ISRN Obstetrics and GynecologyVolume 2013 (2013), Article ID 305175, 1 pagehttp://dx.doi.org/10.1155/2013/305175

Erratum

Erratum to “Robot-Assisted Radical Hysterectomy for Cervical Cancer: Review of Surgical and Oncological Outcomes”

Renato Seracchioli,¹ Mohamed Mabrouk,² Serena Solfrini,¹ Giulia Montanari,¹ Giulia Ferrini,¹ Giulia Giovanardi,¹ Diego Raimondo,¹ and Riccardo Schiavina³

¹Minimally Invasive Gynecological Surgery Unit, S. Orsola-Malpighi Hospital, Bologna University, 40138 Bologna, Italy²Departement of Obstetrics and Gynecology, Civil Hospital, 41049 Sassuolo, Italy³Department of Urology, S. Orsola-Malpighi Hospital, University of Bologna, 40138 Bologna, Italy

Received 4 September 2012; Accepted 18 September 2012

Copyright © 2013 Renato Seracchioli et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Robot-Assisted Radical Hysterectomy for Cervical Cancer: Review of Surgical and Oncological Outcomes”, all the authors’ names and surnames are in reverse order. The authors list should be corrected as follows: Renato Seracchioli, Mohamed Mabrouk, Serena Solfrini, Giulia Montanari, Giulia Ferrini, Giulia Giovanardi, Diego Raimondo, and Riccardo Schiavina.