ISRN CorrosionVolume 2012 (2012), Article ID 932403, 8 pagesdoi:10.5402/2012/932403

Research Article

Acid Corrosion Inhibition of Steel by Lamotrigine

B. S. Shylesha,¹ T. V. Venkatesha,¹ B. M. Praveen,² and S. E. Nataraja¹

¹Department of Chemistry, School of Chemical Sciences, Kuvempu University, Karnataka 577 451, India²Department of Chemistry, Srinivas School of Engineering, Mukka, Mangalore 575 021, India

Received 27 August 2012; Accepted 13 September 2012

Academic Editors: G. Bereket, C. Gu, C.-H. Hsu, I. Obot, and E. Stupnisek-Lisac

Copyright © 2012 B. S. Shylesha et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Corrosion inhibition effect of lamotrigine on steel in 1.0 M HCl and 0.5 M H₂SO₄ was studied by techniques like weight loss, polarisation, and electrochemical impedance spectroscopy. Results indicated that lamotrigine is more competent in HCl than in H₂SO₄ and is justified by scanning electron micrographs. Protection efficiency increased with the concentration of inhibitor and decreased with temperature. Adsorption study revealed the comprehensive adsorption of lamotrigine molecules on steel surface.

1. Introduction

HCl and H₂SO₄ acids are widely used in processes like acid pickling, acid cleaning, acid descaling, and oil-well acidizing [1, 2], where the intention is to remove surface scales and deposits keeping the base metal intact. But acids, after the removal of scales and deposits, invariably attack the precious metal leading to deleterious consequences of acid corrosion. Use of inhibitors is the most practical method to combat this. Inhibitors are organic molecules which possess π-electrons, hetero atoms like nitrogen, sulphur, and oxygen [3, 4]. These inhibitors generally act by adsorbing on the metal surface forming a thin protective film. In acid media, electron-rich center gets protonated to become cation, electrostatically binds to cathodic sites of metal thereby hinders cathodic reaction. Electron-rich spots of unprotonated molecule finds anodic reactive sites thus reduce anodic reaction. Thus, a heterocyclic organic molecule comprehensively acts. Recently, considerable amount of effort has been devoted to develop novel and efficient corrosion inhibitors. It is found that molecules containing both N and S can claim excellent inhibition compared with those containing only N or S [5, 6]. bis thiadiazole derivatives [7], thiosemicarbazide derivatives [8], Benzimidazole derivatives [9], and purines [10] have been verified to be efficient inhibitors for steel.

Generally acid pickling is carried out at high temperature [11, 12]. In that case efficiency of the inhibitor generally goes down. Hence, it is important to find inhibitor which is fair at elevated temperatures. The study by Tang et al. [13], Singh and Quraishi [7] showed that thiadiazoles retain inhibition efficiency up to 45°C, bis-thiadiazoles up to 65°C, respectively, and was attributed to chemisorption of inhibitor molecule on steel surface. Oguzie et al. argue that inhibitors containing sulphur heteroatom favor chemisorption whereas nitrogen favour physisorption, on the surface of steel, in acidic media [14].

This made us choose lamotrigine which has potential characters to perform well at elevated temperature. It has five nitrogen, two chlorine atoms, and two aromatic rings. These heteroatoms and π electrons could be active centres for adsorption [15]. Lamotrigine being a small molecule, ease electronic interactions of inhibitor molecule with steel and impede steric effects [16, 17]. Moreover, lamotrigine has a fairly planar in-structure which facilitates it’s adsorption on the metal surface [18, 19].

Present study was intended to ascertain the ability of lamotrigine to protect steel at different temperatures in HCl and H₂SO₄. Further to check the concordance in results by weight loss, Tafel and EIS techniques. Adsorption and thermodynamic factors were to be assessed to establish mechanism of adsorption. Scanning electron microscopic (SEM) images were to be referred to confirm the findings.

2. Experimental

2.1. Materials

Steel coupons having compositions 0.04% C, 0.35% Mn, 0.022% P, 0.036% S, and the rest being Fe (99.55%) were used for all experiments. Coupons of dimension 4 cm × 2.5 cm × 0.05 cm were used for mass loss method and coupons with an exposed area of 1 cm² (rest is covered with araldite resin) with 2.5 cm long stem were used for polarization and EIS methods. All coupons were abraded by using emery papers (grade no.: 220, 400, 600, 800, and 1200), washed thoroughly with distilled water, degreased with acetone, and dried at room temperature. The corrosive media 1.0 M HCl solutions were prepared using AR grade HCl and double distilled water.

Lamotrigine, also known as Lamictal (IUPAC name: 6-(2,3-dichlorophenyl)-1,2,4-triazine-3,5-diamine), is an anticonvulsant drug used in the treatment of epilepsy and bipolar disorder. It is also used as an adjunct in treating depression, though this is considered off-label usage [20]. The structures of lamotrigine are presented in Figure 1.

(a)

(b)

Figure 1: (a) 2D and (b) 3D Structure of Lamotrigine.

2.2. Methods

2.2.1. Weight Loss Measurements

Weight loss measurements were performed by immersing steel specimen in glass beaker containing 100 cm³ of corrosive media (1.0 M HCl and 0.5 M H₂SO₄) without and with different concentrations of inhibitor. After an immersion period of 4 h, specimen was taken out and washed well with distilled water, dried, weighed accurately using digital balance (accuracy: ±0.1 mg, model no.: AA-2200, manufactured by Anamed Instruments Pvt. Limited, MIDC, Navi Mumbai 400706, India). To assess the effect of temperature on the inhibition efficiency of lamotrigine, experiments were carried out at 30, 40, 50, and 60°C. A digital thermostat (±0.5°C accuracy) was used for maintaining temperature. All corrosion experiments were carried out in aerated as well as static condition. Each measurement was repeated thrice for reproducibility, and an average value was reported.

2.2.2. Electrochemical Measurements

The Electrochemical measurements were carried out in CHI 660C electrochemical analyzer (manufactured by CH Instruments, Austin, USA) at 30°C. The cell consists of three electrodes, namely, the working electrode (steel), counter electrode (platinum), and reference electrode (SCE). An immersion time of 30 minutes was given to allow the stabilization of the open circuit potential (OCP) potential. Each experiment was repeated for three times and an average value was reported. All reported potentials were with respect to SCE. For Tafel measurements, potential-current curves were scanned from −0.2 V to +0.2 V with respect to open circuit potential (OCP) at a constant sweep rate of 0.01 V sec⁻¹. Corrosion parameters such as corrosion potential (), corrosion current (), cathodic Tafel slope (), and anodic Tafel slope () were calculated from the software installed in the instrument.

Impedance measurements were carried out by using AC signal with amplitude of 5 mV at OCP in the frequency range of 100 KHz to 10 mHz. The impedance data were fitted to most appropriate equivalent circuit by using ZSimp Win 3.21 software. The impedance parameters were obtained from Nyquist plots.

2.2.3. Surface Morphology Studies

Scanning electron micrographs of steel surface immersed in 1.0 M HCl and 0.5 M H₂SO₄ containing 2.5 mM lamotrigine, at 30°C, were taken using scanning electron microscope (JEOL, JSM 6400).

3. Results and Discussion

3.1. Mass Loss Studies

The values of percentage protection efficiency (%) obtained from weight loss experiment for the corrosion of steel in 1.0 M HCl and 0.5 M H₂SO₄ in presence of different concentration of lamotrigine are given in Table 1. The % was calculated from the following relationship: where and are weight loss of steel in absence and presence of inhibitor.

Table 1: Corrosion parameters obtained from weight loss measurements for steel in 1.0 M HCl and 0.5 M H₂SO4 in presence of various concentrations of lamotrigine.

Corrosivemedium
Inhibitorconcentration
% at different temperature

mM
30°C
40°C
50°C
60°C

HCl
Blank
—
—
—
—

0.5
74.8
65.3
45.0
34.7

1.0
92.2
87.1
75.4
63.2

2.5
95.5
92.0
86.0
80.0

5.0
96.1
94.2
89.2
85.5

H₂SO₄
0.5
66.8
57.8
47.6
34.0

1.0
80.1
71.4
65.0
54.7

2.5
89.4
86..3
81.0
76.5

5.0
93.0
91.8
88.0
83.6

3.1.1. Effect of Inhibitor Concentration

The variation of % with concentration of lamotrigine, at 30°C is shown in Figure 2. It is evident from figure that lamotrigine has remarkable protection ability, both in HCl and H₂SO₄ media. It showed appreciable raise in % with concentration upto 2.5 mM for both HCl and H₂SO₄, thereafter, a marginal rise. At any selected temperature, in HCl or in H₂SO₄, % increased with inhibitor concentration which suggests magnitude of adsorption and surface coverage by inhibitor increases with concentration of inhibitor [21].

Figure 2: Variation of inhibition efficiency with inhibitor concentration, at 30°C.

3.1.2. Effect of Temperature

Variation of % with temperature is shown in Figure 3 which indicated that %, for both acids, decreased with the increase of temperature. This suggests desorption of previously adsorbed inhibitor molecules, from the steel surface, at elevated temperature indicating physical adsorption of inhibitor molecules [22, 23]. At any temperature, % stands in the order HCl > H₂SO₄.

(a)

(b)

Figure 3: Variation of % with temperature for steel in 1.0 M HCl and 0.5 M H₂SO₄ in presence of different concentration of inhibitor.

3.2. Polarization Studies

The polarization behavior of steel immersed in 1.0 M HCl and 0.5 M H₂SO₄ at 30°C in absence and presence of different concentration of lamotrigine is shown in Figure 4. Electrochemical parameters like corrosion potential (), corrosion current density (), cathodic Tafel slope (), anodic Tafel slope (), and percentage inhibition efficiency according to polarisation studies (%) are listed in Table 2. The % was calculated from following relation: where and are corrosion current densities in absence and presence of inhibitor, respectively. Results mainly point out the following: (a) decreased with increase in concentration of inhibitor in the order HCl < H₂SO₄ which reiterates lamotrigine is more effectual in HCl. (b) value was shifted towards less negative (noble) potential. It has been reported that [24] a compound can be classified as an anodic or a cathodic-type inhibitor on the basis of shift in value. If displacement in is greater than 85 mV, towards anode or cathode with reference to blank, then an inhibitor is categorized as either anodic or cathodic type inhibitor. Otherwise inhibitor is treated as mixed type. In our study, maximum displacement in value was around 65 mV indicating lamotrigine is a mixed type inhibitor, in both acids. (c) and values have changed with respect to inhibitor free solution, for both acids which reiterate that lamotrigine is mixed type inhibitor. Obtained % values are in agreement with % values.

Table 2: Polarisation and impedance parameters for steel in 1.0 M HCl and 0.5 M H₂SO₄ in presence of different concentration of lamotrigine.

Corrosive media
Polarisation
EIS

Inhibitor concentration (mM)
versus SCE (mV)
 (A cm⁻²)
(mV dec⁻¹)
(mV dec⁻¹)
%
( Ω cm²)
(F cm⁻²)
%

HCl
Blank
−0.484
170.0
126
86
—
112
62
—

0.5
−0.460
43.2
112
76
74.5
418
27
73.2

1.0
−0.469
11.4
102
151
93.2
1670
12
93.1

2.5
−0.467
7.0
112
142
95.8
2941
8.8
96.2

5.0
−0.460
5.1
112
107
97.0
3350
9.9
96.6

H₂SO₄
Blank
−0.489
155.6
123
88
—
72
71
—

0.5
−0.480
49.2
115
77
68.3
222
56
67.5

1.0
−0.478
30.4
94
65
80.4
590
22
87.5

2.5
−0.459
20.3
114
134
86.9
1112
16
93.5

5.0
−0.463
9.8
110
116
93.7
1602
10
95.5

(a)

(b)

Figure 4: Tafel plots for steel in 1.0 M HCl and 0.5 M H₂SO₄ containing different concentration of Lamotrigine, at 30°C.

3.3. EIS Studies

Electrochemical impedance spectra for steel in 1.0 M HCl and 0.5 M H₂SO₄ without and with different concentration of lamotrigine inhibitor at 30°C are presented as Nyquist plot in Figure 5. The diameter of semicircle increased with inhibitor concentration and is significant in HCl, reflects the effectiveness of inhibitor [25]. An equivalent circuit model was proposed to fit and analyze EIS data (Figure 6) [10]. EIS parameters calculated in accordance with equivalent circuit are listed in Table 2. Popova et al. [26] said that sum of charge transfer resistance () and adsorption resistance () is equivalent to polarisation resistance (). Inhibition efficiency (%) was calculated using following equation: where and are polarisation resistance values in presence and absence of inhibitor. Table 2 revealed that values increased and capacitance values decreased with inhibitor concentration for both the acids. Decrease in capacitance, which can result from a decrease in local dielectric constant and/or an increase in the thickness of electrical double layer, suggests that the inhibitor molecules act by adsorption at metal/solution interface [27]. This indicated the formation of a surface film on steel. Obtained % are in good agreement with % and %.

(a)

(b)

Figure 5: Nyquist plot for steel in 1.0 M HCl and 0.5 M H₂SO₄ in presence of different concentrations of lamotrigine inhibitor at 30°C.

Figure 6: Equivalent circuit used to interpret the results of EIS.

3.4. Surface Morphology Study

SEM images were referred to check the protection of steel surface by inhibitor. SEM images of steel plate immersed in 1.0 M HCl and 0.5 M H₂SO₄ in absence and presence of 2.5 mM concentration of lamotrigine, at 30°C, are given in Figure 7. SEM image of steel in 1.0 M HCl or 0.5 M H₂SO₄ exhibit rough surface with innumerable number of pits, voids, and channels and has an etched surface of various indentation depths. These are essentially due to washing away of soluble corrosion products from metal surface. Whitish/gray spots seen at few locations are corrosion products. This reveals the severity of corrosion caused by 1.0 M HCl and 0.5 M H₂SO₄. SEM image of steel in H₂SO₄ protected from lamotrigine shows better surface conditions with few imperfections of smaller depth with no white spots. SEM image of steel in HCl protected from lamotrigine was least corroded and has retained smooth and glassy surface. Better surface conditions stands in the order HCl > H₂SO₄.

(a)

(b)

(c)

(d)

Figure 7: SEM visuals of steel in 1.0 M HCl and 0.5 M H₂SO₄ in absence and presence of 2.5 mM lamotrigine. (a) absence of inhibitor in 1.0 M HCl, (b) 0.5 M H₂SO₄, (c) 2.5 mM lamotrigine in HCl, and (d) 2.5 mM lamotrigine in H₂SO₄.

3.5. Adsorption Isotherm

Adsorption isotherms give enough information about the interaction of inhibitor molecules with steel. Surface coverage () defined as %/100 (Table 1) was tested by fitting to various adsorption isotherms like Langmuir, Temkin, Freundlich and Flory-Huggins. However, the best fit was obtained with Langmuir isotherm. According to Langmuir’s isotherm, surface coverage is related to inhibitor concentration () by the following equation [28]: where is equilibrium constant for adsorption process. The plot of versus yields a straight line (shown in Figure 8) with regression coefficient close to 1 suggests that adsorption obeys Langmuir isotherm. The values can be calculated from line intercept on axis and is related to standard free energy change of adsorption () as follows [29]: where is molar gas constant (8.314 J K⁻¹ ), is absolute temperature (K), and value 55.5 is concentration of water in mol dm⁻³ in solution. Obtained and values are listed in Table 3. The negative and high value ensures spontaneity of adsorption, stability of the adsorbed film and hence better inhibition efficiency [30]. In our study, negative and high values stood in the order HCl > H₂SO₄, meaning Ziprasidone is more efficient in HCl. value of −20 kJ mol⁻¹ or lower indicates electrostatic interaction (physisorption), while those around −40 kJ mol⁻¹ or higher are generally accepted to form a coordinate type of bond (chemisorption) [31]. In our study, value of is around −33 kJ mol⁻¹, for both HCl and H₂SO₄, which is an intermediate, indicates that adsorption involves mixture of physisorption and chemisorption.

Table 3: Adsorption parameters for the adsorption of lamotrigine on steel in 1.0 M HCl and 0.5 M H₂SO₄ solutions at different temperature.

Corrosive media
Temperature (°C)
(×10³)
  (k mol⁻¹)

HCl
30
9.8
−33.2

40
6.2
−32.9

50
2.3
−31.6

60
1.4
−31.2

H₂SO₄
30
6.4
−32.1

40
3.6
−31.7

50
2.3
−31.5

60
1.1
−30.7

(a)  

(b)

Figure 8: Langmuir isotherm for the adsorption of lamotrigine on steel in 1.0 M HCl and 0.5 M H₂SO₄.

4. Conclusion

(i)Lamotrigine is an effective inhibitor both in HCl and H₂SO₄ but stands slightly better in HCl. This was explicitly supported by all methods employed in the present study.(ii)Inhibition efficiency increased with concentration and decreased with temperature (iii)Lamotrigine is a mixed type inhibitor.(iv)Adsorption and thermodynamic study showed mixture of chemisorption and physisorption of inhibitor.

Acknowledgments

The authors are grateful to the authorities of Department of Chemistry, Kuvempu University, Karnataka, India for providing lab facilities. The authors also thank Department of Science and Technology, Government of India, New Delhi, (DST: Project Sanction no. 100/IFD/1924/2008-2009 dated 2.07.2008) for providing instrumental facilities.

References

L. R. Chauhan and G. Gunasekaran, “Corrosion inhibition of mild steel by plant extract in dilute HCl medium,” Corrosion Science, vol. 49, no. 3, pp. 1143–1161, 2007.

K. F. Khaled, “Application of electrochemical frequency modulation for monitoring corrosion and corrosion inhibition of iron by some indole derivatives in molar hydrochloric acid,” Materials Chemistry and Physics, vol. 112, no. 1, pp. 290–300, 2008.

M. K. Pavithra, T. V. Venkatesha, K. Vathsala, and K. O. Nayana, “Synergistic effect of halide ions on improving corrosion inhibition behaviour of benzisothiozole-3-piperizine hydrochloride on mild steel in 0.5M H₂SO₄ medium,” Corrosion Science, vol. 52, no. 11, pp. 3811–3819, 2010.

I. Ahamad, R. Prasad, and M. A. Quraishi, “Adsorption and inhibitive properties of some new Mannich bases of Isatin derivatives on corrosion of mild steel in acidic media,” Corrosion Science, vol. 52, no. 4, pp. 1472–1481, 2010.

O. Benali, L. Larabi, M. Traisnel, L. Gengembre, and Y. Harek, “Electrochemical, theoretical and XPS studies of 2-mercapto-1-methylimidazole adsorption on carbon steel in 1 M HClO₄,” Applied Surface Science, vol. 253, no. 14, pp. 6130–6139, 2007.

Y. Abboud, A. Abourriche, T. Saffaj et al., “2,3-Quinoxalinedione as a novel corrosion inhibitor for mild steel in 1 M HCl,” Materials Chemistry and Physics, vol. 105, no. 1, pp. 1–5, 2007.

A. K. Singh and M. A. Quraishi, “The effect of some bis-thiadiazole derivatives on the corrosion of mild steel in hydrochloric acid,” Corrosion Science, vol. 52, no. 4, pp. 1373–1385, 2010.

G. E. Badr, “The role of some thiosemicarbazide derivatives as corrosion inhibitors for C-steel in acidic media,” Corrosion Science, vol. 51, no. 11, pp. 2529–2536, 2009.

J. Aljourani, M. A. Golozar, and K. Raeissi, “The inhibition of carbon steel corrosion in hydrochloric and sulfuric acid media using some benzimidazole derivatives,” Materials Chemistry and Physics, vol. 121, no. 1-2, pp. 320–325, 2010.

Y. Yan, W. Li, L. Cai, and B. Hou, “Electrochemical and quantum chemical study of purines as corrosion inhibitors for mild steel in 1 M HCl solution,” Electrochimica Acta, vol. 53, no. 20, pp. 5953–5960, 2008.

A. Popova, E. Sokolova, S. Raicheva, and M. Christov, “AC and DC study of the temperature effect on mild steel corrosion in acid media in the presence of benzimidazole derivatives,” Corrosion Science, vol. 45, no. 1, pp. 33–58, 2003.

G. Schmitt, “Application of inhibitors for acid media,” British Corrosion Journal, vol. 19, no. 4, pp. 165–176, 1984.

Y. Tang, X. Yang, W. Yang, R. Wan, Y. Chen, and X. Yin, “A preliminary investigation of corrosion inhibition of mild steel in 0.5 M H₂SO₄ by 2-amino-5-(n-pyridyl)-1,3,4-thiadiazole: polarization, EIS and molecular dynamics simulations,” Corrosion Science, vol. 52, no. 5, pp. 1801–1808, 2010.

E. E. Oguzie, Y. Li, and F. H. Wang, “Corrosion inhibition and adsorption behavior of methionine on mild steel in sulfuric acid and synergistic effect of iodide ion,” Journal of Collid and Interface Science, vol. 310, no. 1, pp. 90–98, 2007.

I. Ahamad and M. A. Quraishi, “Bis (benzimidazol-2-yl) disulphide: an efficient water soluble inhibitor for corrosion of mild steel in acid media,” Corrosion Science, vol. 51, no. 9, pp. 2006–2013, 2009.

J. H. Henríquez-Romána, L. Padilla-Campos, M. A. P. Páeza, et al., “The influence of aniline and its derivatives on the corrosion behaviour of copper in acid solution: a theoretical approach,” Journal of Molecular Structure: THEOCHEM, vol. 757, no. 1–3, pp. 1–10, 2005.

J. H. Henrrnquez-Roman, M. Sancy, M. A. Paez et al., “The influence of aniline and its derivatives on the corrosion behaviour of copper in acid solution,” Journal of Solid State Electrochemistry, vol. 9, no. 7, pp. 504–511, 2005.

A. K. Singh and M. A. Quraishi, “The effect of some bis-thiadiazole derivatives on the corrosion of mild steel in hydrochloric acid,” Corrosion Science, vol. 52, no. 4, pp. 1373–1385, 2010.

R. V. Saliyan and A. V. Adhikari, “Corrosion inhibition of mild steel in acid media by quinolinyl thiopropano hydrazone,” Indian Journal of Chemical Technology, vol. 16, no. 2, pp. 162–174, 2009.

http://www.drugbank.com/

A. K. Singh and M. A. Quraishi, “Effect of Cefazolin on the corrosion of mild steel in HCl solution,” Corrosion Science, vol. 52, no. 1, pp. 152–160, 2010.

S. E. Nataraja, T. V. Venkatesha, and H. C. Tandon, “Computational and experimental evaluation of the acid corrosion inhibition of steel by tacrine,” Corrosion Science, vol. 60, pp. 214–223, 2012.

E. E. Ebenso, “Inhibition of aluminium (AA3105) Corrosion in HCl by acetamide and thiourea,” Nigerian Corrosion Journal, vol. 1, no. 1, pp. 29–44, 1998.

E. S. Ferreira, C. Giancomelli, F. C. Giacomelli, and A. Spinelli, “Evaluation of the inhibitor effect of l-ascorbic acid on the corrosion of mild steel,” Materials Chemistry and Physics, vol. 83, no. 1, pp. 129–134, 2004.

A. V. Shanbhag, T. V. Venkatesha, R. A. Prabhu, R. G. Kalkhambkar, and G. M. Kulkarni, “Corrosion inhibition of mild steel in acidic medium using hydrazide derivatives,” Journal of Applied Electrochemistry, vol. 38, no. 3, pp. 279–287, 2008.

A. Popova, S. Raicheva, E. Sokolova, and M. Christov, “Frequency dispersion of the interfacial impedance at mild steel corrosion in acid media in the presence of benzimidazole derivatives,” Langmuir, vol. 12, no. 8, pp. 2083–2089, 1996.

R. A. Prabhu, T. V. Venkatesha, A. V. Shanbhag, G. M. Kulkarni, and R. G. Kalkhambkar, “Inhibition effects of some Schiff's bases on the corrosion of mild steel in hydrochloric acid solution,” Corrosion Science, vol. 50, no. 12, pp. 3356–3362, 2008.

F. Bentiss, M. Lebrini, and M. Lagrenée, “Thermodynamic characterization of metal dissolution and inhibitor adsorption processes in mild steel/2,5-bis(n-thienyl)-1,3,4-thiadiazoles/ hydrochloric acid system,” Corrosion Science, vol. 47, no. 12, pp. 2915–2931, 2005.

E. Machnikova, K. H. Whitmire, and N. Hackerman, “Corrosion inhibition of carbon steel in hydrochloric acid by furan derivatives,” Electrochimica Acta, vol. 53, no. 20, pp. 6024–6032, 2008.

R. Solmaz, G. Kardas, B. Yazıcı, and M. Erbil, “Adsorption and corrosion inhibitive properties of 2-amino-5-mercapto-1,3,4-thiadiazole on mild steel in hydrochloric acid media,” Colloids and Surfaces A, vol. 312, no. 1, pp. 7–17, 2008.

O. Benali, L. Larabi, M. Traisnel, L. Gengembre, and Y. Harek, “Electrochemical, theoretical and XPS studies of 2-mercapto-1-methylimidazole adsorption on carbon steel in 1 M HClO₄,” Applied Surface Science, vol. 253, no. 14, pp. 6130–6139, 2007.