International Journal of PhotoenergyVolume 2012 (2012), Article ID 832180, 7 pagesdoi:10.1155/2012/832180

Research Article

Photocatalytic Degradation of Using Ni-Containing TiO₂

Yao-Hsuan Tseng and Bo-Kai Huang

Department of Chemical Engineering, National Taiwan University of Science and Technology, Taipei 106, Taiwan

Received 15 August 2011; Revised 28 October 2011; Accepted 28 October 2011

Academic Editor: Jiaguo Yu

Copyright © 2012 Yao-Hsuan Tseng and Bo-Kai Huang. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The nickel-containing titania was synthesized and employed in the photomineralization of . A nickel-modified titania photocatalyst was prepared by photodeposition method with using Degussa-P25 TiO₂ particle and nickel chloride as raw materials, respectively. The physical analyses were carried out using X-ray photoelectron spectroscopy (XPS), X-ray diffraction (XRD), transmittance electron microscope (TEM), and photoluminescence spectroscopy (PL), to observe changes in particles following nickel modification. The results showed that Ni does not enter into the crystal lattice and is dispersed onto the surface uniformly. Ni improved the intensity of PL spectra with an appropriate Ni content on the surface. The modified titanium dioxide with 0.1 mol% of nickel exhibited two times the -removal activity of bare under ultraviolet illumination. The nickel content in this photodeposition process plays an important role in affinity to molecules, recombination rate of electron-hole pair, and content of active site on the surface and therefore affects the optical and photocatalytic properties.

1. Introduction

Since the discovery of the photoelectrochemical splitting of water using titanium dioxide electrodes [1–3], researchers have extensively studied semiconductor-based photocatalysis. Today, titanium dioxide is a representative photocatalyst material, due to its powerful redox properties and wide range of applications, such as air purification, water purification, deodorization, self-cleaning surfaces, antibacterial coating, and so forth [1, 4–7].

The photocatalytic capacity of TiO₂ powder heavily depends on its microstructure and physical properties, which are in turn determined by the preparation conditions [8–10]. Several attempts have been made to increase the photodegradation efficiency of TiO₂, by either noble metal deposition or ion doping [11–14]. For example, Pt-doped, N-doped, C-doped, and S-doped TiO₂ are applied as visible-light-responsive photocatalysts [1, 12–14], and cocatalysts and co-adsorbents, such as Ag, Au, activated carbon, and carbon nanotubes (CNTs) [10, 15–17], are used for the improvement of photocatalytic activity under UV illumination. However, in developing their widespread use for any practical application, the cost and stability of the material must be considered first. The anion and noble metal dopants do not have much practicability due to their insufficient stability, complicated preparation process, and expensive raw material. In contrast, transition metal cations have been found to be applied dopants and cocatalysts for the improvement of photocatalytic activity [18–24]. Some researchers report that the Ni²⁺ ion dopant improves the photocatalytic activity of certain semiconductor photocatalyst because the existence of Ni²⁺ suppresses recombination of electron-hole pair on the TiO₂ surface [18–20]. However, the raw material and processes of these previous works, such as organic precursors, sol-gel, and ion-implantation methods [18–22], are not inexpensive enough for mass production. Herein, we present a facile and cost-effective method for the preparation of highly active nickel-containing TiO₂ developed using TiO₂ particle and nickel chloride.

2. Experimental Details

2.1. Preparation of Ni-TiO₂ Particle

The nickel-containing, nanostructured TiO₂ particles were prepared by the photoreduction process by using nickel chloride and Degussa P25 as a nickel precursor and a pristine photocatalyst, respectively. Ni-TiO₂ was prepared by mixing 3 g of nonporous TiO₂ (Degussa P25), 50 mL of ethanol, and certain amount of NiCl₂6H₂O in 200 mL of double-distilled water. The solution was well mixed by ultrasonic treatment for 1 h. The initial pH value was adjusted to 8 with 0.1 M of NaOH solution [23]. A nitrogen stream at the rate of 30 mL/min was continuously introduced into the reaction chamber to remove oxygen in the solution. The solution was then irradiated with four UVC lamps (Philips TUV 10 W/G10 T8) with an intensity of 2 mW/cm² for 3 h. Ni ions were reduced to nickel metallic nanoparticles by the photo-generated electrons of TiO₂, then deposited on the surface of TiO₂. The Ni-TiO₂ particles were obtained by centrifugation at 10000 rpm, washing with DI water, and drying at 373 K for 12 h. Sample nomenclature was defined as follows: % Ni/TiO₂ photocatalyst prepared by the photodeposition process with nickel content mol%. The Ni/TiO₂ molar ratios were controlled at 0, 0.05, 0.1, 0.2, 0.5, 1, 2, and 4%.

2.2. Characterization

The photocatalyst crystal phase was identified using X-ray diffraction with Cu Kα (λ = 0.154 nm) radiation (Shimadzu Rigaku D/Max RCXRD 6000). Average particle size and morphology was obtained by transmission electron microscopy (TEM, Hitachi S600-100 KV). The photoluminescence spectroscopy (PL) data were obtained on a luminescence spectrometer (Jasco FP-6500LE) under excitation with 325 nm irradiation. Material compositions were determined by X-ray photoelectron spectroscopy (Perkin Elmer SSI-M probe XPS system and S4800) and energy dispersion spectroscopy (Horiba, EX-210).

2.3. Photocatalytic Activity

Figure 1 depicted the continuous flow system used for degradation over TiO₂. A round-shaped Pyrex glass vessel (× H, 10 cm × 4 cm) was used as the photoreactor to conduct the degradation of , and a sample dish (, 7 cm) was located inside the vessel containing the TiO₂ powder. A black lamp provided a UV light source with an intensity of 1 mW/cm² (Sankyo Denki FL 20SBLB, main peak located at 352 nm). The degradation was carried out at room temperature using an air stream containing 1.0 ppm NO as feedstock. Two mass flow controllers (MFCs) (Brooks 5850E) manipulated relative humidity (RH = 50%) in the feeding stream. The reaction gas in the feeding stream passed through the vessel containing TiO₂ powder (0.2 g) at a flow rate of 1 L/min. An on-line chemiluminescent analyzer (Eco Physics, CLD 700 AL) continuously monitored NO and NO₂ concentrations for gas analysis in the outlet.

Figure 1: Schematic continuous flow reaction system for photocatalytic degradation of NO.

3. Results and Discussion

3.1. Photocatalytic Degradation over Ni-TiO₂

Many researchers use NO oxidation to determine photocatalytic reactivity in various TiO₂ photocatalytic applications [11–13, 15, 25]. The electron-hole pair (e⁻-h⁺) generated upon light excitation is trapped at the TiO₂ surface as spatially separated redox-active sites. The general mechanism of oxidation by photocatalyst is as follows. Hydrogen ions and hydroxide ions are dissociated from water. The active oxygen species are produced on the TiO₂ surface. The nitric monoxide is oxidized to nitric acid or nitrous acid by active oxygen species. Based on the gas-phase chemistry of [25, 26], NO is converted to HNO₃ as a consecutive photooxidation via a NO₂ intermediate:                          Finally, the nitric acid forms on the catalyst. Photocatalyst activity will lessen as acid accumulates. To illustrate the reaction behavior of NO photocatalytic oxidation, 0.2 g of 0.1% Ni-TiO₂ and 1 mW/cm² of light intensity were used to conduct the experiment. At first, a 1 ppm NO gas stream was introduced into the photoreactor under dark conditions. As shown in the Figure 2, in the beginning, the NO concentration in the gas phase dropped rapidly without generation of NO₂ due to NO adsorption on the TiO₂. A few minutes later (2–4 min), the NO was saturated on the TiO₂ and in the photoreactor, and the NO concentration was thus returned to 1 ppm. The UV lamps were turned on to start this photocatalytic reaction. The steady state of this photocatalytic reaction was achieved as soon as the photocatalyst was illuminated. The NO concentration decreased from 1 to 0.57 ppm, and the NO₂ concentration increased to 0.1 ppm. The concentration, which represents the accumulated mixture of NO and NO₂, was maintained at 0.67 ppm under UV illumination. The activities of these TiO₂ samples do not obviously decrease during 30 mins of operation, due to the short reaction time.

Figure 2: Time-course of the changes in concentration of NO, NO₂, and in the presence of 0.1% Ni-TiO₂ under UV light, reaction conditions as given in Table 1.

Figure 3 shows the removal and NO₂ generation rates obtained using various Ni-containing TiO₂ particles under UV irradiation. The removal activity for these samples with different Ni content decreased in the order: 0.1% Ni-TiO₂ > 0.2% Ni-TiO₂ > 0.05% Ni-TiO₂ > 0.5% Ni-TiO₂ > 1% Ni-TiO₂ > P25 > 4% Ni-TiO₂, indicating the optimal Ni content is 0.1 mol%. The 0.1% Ni-TiO₂ has two times the -removal activity of P25 particle. Under UV illumination, these Ni-containing photocatalysts exhibit better activities in mineralization than pristine TiO₂, except for 4% Ni-TiO₂. The apparent quantum efficiency () and selectivity of NO₂ () further computed based on the following equations [12, 13, 27] are listed in Table 1:     

Table 1: The apparent quantum yields and selectivities of NO₂ of various catalysts: catalyst loading: 0.2 g, intensity of irradiation: 1 mW/cm², inlet concentration of NO, 1 ppm, inlet flow rate, 1 L/min, relative humidity: 55%, reaction temperature, 26°C.

Catalyst
P25
0.05% Ni
0.1% Ni
0.2% Ni
0.5% Ni
1% Ni
4% Ni

Φ (%)
2.13
2.63
2.85
2.58
2.07
1.80
1.30

(%)
62.8
30.7
24.4
29.5
36.9
48.5
56.0

Figure 3: Effect of Ni content and regeneration time on the removal rate of .

The order of apparent quantum efficiency (0.1% Ni-TiO₂ > 0.05% Ni-TiO₂ > 0.2% Ni-TiO₂ > P25 > 0.5% Ni-TiO₂ > 1% Ni-TiO₂ > 4% Ni-TiO₂) is not consistent with the removal activity. It indicates that the nickel content over 0.5% is excess to reduce the active area of TiO₂, resulting in the small quantum efficiency. When comparing the reaction behaviours over P25 and 0.05–0.2% Ni-TiO₂ samples, no significant difference in the NO conversion was observed, and the NO₂ generation rates over these Ni-TiO₂ samples were much less than that over P25, resulting in the better photocatalytic activity of the Ni-TiO₂. The selectivity of NO₂ of the photocatalyst has a great effect on the -removal activity, as shown in Table 1 and Figure 3. For example, the removal activity of 1% Ni-TiO₂ is better than P25 even if the quantum efficiency of P25 is larger than 1% Ni-TiO₂. It might be the Ni particle has a good affinity to NO₂. The platinum-modified TiO₂ also has this property [16], and Ni is much cheaper than Pt. It is a worthy property for NO removal photocatalysis because NO₂ is an undesired intermediate in the consecutive oxidation of NO, where the threshold concentrations of NO₂ and NO are 3 and 25 ppm, respectively, [12].

According to the reaction scheme of the photooxidation of NO, the photocatalyst would be deactivated after long-term operation due to the coverage of active sites by adsorbed ions at the catalyst surface. However, the adsorbed ions could be easily rinsed out with DI water, enabling regeneration of the catalyst. Figure 3 also indicates the removal rates of over 1st-, 3rd-, and 5th-regenerated 0.1% Ni-TiO₂ samples. The experimental results indicate the photocatalytic activity will be gradually decreased with the increase in operation and regeneration times. The photocatalytic activity of 0.1% Ni-TiO₂ sample becomes stable after four reaction and regeneration cycles. It showed that over 93% of the photocatalytic activity could be recovered after multi-reaction-regeneration cycles. The reason for the slight decrease of photocatalytic activity is that the unstable nickel particles peel off from the TiO₂ surface in the regeneration procedure. It can be confirmed by checking the nickel contents with using energy dispersive X-ray analysis after the regeneration procedure. It indicates most nickel particles on the TiO₂ surface are quite stable. This means that the prepared Ni-TiO₂ could provide very good stability for degradation. As a result, good stability, easy regeneration, and high reactivity will provide a great opportunity for the application in air purification with using nickel-modified photocatalysts.

3.2. Characterization of Ni-TiO₂

Figure 4 illustrates the X-ray diffraction patterns of the samples before and after photodeposition treatment. The XRD pattern of the prepared TiO₂ powder in Figure 4 reveals the peaks of anatase (101) and rutile (110) at 2θ = 25.4° and 27.5°, respectively, indicating that the bulk P25 TiO₂ composition is a mixture of rutile and anatase. Since all samples were dried at the relatively low temperature of 373 K and only a small amount of Ni salt was added, there were no significant differences between the samples. No peaks corresponding to crystalline phase of Ni metal and NiO were found due to small crystallite size and low nickel content. According to Scherrer’s equation, by using the full width at half maximum height of the main peaks at 2θ = 25.4° and 27.5°, respectively, for anatase and rutile phases, the TiO₂ anatase and rutile grain sizes of all prepared samples were around 21 and 15 nm. The results indicate that the addition of Ni salt produced insignificant changes in the primary TiO₂ particle size.

Figure 4: XRD patterns of prepared TiO₂ samples.

Figure 5 shows the morphology of the Ni-deposited titanium oxide as captured by TEM. The deposited Ni particles measuring approximately 1–3 nm were dispersed on the surface of the P25. The pH value of the slurry influences the morphology of deposited metal particles on the TiO₂ surface [28]. This study finds that the reduction rate increases as the pH value increases. However, Ni particles cannot adhere well on TiO₂ when the pH value is higher than 10. The optimal pH value for the photodeposition of Ni in our study was found to be 8 [23]. The stability of Ni-TiO₂ was confirmed by checking their TEM images after the photocatalytic reaction and regeneration procedure.

(a)

(b)

Figure 5: TEM morphology of (a) P25 and (b) 1% Ni-TiO₂.

Element composition and chemical states on the surface of prepared samples were determined by XPS high-resolution scans over the Ti 2p and Ni 2p spectra regions. Figure 6(a) shows the Ni 2p spectra of Ni-TiO₂ samples. For 0.1–1% Ni-TiO₂ samples, their spectra exhibit broad peaks due to the small amount of Ni, and indicate the existence of Ni(II) and Ni(III) in these TiO₂ particles. However, the plenty amount of Ni(0) is found on the surface of 4% Ni-TiO₂ particle. In the preparation of Ni-TiO₂ via the photodeposition process, the valence state of nickel on the TiO₂ surface should be zero because nickel ions are reduced by the photo-produced electrons from the TiO₂. The Ni 2p3/2 peaks of the samples assigned for Ni(0), Ni(II), and Ni(III) of binding energy are 852.9, 854.3, and 855.9 eV, respectively, [18–20, 23]. The compounds regarding Ni(II) and Ni(III) are major in the forms of NiO and Ni₂O₃ because the existence of Cl on the TiO₂ surface is not observed. The metal oxides could be resulted from the oxidation of small nickel particles by heating in air [23, 29]. The Ni content of 4% Ni-TiO₂ should be much more than those of other samples, and therefore partial nickel on the 4% Ni-TiO₂ are not oxidized. The relatively atomic ratios of Ni(0), Ni(II), and Ni(III) species on the 4% Ni-TiO₂ are 55 : 26 : 19, as estimated from XPS results. In Figure 6(b), Ti (2p3/2,1/2) core level spectra confirm that the Ti(IV) is indeed present in the pristine TiO₂ sample. However, the Ti 2p3/2 peak becomes broad and asymmetric with increasing Ni content. We interpreted the Ti 2p3/2 peak for the Ni-TiO₂ sample as a combination of the Ti(IV) (peak at 458.7 eV) and a Ti(III) (peak at 457.2 eV). The appearance of Ti(III) is probably due to the loss of oxygen atoms from TiO₂ during the oxidation of metallic nickel particles. Moreover, following the Ar⁺ ion etching process of 4% Ni-TiO₂, the peak intensities associated with the Ti(III) species decreased; after 90 s of etching (etching depth = 5 nm), the Ti(III) species could not be observed on the TiO₂. This shows that the Ti(III) species exists predominantly on the surface, as shown in Figure 6(b). It indicates the partial Ti(IV) species on the surface is reduced to Ti(III) as the metallic nickel is oxidized to nickel oxide.

(a)

(b)

Figure 6: (a) XPS spectra over Ni 2p (b) Ti 2p of prepared samples.

The photoluminescence emission spectra were detected for various photocatalysts, as presented in Figure 7, to elucidate the fate of e–/h⁺ pairs in the semiconductor particles (TiO₂). As anticipated, the pristine TiO₂ photocatalyst (P25) shows a broad PL emission band, which is similar to the results of the literature [30]. The P25 and Ni-TiO₂ samples exhibit similar excitonic PL emission band, demonstrating that the nickel species does not cause the new PL phenomena. The spectrum exhibits a broad emission region from 350 to 450 nm wavelengths with an excitation wavelength of 325 nm. The PL intensities of Ni-TiO₂ particles lessen with the increase in the Ni content. A small amount of Ni gives a higher PL intensity of the Ni-TiO₂ particle than P25, but the PL intensity of the Ni-TiO₂ is smaller than that of pristine TiO₂ as the Ni content is more than 1%. It indicates that Ni species in the higher concentration condition do not act as a trapping site to capture photogenerated electron from TiO₂ conduction band, but it becomes the recombination centre of electron-hole as its concentration is less than 0.5%. The excitonic PL intensity of TiO₂ decreases as the increase in particle size, which is ascribed to the decrease in the content of surface oxygen vacancy and defect with increasing particle size [11, 30]. In this work, the TiO₂ size effect on PL intensity should be not significant here due to the small difference in crystallite size between these samples (see Figure 4). Therefore, the loss in PL intensities of 4% and 1% Ni-TiO₂ results from the active sites on the TiO₂ surface are covered by the Ni species. The metal particles on the TiO₂ surface, such as Ag, Au, Pt, act as trapping sites to capture photogenerated electron from TiO₂ conduction band, separating the photogenerated electron-hole pairs [14, 16]. The Ni species on the as-synthesized Ni-TiO₂ particles seems to be the recombination sites of the photogenerated electron-hole pairs. It is probably as the metallic Ni and Ni ions could capture photogenerated holes and electrons, respectively. Thus, the recombination rate of photogenerated electrons and holes increased, leading to an increase in the PL signal. Some literatures report that the Ni dopant suppresses recombination of electron-hole pair on the TiO₂ surface [18–20]. The different phenomena observed in the former reports and this work are reasonably due to the different preparation process and Ni content. The Ni content used in the former works is 2–10 mol%, so the PL intensity of TiO₂ decreased obviously in the existence of large Ni content [18, 19]. For the above reasons, the results indicate the 0.1% Ni-TiO₂ should exhibit the smallest photocatalytic activity. However, the 0.1% Ni-TiO₂ exhibits the highest removal rate of NO under UV illumination than other samples. It reveals there should be another factors influencing its activity. The light absorbance is not the reason for good photoactivity of Ni-TiO₂ because the UV-vis diffuse reflectance spectra of P25 and 0.1% Ni-TiO₂ are the same (not shown here). Thus, the nickel species exhibits a good affinity to NO and NO₂ molecules, so the photogenerated active oxygen species on TiO₂ particles could contact molecules rapidly, resulting in the enhancement of PL intensity and removal rate on the 0.1% Ni-TiO₂.

Figure 7: Photoluminescence spectra of prepared TiO₂ samples.

4. Conclusions

In this study, the Ni-containing TiO₂ particle was successfully prepared via a photodeposition process. Characterization results revealed that the particle size, crystal structure, and light absorption were unchanged after modification with Ni salt. PL spectra identified that the small amount of Ni on TiO₂ enhances the recombination of photogenerated electrons and holes. The nickel species exhibits a good affinity to molecules, resulting in the increase in removal rate and the decrease in selectivity of NO₂ over the TiO₂. The excess Ni content on TiO₂ hinders reaction rate, due to coverage effect of nickel species on the active site on TiO₂ surface. Thus, 0.1 mol% Ni content is the proper content to prepare the highly photocatalytic material for removal of . In conclusion, this simple and energy-saving process for the production of Ni-containing photocatalysts can be applied practically for removal of .

Acknowledgment

The authors would like to thank the National Science Council of Taiwan, for financial support of this research under contracts NSC-99-2221-E-011-082.

References

A. Fujishima, T. N. Rao, and D. A. Tryk, “Titanium dioxide photocatalysis,” Journal of Photochemistry and Photobiology C, vol. 1, no. 1, pp. 1–21, 2000.

J. Yu and J. Ran, “Facile preparation and enhanced photocatalytic H₂-production activity of Cu(OH)₂ cluster modified TiO₂,” Energy and Environmental Science, vol. 4, no. 4, pp. 1364–1371, 2011.

J. Yu, Y. Hai, and M. Jaroniec, “Photocatalytic hydrogen production over CuO-modified titania,” Journal of Colloid and Interface Science, vol. 357, no. 1, pp. 223–228, 2011.

Y. Fan, G. Chen, D. Li, et al., “Highly selective deethylation of rhodamine B on TiO₂ prepared in supercritical fluids,” International Journal of Photoenergy, vol. 2012, Article ID 173865, 2012.

H. Fu, G. Shang, S. Yang, and T. Xu, “Mechanistic study of visible-light-induced photodegradation of 4-chlorophenol by () with low nitrogen concentration,” International Journal of Photoenergy, vol. 2012, Article ID 759306, 2012.

J. A. Byrne, P. A. Fernandez-Ibañez, P. S. M. Dunlop, D. M. A. Alrousan, and J. W. J. Hamilton, “Photocatalytic enhancement for solar disinfection of water: a review,” International Journal of Photoenergy, vol. 2011, Article ID 798051, 2011.

M. L. Chen and W. C. Oh, “The improved photocatalytic properties of methylene blue for V₂O₃/CNT/TiO₂ composite under visible light,” International Journal of Photoenergy, vol. 2010, Article ID 264831, 2010.

R. J. Tan, Y. H. Tseng, and C. H. Kuo, “Crystal size control of TiO₂ using experimental strategies in sol-gel process,” Micro and Nano Letters, vol. 5, no. 6, pp. 361–364, 2010.

S. Wang, L. Zhao, J. Ran, Z. Shu, G. Dai, and P. Zhai, “Effects of calcination temperatures on photocatalytic activity of ordered titanate nanoribbon/SnO₂ films fabricated during an EPD process,” International Journal of Photoenergy, vol. 2012, Article ID 472958, 2012.

S. J. Kim, N. H. Lee, H. J. Oh, S. C. Jung, W. J. Lee, and D. H. Kim, “Photocatalytic properties of nanotubular-shaped TiO₂ powders with anatase phase obtained from titanate nanotube powder through various thermal treatments,” International Journal of Photoenergy, vol. 2011, Article ID 327821, 2011.

Y. C. Hsiao and Y. H. Tseng, “Preparation of Pd-containing TiO₂ film and its photocatalytic properties,” Micro and Nano Letters, vol. 5, no. 5, pp. 317–320, 2010.

Y. H. Tseng, C. S. Kuo, C. H. Huang, and Y. Y. Li, “Preparation of visible-light-responsive nitrogen-carbon co-doped titania by chemical vapor deposition,” Zeitschrift fur Physikalische Chemie, vol. 224, no. 6, pp. 843–856, 2010.

Y. H. Tseng and C. H. Kuo, “Photocatalytic degradation of dye and using visible-light-responsive carbon-containing TiO₂,” Catalysis Today, vol. 174, no. 1, pp. 114–120, 2011.

H. W. Chen, Y. Ku, and Y. L. Kuo, “Effect of Pt/TiO₂ characteristics on temporal behavior of o-cresol decomposition by visible light-induced photocatalysis,” Water Research, vol. 41, no. 10, pp. 2069–2078, 2007.

Y. H. Tseng, C. Y. Yen, M. Y. Yen, and C. C. M. Ma, “Effects of the acid pretreated multi-walled carbon nanotubes on the photocatalytic capacity of TiO₂/multi-walled carbon nanotubes nanocomposites,” Micro and Nano Letters, vol. 5, no. 1, pp. 1–6, 2010.

C. H. Huang, I. K. Wang, Y. M. Lin, Y. H. Tseng, and C. M. Lu, “Visible light photocatalytic degradation of nitric oxides on -modified TiO₂ via sol-gel and impregnation method,” Journal of Molecular Catalysis A, vol. 316, no. 1-2, pp. 163–170, 2009.

Y. H. Tseng, Y. L. Huang, S. L. Liu, Y. M. Lin, and J. H. Huang, “Photocatalytic composite material, method for producing the same and application thereof,” Chinese Patent no. I324948, 2010

S. H. Woo, W. W. Kim, S. J. Kim, and C. K. Rhee, “Photocatalytic behaviors of transition metal ion doped TiO₂ powder synthesized by mechanical alloying,” Materials Science and Engineering A, vol. 448–451, pp. 1151–1154, 2007.

D. H. Kim, D. K. Choi, S. J. Kim, and K. S. Lee, “The effect of phase type on photocatalytic activity in transition metal doped TiO₂ nanoparticles,” Catalysis Communications, vol. 9, no. 5, pp. 654–657, 2008.

M. Dhayal, S. D. Sharma, C. Kant, K. K. Saini, and S. C. Jain, “Role of Ni doping in surface carbon removal and photo catalytic activity of nano-structured TiO₂ film,” Surface Science, vol. 602, no. 6, pp. 1149–1154, 2008.

J. Wang, S. Uma, and K. J. Klabunde, “Visible light photocatalysis in transition metal incorporated titania-silica aerogels,” Applied Catalysis B, vol. 48, no. 2, pp. 151–154, 2004.

D. Y. Wang, H. C. Lin, and C. C. Yen, “Influence of metal plasma ion implantation on photo-sensitivity of anatase TiO₂ thin films,” Thin Solid Films, vol. 515, no. 3, pp. 1047–1052, 2006.

C. S. Kuo, Y. H. Tseng, H. Y. Lin et al., “Synthesis of a CNT-grafted TiO₂ nanocatalyst and its activity triggered by a DC voltage,” Nanotechnology, vol. 18, no. 46, Article ID 465607, 2007.

J. Yu, Y. Hai, and B. Cheng, “Enhanced photocatalytic H₂-production activity of TiO₂ by Ni(OH)₂ cluster modification,” Journal of Physical Chemistry C, vol. 115, no. 11, pp. 4953–4958, 2011.

Y. H. Tseng, C. S. Kuo, C. H. Huang et al., “Visible-light-responsive nano-TiO₂ with mixed crystal lattice and its photocatalytic activity,” Nanotechnology, vol. 17, no. 10, pp. 2490–2497, 2006.

R. Atkinson, D. L. Baulch, R. A. Cox, R. F. Hampson Jr., J. A. Kerr, and A. Troe, “Evaluated kinetic and photochemical data for atmospheric chemistry: supplement III,” International Journal of Chemical Kinetics, vol. 21, no. 2, pp. 115–150, 1989.

S. Y. Treschev, P. W. Chou, Y. H. Tseng, J. B. Wang, E. V. Perevedentseva, and C. L. Cheng, “Photoactivities of the visible-light-activated mixed-phase carbon-containing titanium dioxide: the effect of carbon incorporation,” Applied Catalysis B, vol. 79, no. 1, pp. 8–16, 2008.

F. Zhang, J. Chen, X. Zhang et al., “Synthesis of titania-supported platinum catalyst: the effect of pH on morphology control and valence state during photodeposition,” Langmuir, vol. 20, no. 21, pp. 9329–9334, 2004.

H. Y. Lin, Y. F. Chen, and Y. W. Chen, “Water splitting reaction on NiO/InVO₄ under visible light irradiation,” International Journal of Hydrogen Energy, vol. 32, no. 1, pp. 86–92, 2007.

J. Liqiang, Q. Yichun, W. Baiqi et al., “Review of photoluminescence performance of nano-sized semiconductor materials and its relationships with photocatalytic activity,” Solar Energy Materials and Solar Cells, vol. 90, no. 12, pp. 1773–1787, 2006.