65
15.93 ± 9.98
0
30
<0.001

Average A-B gap
34 ± 9.92
17
62
12.03 ± 6.02
0
25
<0.001

Figure 2: Reverse stapedotomy with preservation of the stapedial tendon.

Air conduction threshold and air-bone gap after the surgery were  dB and  dB, respectively. Hearing gain for average air conduction and air-bone gap closure after the surgery were statistically significant (<0.001). Average bone conduction threshold after the surgery ( dB) was better than that before the surgery (). However, no statistically significant difference was found (). One patient with severe obliterative otosclerosis who had required extensive drilling out to achieve fenestration had significant decrease in bone conduction at 4000 Hz from 10 dB to 55 dB. None of the rest of the patients had any drop in bone conduction threshold at any frequency. Air-bone gap was closed within 10 dB or less in 50% of the cases and in 20 dB or less in 90% of cases (Table 2). Speech reception threshold (SRT) improved in all patients after the surgery. The mean speech reception threshold before and after the surgery was  dB and  dB, respectively, and the difference was statistically significant (<0.001). Average speech discrimination scores (SDS) before and after the surgery were and , respectively, and no statistically significant difference was found ().

Table 2: Distribution of air-bone gap closure.

ABG closure
Number of patients
Percentage

0–10 dB
15
50

11–20 dB
12
40

21–30 dB
3
10

Total
30
100

None of the patients had facial paralysis or sensorineural hearing loss or anacusis after the operation. Two patients had additional tinnitus after surgery. Of those, one had no tinnitus ten days after surgery. None of the patients had sickness or vomiting due to surgery. Eleven patients (36.6%) had very mild nystagmus beating toward the contralateral side the day after surgery (Table 3). No spontaneous nystagmus was detected 10 days after operation in any of the patients. All patients were able to walk without any personal help immediately after surgery. However, twelve patients (40%) were not able to do tandem walk the day after surgery. Fifteen patients (50%) had tendency to fall toward the operated side while standing still with closed eyes the day after surgery (Romberg’s sign). However, majority of patients demonstrated improved conditions at 10 days after surgery without any medication. Two patients were cured with medication (6.6%). None of the patients had difficulty to do “finger to nose” test the day after surgery (past-pointing).

Table 3: Balance function after surgery in patients with laser stapedotomy.

Postop day 1
Postop days 7–10

Number of patients
Percentage
Number of patients
Percentage

Nystagmus
11
36.6%
None
0%

Tandem walking
12
40%
1
4%

Past-pointing
None
0%
None
0%

Romberg
15
50%
2
6.6%

Additional postop tinnitus
2
8% (25/2)
1
4% (25/1)

4. Discussion

Stapedotomy with microdrill or pick is sometimes a difficult task to achieve where the anatomy presents challenging conditions such as dehiscent facial nerve, deep oval window, and thick footplate. Besides, it is the surgeon’s major concern not to allow extensive trauma to the inner ear. Laser provides nonvibrational penetration of the oval window as compared to microdrilling or manual applications. Functional results in stapedotomy with laser are better than conventional methods. Higher proportion of air-bone gap closure within 10 dB and better bone conduction after the operation has been reported with laser assisted surgery [13–16]. More recently, Fang et al. have conducted a meta-analytic study aiming to compare the hearing outcome of patients with otosclerosis treated with laser and traditional methods. They reported that laser stapedotomy had significantly better hearing outcome [17]. However, thermal effects to the inner ear and associated vestibular symptoms have been subject of discussions [18]. Vestibular function after laser assisted stapedotomy has been less studied. Sakamoto et al. have reported that laser is as safe as conventional technique in terms of duration of vestibular symptoms after the surgery [19]. Almost half of the patients had balance problem the day after surgery in this series, when they are forced to stand still and to walk with closed eyes. But, all improved within a week.

Laser aims ablation of the target tissue by means of heat which is dependent on the thermal and optical properties of the laser itself. This effect is outlined by two major parameters: wavelength and pulse duration. Lower energy inputs will be provided with the presentation of pulsed shootings having cooling intervals [20, 21]. Even in pulsed systems such as Er:YAG laser (Erbium:Yttrium-Aluminum-Oxide), explosive nature of the ablative process raises the risk of acoustic damage [22]. Therefore, success in stapes surgery is mainly dependent on the wavelength property of the laser. Following penetration process of the stapes footplate, CO₂ has ideal safe conditions for inner ear. Owing to poor absorption in water, there is a risk of damage to deeper-lying structures for KTP and Argon. Comparative analysis of hearing outcome of patients with otosclerosis treated with CO₂ and other lasers such as KTP-532, Argon, and Er:YAG presents better air-bone gap closure for CO₂ laser [9, 10, 23, 24]. Air-bone gap closure has been achieved within 20 dB in 90% of cases in this series.

CO₂ laser can be used as an “one-shot” procedure with increased spot size and power. Jovanovic et al. have optimized the surgical technique with one-shot CO₂ laser having a footplate perforation of 0.5-0.6 mm to reduce the possible laser-depending inner ear affections. However, adequate diameter could be achieved in 68% of patients [25]. Besides, if a second shot with increased size and power is needed for adequate opening this may increase the risk of inner ear damage [26]. Therefore, fiber-enabled CO₂ laser with low power and a chance of multiple shooting more accurately is much practical and safer [12]. The fine tip of the laser can be placed over the footplate in a millimetric distance without the need of guided aiming beam. The accuracy problem of the aiming beam from a distance has been one of the disadvantages of CO₂ laser in the past. Laser mounted on the microscope requires the use of a micromanipulator which is sometimes unable to reach the targeted tissue from a desired angle [12]. Three patients in this series had obliterative otosclerosis which required drilling of the oval window. Obliterative cases present challenging problem and carry the risk for hearing loss and failure. However, it was possible to achieve the oval window fenestration with combined drilling and laser shooting. Conclusively, the results of the study indicate that fiber optic flexible CO₂ laser provides the surgeon safe and very precise surgical manipulation even in cases with extensive and obliterative otosclerosis.

Competing Interests

The author hereby declares that they do not have any competing interests in the manuscript, including financial, consultant, institutional, and other relationships that might lead to bias or competing interests.

References

R. C. Perkins, “Laser stapedotomy for otosclerosis,” The Laryngoscope, vol. 90, no. 2, pp. 228–241, 1980.

B. J. Gantz, H. A. Jenkins, S. Kishimoto, and U. Fisch, “Argon laser stapedotomy,” Annals of Otology, Rhinology and Laryngology, vol. 91, no. 1 I, pp. 25–26, 1982.

M. Vollrath and M. Schreiner, “The effects of the Argon laser stapedotomy on cochlear potentials,” Acta Oto-Laryngologica. Supplementum, vol. 385, pp. 1–32, 1982.

M. Vollrath and C. Schreiner, “The effects of the argon laser on temperature within the cochlea,” Acta Oto-Laryngologica, vol. 93, no. 1–6, pp. 341–348, 1982.

N. J. Coker, G. A. Ator, H. A. Jenkins, C. R. Neblett, and J. R. Morris, “Carbon dioxide laser stapedotomy. Thermal effects in the vestibule,” Archives of Otolaryngology, vol. 111, no. 9, pp. 601–605, 1985.

S. Jovanovic, D. Anft, U. Schönfeld, A. Berghaus, and H. Scherer, “Influence of CO₂ laser application to the guinea-pig cochlea on compound action potentials,” American Journal of Otology, vol. 20, no. 2, pp. 166–173, 1999.

S. G. Lesinski and A. Palmer, “Co2 laser for otosclerosis: safe energy parameters,” Laryngoscope, vol. 99, no. 6, part 2, supplement 46, pp. 9–12, 1989.

S. G. Lesinski and J. A. Stein, “CO₂ laser stapedotomy,” Laryngoscope, vol. 99, no. 6, pp. 20–24, 1989.

R. Vincent, A. J. N. Bittermann, J. Oates, N. Sperling, and W. Grolman, “KTP versus CO₂ laser fiber stapedotomy for primary otosclerosis: results of a new comparative series with the otology-neurotology database,” Otology & Neurotology, vol. 33, no. 6, pp. 928–933, 2012.

C. A. Buchman, M. J. Fucci, J. B. Roberson Jr., and A. De La Cruz, “Comparison of argon and CO₂ laser stapedotomy in primary otosclerosis surgery,” American Journal of Otolaryngology—Head and Neck Medicine and Surgery, vol. 21, no. 4, pp. 227–230, 2000.

E. Lescanne, S. Moriniere, C. Gohler, A. Manceau, P. Beutter, and A. Robier, “Retrospective case study of carbon dioxide laser stapedotomy with lens-based and mirror-based micromanipulators,” Journal of Laryngology and Otology, vol. 117, no. 4, pp. 256–260, 2003.

C. Brase, J. Schwitulla, J. Künzel, T. Meusel, H. Iro, and J. Hornung, “First experience with the fiber-enabled CO₂ laser in stapes surgery and a comparison with the ‘one-shot’ technique,” Otology & Neurotology, vol. 34, no. 9, pp. 1581–1585, 2013.

H. Silverstein, S. Rosenberg, and R. Jones, “Small fenestra stapedotomies with and without KTP laser: a comparison,” Laryngoscope, vol. 99, no. 5, pp. 485–488, 1989.

Y. K. Shabana, H. Allam, and C. B. Pedersen, “Laser stapedotomy,” Journal of Laryngology and Otology, vol. 113, no. 5, pp. 413–416, 1999.

P. Garin, S. Van Prooyen-Keyser, and J. Jamart, “Hearing outcome following laser-assisted stapes surgery,” Journal of Otolaryngology, vol. 31, no. 1, pp. 31–34, 2002.

G. Motta and L. Moscillo, “Functional results in stapedotomy with and without CO₂ laser,” ORL: Journal for Oto-Rhino-Laryngology and Its Related Specialties, vol. 64, no. 5, pp. 307–310, 2002.

L. Fang, H. Lin, T.-Y. Zhang, and J. Tan, “Laser versus non-laser stapedotomy in otosclerosis: a systematic review and meta-analysis,” Auris Nasus Larynx, vol. 41, no. 4, pp. 337–342, 2014.

B. Schwab and G. Kontorinis, “Pressure and temperature changes in in vitro applications with the laser and their implications for middle ear surgery,” International Journal of Otolaryngology, vol. 2010, Article ID 237521, 6 pages, 2010.

T. Sakamoto, H. Iwamura, A. Kashio et al., “Comparison of hearing improvement and complications after stapes surgery with and without potassium titanyl phosphate laser for manipulation of the foot plate,” ORL: Journal for Oto-Rhino-Laryngology and Its Related Specialties, vol. 72, no. 1, pp. 16–21, 2010.

S. Jovanovic, U. Schönfeld, R. Fischer et al., “Thermic effects in the ‘vestibule’ during laser stapedotomy with pulsed laser systems,” Lasers in Surgery and Medicine, vol. 23, no. 1, pp. 7–17, 1998.

B. J. F. Wong, J. Neev, and M. J. C. van Gemert, “Surface temperature distributions in carbon dioxide, argon, and KTP (Nd:YAG) laser ablated otic capsule and calvarial bone,” American Journal of Otology, vol. 18, no. 6, pp. 766–772, 1997.

Z.-Z. Li, L. Reinisch, and W. P. Van de Merwe, “Bone ablation with Er:YAG and CO₂ laser: study of thermal and acoustic effects,” Lasers in Surgery and Medicine, vol. 12, no. 1, pp. 79–85, 1992.

S. G. Lesinski and A. Palmer, “Lasers for otosclerosis: CO₂ vs. Argon and KTP-532,” Laryngoscope, vol. 99, no. 6, part 2, supplement 46, pp. 1–8, 1989.

M. R. Marchese, A. Scorpecci, F. Cianfrone, and G. Paludetti, “‘One-shot’ CO₂ versus Er:YAG laser stapedotomy: is the outcome the same?” European Archives of Oto-Rhino-Laryngology, vol. 268, no. 3, pp. 351–356, 2011.

S. Jovanovic, U. Schönfeld, and H. Scherer, “CO₂ laser stapedotomy with the ‘one-shot’ technique—clinical results,” Otolaryngology—Head and Neck Surgery, vol. 131, no. 5, pp. 750–757, 2004.

T. Just, E. Guder, and H. W. Pau, “Effect of the stapedotomy technique on early post-operative hearing results—preliminary results,” Auris Nasus Larynx, vol. 39, no. 4, pp. 383–386, 2012.