ISRN Analytical ChemistryVolume 2013 (2013), Article ID 209518, 9 pageshttp://dx.doi.org/10.1155/2013/209518

Research Article

Spectrophotometric Determination of Some Non-Sedating Antihistamines Using Erythrosine B

Michael E. El-Kommos, Samia M. El-Gizawy, Noha N. Atia, and Noha M. Hosny

Department of Pharmaceutical Analytical Chemistry, Faculty of Pharmacy, Assiut University, Assiut 71526, Egypt

Received 9 April 2013; Accepted 12 May 2013

Academic Editors: A. Garcia Asuero, E. T. Haupt, B. K. Jena, J. B. MacMillan, and A. Senthil Kumar

Copyright © 2013 Michael E. El-Kommos et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A simple and sensitive spectrophotometric method has been developed for the determination of cetirizine (I), ebastine (II), fexofenadine (III), ketotifen (IV), and loratadine (V) based on ion-pair complex formation with erythrosine B. The pink color of the produced complex was measured at 550 nm without solvent extraction. Appropriate conditions were established by studying the color reaction between erythrosine B and the studied drugs to obtain the maximum sensitivity. Beer-Lambert's law is obeyed in the concentration ranges 1–7, 1–8, and 1–6 g/mL for (I, IV), (II, III), and (V), respectively. The method was validated according to ICH guidelines. The suggested method is applicable for the determination of the five investigated drugs in bulk and pharmaceutical dosage forms with excellent recoveries.

1. Introduction

In 1937, the first H1 antihistamine (thymo-ethyl-diethylamine) was synthesized. However, because of its weak activity and high toxicity, this compound was not used. Clinically useful H1 antihistamines such as phenbenzamine, pyrilamine, and diphenhydramine were introduced in the 1940s. Currently, H1 antihistamines constitute the second most commonly used class of medications after antibiotics. The older first-generation antihistamines are associated with troublesome sedative and antimuscarinic effects and are often termed “sedating antihistamines.” The newer generations of antihistamines, which are essentially devoid of these effects, are correspondingly termed “non-sedating antihistamines.”

Non-sedating antihistamines are of potential value in the management of allergic rhinitis in which they relieve nasal and conjunctival itching, sneezing, and rhinorrhoea. They are also useful in the treatment of acute and chronic urticaria [1].

Non-sedating antihistamines down regulate allergic inflammation directly through the H1-receptor by interfering with histamine action at H1-receptors on sensory neurons and small blood vessels. They also decrease the antigen presentation, expression of pro-inflammatory cytokines and cell adhesion molecules, and chemotaxis. In a concentration-dependent manner, they inhibit mast cell activation and histamine release [2].

Second-generation non-sedating antihistamines investigated are cetirizine (CTZ), ebastine (EBS), ketotifen (KET), and loratadine (LOR), while Fexofenadine (FXD) is one of the third-generation drugs. Their chemical structures are given in Figure 1.

Figure 1: Chemical structures of the investigated drugs.

The studied drugs, CTZ, EBS, FXD, KET, and LOR are available in cheap generic forms, and they are considered over-the-counter (OTC) drugs and used without prescription with very low or no sedating effect.

Many procedures were described for quantitative determination of CTZ, EBS, FEX, KET, and LOR in the literature. Among these methods are liquid chromatography (HPLC) [3–8], gas chromatography (GC) [9–12], electrochemical [13–17], spectrophotometric (derivative-spectrophotometry, formation of ion-pair complexes with methyl orange, bromocresol blue and eosin, and charge transfer with DDQ) [18–23], and fluorimetric methods [19, 22, 24–27].

In the present study, CTZ, EBS, FXD, KET, and LOR were determined through formation of ion-pair complex with erythrosine B (Figure 2), as acidic dye without extraction.

Figure 2: Chemical structure of erythrosine B.

Erythrosine B is the disodium salt of 2,4,5,7-tetraiodofluorescein, primarily used for food coloring and was used for spectrofluorimetric determination of imipramine [28].

The proposed method provides a rapid and sensitive procedure for the analysis of the studied drugs in pure and in pharmaceutical formulations. The proposed method provides an inexpensive tool for determination of the studied drugs in quality control laboratories especially in developing countries where the cost is the main concern.

2. Experimental

2.1. Apparatus

(i)Spectrophotometric measurements were carried out using a Shimadzu UV-1601 PC UV-Visible spectrophotometer (Tokyo, Japan) with 1 cm glass cells.(ii)Jenway 3505 pH meter (UK) was set to check pH values of acetate buffer solutions (pH 3.3; 0.2 M).

2.2. Materials and Reagents

(i)CTZ HCl was kindly supplied by Egyptian International Pharmaceutical Industries Company E.I.P.I.Co. (10th of Ramadan city, Egypt).(ii)EBS was kindly supplied by Global Napi Pharmaceutical Company (Giza, Egypt).(iii)FXD HCl and LOR were kindly supplied by Amoun pharmaceutical company (Obour, Egypt).(iv)KET fumarate was kindly supplied by Novartis pharmaceutical company (Cairo, Egypt).(v)Erythrosine B (Market Harborough Leicestershire, UK), 0.15% solution in distilled water, was used.(vi)Acetate buffer (pH 3.3; 0.2 M) was prepared from acetic acid and sodium hydroxide [29].(vii)All other chemicals and reagents used were of analytical grade.

2.3. Pharmaceutical Formulations

All pharmaceutical formulations were obtained from the Egyptian market as follows:(i)Epirizine tablets (labeled to contain 10 mg CTZ HCl per tablet);(ii)Evastine tablets (labeled to contain 10 mg EBS per tablet);(iii)Allerfen tablets (labeled to contain 60 mg FXD HCl per tablet);(iv)Zaditen tablets (labeled to contain 1 mg KET fumarate per tablet);(v)Mosedine tablets (labeled to contain 10 mg LOR per tablet).

2.4. Preparation of Standard Solutions

Stock standard solutions were prepared to contain 1 mg/mL by dissolving 50.0 mg of each drug in 25 mL methanol, and then the volumes were completed to 50 mL with the same solvent.

The working solutions were prepared by appropriate dilution of the stock solutions with methanol.

2.5. General Procedure

One milliliter of the working standard or sample solution of CTZ, EBS, FXD, KET, or LOR was transferred to 10 mL volumetric flask. Also, 0.45 mL of erythrosine B (0.15% w/v) was added, then 1 mL of acetate buffer. The contents were left for 9 minutes at room temperature. Then, the mixture was diluted with distilled water, and the absorbance was measured at 550 nm for all drugs against a reagent blank prepared in the same manner.

2.6. Construction of Calibration Curves

Transfer different aliquots of standard solutions equivalent to 0.01–0.07, 0.01–0.08, and 0.01–0.06 mg of (I, IV), (II, III), and (V), respectively, to 10 mL volumetric flasks. Then, the assay was completed as under general procedure.

3. Procedure for Tablets

Accurately weighed powder samples obtained from 30 tablets, equivalent to 25 mg of each drug, were suspended in methanol, and then the volumes were completed to the mark with the same solvent in 25 mL calibrated flasks, filtered and the first portion of the filtrate was rejected. Then, the assay was completed as under general procedure.

4. Method Validation

Typical analytical performance characteristics for the validation of procedures according to ICH Q2 guidelines were described in this study, including specificity, linearity, limit of detection, limit of quantification, precision, accuracy, recovery, and robustness [30].

4.1. Specificity

To assess the specificity of the method, the effect of diluents, excipients, and additives commonly used in pharmaceutical formulations such as lactose, titanium dioxide, starch, cellulose, and microcrystalline cellulose was studied.

4.2. Linearity

Linearity was determined either by plotting absorbance versus concentration or from linear regression equation , where is the absorbance of the ion-pair complex solution, is the slope, is the intercept, and is the concentration of the drug.

4.3. Limits of Detection (LOD) and Quantification (LOQ)

LOD and LOQ were calculated as 3.3 r/S and 10 r/S, respectively, where is the standard deviation of y-intercept of the regression equation and is the slope of the calibration curve.

4.4. Accuracy

To determine the accuracy of the proposed method, three levels of drug concentrations (low, medium, and high) were prepared from stock solutions and analyzed ().

4.5. Precision

Intra-day precision of the proposed method was tested by replicate analysis of three separate solutions of the working standard of CTZ, EBS, FXD, KET, and LOR at three different concentration levels: low (2 μg/mL), middle (4 μg/mL), and high (6 μg/mL). This study was repeated for three days to determine the inter-day precision ().

4.6. Recovery

The recovery of the proposed method was determined using the standard addition technique, by adding a known amount of standard at three different levels to the pre-analyzed sample.

4.7. Robustness

The robustness of the proposed method was determined by studying the effect of minor changes on the absorbance of the formed complex: the pH of the media, buffer concentration, reaction time, and volume and concentration of the reagent on the method performance.

5. Results and Discussion

5.1. Absorption Spectra

The five studied drugs react with erythrosine B through an ion-pair salt formation, forming a pink chromophore with at 550 nm (Figure 3).

Figure 3: Absorption spectra of ion-pair complexes of CTZ, EBS, FXD, KET, and LOR (6 μg/mL) with erythrosine B.

5.2. Optimum Reaction Conditions for Complex Formation

To optimize the assay parameters, the effects of pH, reaction time, effect of temperature, erythrosine B concentration and volume, order of addition of reactants, and the effect of solvent were studied.

5.2.1. Effect of pH

The procedure was carried out in the presence of various buffers such as phosphate, acetate, borate, and potassium hydrogen phthalate-HCl buffers. Acetate buffer was the best one giving the highest absorbance. Various concentrations of acetate buffer (0.05–0.3 M) were also tried. It was found that the ion-pair formation was optimized using 0.2 M for all drugs. At pH 3.7 precipitation occurred; therefore acetate buffer in the pH range (2.8–3.6) was studied; the maximum color intensity was observed by using acetate buffer of pH 3.3, 0.2 M (Figures 4 and 5).

Figure 4: Effect of pH on the reaction of the studied drugs (6 μg/mL) with erythrosine B.

Figure 5: Effect of buffer concentration on the reaction of the studied drugs (6 μg/mL) with erythrosine B.

5.2.2. Effect of Reaction Time

The effect of time (Figure 6) and temperature on the developed reaction was judged based on the observation of complete color development which remained stable for one day. The optimum reaction time was studied from 0.0 to 14.0 min. High temperature caused turbidity of the solution. It was observed that absorbance reached the maximum in 9 min at 25°C (room temperature).

Figure 6: Effect of reaction time on the ion-pair complexation of the studied drugs (6 μg/mL) with erythrosine B.

5.2.3. Effect of Erythrosine B Concentration and Volume

Different volumes (0.4–0.52 mL) and various concentrations of erythrosine B (0.05%–0.225% w/v) were added to the studied drugs. Higher dye concentrations caused turbidity of the solution. It was found that the ion-pair formation was optimized using 0.45 mL of 0.15% w/v erythrosine B for all drugs (Figures 7 and 8).

Figure 7: Effect of erythrosine B volume on the ion-pair complexation of the studied drugs (6 μg/mL) with erythrosine B.

Figure 8: Effect of erythrosine B concentration on ion-pair complexation of the studied drugs (6 μg/mL) with erythrosine B.

5.2.4. Effect of Solvent

n-Butanol, ethanol, methanol, chloroform, dichloroethane, acetone, and distilled water were studied as diluting solvents. The maximum color intensity and highest absorbance values were observed with distilled water.

5.2.5. Effect of Order of Addition of Reactants

The studied orders of addition of reactants are summarized as shown in Table 1.

Table 1: The studied orders of addition of reactants.

Order of addition
(nm)
Absorbance at

Drug—buffer—dye
546
0.647

Drug—dye—buffer
550
0.776

Dye—drug—buffer
544
0.637

Dye—buffer—drug
543
0.602

EBS (6 μg/mL) was used as a representative example.

It was found that the most favorable sequence is drug—dye—buffer for all the studied drugs to attain the highest color intensity and stability.

5.2.6. Stability Time

Absorbances of all formed complexes are stable for at least 2.5 h after final dilution for all the studied drugs.

5.2.7. Stoichiometric Ratio

Job’s method of continuous variations [31] was employed using equimolar ( M) standard solutions of CTZ, FXD, KET, LOR, and ( M) of EBS with erythrosine B ( and  M, resp.). A series of solutions were prepared in which the total volume of drugs and erythrosine B was kept at 5 mL then diluted to volume in 10 mL calibrated flask with distilled water following the general procedure. The absorbance was measured at the optimum wavelength (550 nm).

The molar ratio of drug to dye in the ion-pair complex was found to be 1 : 2 (Figure 9).

Figure 9: Continuous variation plot for CTZ as a representative example with erythrosine B.

5.3. Validation of the Developed Method

5.3.1. Linearity, Detection and Quantitation Limits

Under the described experimental conditions, standard calibration curves for CTZ, EBS, FXD, KET, and LOR with erythrosine B were constructed by plotting absorbance against concentration (Figure 10).

Figure 10: Calibration curves of the ion-pair complexes of the studied drugs with erythrosine B.

Conformity with Beer-Lambert’s law was evident in the concentration range of the final solution cited in Table 2. The linear regression equation, limit of detection, and limit of quantitation for each drug are presented also in Table 2. The correlation coefficients were 0.9996–0.9998 indicating good linearity.

Table 2: Spectral characteristics for the reaction of the studied drugs with erythrosine Ba.

Parameter
CTZ
EBS
FXD
KET
LOR

(nm)

Linearity range (μg/mL)
1–7
1–8
1–8
1–7
1–6

() ± SD*

± SD*

Intercept (a) ± SD*

Slope (b) ± SD*

LODb (μg/mL)

LOQc (μg/mL)

Average of six replicates.

bLimit of detection.

cLimit of quantitation.

*Standard deviation.

5.3.2. Precision and Accuracy

RSD% values for CTZ, EBS, FXD, KET, and LOR for intra-day and inter-day precisions were ranged from 0.22 to 1.64 indicating good repeatability. Accuracy was determined by comparing measured concentrations of CTZ, EBS, FXD, KET, and LOR with the actual values and expressed as percentage in Table 3. The accuracy of the developed method for the studied drugs ranged from 98.17% to 101.76% indicating acceptable accuracy. The obtained accuracy and precision were satisfactory for quality control measurements.

Table 3: Accuracy and precision of the developed spectrophotometric method.

Authentic drug
Concentration (μg/mL)
RSD %
Accuracy* %

Inter-day precision
Intra-day precision

CTZ
2
0.69
0.85
98.17

4
1.31
0.59
101.76

6
0.85
0.85
100.99

EBS
2
1.22
1.15
99.20

4
1.27
0.76
98.45

6
0.26
0.38
99.46

FXD
2
1.59
1.07
99.80

4
0.73
0.65
99.84

6
0.53
0.51
101.43

KET
2
0.98
0.59
99.33

4
0.73
0.71
100.24

6
0.37
0.28
101.90

LOR
2
1.64
1.29
99.87

4
0.62
0.45
99.66

6
0.33
0.22
99.83

Average of six replicates.

5.3.3. Robustness

The robustness of an analytical procedure refers to its capability to remain unaffected by small and deliberate variations in method parameters without changes in quantitation. For the determination of the method’s robustness, five factors were selected from the analytical procedure to be examined in the robustness testing: pH and concentration of the buffer, volume and concentration of the dye, and reaction time. Results are shown in Table 4. It was found that none of these variables had a significant effect on the determination of investigated drugs. This provides an indication of the reliability of the proposed method during normal usage, so the developed spectrophotometric method is considered robust.

Table 4: Robustness of the developed spectrophotometric method.

Drug
% Recovery* ± SD

CTZ
EBS
FXD
KET
LOR

No variation**

pH of acetate buffer

    3.2

    3.4

Acetate buffer conc.

    0.15 M

    0.25 M

Erythrosine B conc.

    0.14% w/v

    0.16% w/v

Erythrosine B volume

    0.44 mL

    0.46 mL

Reaction time

    8 min.

    10 min.

Average of six replicates.

**No variation in the assay condition of the proposed method.

6. Application of the Developed Method to Pharmaceutical Preparations

Different commercial dosage forms of the studied drugs were successfully analyzed by the developed method, and results were compared with those obtained by reported methods [21, 22, 24] as shown in Table 5. It was observed that there was no significant difference between results obtained by the developed method and the reported methods as indicated by - and -tests. Additionally, recovery experiments were carried out for the studied drugs in their respective pharmaceutical formulations by standard addition method. The results in Table 6 indicate that the developed method is convenient for all investigated drugs with good recoveries, and there is no interference from either the coadministered drugs or frequently encountered excipients. The proposed method is sensitive, accurate, and precise. It is suitable for the determination of the studied drugs in their dosage forms and application in quality control laboratories.

Table 5: Assay of tablets of investigated non-sedating antihistamines by the developed method and reported methods.

Authentic drug
Dosage form
% Recoverya ± SD
t-valueb
F-valueb

Proposed method
Reported method

CTZ
Epirizine tablets

0.36
4.94

EBS
Evastine tablets

0.22
1.77

FXD
Allerfen tablets

0.22
2.36

KET
Zaditen tablets

0.55
1.00

LOR
Mosedine tablets

1.72
1.66

Average of six determinations ± standard deviation.

bTheoretical values at 95% confidence limit; t = 2.228, F = 5.053.

*Reference [22].

**Reference [24].

***Reference [21].

Table 6: Assay of tablets by standard addition method.

Authentic drug
Dosage form
Claimed taken (µg/mL)
Authentic added (µg/mL)
Found concentration (µg/mL)
% Recovery SD*
C.V

CTZ
Epirizine tablets

1.18

2

1.09

0.65

EBS
Evastine tablets

1.14

2

1.53

1.58

FXD
Allerfen tablets

1.31

2

1.18

0.90

KET
Zaditen tablets

1.44

2

1.09

1.45

LOR
Mosedine tablets

1.63

2

1.25

1.11

Average of six replicates.

7. Conclusion

A non-extractive spectrophotometric method was developed for the determination of some non-sedating antihistamines (cetirizine, ebastine, fexofenadine, ketotifen and loratadine) based on ion-pair complex formation with a simple and commercially available reagent (erythrosine B), which most ordinary analytical laboratories can afford. The method is sufficiently sensitive to permit determinations of as low as 1.0 μg/mL. Unlike GC and HPLC procedures, the spectrophotometer is relatively simple to handle and affordable. The proposed method is simple, precise, accurate, and convenient. Hence, the proposed method should be useful for routine quality control purposes.

Disclosure

All the authors of the paper do not have a direct financial relation with the commercial identity mentioned in the paper.

Conflict of Interests

All the authors declare that there is no conflict of interests in their submitted paper.

References

S. C. M. Sweetman, The Complete Drug Reference, Pharmaceutical Press, London, UK, 36th edition, 2009.

F. Simons, R. Estelle, and K. J. Simons, “Histamine and H1-antihistamines: celebrating a century of progress,” Journal of Allergy and Clinical Immunology, vol. 128, no. 6, pp. 1139–1150, 2011.

R. K. Trivedi, M. C. Patel, and S. B. Jadhav, “A rapid, stability indicating RP-UPLC method for simultaneous determination of ambroxol hydrochloride, cetirizine hydrochloride and antimicrobial preservatives in liquid pharmaceutical formulation,” Scientia Pharmaceutica, vol. 79, no. 3, pp. 525–543, 2011.

G. M. Hadad, S. Emara, and W. M. M. Mahmoud, “Development and validation of a stability-indicating RP-HPLC method for the determination of paracetamol with dantrolene or/and cetirizine and pseudoephedrine in two pharmaceutical dosage forms,” Talanta, vol. 79, no. 5, pp. 1360–1367, 2009.

L. Konieczna, A. Plenis, I. Olędzka, P. Kowalski, and T. Bączek, “Rapid RP-LC method with fluorescence detection for analysis of fexofenadine in human plasma,” Chromatographia, vol. 71, no. 11-12, pp. 1081–1086, 2010.

A. Plenis, L. Konieczn, I. Olędzka, and P. Kowalski, “Rapid analysis of loratadine in human serum by high-performance liquid chromatography with fluorescence detection,” Acta Chromatographica, vol. 22, no. 1, pp. 69–79, 2010.

F. Ibrahim, M. K. Sharaf El- Din, M. I. Eid, and M. E. K. Wahba, “Validated stability indicating liquid chromatographic determination of ebastine in pharmaceuticals after pre column derivatization: application to tablets and content uniformity testing,” Chemistry Central Journal, vol. 5, no. 1, article 24, 2011.

H. M. Maher, M. A. Sultan, and I. V. Olah, “Development of validated stability-indicating chromatographic method for the determination of fexofenadine hydrochloride and its related impurities in pharmaceutical tablets,” Chemistry Central Journal, vol. 5, article 76, no. 1, 2011.

C. Julien-Larose, M. Guerret, D. Lavene, and J. R. Kiechel, “Quantification of ketotifen and its metabolites in human plasma by gas chromatography mass spectrometry,” Biomedical Mass Spectrometry, vol. 10, no. 3, pp. 136–142, 1983.

H. Maurer and K. Pfleger, “Identification and differentiation of alkylamine antihistamines and their metabolites in urine by computerized gas chromatography-mass spectrometry,” Journal of Chromatography, vol. 430, no. 1, pp. 31–41, 1988.

R. Johnson, J. Christensen, and C. C. Lin, “Sensitive gas-liquid chromatographic method for the determination of loratadine and its major active metabolite, descarboethoxyloratadine, in human plasma using a nitrogen-phosphorus detector,” Journal of Chromatography B, vol. 657, no. 1, pp. 125–131, 1994.

H. J. Leis and E. Malle, “Deuterium-labelling and quantitative measurement of Ketotifen in human plasma by gas chromatography/negative ion chemical ionization mass spectrometry,” Biological Mass Spectrometry, vol. 20, no. 8, pp. 467–470, 1991.

R. H. Patil, R. N. Hegde, and S. T. Nandibewoor, “Electro-oxidation and determination of antihistamine drug, cetirizine dihydrochloride at glassy carbon electrode modified with multi-walled carbon nanotubes,” Colloids and Surfaces B, vol. 83, no. 1, pp. 133–138, 2011.

M. Rachidi, K. Digua, P. Hubert, M. A. Faouzi, Y. Cherrah, and A. Bouklouze, “Analytical validation of potentiometric method for cetirizinium ion,” Analytical Letters, vol. 39, no. 8, pp. 1699–1708, 2006.

M. M. Aleksi, V. I. Radulovi, V. P. Kapetanovi, and V. M. Savi, “The possibility of simultaneous voltammetric determination of desloratadine and 3-Hydroxydesloratadine,” Acta Chimica Slovenica, vol. 57, no. 3, pp. 686–692, 2010.

M. M. Ghoneim, M. M. Mabrouk, A. M. Hassanein, and A. Tawfik, “Polarographic behaviour of loratadine and its direct determination in pharmaceutical formulation and human plasma by cathodic adsorptive stripping voltammetry,” Journal of Pharmaceutical and Biomedical Analysis, vol. 25, no. 5-6, pp. 933–939, 2001.

S. D. Güngör, “Electrooxidation of cetirizine dihydrochloride with a glassy carbon electrode,” Pharmazie, vol. 59, no. 12, pp. 929–933, 2004.

H. Mahgoub, A. A. Gazy, F. A. El-Yazbi, M. A. El-Sayed, and R. M. Youssef, “Spectrophotometric determination of binary mixtures of pseudoephedrine with some histamine H1-receptor antagonists using derivative ratio spectrum method,” Journal of Pharmaceutical and Biomedical Analysis, vol. 31, no. 4, pp. 801–809, 2003.

M. K. Sharaf El-Din, F. A. Ibrahim, M. I. Eid, and M. E. K. Wahba, “First and second derivative synchronous fluorescence and spectrophotometric spectroscopy for the simultaneous determination of fexofenadine hydrochloride in presence of its degradation products. Application to stability studies,” Acta Chimica Slovenica, vol. 58, no. 2, pp. 278–287, 2011.

N. El-Kousy and L. I. Bebawy, “Determination of some antihistaminic drugs by atomic absorption spectrometry and colorimetric methods,” Journal of Pharmaceutical and Biomedical Analysis, vol. 20, no. 4, pp. 671–679, 1999.

C. S. P. Sastry and P. Y. Naidu, “Spectrophotometric estimation of Ketotifen fumarate in pharmaceutical formulations,” Mikrochimica Acta, vol. 127, no. 3–4, pp. 219–223, 1997.

A. A. Gazy, H. Mahgoub, F. A. El-Yazbi, M. A. El-Sayed, and R. M. Youssef, “Determination of some histamine H1-receptor antagonists in dosage forms,” Journal of Pharmaceutical and Biomedical Analysis, vol. 30, no. 3, pp. 859–867, 2002.

T. U. Sevgi, “Extractive spectrophotometric determination of cetirizine dihydrochloride in pure and pharmaceutical preparations,” Journal of Food and Drug Analysis, vol. 18, no. 6, pp. 440–446, 2010.

M. K. Sharaf El-Din, F. Ibrahim, M. I. Eid, and M. E. Wahba, “Validated spectroflurimetric determination of some H1 receptor antagonist drugs in pharmaceutical preparations through charge transfer complexation,” Journal of Fluorescence, vol. 22, no. 1, pp. 175–191, 2012.

M. I. Walash, F. Belal, N. El-Enany, M. Eid, and R. N. El-Shaheny, “Stability-indicating micelle-enhanced spectrofluorimetric method for determination of loratadine and desloratadine in dosage forms,” Luminescence, vol. 26, no. 6, pp. 670–679, 2011.

Z. A. Alothman, N. Bukhari, S. Haider, S. M. Wabaidur, and A. A. Alwarthan, “Spectrofluorimetric determination of fexofenadine hydrochloride in pharmaceutical preparation using silver nanoparticles,” Arabian Journal of Chemistry, vol. 3, no. 4, pp. 251–255, 2010.

F. Ibrahim, M. K. El-Din, M. I. Eid, and M. E. Wahba, “Validated stability-indicating spectrofluorimetric methods for the determination of ebastine in pharmaceutical preparations,” Chemistry Central Journal, vol. 5, article 11, 2011.

P. R. Tomás, M. L. Carmen, T. Virginia, and S. Ciriaco, “Automatic extraction-spectrofluorimetric method for the determination of imipramine in pharmaceutical preparations,” Analyst, vol. 120, no. 4, pp. 1103–1106, 1995.

T. M. Wood, “Cellulolytic enzyme system of Trichoderma koningii. Separation of components attacking native cotton,” Biochemical Journal, vol. 109, no. 2, pp. 217–227, 1968.

Validation of Analytical Procedures, Methodology ICH Harmonized Tripartite Guideline, Having Reached Step 4 of the ICH Process at the ICH Steering Committee meeting, 1996

C. Y. Huang, “Determination of binding stoichiometry by the continuous variation method: the job plot,” Methods in Enzymology, vol. 87, pp. 509–525, 1982.