International Journal of Photoenergy

Volume 2014 (2014), Article ID 521209, 6 pages

http://dx.doi.org/10.1155/2014/521209

Research Article

Effect of Light-Activated Hypocrellin B on the Growth and Membrane Permeability of Gram-Negative Escherichia coli Cells

Yuan Jiang,¹ Wingnang Leung,² Qingjuan Tang,³ Hongwei Zhang,² and Chuanshan Xu2,4

¹Department of Rehabilitation Medicine, Second Affiliated Hospital, Chongqing Medical University, Chongqing 400010, China

²School of Chinese Medicine, Faculty of Medicine, The Chinese University of Hong Kong, Shatin, Hong Kong

³College of Food Science and Engineering, Ocean University of China, Qingdao 266003, China

⁴Shenzhen Research Institute, The Chinese University of Hong Kong, Shenzhen 518057, China

Received 25 February 2014; Revised 25 April 2014; Accepted 28 April 2014; Published 14 May 2014

Academic Editor: Timon Cheng-Yi Liu

Copyright © 2014 Yuan Jiang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aim. To investigate the effect of light-activated hypocrellin B on the growth and membrane permeability of Gram-negative bacteria. Methods. Escherichia coli (E. coli) as a model bacterium of Gram-negative bacteria was incubated with various concentrations of hypocrellin B for 60 min and was subsequently irradiated by blue light with wavelength of 470 nm at the dose of 12 J/cm². Colony forming units were counted and the growth inhibition rate of E. coli cells was calculated after light-activated hypocrellin B. Membrane permeability was measured using flow cytometry and confocal laser scanning microscopy (CLSM) with propidium iodide (PI) staining. Bacterial morphology was observed using transmission electron microscopy (TEM). Reactive oxygen species in bacterial cells were measured using flow cytometry with DCFH-DA staining. Results. Significant growth inhibition rate of E. coli cells was observed after photodynamic action of hypocrellin B. Remarkable damage to the ultrastructure of E. coli was also observed by TEM. Flow cytometry and CLSM observation showed that light-activated hypocrellin B markedly increased membrane permeability of E. coli. Flow cytometry showed the intracellular ROS increase in E. coli treated by photodynamic action of hypocrellin B. Conclusion. Light-activated hypocrellin B caused intracellular ROS increase and structural damages and inhibited the growth of Gram-negative E. coli cells.

1. Introduction

Bacterial infection is a threat to human beings and the problem can be exacerbated by the emergence of resistant strains through the use of antibiotics. Thus, there is an urgent need to explore alternative strategies for combating pathogenic bacteria.

Photodynamic inactivation (PDI) is a promising method to eradicate pathogenic bacteria because PDI kills pathogenic bacteria via cytotoxic reactive oxygen species (ROS) produced by the photosensitive drug after light irradiation. The nonspecific damages of ROS on bacteria are unlikely to cause the resistance of bacteria to PDI [1–4]. Therefore, PDI draws our interest to explore its role in combating bacterial infections.

In our previous study we investigated photodynamic activity of some naturally occurring photosensitive compounds from traditional Chinese herbs [5–7]. Hypocrellin B is one of the most frequently explored photosensitive drugs from traditional Chinese herb Hypocrella bambuase [8, 9]. Our studies observed that light-activated hypocrellin B could produce intracellular ROS level, which can cause significant cell death and damage to Gram-positive bacteria Staphylococcus aureus [5, 6, 10]. However, growing evidence shows that Gram-negative bacteria are more resistant to PDI than Gram-positive bacteria [11]. To kill Gram-negative bacteria many photosensitizers were investigated, including methylene blue, toluidine blue, phthalocyanines, chlorins, porphyrins, chlorophyll, bacteriochlorophyll, fullerenes, and their nanoparticles [12]. In the present study, we chose E. coli as a Gram-negative model bacterium and focused on observing the effect of light-activated hypocrellin B on the growth and membrane permeability of Gram-negative bacteria.

2. Materials and Methods

2.1. Bacterial Strain

E. coli strain DH5α was a generous gift from Dr. Wu Junfeng, P2 Lab of Children’s Hospital of Chongqing Medical University, China. After E. coli cells were cultured overnight at 37°C in Luria-Bertani (LB) medium at 200 rpm, E. coli suspension ( cfu/mL, 100 μL) was spread over LB-Agar plates and then incubated for 16 h at 37°C in a humidified atmosphere containing 5% CO₂.

2.2. Colony Forming Unit Assay

E. coli cells growing in exponential phase were harvested by centrifugation (at 4000 rpm, 5 min). Bacterial suspension (10⁸ cfu/mL) was prepared and incubated with different concentrations of hypocrellin B (0, 5, 10, 15, 20, and 25 μM) in 6-well plate. After incubation for 60 min in the dark at room temperature, bacterial suspension was irradiated by blue light from a novel LED light source with the wavelength of 470 nm and the power density of 60 mW/cm². After light irradiation, bacteria cells were serially diluted 10-fold in PBS. Each sample (50 μL) was spread on LB-Agar plates and incubated for 16 h at 37°C in the dark. The colony forming units (CFU) were counted and the inhibition rate of bacterial growth was calculated by the following formula: the growth inhibition rate (%) = (CFU of the control group − CFU of the treatment group)/CFU of the control group 100%.

All experiments were randomly divided into 4 groups.

Group A: Sham Control. The bacteria in the control were treated by neither hypocrellin B nor light irradiation.

Group B: Hypocrellin B Treatment Alone. The bacteria in the group were treated by hypocrellin B without light irradiation.

Group C: Light Irradiation Alone. The bacteria in the group were irradiated by LED light without hypocrellin B treatment.

Group D: Light-Activated Hypocrellin B. The bacterial cells in this group were incubated by various concentrations of hypocrellin B and irradiated by LED light with the energy density of 12 J/cm².

2.3. Membrane Permeability Measurement

Bacterial cells were incubated with hypocrellin B (25 μM) for 60 min in the dark at 37°C and were then exposed to blue light with light dose of 12 J/cm². After light irradiation, bacterial cells were immediately harvested and incubated with propidium iodide (PI, 10 µg/mL) for 20 min in the dark. Membrane permeability of the stained cells was observed immediately using a confocal laser scanning microscopy (CLSM) and the images were recorded using a colorful charge-coupled device camera. At the meantime, bacterial cells were also analyzed using flow cytometry (SE, Becton Dickinson) with the excitation setting at 488 nm.

2.4. Bacterial Morphology

After light activation of hypocrellin B, the bacterial cells were immediately fixed, postfixed, dehydrated, and embedded in Epon 812 (Electron Microscopy Sciences, Fort Washington, PA) and were cut into ultrathin sections (100 nm) to be stained in uranyl acetate and lead citrate. Ultrastructural changes were observed using an electron microscopy (H-600; Hitachi, Japan).

2.5. ROS Measurement

After light-activation of hypocrellin B, bacterial cells were immediately harvested and incubated with 2,7-dichlorodihydrofluorescein diacetate (DCFH-DA, 10 μM, Beyotime, Jiangshu, China) for 20 min at 37°C in the dark and were then analyzed using a flow cytometry (SE, Becton Dickinson) with the excitation setting at 488 nm.

2.6. Statistical Analysis

All data expressed as mean ± SD were statistically analyzed using SPSS 18.0 for Windows. The differences between groups were analyzed using one-way ANOVA (analysis of variance). A value < 0.05 was considered as significant difference.

3. Results

3.1. Colony Forming Unit Assay

Colony forming units of E. coli were investigated after treatment of light-activated hypocrellin B and the growth inhibition rate of E. coli cells was calculated. Figure 1 showed a significant growth inhibition rate of E. coli cells treated by light-activated hypocrellin B in hypocrellin concentration-dependent manner (). No significant difference was shown in the cells treated by hypocrellin alone or light irradiation alone ().

Figure 1: Inhibition of E. coli induced by photodynamic treatment of hypocrellin B. E. coli cells were incubated with different concentrations of hypocrellin B (0, 5, 10, 15, 20, and 25 μM) and irradiated by blue light with wavelength of 470 nm and energy density of 12 J/cm².

3.2. Membrane Permeability

The membrane permeability of E. coli cells was observed using a CLSM and flow cytometry with PI staining. Flow cytometry showed the positive rate of cells stained by PI was 3.71% in the sham group, 2.24% in the hypocrellin B treatment alone group, and 8.04% in the light irradiation group. The positive rate of cells remarkably increased up to 69.24% in the light-activated hypocrellin treatment group (Figure 2). CLSM also observed that more red fluorescence was found in E. coli cells treated by light-activated hypocrellin B than those of the control cells including sham control, hypocrellin treatment alone, and light irradiation alone. No marked difference was found between sham control, hypocrellin treatment alone, and light irradiation alone (Figure 3).

(a)

(b)

(c)

(d)

Figure 2: Membrane permeability of E. coli cells was measured using flow cytometry with PI staining after photodynamic treatment of hypocrellin B (25 μM), in which the energy density of blue light was 12 J/cm². (a) Sham control; (b) hypocrellin B treatment alone; (c) blue light irradiation alone; and (d) photodynamic treatment of hypocrellin B.

(a)

(b)

(c)

(d)

Figure 3: Membrane permeability of E. coli cells was measured using confocal laser scanning microscopy with PI staining after photodynamic treatment of hypocrellin B (25 μM), in which the energy density of blue light was 12 J/cm². (a) Sham control; (b) hypocrellin B treatment alone; (c) blue light irradiation alone; and (d) photodynamic treatment of hypocrellin B.

3.3. Bacterial Morphology

The ultrastructural changes of bacteria were observed using TEM. Intact and smooth cells were observed in sham control, hypocrellin B treatment alone, and light irradiation alone (Figures 4(a), 4(b), and 4(c)), whereas partial cytoplasm leakage was found in cells treated by light-activated hypocrellin B (Figure 4(d)).

(a)

(b)

(c)

(d)

Figure 4: The ultrastructural morphology of E. coli cells was observed under a transmission electron microscopy (TEM) after photodynamic action of hypocrellin B (25 μM), in which the energy density of blue light was 12 J/cm². (a) Sham control; (b) hypocrellin B treatment alone; (c) blue light irradiation alone; and (d) photodynamic treatment of hypocrellin B (×30000).

3.4. Reactive Oxygen Species

The level of reactive oxygen species (ROS) in E. coli cells was analyzed using flow cytometry with DCFH-DA staining. Flow cytometry showed the spectral shift of the fluorescence curves to the right after light activation of hypocrellin B, indicating significant increase of the intracellular ROS level in E. coli (Figure 5).

Figure 5: Reactive oxygen species (ROS) in E. coli cells were analyzed using flow cytometry with DCFH-DA staining after treatment of hypocrellin B (25 μM) and blue light irradiation (12 J/cm²). A: sham control; B: hypocrellin B treatment alone; C: blue light irradiation alone; and D: photodynamic treatment of hypocrellin B.

4. Discussion

Traditional Chinese herbs have a long history as folk medicine for treating infectious diseases. Growing evidences have shown that many active compounds isolated from traditional Chinese herbs are capable of producing anti-infection and anti-inflammation effect [13, 14]. Hypocrellin B as an active component of a traditional Chinese herb Hypocrella bambuase has been confirmed to have significant activities against pathogenic microbes and malignant tumors [5, 6, 10, 11, 15–17]. Our recent study showed that hypocrellin B as a naturally occurring photosensitizer could cause significant damage to Gram-positive bacteria S. aureus cells as well as cancer cells while it was activated by blue light [5, 6, 10]. Our preliminary study also observed that E. coli cells were more resistant to photodynamic action of hypocrellin B than S. aureus. Thus, in the present study, we chose higher concentrations of hypocrellin B (0, 5, 10, 15, 20, and 25 μM) and higher energy density of blue light (12 J/cm²) to investigate the effect of light-activated hypocrellin B on E. coli cells. Colony forming unit assay showed hypocrellin B had significantly photodynamic inhibition on E. coli cells.

Our previous studies reported that blue light could activate hypocrellin B to increase the intracellular ROS level in tumor cells and Gram-positive bacteria strain S. aureus [5, 6, 10]. In the present study flow cytometry with DCFH-DA staining also showed the ROS increase in Gram-negative bacteria strain E. coli cells. Our TEM observed notable cytoplasm leakage in E. coli cells after the treatment of light-activated hypocrellin B. Flow cytometry with PI staining showed that the positive rate of cells stained by PI increased remarkably up to 69.24% in the light-activated hypocrellin treatment group and confocal laser scanning microscopy also found more red fluorescence of PI in cells after light-activated hypocrellin B, demonstrating that light-activated hypocrellin B increased membrane permeability of the treated E. coli cells. The results were consistent with our past report on S. aureus treated by photodynamic action of hypocrellin B [10]. These findings demonstrated that nonspecific damage of ROS generated by photosensitization of hypocrellin B to bacterial cells was an important cause of damage in the morphological structure of bacteria and in their general inhibition.

In summary, our study found that Gram-negative bacterial strain E. coli cells were more resistant to photodynamic treatment of hypocrellin B than Gram-positive bacteria, but light-activated hypocrellin B could also increase the ROS level in E. coli cells to cause damage of bacterial structure and inhibit growth of Gram-negative bacteria while higher concentrations of hypocrellin B and higher energy density of light irradiation were used in photodynamic treatment.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the GRF Grant from Hong Kong RGC (476912), the Direct Grant from the Chinese University of Hong Kong (4053026), and Innovation and Technology Fund of Shenzhen (CXZZ20120619150627260). The authors express their sincere thanks to Mr. Eric Pun, Dr. Wu Jufeng, Mr. Liangku Wong, and Mr. Liumiao for their helpful assistance.

References

T. Maisch, J. Baier, B. Franz et al., “The role of singlet oxygen and oxygen concentration in photodynamic inactivation of bacteria,” Proceedings of the National Academy of Sciences of the United States of America, vol. 104, no. 17, pp. 7223–7228, 2007.

H. M. Tang, M. R. Hamblin, and C. M. N. Yow, “A comparative in vitro photoinactivation study of clinical isolates of multidrug-resistant pathogens,” Journal of Infection and Chemotherapy, vol. 13, no. 2, pp. 87–91, 2007.

M. Wainwright, “Photodynamic antimicrobial chemotherapy (PACT),” Journal of Antimicrobial Chemotherapy, vol. 42, no. 1, pp. 13–28, 1998.

K. Sahu, M. Sharma, H. Bansal, A. Dube, and P. K. Gupta, “Topical photodynamic treatment with poly-l-lysine-chlorin p6 conjugate improves wound healing by reducing hyperinflammatory response in Pseudomonas aeruginosa-infected wounds of mice,” Lasers in Medical Science, vol. 28, no. 2, pp. 465–471, 2013.

Y. Jiang, A. W. N. Leung, J. Y. Xiang, and C. S. Xu, “Blue light-activated hypocrellin B damages ovarian cancer cells,” Laser Physics, vol. 22, no. 1, pp. 300–305, 2012.

Y. Jiang, X. S. Xia, A. W. N. Leung, J. Y. Xiang, and C. S. Xu, “Apoptosis of breast cancer cells induced by hypocrellin B under light-emitting diode irradiation,” Photodiagnosis and Photodynamic Therapy, vol. 9, no. 4, pp. 337–343, 2012.

X. B. Zeng, A. W. N. Leung, X. S. Xiac et al., “Effect of blue light radiation on curcumin-induced cell death of breast cancer cells,” Laser Physics, vol. 20, no. 6, pp. 1500–1503, 2010.

W. Nenghui and Z. Zhiyi, “Relationship between photosensitizing activities and chemical structure of hypocrellin A and B,” Journal of Photochemistry and Photobiology B: Biology, vol. 14, no. 3, pp. 207–217, 1992.

G. Ma, S. I. Khan, M. R. Jacob et al., “Antimicrobial and antileishmanial activities of hypocrellins A and B,” Antimicrobial Agents and Chemotherapy, vol. 48, no. 11, pp. 4450–4452, 2004.

Y. Jiang, A. W. Leung, X. Wang, H. Zhang, and C. Xu, “Inactivation of Staphylococcus aureus by photodynamic action of hypocrellin B,” Photodiagnosis and Photodynamic Therapy, vol. 10, no. 4, pp. 600–606, 2013.

J. Walther, M. J. Bröcker, D. Wätzlich et al., “Protochlorophyllide: a new photosensitizer for the photodynamic inactivation of Gram-positive and Gram-negative bacteria,” FEMS Microbiology Letters, vol. 290, no. 2, pp. 156–163, 2009.

F. F. Sperandio, Y. Y. Huang, and M. R. Hamblin, “Antimicrobial photodynamic therapy to kill gram-negative bacteria,” Recent Patents on Anti-Infective Drug Discovery, vol. 8, no. 2, pp. 108–120, 2013.

F. Ma, Y. Chen, J. Li et al., “Screening test for anti-Helicobacter pylori activity of traditional Chinese herbal medicines,” World Journal of Gastroenterology, vol. 16, no. 44, pp. 5629–5634, 2010.

J. Shao, H. Cheng, C. Wang, and Y. Wang, “A phytoanticipin derivativie, sodium houttuyfonate, induces in vitro synergistic effects with levofloxacin against biofilm formation by Pseudomonas aeruginosa,” Molecules, vol. 17, no. 9, pp. 11242–11254, 2012.

S. M. Ali, S. K. Chee, G. Y. Yuen, and M. Olivo, “Hypericin and hypocrellin induced apoptosis in human mucosal carcinoma cells,” Journal of Photochemistry and Photobiology B: Biology, vol. 65, no. 1, pp. 59–73, 2002.

C. Yu, S. Xu, S. Chen, M. Zhang, and T. Shen, “Investigation of photobleaching of hypocrellin B in non-polar organic solvent and in liposome suspension,” Journal of Photochemistry and Photobiology B: Biology, vol. 68, no. 2-3, pp. 73–78, 2002.

S. Xu, S. Chen, M. Zhang, and T. Shen, “Hypocrellin derivative with improvements of red absorption and active oxygen species generation,” Bioorganic and Medicinal Chemistry Letters, vol. 14, no. 6, pp. 1499–1501, 2004.