International Journal of Photoenergy
Volume 2017 (2017), Article ID 3029101, 1 page
https://doi.org/10.1155/2017/3029101

Corrigendum

Corrigendum to “Effects of Ion Beam Irradiation on Nanoscale Cooper-Pair Insulators”

Srdjan Milosavljević,¹ Djordje Lazarević,² Koviljka Stanković,³ Milić Pejović,⁴ and Miloš Vujisić³

¹Institute of Electrical Engineering “Nikola Tesla”, 11000 Belgrade, Serbia
²Institute of Nuclear Sciences “Vinca”, 11000 Belgrade, Serbia
³Faculty of Electrical Engineering, University of Belgrade, 11000 Belgrade, Serbia
⁴Faculty of Electronic Engineering, University of Niš, 18000 Niš, Serbia

Correspondence should be addressed to Miloš Vujisić; vujsa@ikomline.net

Received 15 June 2017; Accepted 28 June 2017; Published 22 November 2017

Copyright © 2017 Srdjan Milosavljević et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The article titled “Effects of Ion Beam Irradiation on Nanoscale Cooper-Pair Insulators” [1] discusses a similar topic to that of the following article: Lazarević, Đ. R., Vujisić, M. L., Stanković, K. Đ., Dolićanin, E. Ć., & Osmokrović, P. V. (2012). Radiation hardness of indium oxide films in the Cooper-pair insulator state. Nuclear Technology and Radiation Protection, 27(1), 40–43 [2]. The authors apologize for not citing this article and not discussing its relationship with their work.

The articles both investigated radiation hardness in the Cooper-pair insulator state, using indium oxide film. The numerical simulation method and the description of this method are the same, that is, the commonly used approach of the Monte Carlo simulation of charged particle transport through matter, as well as some of the wording in the introduction and discussion, but the results of the articles differ.

The thickness of film was 10/20 nm in the previous work and 5/15 nm in the present work. The previous work in Nucl. Technol. Radiat. used radiation fields of 10 keV boron ions and 50 keV iron ions, while the article in Int. J. Photoenergy built on that work and used beams of 10 keV protons, 10 keV alpha particles, 0.1 MeV iron ions, 0.1 MeV phosphorus ions, 0.1 MeV boron ions, and 0.1 MeV arsenic ions. The linear energy transfer and nonionizing energy loss of the lighter ions differ significantly from those of the heavy boron and iron ions. For the boron and iron ions, additional simulations show that higher energies are more damaging. Notable energy loss to phononic excitations is shown for proton and alpha particle beams in the Int. J. Photoenergy article, as well as a mechanism for a possible influence of energy lost to phonons on insulator properties. The parametric shift shown in Figure 6 in the Int. J. Photoenergy article is similar to Figure 1 in Nucl. Technol. Radiat., but more accurate.

In addition, the following disclosure should be made:

Conflicts of Interest

There is a conflict of interest between the authors of the article and its handling editor since they share the same affiliation and have common publications. This corrigendum is recommended by the journal’s Editorial Board members.

References

S. Milosavljević, D. Lazarević, K. Stanković, M. Pejović, and M. Vujisić, “Effects of Ion Beam Irradiation on Nanoscale Cooper-Pair Insulators,” International Journal of Photoenergy, vol. 2013, Article ID 236823, 8 pages, 2013.

Đ. R. Lazarević, M. L. Vujisić, K. Đ. Stanković, E. Ć. Dolićanin, and P. V. Osmokrović, “Radiation hardness of indium oxide films in the Cooper-pair insulator state,” Nuclear Technology and Radiation Protection, vol. 27, no. 1, pp. 40–43, 2012.