International Journal of Photoenergy
Volume 2018 (2018), Article ID 8502730, 1 page
https://doi.org/10.1155/2018/8502730

Corrigendum

Corrigendum to “Application of DC-AC Hybrid Grid and Solar Photovoltaic Generation with Battery Storage Using Smart Grid”

Shoaib Rauf and Nasrullah Khan

Department of Electrical Engineering, Comsats Institute of Information Technology, Islamabad/UOGHH, Gujrat, Pakistan

Correspondence should be addressed to Shoaib Rauf; engr.shoaib@uog.edu.pk

Received 17 February 2018; Accepted 6 March 2018; Published 1 April 2018

Copyright © 2018 Shoaib Rauf and Nasrullah Khan. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Application of DC-AC Hybrid Grid and Solar Photovoltaic Generation with Battery Storage Using Smart Grid” [1], there was a mistake in the authors’ affiliation. The corrected affiliation is shown above.

References

S. Rauf and N. Khan, “Application of DC-AC hybrid grid and solar photovoltaic generation with battery storage using smart grid,” International Journal of Photoenergy, vol. 2017, Article ID 6736928, 16 pages, 2017.