ISRN Mechanical EngineeringVolume 2014 (2014), Article ID 824029, 2 pageshttp://dx.doi.org/10.1155/2014/824029

Erratum

Erratum to “Verification, Validation, and Testing of Kinetic Mechanisms of Hydrogen Combustion in Fluid-Dynamic Computations”

Victor P. Zhukov

Institute of Space Propulsion, German Aerospace Center (DLR), Lampoldshausen, 74239 Hardthausen, Germany

Received 2 October 2013; Accepted 13 October 2013; Published 2 January 2014

Copyright © 2014 Victor P. Zhukov. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

A typing error in Table 1 in page 5 was detected. The chemical equation of reaction R2 was typed incorrectly: The correct chemical equation is 

The correct complete kinetic mechanism can be found in Table 1.

Table 1: New skeletal mechanism.

Numbers
Reference number
Reaction

Reference

1
R1

0.0
16.44

2
R2

2.67
6.292

3
R3

1.51
3.43

4
R5

−1.4
105.1

5
R6

−0.5
0.0

6
R7

−1.0
0.0

7
R8

−2.0
0.0

8
R9

−1.42
0.0

9
R10

0.0
0.82

10
R-10

0.203
54.46

11
R11

0.0
0.87

12
R13

0.0
−0.5

13
R15

0.0
45.5

14
R-17

0.202
27.12

; units: mol, , K, and kcal; thermodynamic data ; the reverse rate constants (R5, R6) are calculated from the forward rate constants through the equilibrium constants.