International Journal of PeptidesVolume 2012 (2012), Article ID 621329, 4 pagesdoi:10.1155/2012/621329

Research Article

Identification of Histoplasma-Specific Peptides in Human Urine

David K. Crockett, Mark M. Kushnir, Joann L. Cloud, Edward R. Ashwood, and Alan L. Rockwood

ARUP Institute for Clinical & Experimental Pathology, Department of Pathology, University of Utah, Salt Lake City, UT 84108, USA

Received 22 December 2011; Accepted 26 January 2012

Academic Editor: Suhn Hee Kim

Copyright © 2012 David K. Crockett et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Histoplasmosis is a severe dimorphic fungus infection, which is often difficult to diagnose due to similarity in symptoms to other diseases and lack of specific diagnostic tests. Urine samples from histoplasma-antigen-positive patients and appropriate controls were prepared using various sample preparation strategies including immunoenrichment, ultrafiltration, high-abundant protein depletion, deglycosylation, reverse-phase fractions, and digest using various enzymes. Samples were then analyzed by nanospray tandem mass spectrometry. Accurate mass TOF scans underwent molecular feature extraction and statistical analysis for unique disease makers, and acquired MS/MS data were searched against known human and histoplasma proteins. In human urine, some 52 peptides from 37 Histoplasma proteins were identified with high confidence. This is the first report of identification of a large number of Histoplasma-specific peptides from immunoassay-positive patient samples using tandem mass spectrometry and bioinformatics techniques. These findings may lead to novel diagnostic markers for histoplasmosis in human urine.

1. Introduction

Infection and disease caused by pathogenic and opportunistic fungi has been increasing over the past decade. One widespread and severe fungal disease, histoplasmosis, is caused by the dimorphic fungus Histoplasma capsulatum. The H. capsulatum mycelial phase may be inhaled by mammals to cause pulmonary disease [1]. Disease progression then occurs as the fungus transforms to yeast phase and disseminates to other parts of the body [2]. While most infections are mild, it can lead to rapid progression and life threatening symptoms for individuals with weak immune systems such as elderly, infants, HIV, and cancer patients or transplant recipients [3]. Furthermore, once infected, a latent infection may also be reactivated. Current laboratory testing for histoplasmosis does not provide adequate clinical sensitivity and specificity for accurate diagnosis of this infection. Antigen cross reactivity with other fungi species can be especially troublesome [4, 5].

Although progress has been made in understanding the pathogen-host interaction [6, 7], there are currently no known biomarkers of histoplasma infection, whereby molecular or chemical structures have been clearly defined. Incomplete genomes and/or databases for either protein or nonprotein compounds from Histoplasma have been a significant limitation of the work to date. This limitation has been improved due to recent efforts of the Human Microbiome Project hosted by the Genome Center at Washington University and the Broad Institute [8, 9]. The resulting genome and protein entries into public databases (such as NCBI) allow proteomics-based research to now move forward in a meaningful way. This study utilized comparative LC-MS/MS analysis of urine specimens from infected and noninfected patients to identify several potential protein and peptide markers specific to H. capsulatum infection in human urine.

2. Materials and Methods

Samples utilized in the study were unused aliquots of human urine samples referred for clinical laboratory testing at ARUP Laboratories (Salt Lake City, UT). Initial experiments included samples () positive for histoplasma antigen (HAG) retrieved from samples submitted for routine clinical testing using an existing polyclonal enzyme immunoassay developed and validated by ARUP Laboratories using analyte-specific reagents (ImmunoMycologics, Inc., Norman, OK). Negative control samples () were urine samples from individuals without histoplasma antigenuria. The study was approved by the Institutional Review Board of the University of Utah.

The following methodologies were used alone or in combination for sample preparation including immuno-enrichment (Immuno-Mycologics, Inc., Norman, OK), glyco-enrichment, SDS-PAGE gel separation, fractionation by molecular weight using ultrafiltration (Amicon Ultra-4, Millipore, Billerica, MA), high-abundant protein depletion (Agilent Technologies, Santa Clara, CA, Part #5185–5984) [10], deglycosylation (EDEGLY, Sigma-Aldrich, St. Louis, MO), reverse-phase fractions, and digestion using trypsin, glutamic C, or proteinase K (Princeton Separations, Adelphia, NJ). Experiments for discovery and validation of Histoplasma urine peptides were performed using nanoESI—tandem mass spectrometry (Agilent 6510 QTOF and AB/Sciex 4000 QTrap). Data was acquired (MassHunter 3.0 and Analyst 1.5) using replicate TOF scans as well as Auto MS/MS or information-dependent acquisition (IDA) MS/MS experiments. Replicate analysis was also performed using mass range partitions for precursor isolation of 400–600, 600–800, and 800–1600 m/z.

Accurate mass TOF scans were processed using MassHunter software (Agilent) for molecular feature extraction by retention time, mass-to-charge ratio, and integrated peak area. Files with molecular features (.mhd file format) corresponding to each analyzed sample were then uploaded into GeneSpringMS (Agilent) for further statistical analysis consisting of statistical filtering by normalized peak abundances, analysis of variance (ANOVA) and fold change (>2) between disease and control groups, significance testing, and unsupervised condition tree clustering to identify candidate features that were statistically significant and unique to the disease data set. Acquired MS/MS data files were searched using Mascot or Spectrum Mill (Agilent) against a combined human/histoplasma protein electronic fasta database (April 2011 NCBI download), and the results were evaluated.

Lastly, pooled samples in multiple independent experiments () and additional individual samples (disease, and control, ) were used to validate potential biomarkers of HAG. Targeted MS/MS and extracted ion chromatograms (EIC) were also used to manually verify peptide targets. Potential nonhuman peptides identified in these experiments were further confirmed against the full NCBI nonredundant database using protein-protein BLAST (pBLAST).

3. Results and Discussion

Although high-quality spectra were acquired during initial experiments, early search results were frustrated as electronic databases contained less than 250 protein entries for Histoplasma. Experiments during 2006 and 2007 identified only 5 potential peptides belonging to Histoplasma. Later experiments (2008-2009) yielded more promising results, but only an additional 14 peptides confidently identified. To better evaluate the newly added fungal sequences recently made public, all original data files (2006–2010) were combined and the MS/MS search repeated using the latest available NCBI electronic protein fasta entries (19,178). Importantly, this increased number of protein entries led to an approximate 10-fold increase in the number of high-quality spectra matching Histoplasma-specific peptides. Further independent experiments were performed to confirm initial findings. This remarkable growth of electronic fasta database entries for Histoplasma proteins over the last 7 years, as available for download at NCBI is shown in Figure 1.

Figure 1: Rapid growth of electronic fasta database entries available for download at NCBI for Histoplasma proteins over last 7 years.

Histoplasma-specific peptides identified in this study are summarized in Table 1, where entries are ranked by the number of independent observations and BLAST score indicating “uniqueness” of the peptides. In total, 52 peptides were identified with a high degree of confidence, which belongs to 37 known and predicted Histoplasma proteins. Measuring one or more of these markers in patient samples may be potentially useful for diagnostic testing of histoplasmosis.

Table 1: Histoplasma-specific peptides identified from infected patient urine.

NCBI
Protein
Peptide
BLAST
ind.

accession
description
sequence
E-value
obs.†

154275270
polyubiquitin
LDVESADTIDAVK
0.006
5

TLSDYNIQKESTLHLVLR
3e−08
4

MQIFVK
1107
4

IQDKEGIPPDQQRLIFAGK
2e−09
3

225554709
leucyl-tRNA synthetase
IDLLAVDK
141
4

TVPSIFSSPWPDPLLSSR
2e−08
3

NSSTISSPPR
3.8
3

240281880
conserved hypothetical protein
NPKSRPQHLQTATTNGR
4e−07
3

SLEILRQR
78
3

240277865
DUF500 and SH3 domain-containing protein
NAEAAGAASTKGVAGVFSYSK
3e−09
3

IGDRTGIFPSNYVDASNL
3e−08
3

240280678
5-oxoprolinase
GITGEYIHILVKPDMEK
5e−08
3

150412285
mannosyl-oligosaccharide 1,2-alpha- mannosidase
NHTSISVQDRDPPIR
9e−06
3

150408441
ADP-ribosylation factor
ITHSWVLQSLTRRAW
2e−06
3

239613150
predicted protein
KQTNYVSGLFRNSRT
2e−05
3

240276397
histone transcription regulator slm9
AISDLSWSPDGK
0.019
3

SWSPDG
2675
3

150406597
hypothetical protein HCAG_00002
GWDQTGSNGANL
0.019
3

240273359
glycogen debranching enzyme
RLGLSALIRE
3.8
3

150408639
predicted protein
NLLTCMSR
24
3

240274939
ubiquitin-activating enzyme
NSFVNLALPFFSFIDPIASPMDK
1e−13
2

LNNSEPR
535
3

240281152
conserved hypothetical protein
RQFVDSLSEGLGEQGKG
2e−06
3

239614048
TdiA
RGEHKYDPVVTLQPFGNKA
2e−9
2

240273135
xaa-proaminopeptidase
SKHQHFVGLSFDTISST
5e−07
2

DIEFLIPIQCSILSERR
5e−08
2

LDALRVPLTHLLAVR
5e−05
2

240276009
priB
RSKERSWLMLFVYDRS
1e−07
2

150411212
methionine sulfoxide reductase msrB
YFDSIPGAVTRKEDR
1e−05
2

239611175
predicted protein
TVIVITRRSLEPAR
3e−04
2

225555719
SAM and PH domain-containing protein
NWMRELMLARALK
1e−04
2

348156
YPS-3 yeast phase-specific protein
PAPFCGTCNPISGK
1e−04
2

150409767
predicted protein
KLDGAVPFKVQTRM
1e−04
2

239609148
phenol monooxygenase
MKPFTEEETIK
0.026
2

150407363
predicted protein
KCPTLSPENKN
0.084
2

154280483
predicted protein
LLFVGSNSAPGR
0.084
2

TLPDDHILQEAK
0.011
2

150411980
conserved hypothetical protein
KLNMRVARWRE
0.011
2

225561657
conserved hypothetical protein
ISITDPANDR
1.2
2

239613737
cysteine synthase B
RVATSILRA
36
2

240275767
conserved hypothetical protein
LSIQATLIR
20
2

LSIQA
75910
2

240276203
DNA binding protein URE-B1
AENTAESPESEDVKVK
9e−06
1

ADPFATTPSKPR0
0.026
1

150414072
predicted protein
MFYFDSEFVGPPR
1e−04
1

LLWGGAQQER
0.66
1

150412949
conserved hypothetical protein
RFSIKSCLFPHAKK
1e−04
1

150412547
predicted protein
RFLQPGDLVVLKS
0.003
1

150413459
predicted protein
KLSTLVGALATRN
0.019
1

240274117
pre-mRNA splicing factor
RVAEEMRCKV
0.27
1

154282923
2-isopropylmalate synthase
ACTLAAEPDR
1.6
1

239610650
glycerol:H+ symporter
KAVLASEPRT
5.2
1

†Number of times peptide(s) identified in independent experiments.

4. Conclusions

Diagnosis and management of invasive fungal disease remains a major health problem, both in this country and worldwide. The ability to definitively diagnose histoplasmosis has become even more important due to the increasing number of patients with weakened immune systems who are susceptible to this life threatening disease, yet the laboratory tests for this disease are far from adequate.

Obviously, since fungal proteins and peptides are not expected to be present in urine from noninfected patients, studies similar to this represent a rich source of potential and novel targets for clinical diagnostic testing. The multiple and independent experiments with exhaustive sample preparation reported here have resulted in a unique data set representing the urine proteome associated with histoplasma antigenuria. Importantly, data files have been uploaded to the Proteome Commons Tranche repository (http://proteomecommons.org/) as a Histoplasma group project and are publically available as of May 2011.

Acknowledgments

This paper was supported by the ARUP Institute for Clinical and Experimental Pathology. The authors are grateful to Immuno-Mycologics, Inc., Norman, OK, for supplying source material of histoplasma culture, antibody enrichment fractions, and enzyme immunoassay reagents and to Katie Ludwig for assisting with sample aliquots and de-identification.

References

M. Durkin, S. Kohler, C. Schnizlein-Bick et al., “Chronic infection and reactivation in a pulmonary challenge model of histoplasmosis,” The Journal of Infectious Diseases, vol. 183, no. 12, pp. 1822–1824, 2001.

M. R. Chang, C. L. Taira, A. M. M. Paniago, D. L. Taira, R. V. Cunha, and B. Wanke, “Study of 30 cases of histoplasmosis observed in Mato Grosso do Sul State, Brazil,” Revista do Instituto de Medicina Tropical de Sao Paulo, vol. 49, no. 1, pp. 37–39, 2007.

A. Rachid, L. S. Rezende, S. F. de Moura, P. C. Loffy, and F. L. Magalhães, “A case study of disseminated histoplasmosis linked to common variable immunodeficiency,” The Brazilian Journal of Infectious Diseases, vol. 7, no. 4, pp. 268–272, 2003.

J. L. Cloud, S. K. Bauman, B. P. Neary, K. G. Ludwig, and E. R. Ashwood, “Performance characteristics of a polyclonal enzyme immunoassay for the quantitation of Histoplasma antigen in human urine samples,” American Journal of Clinical Pathology, vol. 128, no. 1, pp. 18–22, 2007.

M. O. Xavier, A. C. Pasqualotto, I. C. E. Cardoso, and L. C. Severo, “Cross-reactivity of Paracoccidioides brasiliensis, Histoplasma capsulatum, and Cryptococcus species in the commercial platelia Aspergillus enzyme immunoassay,” Clinical and Vaccine Immunology, vol. 16, no. 1, pp. 132–133, 2009.

E. D. Holbrook, J. A. Edwards, B. H. Youseff, and C. A. Rappleye, “Definition of the extracellular proteome of pathogenic-phase Histoplasma capsulatum,” Journal of Proteome Research, vol. 10, no. 4, pp. 1929–1943, 2011.

M. S. Winters, Q. Chan, J. A. Caruso, and G. S. Deepe, “Metallomic analysis of macrophages infected with Histoplasma capsulatum reveals a fundamental role for zinc in host defenses,” The Journal of Infectious Diseases, vol. 202, no. 7, pp. 1136–1145, 2010.

L. M. Proctor, “The human microbiome project in 2011 and beyond,” Cell Host and Microbe, vol. 10, no. 4, pp. 287–291, 2011.

C. A. Cuomo and B. W. Birren, “The fungal genome initiative and lessons learned from genome sequencing,” Methods in Enzymology, vol. 470, pp. 833–855, 2010.

M. M. Kushnir, P. Mrozinski, A. L. Rockwood, and D. K. Crockett, “A depletion strategy for improved detection of human proteins from urine,” Journal of Biomolecular Techniques, vol. 20, no. 2, pp. 101–108, 2009.