ISRN OtolaryngologyVolume 2014 (2014), Article ID 103598, 5 pageshttp://dx.doi.org/10.1155/2014/103598

Clinical Study

The Vestibular-Auditory Interaction for Auditory Brainstem Response to Low Frequencies

Seyede Faranak Emami and Nasrin Gohari

Department of Audiology, Faculty of Rehabilitation, Hamadan University of Medical Sciences and Health Services, Hamadan 16657-696, Iran

Received 5 February 2014; Accepted 27 February 2014; Published 31 March 2014

Academic Editors: A. Horii and J. Meinzen-Derr

Copyright © 2014 Seyede Faranak Emami and Nasrin Gohari. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Since saccular projection is sound sensitive, the objective is to investigate the possibility that the saccular projections may contribute to auditory brainstem response to 500 HZ tone burst (ABR500 HZ). During the case-control research, twenty healthy controls compared to forty selected case groups as having chronic and resistant BPPV were evaluated in the audiology department of Hamadan University of Medical Sciences (Hamadan, Iran). Assessment is comprised of audiologic examinations, cervical vestibular evoked myogenic potentials (cVEMPs), and ABR500 HZ. We found that forty affected ears of BPPV patients with decreased vestibular excitability as detected by abnormal cVEMPs had abnormal results in ABR500 HZ, whereas unaffected ears presented normal findings. Multiple comparisons of mean p13, n23 latencies, and peak-to-peak amplitudes between three groups (affected, unaffected, and healthy ears) were significant. In conclusion, the saccular nerves can be projective to auditory bundles and interact with auditory brainstem response to low frequencies. Combine the cVEMPs and ABR500 HZ in battery approach tests of vestibular assessment and produce valuable data for judgment on the site of lesion. Regarding vestibular cooperation for making of wave V, it is reasonable that the term of ABR500 HZ is not adequate and the new term or vestibular-auditory brainstem response to 500 HZ tone burst is more suitable.

1. Introduction

The evolutionary adaptations in the mammalian and the human inner ear allow selective activation of auditory or vestibular hair cells. The pars superior of the labyrinth (utricle and semicircular canals) has remained fairly constant throughout evolution, whereas the pars inferior (saccule and other otolith, macular, and auditory end organs) has seen considerable change as many adaptations were made for the development of auditory function [1]. The saccular projections are involved with the transduction of acoustic stimuli [2]. These fibres travel caudally through the descending vestibular nucleus, next are entered into the cochlear nucleus, and terminate at cells situated between the dorsal and posteroventral cochlear nucleus [3]. Some of them send projections from cochlear nucleus to various auditory fields [4]. The main portion of auditory brain (temporal gyrus) can activate from the vestibular sensitivity to sound [5], which is activated in response to stimuli that may be used clinically to evoke cVEMPs [5–7]. It provides a means of assessing saccular function and is elicited by the sound of low frequency and loud intensity within the range (100–1000 HZ) of human hearing [8].

On the other hand, ABR500 HZ provides an estimate of low frequency sensitivity, which is called slow-wave negative (SN10) response [9, 10]. The sharp peak (wave V) of ABR500 HZ is generated by the lateral lemniscus as it terminates into the inferior colliculus and the activity of the inferior colliculus is responsible for the generation of the relatively slow and large negativity following the peak of the wave V (Figure 1) [11, 12]. For some individuals, the amplitude of the ABR500 HZ can achieve several times of the faster (click) ABR component. Several recent studies have demonstrated strong relationships between ABR500 HZ thresholds and pure-tone500 HZ behavioral thresholds, with correlations of 0.9 and higher in subjects with normal and impaired hearing [13]. However, neurons at the brainstem and primary auditory cortex are responsive to the low frequency [11]. It is known that low frequency components are important contributors in the neural phenomena and may serve as the basis for hierarchical synchronization function through which the central nervous system processes and integrates sensory information [14]. Thus, the objective is to investigate the possibility that the saccular projections may contribute to ABR500 HZ.

Figure 1: The neural generators of auditory brainstem response in afferent auditory pathway.

2. Materials and Methods

The type of study is case control, which involved twenty volunteer healthy persons (11 females and 9 males; mean age: 31 years and range: 18–43 years = 40 ears) and forty selected case groups (24 females and 16 males; mean age: 30 years and range: 26–35 years = 80 ears) as having chronic and resistant benign paroxysmal positional vertigo (BPPV). The diagnosis of patients with BPPV found results of typical nystagmus (torsional upbeating nystagmus with latency and fatigue lasting less than 1 min and subjective vertigo in the Dix-Hallpike). They were not treated with canalith repositioning maneuver (CRM) on the side determined by Dix-Hallpike test (the repetition of CRM was five with intervals of 5 days) [15] and presented to Audiology Department of Hamadan University of Medical Sciences from April to June 2013.

The inclusion criteria involved BPPV disorder with normal function ofhearing, middle ear pressure, ipsilateral and contralateral acoustic reflexes, auditory brainstem responses, and abnormal cVEMPs.

Assessment. The calibration of our instruments (full set of LABAT evoked potential recorder, MADSEN diagnostic audiometer, HOMOTH impedancemetre) had been kept under control. Testing was performed bilaterally and consisted of pure tone audiometry, immittance measures, videonystagmography (VNG), click-evoked ABR, ABR500 HZ, and cVEMPs. All of the tests were performed on the same day.

Hearing thresholds in the normal range (−10 to 15 dBHL) were obtained from each person over the frequency range of 250–8000 Hz [16]. Impedance measures consisted of normal tympanometry (between ±50 dapa) [17] and acoustic values (85 to 100 dBSpl) [18]. VNG was used to eliminate the possibility of any additional vestibular pathology (saccade, tracking, optokinetic, Dix-Hallpike, and caloric tests) [15]. Click-evoked auditory brainstem response provides an estimation of high frequency (2000–4000 HZ) sensitivity [19]. The response was abnormal, when peaks III and/or V were absent or when the peak-to-peak I-V exceeded the normal limits of our laboratory (4.40 ms for females, 4.58 ms for males).

Auditory brainstem response to 500 HZ tone burst (ABR500 HZ): the patients were placed in the supine position on a gurney within a sound-treated room. Noninverting electrode was placed at the high forehead and inverting electrode on ipsilateral mastoid and ground electrode on contra lateral. Electrode impedances were roughly equivalent and were < 5 kilohms at the start of the test. Responses to 2000 stimuli were averaged (rate of 37/s, filtered from 30 to 3000 HZ, 2-0-2, 500 HZ tone burst, 120 dBSPL; contralateral noise = 90 dBSPL, window of 25 ms) [11, 12]. The ABR500 HZ concluded to be abnormal, when wave V was absent or when it exceeded the normal limits of our laboratory.

Cervical vestibular evoked myogenic potentials (cVEMPs): during cVEMPs (air-conducted) recording patients were instructed to turn and hold their heads as far as possible toward the side contralateral to the stimulated ear. At that point, the overall electromyogenic activity of the sternocleidomastoid muscle (SCM) was set as the reference level of the tonic contraction. Patients were asked to maintain contraction at this level throughout the test session (approximately 50 s) [4]. The active electrode was placed over the middle portion of the ipsilateral SCM body. The reference and the ground electrodes were placed over the upper sternum and on the midline forehead, respectively. Auditory stimuli consisted of tone burst (500 HZ, 120 dBSPL, rise/fall time = 1 ms, plateau = 2 ms, grand-average = 200, and filtered = 20–20000 HZ) which presented to the ear ipsilateral to the contracted SCM [7]. The cVEMPs results for the healthy ears are used as normative data, and latencies and any cVEMPs asymmetry ratio (100 [(An − Ad)/(An + Ad)], An = p13 − n23 (the peak-to-peak amplitude in the normal ear), and Ad = p13 − n23 (the peak-to-peak amplitude in the affected ear) [4]) above the calculated upper limit are interpreted as abnormal.

Data Analysis. All analysis was done by means of the statistics software SPSS₁₇. Data were expressed as mean ± standard deviation. Kolmogorov-Smirnov test was used for evaluation of normal test distribution. One-way ANOVA was used to compare findings among the three groups (case group = affected and unaffected ears, control group = healthy ears). Tukey’s least significant difference (Tukey’s HSD) test was chosen as the post hoc test. Also, value of < 0.05 was considered to indicate statistical significance.

3. Results

In this study, we evaluated twenty healthy controls compared to forty selected case groups as having chronic and resistant BPPV. The latency and amplitude values of the cVEMPs were detectable in all healthy persons (Table 1). The case group had unilateral vestibulopathic ears (). Vestibulopathic ears had both decreased amplitudes and delayed latencies of the cVEMPs (affected) in thirty-five and absent responses in five. Unvestibulopathic ears () presented normal cVEMPs findings (unaffected).

Table 1: The mean of the right and left latencies and amplitudes of cervical vestibular evoked myogenic potentials (cVEMPs) in the healthy ears and the affected ears of the dizzy patients.

Variable
Affected ears
Unaffected ears
Healthy ears

p13 (ms)
19.5 ± 1.4
12.85 ± 2.1
13.37 ± 1.9

n23 (ms)
26.45 ± 1.5
20.48 ± 1.8
19.56 ± 2.5

Peak-to-peak amplitude (µv)
37.08 ± 11.7
48.21 ± 32.3
45.57 ± 38.6

ABR500 HZ was recordable from all healthy persons and unaffected ears (Figure 2). But it only had lower amplitudes and longer latencies values in affected ears (Table 2). Multiple comparisons of mean p13, n23 latencies and peak-to-peak amplitudes between three groups (affected, unaffected, and healthy ears) were significant ( for all, one-way ANOVA test). Comparisons of mean p13, n23 latencies and peak-to-peak amplitudes in affected ears versus healthy group were significant (, Tukey’s HSD). Since affected and unaffected ears belong to the same individuals (matched ears), so there would be no differences between these two regarding sex or age. Affected ears had both abnormal cVEMPs and ABR500 HZ results, but unaffected ears presented normal findings.

Table 2: The mean of the right and left latencies and amplitudes of auditory brainstem response to 500 HZ tone burst (ABR500 HZ) in the healthy ears and the affected ears of the dizzy patients.

Variable
Affected ears
Unaffected ears
Healthy ears

Peak-to-peak amplitude (µv)
0.6 ± 0.3
0.97 ± 0.48
1.09 ± 0.62

Latency (ms)
6.64 ± 0.67
5.84 ± 0.36
5.95 ± 0.57

Figure 2: The auditory brainstem response to 500 HZ tone burst (ABR500 HZ) in a healthy ear.

4. Discussion

Forty affected ears of the case group with decreased vestibular excitability as detected by abnormal cVEMPs had distorted ABR500 HZ, whereas both unaffected and control ears presented normal results. Since the ABR500 HZ and the cVEMPs are evoked by low frequency sound [4, 11], the saccular nerves may enter into afferent auditory pathway and the acoustic sensitivity of the saccule can improve the ABR500 HZ response and may be effective in making the shorter latency, higher amplitude, and sharp shape of the waveform, while lower amplitude, rounded shape, and longer latency of auditory brainstem activity may occur in abnormal function of the saccule, which cannot transmit low frequency neural response from vestibular endings to cochlear nucleus. Then, the present study is a description of the vestibular-auditory interaction for auditory brainstem response.

Similarly, Burian and Gstoettner reported that the afferent saccular fibres (guinea pig) are involved with the transduction of acoustic stimuli. They found the superior branch of the vestibular nerve and the saccular projections run into the cochlear nucleus. These axons travel caudally through the descending vestibular nucleus, enter the cochlear nucleus at a level caudal to subgroup , and terminate at cells situated between the dorsal and posteroventral cochlear nucleus [2].

Most of the saccular afferents however showed irregular spontaneous firing. The vestibular nucleus neurons in the lateral vestibular nucleus and in the rostral portion of the inferior vestibular nucleus are sound sensitive [4], and there is anatomical evidence of the projection from the vestibular nerves (mainly saccule) to the cochlear nucleus [7]. Some of the vestibular afferent nerves send projections to various auditory fields on the cortex, [5] and the areas of the humans auditory brain activate by vestibular sensitivity to sound [5, 6].

The people with normal saccular function have intact projections to cochlear nucleus, lateral lemniscus, and inferior colliculus [20]. These projections can increase the peaks of the ABR500 HZ and increase neural response velocity. Consequently, lower amplitude, rounded shape, and longer latency of ABR500 HZ are the signs of the absence of transmitted neural signals by saccular projections into auditory brainstem pathway.

On the other hand, the amplitude of an ABR component depends on the amount of neural conduction time, and the auditory fibers’ responses have the best conduction time in the low frequencies [10]. The auditory fibers in the brainstem pathway are temporally precise, with better neural conduction time to F0 (fundamental frequency or lowest component of the sound). Indeed, the temporal pattern of fibers’ responses in the auditory nerve and the cochlear nucleus to medial geniculate body are near-periodic, and the frequency of their repetition is synchronized with F0 [21]. The range of saccular sensitivity happens to coincide with the range of our voice pitch (F0 = ~100 up to 400 Hz) [8]. Pitch perception is crucial for music-speech perception and auditory object recognition in a complex acoustic environment, which conveys the phonetic information and prosodic cues such as intonation, stress (in European languages), and semantic information in tonal languages (Chinese, Vietnamese, and Thai) [20].

In addition, our recent study shows that percussive daf musical sound (daf is a Persian percussive instrument, which had important usage specially in celebrations) seems to be related to both saccular and cochlear dysfunction. The associated degeneration in the cochlear and saccular afferents is associated with the exposure to low frequency, high intensity percussive daf music. It may reflect their common sound sensitive function [22].

Recent studies show that the saccule is the site of phonetic self-regulating mechanism with positive feedback [6]. Low frequency cues of the sound spectrum have very important roles in auditory function, which can stimulate the saccular afferents [23]. Also, the sensation of the sound at low frequencies may be present in patients with total deafness and normal vestibular function (predominantly saccule). This improvement disappears when saccular function is lost [24]. In the case of healthy hearing human and in presence of severe competing noise, saccule has a facilitating role in cochlea and can improve detection of loud low frequencies [25]. Consequently, it may be valuable for speech processing and perception-production system [8].

However, the auditory brainstem is sensitive to the azimuth and elevation of sound source locations [14], and the brainstem’s response to speech is the representation of the F0 [21]. Recent studies have shown in normal hearing that the saccular stimulation can activate cortical multisensory areas especially in the temporoinsular and temporoparietal cortex in both hemispheres [26].

After all, the acoustic sensitivity of the saccule to low frequency component is effective in neural activities; it can improve and contribute to auditory brainstem response. The ABR500 HZ has a prediction role in saccular function and the observation of any abnormality in waveform pattern in presence of normal hearing can be a sign of damage to saccular hearing. So there is a vestibular-auditory interaction not only for hearing but also for auditory brainstem response to low frequencies. In battery approach test of vestibular assessment, the use of the cVEMPs and ABR500 HZ can produce valuable data for judgment on the site of lesion. Regarding vestibular cooperation for making of wave V, it is reasonable that the term of ABR500 HZ is not adequate and the new term or vestibular-auditory brainstem response to 500 HZ tone burst is more suitable.

Abbreviations

(cVEMPs): | Cervical vestibular evoked myogenic p
(ABR500 HZ): | Auditory brainstem response to 500 HZ tone burst.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The research project was fully sponsored by Hamadan University of Medical Sciences. The authors would like to thank all the volunteers for their contribution to this research. All financial and material support for this research and work are sponsored by Hamadan University of Medical Sciences and Health Services.

References

J. Carey and N. Amin, “Evolutionary changes in the cochlea and labyrinth: Solving the problem of sound transmission to the balance organs of the inner ear,” Anatomical Record A: Discoveries in Molecular, Cellular, and Evolutionary Biology, vol. 288, no. 4, pp. 482–489, 2006.

M. Burian and W. Gstoettner, “Projection of primary vestibular afferent fibers to the cochlear nucleus in the guinea pig,” Neuroscience Letters, vol. 84, no. 1, pp. 13–17, 1987.

C. A. McCormick, “Central connections of anamniote auditory otolith endorgans,” Journal of the Acoustical Society of America, vol. 119, no. 5, p. 3432, 2006.

T. Murofushi and K. Kaga, “Sound sensitivity of the vestibular end-organs and sound-evoked vestibulocollic reflexes in mammals,” in Issues in Vestibular Evoked Myogenic Potential, T. Murofushi and K. Kaga, Eds., pp. 20–25, Springer, Tokyo, Japan, 2009.

K. M. McNerney, A. H. Lockwood, M. L. Coad, D. S. Wack, and R. F. Burkard, “Use of 64-channel electroencephalography to study neural otolith-evoked responses,” Journal of the American Academy of Audiology, vol. 22, no. 3, pp. 143–155, 2011.

N. P. M. Todd, A. C. Paillard, K. Kluk, E. Whittle, and J. Colebatch, “Vestibular receptors contribute to cortical auditory evoked potentials,” Hearing Research, vol. 309, no. 3, pp. 63–74, 2014.

K. Sheykholeslami and K. Kaga, “The otolithic organ as a receptor of vestibular hearing revealed by vestibular-evoked myogenic potentials in patients with inner ear anomalies,” Hearing Research, vol. 165, no. 1-2, pp. 62–67, 2002.

S. F. Emami, A. Pourbakht, K. Sheykholeslami, M. Kammali, F. Behnoud, and A. Daneshi, “Vestibular hearing and speech processing,” ISRN Otolaryngology, vol. 1, pp. 1–7, 2010, Persian

B. Chandrasekaran and N. Kraus, “The scalp-recorded brainstem response to speech: neural origins and plasticity,” Psychophysiology, vol. 47, no. 2, pp. 236–246, 2010.

M. Don and B. Kwong, “Auditory brainstem response: differential diagnosis,” in Issues in Hand Book of Clinical Audiology, J. Katz, Ed., vol. 13, pp. 265–292, Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 6th edition, 2010.

R. F. Burkard and C. Secor, “Overview of auditory evoked potentials,” in Hand Book of Clinical Audiology, J. Katz, L. Medwetsky, and R. Burkard, Eds., pp. 233–248, Lippincott Williams & Wilkins, New York, NY, USA, 5th edition, 2002.

D. R. Stapells and P. Oates, “Estimation of the pore-tone audiogram by the auditory brainstem response: a review,” Audiology and Neuro-Otology, vol. 2, no. 5, pp. 257–280, 1997.

M. P. Gorga, T. A. Johnson, J. R. Kaminski, K. L. Beauchaine, C. A. Garner, and S. T. Neely, “Using a combination of click- and tone burst-evoked auditory brain stem response measurements to estimate pure-tone thresholds,” Ear and Hearing, vol. 27, no. 1, pp. 60–74, 2006.

X. Wang, “The harmonic organization of auditory cortex,” in The Neurophysiological Bases of Auditory Perception, E. A. Lopez-Poveda, R. Meddis, and A. R. Palmer, Eds., pp. 211–222, Springer Science, New York, NY, USA, 2010.

Y. H. Cha, Acute Vestibulopathy. The Neurophysiologist, SAGE, 2011.

R. W. Harrell, “Pure tone evaluation,” in Issues in Hand Book of Clinical Audiology, J. Katz, Ed., pp. 71–88, Lippincott Williams & Wilkins, USA, 6th edition, 2002.

C. G. Fowllff and E. G. Shanks, “Tmpanometry,” in Issues in Hand Book of Clinical Audiology, J. Katz, Ed., pp. 175–204, Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 6th edition, 2002.

S. A. Gelfand, “The acoustic reflex,” in Issues in Hand Book of Clinical Audiology, J. Katz, Ed., pp. 205–232, Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 6th edition, 2002.

J. W. Hall III, “Electrically evoked and myogenic responses,” in New Handbook of Auditory Evoked Responses, J. W. Hall III, S. D. Dragin, K. Heimsoth, and J. Sweeney, Eds., pp. 602–613, Pearson Education, Boston, Mass, USA, 2007.

S. F. Emami and A. Daneshi, “Vestibular hearing and neural synchronization,” ISRN Otolaryngology, vol. 1, pp. 37–40, 2010, Persian

S. K. Scott and D. G. Sinex, “Speech,” in The Oxford Handbook of Auditory Science the Auditory Brain, A. Rees and A. R. Palmer, Eds., vol. 2, pp. 193–215, Oxford University Press, New York, NY, USA, 2010.

S. F. Emami, “Acoustic sensitivity of the saccule and daf music,” Iranian Journal of Otorhinolaryngology, vol. 26, no. 75, pp. 105–110, 2014, Persian

S. F. Emami, “Is all human hearing cochlear?” The Scientific World Journal, vol. 2013, Article ID 147160, 5 pages, 2013.

S. F. Emami, “Hypersensitivity of vestibular system to sound and pseudoconductive hearing loss in deaf patients,” ISRN Otolaryngology, vol. 2014, Article ID 817123, 5 pages, 2014, Persian

S. F. Emami, A. Pourbakht, A. Daneshi, K. Sheykholeslami, H. Emamjome, and M. Kammali, “Sound sensitivity of the saccule to low frequency in healthy adults,” ISRN Otolaryngology, vol. 2013, Article ID 429680, 6 pages, 2013, Persian

M. Trivelli, M. Potena, V. Frari, T. Petitti, V. Deidda, and F. Salvinelli, “Compensatory role of saccule in deaf children and adults: novel hypotheses,” Medical Hypotheses, vol. 80, no. 1, pp. 43–46, 2013.