Interdisciplinary Perspectives on Infectious Diseases
Volume 2016 (2016), Article ID 4801509, 1 page
http://dx.doi.org/10.1155/2016/4801509

Retraction

Retracted: Contamination of Hospital Water Supplies in Gilan, Iran, with Legionella pneumophila, Escherichia coli, and Pseudomonas aeruginosa

Interdisciplinary Perspectives on Infectious Diseases

Received 29 September 2016; Accepted 29 September 2016

Copyright © 2016 Interdisciplinary Perspectives on Infectious Diseases. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Interdisciplinary Perspectives on Infectious Diseases has retracted the article titled “Contamination of Hospital Water Supplies in Gilan, Iran, with Legionella pneumophila, Escherichia coli, and Pseudomonas aeruginosa” [1]. The article was found to contain a substantial amount of material, without citation, from previously published articles.

References

M. Ahmadi Jalali Moghadam, H. Honarmand, and S. Asfaram Meshginshahr, “Contamination of hospital water supplies in gilan, Iran, with Legionella pneumophila, Escherichia coli, and Pseudomonas aeruginosa,” Interdisciplinary Perspectives on Infectious Diseases, vol. 2015, Article ID 809842, 7 pages, 2015.