Journal of Analytical Methods in Chemistry

Volume 2014 (2014), Article ID 286379, 16 pages

http://dx.doi.org/10.1155/2014/286379

Research Article

Spectrophotometric Determination of Gemifloxacin Mesylate, Moxifloxacin Hydrochloride, and Enrofloxacin in Pharmaceutical Formulations Using Acid Dyes

Ayman A. Gouda,¹ Alaa S. Amin,² Ragaa El-Sheikh,¹ and Amira G. Yousef¹

¹Chemistry Department, Faculty of Science, Zagazig University, Zagazig 44519, Egypt

²Chemistry Department, Faculty of Science, Benha University, Benha, Egypt

Received 4 September 2013; Revised 25 November 2013; Accepted 27 November 2013; Published 22 January 2014

Academic Editor: Sibel A. Ozkan

Copyright © 2014 Ayman A. Gouda et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Simple, rapid, and extractive spectrophotometric methods were developed for the determination of some fluoroquinolones antibiotics: gemifloxacin mesylate (GMF), moxifloxacin hydrochloride (MXF), and enrofloxacin (ENF) in pure forms and pharmaceutical formulations. These methods are based on the formation of ion-pair complexes between the basic drugs and acid dyes, namely, bromocresol green (BCG), bromocresol purple (BCP), bromophenol blue (BPB), bromothymol blue (BTB), and methyl orange (MO) in acidic buffer solutions. The formed complexes were extracted with chloroform and measured at 420, 408, 416, 415, and 422 nm for BCG, BCP, BPB, BTB, and MO, respectively, for GMF; at 410, 415, 416, and 420 nm for BCP, BTB, BPB, and MO, respectively, for MXF; and at 419 and 414 nm for BCG and BTB, respectively, in case of ENF. The analytical parameters and their effects are investigated. Beer’s law was obeyed in the ranges 1.0–30, 1.0–20, and 2.0–24 μg mL⁻¹ for GMF, MXF, and ENF, respectively. The proposed methods have been applied successfully for the analysis of the studied drugs in pure forms and pharmaceutical formulations. Statistical comparison of the results with the reference methods showed excellent agreement and indicated no significant difference in accuracy and precision.

1. Introduction

Fluoroquinolones are the second-generation members of quinolone antibiotics fluorinated in position 6 and bearing a piperazinyl moiety at position. They are considered to be the most effective Gram-positive and Gram-negative pathogens to combat infection caused by microorganisms that are resistant to other microbials, such as tetracyclines. Also, they have some activity against mycobacteria, mycoplasmas, rickettsias, and the protozoan Plasmodium falciparum [1–3]. There is a substantial body of literature related to both the mechanism of their action as DNA gyrase inhibitors and the influence of systematic structural modifications on their biological activity. Gemifloxacin mesylate (GMF) is (R,S)-7-[(4Z)-3-(aminomethyl)-4-(methoxyimino)-1-pyrrolidinyl]-1-cyclopropyl-6-fluoro-1,4-dihydro-4-oxo-1,8-naphthyridine-3-carboxylic acid methanesulfonate. Moxifloxacin (MXF) is {1-cyclopropyl-7-[2,8-diazobicyclo (4.3.0) nonane]-6-fluoro-8-methoxy-1,4 dihydro-4-oxo-3-quinolone carboxylic acid}. Enrofloxacin (ENF) is (1 cyclopropyl-7-(4-ethyl-1-piperazinyl)-6-fluoro-1,4-dihydro-4-oxo-3-quinolone carboxylic acid) (Scheme 1). GMF and MXF are fourth-generation synthetic broad-spectrum 8-methoxy fluoroquinolone antibacterial drug derivatives. Due to their clinical advantages, GMF and MXF are receiving a great interest and there was an increase in number of their pharmaceutical dosage forms in the market in the recent past. Enrofloxacin is the first fluoroquinolone developed for veterinary application and is potentially available for the treatment of some urinary tract, respiratory tract, and skin infectious diseases in pets and livestock [2]. There are no official (pharmacopoeia) methods that have been found for the assay of GMF and MXF in their pharmaceutical formulations. ENF is official in the United States Pharmacopeia (USP) [4].

Scheme 1: The chemical structure of the studied fluoroquinolones.

Several methods have been reported for the determination of fluoroquinolones either in pure forms, dosage forms, or biological fluids like chromatography [5–9], microchip electrophoresis [10], chiral counter-current chromatography [11], capillary zone electrophoresis [12], electrochemistry [13–15], atomic absorption spectrometry [16, 17], and spectrofluorimetry [18–21]. However, these methods are expensive and not available at most quality control laboratories. For routine analysis of the studied drugs, a simple, rapid, and cost effective analytical method was required.

The spectrophotometric technique continues to be the most preferred method for the assay of different classes of drugs in pure, pharmaceutical formulations and in biological samples, for its simplicity and reasonable sensitivity with significant economical advantages. Spectrophotometric methods are reported for the assay of GMF [22–32], MXF [16, 33–40], and ENF [17, 41–47]. These methods were associated with some major drawbacks such as decreased selectivity due to measurement in ultraviolet region and/or decreased simplicity of the assay procedure (e.g., tedious precipitation, heating, or liquid-liquid extraction steps in the ion-pair formation-based methods). For these reasons, it was worthwhile to develop a new simple and selective spectrophotometric method for the determination of the studied drugs in their pharmaceutical dosage forms.

In the present work, we report the development of accurate and precise extractive spectrophotometric methods based on the chloroform soluble ion-pair complexes between the studied fluoroquinolone antibiotics (GMF, MXF, and ENF) and some acid dyes (BCG, BCP, BTB, BPB, or MO). The absorbance measurements were measured at optimum wavelengths. The proposed methods were applied successfully for the determination of the studied drugs in pure and dosage forms. No interference was observed from the additives. The methods provide rapid, economic procedures and more sensitive compared to the previously reported spectrophotometric methods. These methods were validated by the statistical data.

2. Experimental

2.1. Apparatus

All absorption spectra were made using Kontron Unikon 930 (UV-Visible) spectrophotometer (German) with a scanning speed of 200 nm/min and a band width of 2.0 nm, equipped with 10 mm matched quartz cells. The pH values of different buffer solutions were checked using a Hanna pH-meter instrument (pH 211) (Romania) equipped with a combined glass-calomel electrode.

2.2. Materials and Reagents

All reagents and chemicals used were of analytical or pharmaceutical grade and all solutions were prepared fresh daily.

Materials. Pharmaceutical grade gemifloxacin mesylate (GMF) was supplied by Al-Obour Pharmaceutical and Chemical Industries Company, Egypt. Moxifloxacin hydrochloride (MXF) reference standard was provided by Sabaa, Kahira Company, Egypt. Enrofloxacin (ENF) was kindly provided by Pharma Swede, Egypt (AVICO).

All pharmaceutical preparations were obtained from commercial sources in the local markets. Factive tablets were obtained from Oscient Pharmaceuticals Corporation, USA, labeled to contain 320 mg GMF per tablet; Flobiotic tablets were obtained from Hikma Pharmaceutical and Chemical Industries Company, Egypt, labeled to contain 320 mg GMF per tablet. GemiQue tablets were obtained from Obour Pharmaceutical and Chemical Industries Company, Egypt, labeled to contain 320 mg GMF per tablet. Avelox tablets were obtained from Bayer, Germany, labeled to contain 400 mg MXF per tablet. Moxiflox tablets were obtained from EVA Pharm. & Chem. Ind. Company, Egypt, labeled to contain 400 mg MXF per tablet. Moxifloxacin tablets were obtained from Sabaa International Company for Pharmaceuticals and Chemical Industries, S.A.E., labeled to contain 400 mg MXF per tablet. Enrocin 10% injectable (Alexandria Company for Pharmaceuticals and Chemical Industries, Alexandria, Egypt) was labeled to contain 10% ENR and Avitryl 20% injectable (AVICO Veterinary Pharmaceuticals) was labeled to contain 200 mg ENR.

2.3. Preparation of Stock Standard Solutions

Stock standard solutions of GMF, MXF, and ENR (100 μg mL⁻¹ and 1.0 × 10−3 M) were prepared by dissolving an exact weight of pure drugs in least amount of 0.1 M HCl; the mixture was warmed at 50°C in a water bath for 5.0 min, agitated by an electrical shaker for another 5.0 min, cooled to room temperature, and diluted to 100 mL with bidistilled water in a 100 mL measuring flask. The standard solutions were found stable for at least one week without alteration when kept in an amber coloured bottle and stored in a refrigerator when not in use.

2.4. Reagents

Bromocresol green (BCG), bromocresol purple (BCP), bromophenol blue (BPB), bromothymol blue (BTB), and methyl orange (MO) (BDH Chemicals Ltd., Poole, England) were used without further purification. Stock solutions (1.0 × 10⁻³ M) of reagents were prepared by dissolving the appropriate weight of each reagent in 10 mL of 96% ethanol and diluted to 100 mL with bidistilled water. These solutions are stable for at least one week if kept in the refrigerator.

Series of buffer solutions of KCl-HCl (pH = 1.5–4.2), NaOAc-HCl (pH = 1.99–4.92), NaOAc-AcOH (pH = 3.0–5.6), and potassium hydrogen phthalate-HCl (pH = 2.0–7.0) were prepared by following the standard methods [48].

2.5. General Procedures

2.5.1. For GMF

Aliquots of (0.1–3.0 mL) the standard drug solution (100 μg mL⁻¹) were transferred to 10 mL measuring flasks and added 2.0 mL of acetate buffers of pH 3.0 and 3.5 using (BCG or BCP) and (BPB, BTB or MO), respectively and then added 2.0 mL of all reagent solutions (1.0 × 10−3 M). The mixture was extracted twice with 10 mL chloroform by shaking for 2.0 min and then allowed to stand for clear separation of the two phases and the chloroform layer was passed through anhydrous sodium sulphate. The absorbance of the yellow colored complexes was measured at 420, 408, 416, 415, and 422 nm, using BCG, BCP, BPB, BTB, and MO, respectively, against corresponding reagent blank similarly prepared. All measurements were made at room temperature (25 ± 2°C). The procedures were repeated for other analyte aliquots and calibration plots were drawn to calculate the amount of drugs in unknown analyte samples.

2.5.2. For MXF

Aliquots of (0.1–2.0 mL) the standard drug solution (100 μg mL⁻¹) were transferred to 10 mL measuring flasks and added 2.0 mL of potassium hydrogen phthalate-HCl buffer of pH 3.5 and 3.0 using BCP or MO and BPB or BTB, respectively, then added to 2.0 mL of all reagent solutions (1.0 × 10−3 M). The mixture was extracted twice with 10 mL chloroform by shaking for 2.0 min and then allowed to stand for clear separation of the two phases and the chloroform layer was passed through anhydrous sodium sulphate. The absorbance of the yellow colored complexes was measured at 410, 415, 416, and 420 nm using BCP, BTB, BPB, and MO, respectively, against corresponding reagent blank similarly prepared. All measurements were made at room temperature (25 ± 2°C). The procedures were repeated for other analyte aliquots and calibration plots were drawn to calculate the amount of drugs in unknown analyte samples.

2.5.3. For ENF

Aliquots of (0.2–2.4 mL) the standard drug solution (100 μg mL⁻¹) were transferred to 10 mL measuring flasks and added 2.0 mL of acetate buffer of pH 3.0 using BCG or BTB and then added to 2.0 mL of reagent solutions (1.0 × 10−3 M). The mixture was extracted twice with 10 mL chloroform by shaking for 2.0 min, then allowed to stand for clear separation of the two phases and the chloroform layer was passed through anhydrous sodium sulphate. The absorbance of the yellow colored complexes was measured at 419 and 414 nm using BCG and BTB, respectively, against corresponding reagent blank similarly prepared. All measurements were made at room temperature (25 ± 2°C). The procedures were repeated for other analyte aliquots and calibration plots were drawn to calculate the amount of drug in unknown analyte samples.

2.6. Applications to Pharmaceutical Formulations

2.6.1. Procedure for Tablets

The contents of ten tablets (Factive, Flobiotic, or GemiQue) labeled to contain 320 mg GMF per tablet and (Avelox or Moxiflox) labeled to contain 400 mg MXF per tablet were crushed, powdered, and weighted out and the average weight of one tablet was determined. An accurate weight equivalent to 10 mg GMF or MXF was dissolved in 20 mL of 0.5 M HCl with shaking for 5.0 min and filtered. The filtrate was diluted to 100 mL with bidistilled water in a 100 mL measuring flask to give 100 μg mL⁻¹ stock solution. An aliquot of the diluted drug solution was treated as described previously.

2.6.2. Procedure for Injection

Accurate volumes of Enrocin 10% or Avitryl 20% of injectable quantity equivalent to 200 mg were extracted with 10 mL of 0.5 M HCl, diluted with water, and sonicated for about 5.0 min. The extracts were transferred into 100 mL volumetric flasks and then diluted to volume with bidistilled water. Aliquots of these solutions were transferred into a series of 10 mL volumetric flasks, and the analysis was completed as previously mentioned.

2.7. Stoichiometric Relationship

The stoichiometric ratios of the ion-associates formed between the drugs under investigation and the reagents were determined by applying the continuous variation [49] and the molar ratio [50] methods at the wavelengths of maximum absorbance. In continuous variation method, equimolar solutions were employed: 5.0 × 10−4 M standard solutions of drug and 5.0 × 10−4 M solutions of dye were used. A series of solutions was prepared in which the total volume of the studied drugs and the dye was kept at 2.0 mL. The drug and reagent were mixed in various complementary proportions (0 : 2, 0.2 : 1.8, 0.4 : 1.6,…,2 : 0, inclusive) and completed to volume in a 10 mL calibrated flask with the appropriate solvent for extraction following the above mentioned procedure. In the molar ratio method, the concentrations of GMF, MXF, and ENF are kept constant (1.0 mL of 5.0 × 10−4 M) while that of dyes (5.0 × 10−4 M) are regularly varied (0.2–2.4 mL). The absorbance of the prepared solutions optimum is measured at optimum condition at wavelength for each complex.

3. Results and Discussion

3.1. Absorption Spectra

The nitrogenous drugs are present in positively charged protonated forms and anionic dyes of sulfonephthalein group present mainly in anionic form at pH ≥ 2.5. So when treated with an acid dye at pH range 2.8–4.0 of acidic buffers solutions, a yellow ion-pair complex which is extracted with chloroform is formed. The absorption spectra of the ion-pair complexes, which were formed between GMF, MXF, or ENF and reagents, were measured in the range 350–550 nm against the blank solution. The ion-pair complexes of GMF and BCG, BCP, BPB, BTB, and MO show maximum absorbance at 420, 408, 416, 415, and 422 nm, respectively; of MXF and BCP, BTB, BPB, and MO show maximum absorbance at 410, 415, 416, and 420 nm, respectively and of ENF and BCG and BTB show maximum absorbance at 419 and 414 nm, respectively.

3.2. Optimum Reaction Conditions for Complex Formation

The optimization of the methods was carefully studied to achieve complete reaction formation, highest sensitivity, and maximum absorbance.

3.2.1. Effects of pH on Ion-Pair Formation

The effect of pH on the drug-reagent complex was studied by extracting the colored complexes in the presence of various buffers. It was noticed that the maximum color intensity and highest absorbance value were observed in NaOAc-AcOH buffer of pH 3.0 or 3.5 using BCG or BCP and BPB, BTB, or MO, respectively, for GMF (Figure 1) and pH 3.0 using BCG or BTB for ENF. Whereas for MXF, the highest absorbance value was observed in potassium hydrogen phthalate-HCl buffer of 3.0 and 3.5 using BCP or MO and BPB or BTB, respectively, in addition to the stability of the color without affecting the absorbance at the optimum pH values. Further, 2.0 mL of the buffers solutions gave maximum absorbances and reproducible results.

Figure 1: Effect of pH of acetate buffer solution on ion-pair complex formation between GMF and (1.0 × 10−3 M) reagents.

3.2.2. Effect of Extracting Solvents

The effect of several organic solvents, namely, chloroform, carbon tetrachloride, methanol, ethanol, acetonitrile, -butanol, benzene, acetone, ethyl acetate, diethyl ether, toluene, dichloromethane, and chlorobenzene, was studied for effective extraction of the colored species from aqueous phase. Chloroform was found to be the most suitable solvent for extraction of colored ion-pair complexes for all reagents quantitatively. Experimental results indicated that double extraction with total volume 10 mL chloroform, yielding maximum absorbance intensity, stable absorbance for the studied drugs and considerably lower extraction ability for the reagent blank and the shortest time to reach the equilibrium between both phases.

3.2.3. Effects of Reagents Concentration

The effect of the reagents was studied by measuring the absorbance of solutions containing a fixed concentration of GMF, MXF, or ENF and varied amounts of the respective reagents. Maximum color intensity of the complex was achieved with 2.0 mL of 1.0 × 10⁻³ M of all reagents solutions, although a larger volume of the reagent had no pronounced effect on the absorbance of the formed ion-pair complex (Figure 2).

Figure 2: Effect of volume of (1.0 × 10−3 M) reagent on the ion-pair complex formation with GMF.

3.2.4. Effect of Time and Temperature

The optimum reaction time was investigated from 0.5 to 5.0 min by following the color development at ambient temperature (25 ± 2°C). Complete color intensity was attained after 2.0 min of mixing for all complexes. The effect of temperature on colored complexes was investigated by measuring the absorbance values at different temperatures. It was found that the colored complexes were stable up to 35°C. At higher temperatures, the drug concentration was found to increase due to the volatile nature of the chloroform. The absorbance remains stable for at least 12 h at room temperature for all reagents.

3.3. Stoichiometric Relationship

The stoichiometric ratio between drug and dye in the ion-pair complexes was determined by the continuous variations method (Figure 3). Job’s method of continuous variation of equimolar solutions was employed: a 5.0 × 10⁻⁴ M standard solution of drug base and 5.0 × 10⁻⁴ M solution of BCG, BCP, BPB, BTB, or MO, respectively, were used. A series of solutions was prepared in which the total volume of drug and reagent was kept at 2.0 mL for BCG, BCP, BPB, BTB, and MO, respectively. The absorbance was measured at the optimum wavelength. The results indicate that 1 : 1 (drug : dye) ion-pairs are formed through the electrostatic attraction between positive protonated GMF⁺, MXF⁺, or ENF⁺ and negative BCG⁻, BCP⁻, BPB⁻, BTB⁻, and MO⁻. The extraction equilibrium can be represented as follows:

where GMF⁺ and D⁻ represent the protonated GMF and the anion of the dye, respectively, and the subscripts (aq) and (org) refer to the aqueous and organic phases, respectively (Scheme 2).

Scheme 2: Proposed mechanism of the reaction between MXF and BPB salt.

Figure 3: Job’s method of continuous variation graph for the reaction of MXF with dyes BCP, BPB, BTB, and MO, [drug] = [dye] = 5.0 × 10−4 M.

3.4. Conditional Stability Constants () of Ion-Pair Complexes

The stability of the ion-pair complexes was evaluated. The formation of the ion-pair complexes was rapid and the yellow color extracts were stable at least for 12 h for drug-dye without any change in color intensity and with the maximum absorbance at room temperature. The conditional stability constants () of the ion-pair complexes for the studied drug were calculated from the continuous variation data using the following equation [51]:

where is the observed maximum absorbance, is the absorbance value corresponding to intersection of the two tangents of the curve, is the mole concentration corresponding to maximum absorbance, and is the stoichiometry with which dye ion associates with drugs. The values for drug-dye ion-pair associates were calculated in Table 1.

Table 1: Statistical analysis of calibration graphs and analytical data in the determination of the studied drugs using the proposed methods.

Parameters
GMF
MXF
ENF

BCG
BCP
BTB
BPB
MO
BCP
BTB
BPB
MO
BCG
BTB

Wavelengths (nm)
420
408
415
416
422
410
415
416
420
419
414

pH
3.0
3.0
3.5
3.5
3.5
3.0
3.5
3.0
3.5
3.0
3.0

Beer’s law limits (µg mL⁻¹)
1.0–16
1.0–12
2.0–16
1.0–16
3.0–30
1.0–12
2.0–18
1.0–10
2.0–20
2.0–20
2.0–24

Molar absorptivity (L/mol⁻¹ cm⁻¹) × 10⁴
2.1787
3.9244
1.8904
2.4457
0.9386
3.3572
1.9365
4.1976
1.2876
1.4126
1.198

Sandell’s sensitivity (ng cm⁻²)
22.3
12.4
25.7
19.9
51.7
13.0
22.6
10.4
34.0
25.4
30.0

log

Regression equationa

    Intercept ()
0.0016
0.0042
0.0087
0.0064
−0.0006
−0.0091
−0.0058
−0.0137
0.0299
0.0066
0.0005

    Slope ()
0.0447
0.0805
0.0382
0.0498
0.0196
0.0764
0.0441
0.0953
−0.0023
0.0393
0.0334

    Correlation coefficient ()
0.9998
0.9999
0.9993
0.9997
0.9996
0.9991
0.9997
0.9994
0.9995
0.9998
0.9995

    LOD (µg mL⁻¹)b
0.23
0.26
0.52
0.28
0.87
0.21
0.56
0.25
0.41
0.48
0.51

    LOQ (µg mL⁻¹)b
0.77
0.87
1.73
0.93
2.90
0.70
1.87
0.83
1.37
1.60
1.70

    Mean ± SD

    RSD %
1.14
0.74
0.90
1.05
0.86
0.74
1.07
0.82
0.79
0.98
0.87

    RE %
1.20
0.77
0.94
1.10
0.90
0.78
1.12
0.86
0.83
1.03
0.91

    -testc
0.23
0.50
0.19
0.29
0.42
0.01
0.11
0.26
0.19
0.24
0.07

    -testc
3.49
1.47
2.18
2.96
1.98
1.35
1.54
1.10
1.19
1.24
1.02

, where is the concentration in µg mL⁻¹ and is the absorbance units.

LOD: limit of detection; LOQ: limit of quantification; : molar absorptivity.

The theoretical values of and at are 2.571 and 5.05, respectively.

3.5. Method of Validation

3.5.1. Linearity

At described experimental conditions for GMF, MXF, and ENF determination, standard calibration curves with reagents were constructed by plotting absorbance versus concentration. The statistical parameters were given in the regression equation calculated from the calibration graphs. The linearity of calibration graphs was proved by the high values of the correlation coefficient () and the small values of the -intercepts of the regression equations. The apparent molar absorptivities of the resulting colored ion-pair complexes and relative standard deviation of response factors for each proposed spectrophotometric method were also calculated and recorded in Table 1. The molar absorptivity of BCP > BCG > BTB > MO > BPB ion-pair complexes for GMF, while for MXF the molar absorptivity of BCP > BTB > BPB > MO ion-pair complexes, also, the molar absorptivity of BCG > BTB ion-pair complexes for ENF.

3.5.2. Sensitivity

The limits of detection (LOD) and quantitation (LOQ) for the proposed methods were calculated using the following equation [51, 52]:

where is the standard deviation of the response of the blank or the standard deviation of intercepts of regression lines and is the sensitivity, namely, the slope of the calibration graph. In accordance with the formula, the limits of detection for GMF were found to be 0.23, 0.26, 0.52, 0.28, and 0.87 μg mL⁻¹ for BCG, BCP, BTB, BPB, and MO methods, respectively. Whereas, for MXF the detection limits were found to be 0.21, 0.56, 0.25, and 0.41 μg mL⁻¹ for BCP, BTB, BPB, and MO methods, respectively. Also, for ENF the detection limits were found to be 0.48 and 0.51 μg mL⁻¹ for BCG and BTB methods, respectively.

According to this equation, the limit of quantitation for GMF was found to be 0.77, 0.87, 1.73, 0.93, and 2.90 μg mL⁻¹ for BCG, BCP, BTB, BPB, and MO methods, respectively. Whereas, for MXF the detection limits were found to be 0.70, 1.87, 0.83, and 1.37 μg mL⁻¹ for BCP, BTB, BPB, and MO methods, respectively. Also, for ENF the detection limits were found to be 1.6 and 1.70 μg mL⁻¹ for BCG and BTB methods, respectively.

3.5.3. Accuracy and Precision

Specificity of ion-pair reaction and selective determination of GMF, MXF, and ENF which were the basic nitrogenous compounds with acid dyes could be possible. Percentage relative standard deviation (RSD%) as precision and percentage relative error (RE%) as accuracy of the suggested methods were calculated. Precision was carried out by six determinations at four different concentrations in these spectrophotometric methods. The percentage relative error was calculated using the following equation:

The interday and intraday precision and accuracy results are shown in Tables 2, 3, and 4. These results of accuracy and precision show that the proposed methods have good repeatability and reproducibility.

Table 2: Intraday and interday precision and accuracy data for GMF obtained by the proposed methods.

Method
Added (μg mL⁻¹)
Intraday
Interday

Recovery %
Precision RSD %a
Accuracy RE %
Confidence limitb
Recovery %
Precision RSD %a
Accuracy RE %
Confidence limitb

BCG
5.0
99.30
0.53
−0.80
4.996 ± 0.026
100.60
0.43
0.60
5.03 ± 0.022

10
99.50
0.65
−0.50
9.950 ± 0.065
99.30
0.59
−0.70
9.930 ± 0.059

15
99.10
0.82
−0.90
14.865 ± 0.122
99.90
0.83
−0.10
14.985 ± 0.124

BCP
4.0
100.60
0.47
0.60
4.024 ± 0.019
99.30
0.51
−0.70
3.988 ± 0.02

8.0
99.20
0.72
−0.80
7.936 ± 0.057
99.70
0.70
−0.30
7.976 ± 0.056

12
100.20
1.17
0.20
12.024 ± 0.141
100.30
1.10
0.30
12.036 ± 0.132

BPB
5.0
100.10
0.49
0.10
5.005 ± 0.025
99.60
0.62
−0.40
4.98 ± 0.031

10
99.80
0.79
−0.20
9.98 ± 0.079
99.40
0.87
−0.60
9.94 ± 0.086

15
99.70
1.01
−0.30
14.955 ± 0.151
100.20
1.24
0.20
15.03 ± 0.23

BTB
5.0
99.60
0.65
−0.40
4.98 ± 0.032
99.70
0.54
−0.30
4.985 ± 0.027

10
100.10
0.88
0.10
10.01 ± 0.088
99.30
0.75
−0.70
9.93 ± 0.074

15
100.40
0.93
0.40
15.06 ± 0.140
100.20
1.08
0.20
15.03 ± 0.162

MO
10
99.60
0.44
−0.40
9.96 ± 0.044
99.50
0.52
−0.50
9.95 ± 0.052

20
99.80
0.68
−0.20
19.96 ± 0.136
99.70
0.83
−0.30
19.94 ± 0.166

30
100.30
0.98
0.30
30.09 ± 0.295
100.20
1.20
0.20
30.06 ± 0.361

Mean of six determinations; RSD %: percentage relative standard deviation; RE %: percentage relative error.

Confidence limit at 95% confidence level and five degrees of freedom ().

Table 3: Intraday and interday precision and accuracy data for MXF obtained by the proposed methods.

Method
Added (μg mL⁻¹)
Intraday
Interday

Recovery %
Precision RSD %a
Accuracy RE %
Confidence limitb
Recovery %
Precision RSD %a
Accuracy RE %
Confidence limitb

BCP
2.0
99.50
0.36
−0.50

99.00
0.38
−1.00
1.98 ± 0.008

6.0
100.20
0.57
0.20

99.60
0.70
−0.40
5.976 ± 0.042

10
100.50
0.81
0.50

99.80
0.92
−0.20
9.98 ± 0.092

BPB
5.0
99.20
0.42
−0.80

100.30
0.50
0.30
5.015 ± 0.025

10
99.50
0.76
−0.50

99.20
0.79
−0.80
9.92 ± 0.078

15
99.70
0.90
−0.30

99.60
1.16
−0.40
14.94 ± 0.173

BTB
2.0
99.40
0.50
−0.60

100.10
0.58
0.10
2.002 ± 0.012

6.0
99.20
0.79
−0.80

99.70
0.76
−0.30
5.982 ± 0.045

10
99.50
1.05
−0.50

99.30
1.07
−0.70
9.93 ± 0.106

MO
5.0
100.30
0.42
0.30

100.40
0.47
0.40
5.02 ± 0.024

10
100.60
0.85
0.60

99.80
0.83
−0.20
9.98 ± 0.083

15
99.90
1.19
−0.10

99.20
1.23
−0.80
14.88 ± 0.183

Mean of six determinations; RSD %: percentage relative standard deviation; RE %: percentage relative error.

Confidence limit at 95% confidence level and five degrees of freedom ().

Table 4: Intraday and interday precision and accuracy data for ENF obtained by the proposed methods.

Method
Added 

(μg mL⁻¹)
Intraday
Interday

Recovery

%
Precision

RSD %a
Accuracy

RE %
Confidence

limitb
Recovery

%
Precision

RSD %a
Accuracy

RE %
Confidence

limitb

BCG
5.0
99.10
0.42
−0.90

99.60
0.51
−0.40
4.98 ± 0.025

10
100.20
0.78
0.20

99.80
0.75
0.20
9.98 ± 0.075

15
99.40
1.16
−0.60

99.20
1.02
−0.80
14.88 ± 0.152

BTB
5.0
99.30
0.53
−0.70

100.60
0.40
0.60
5.03 ± 0.020

10
99.50
0.90
−0.50

99.40
0.68
−0.60
9.94 ± 0.068

20
100.50
1.15
0.50

99.60
0.96
−0.40
19.92 ± 0.191

Mean of six determinations; RSD%: percentage relative standard deviation; RE%: percentage relative error.

Confidence limit at 95% confidence level and five degrees of freedom ().

3.5.4. Robustness and Ruggedness

For the evaluation of the method robustness, some parameters were interchanged: pH, dye concentration, wavelength range, and shaking time. The capacity remains unaffected by small deliberate variations. Method ruggedness was expressed as RSD% of the same procedure applied by two analysts and with two different instruments on different days. The results showed no statistical differences between procedures done with different analysts and instruments suggesting that the developed methods were robust and rugged.

3.6. Effects of Interference

To assess the usefulness of the method, the effect of diluents, excipients, and additives which often accompany GMF, MXF, and ENF in their dosage forms (starch, lactose, glucose, sucrose, talc, sodium chloride, titanium dioxide, and magnesium stearate) was studied. The results indicated that there is no interference from excipients and additives, indicating a high selectivity for determining the studied GMF, MXF, and ENF in their dosage forms.

3.7. Analysis of Pharmaceutical Formulations

The proposed methods have been successfully applied to the determination of GMF, MXF, and ENF in pharmaceutical dosage forms. Six replicate determinations were made. Moreover, to check the validity of the proposed methods, dosage forms were tested for possible interference with standard addition method (Tables 5, 6, and 7). There was no significant difference between slopes of calibration curves and standard addition methods. Therefore it is concluded that the excipients in pharmaceutical dosage forms of GMF, MXF, and ENF were not found any interference in the analysis of GMF, MXF, and ENF. At 95% confidence level the calculated - and -values did not exceed the theoretical -value indicating no significant difference between the proposed methods and the reported methods for GMF [29], MXF [40], and ENF [44] (Table 8) [52]. The results show that satisfactory recovery data were obtained and the assay results were in good agreement with the reported methods.

Table 5: Determination of GMF in its pharmaceutical dosage forms applying the standard addition technique.

Reagent
Taken (μg mL⁻¹)
Pure drug added (μg mL⁻¹)
Factive tablets
Flobiotic tablet
GemiQue tablets

Total found (μg mL⁻¹)
Recovery %a  ± SD
Total found (μg mL⁻¹)
Recovery %  ± SD
Total found (μg mL⁻¹)
Recovery % ± SD

BCG
2.0
4.0
5.96
99.30 ± 0.78
5.98
99.60 ± 0.67
6.02

8.0
9.91
99.10 ± 1.02
10.02

9.92

12
13.97
99.80 ± 1.24
13.96

13.99

BCP

2.0
2.0
3.996
99.90 ± 0.66
3.96

3.97

6.0
8.02
100.20 ± 0.90
7.98

7.99

10
11.92
99.30 ± 0.95
12.05

11.95

BPB
2.0
4.0
5.97
99.50 ± 0.57
5.99

6.01

8.0
9.97
99.70 ± 0.76
9.96

9.97

12
13.87
99.10 ± 1.14
13.97

13.89

BTB
2.0
4.0
6.03
100.50 ± 0.48
6.01

6.01

8.0
9.90
99.00 ± 0.72
9.96

9.96

12
13.93
99.50 ± 0.97
13.96

14.04

MO
5.0
5.0
9.97
99.70 ± 0.32
9.91

9.99

10
14.94
99.60 ± 0.56
15.06

14.97

20
24.95
99.80 ± 0.90
24.88

24.90

Average of six determinations.

Table 6: Determination of MXF in its pharmaceutical dosage forms applying the standard addition technique.

Reagent
Taken (μg mL⁻¹)
Pure drug added (μg mL⁻¹)
Avelox tablets
Moxiflox tablets
Moxifloxacin tablets

Total found (μg mL⁻¹)
Recovery %a  ± SD
Total found (μg mL⁻¹)
Recovery % ± SD
Total found (μg mL⁻¹)
Recovery % ± SD

BCP

2.0
2.0
3.98
99.40 ± 0.56
3.96

3.98

6.0
7.98
99.70 ± 0.83
8.06

7.98

10
11.89
99.10 ± 1.20
12.02

11.92

BPB
2.0
4.0
5.98
99.60 ± 0.61
5.97

5.96

8.0
9.99
99.90 ± 0.84
9.96

9.99

12
14.07
100.50 ± 1.14
13.99

14.08

BTB
2.0
2.0
3.98
99.50 ± 0.48
3.97

4.01

4.0
5.95
99.20 ± 0.92
5.99

5.96

8.0
10.04
100.40 ± 1.17
10.01

9.95

MO
5.0
5.0
9.91
99.10 ± 0.42
9.94

9.95

10
15.08
100.50 ± 0.76
15.03

14.97

15
19.90
99.50 ± 1.16
19.92

19.83

Average of six determinations.

Table 7: Determination of ENF in its pharmaceutical dosage forms applying the standard addition technique.

Reagent
Taken (μg mL⁻¹)
Pure drug added (μg mL⁻¹)
Enrocin 10% injectable
Avitryl 20% injectable

Total found (μg mL⁻¹)
Recovery %a  ± SD
Total found (μg mL⁻¹)
Recovery % ± SD

BCG
5.0
5.0
9.92
99.20 ± 0.48
9.94
99.40 ± 0.46

10
14.94
99.60 ± 0.66
15.20
100.10 ± 0.72

15
19.98
99.90 ± 0.82
19.90
99.50 ± 1.05

BBTB

5.0
5.0
10.05
100.50 ± 0.56
9.97
99.70 ± 0.52

10
14.91
99.40 ± 0.83
15.05
100.30 ± 0.69

15
19.84
99.20 ± 1.20
19.82
99.10 ± 0.95

Average of six determinations.

Table 8: Application of the proposed methods for the determination of GMF, MXF, and ENF in their pharmaceutical preparations.

Samples
Reported methodsc
Proposed methods

BCG
BCP
BPB
BTB
MO

Factive tablets

    X ± SDa

    t-valueb

0.20
0.07
0.39
0.28
0.13

    F-valueb

1.23
1.75
1.12
1.61
1.11

Flobiotic tablets

    X ± SDa

    t-valueb

0.23
0.15
0.04
0.14
0.23

    F-valueb

1.38
1.42
1.15
1.53
1.67

GemiQue tablets

    X ± SDa

    t-valueb

0.18
0.24
0.37
0.14
0.34

    F-valueb

1.50
1.35
1.66
1.26
1.65

Avelox tablets

    X ± SDa

    t-valueb

0.47
0.21
0.04
0.34

    F-valueb

1.72
1.02
1.53
1.40

Moxiflox tablets

    X ± SDa

    t-valueb

0.28
0.26
0.47
0.28

    F-valueb

2.34
1.83
1.60
3.11

Moxifloxacin tablets

    X ± SDa

    t-valueb

0.16
0.07
0.14
0.03

    F-valueb

1.30
1.32
1.13
1.20

Enrocxin 10% injectable

    X ± SDa

    t-valueb

0.17

0.43

    F-valueb

2.50

1.81

Avitryl 20% injectable

    X ± SDa

    t-valueb

0.32

0.37

    F-valueb

1.78

1.85

Average of six determinations.

Theoretical values for - and -values at five degrees of freedom and 95% confidence limit are and .

Reported spectrophotometric methods for GMF [29], MXF [40], and ENF [44].

4. Conclusion

This paper describes the application of extractive ion-pair complexation reaction with acid dyes for the quantification of some fluoroquinolones antibiotics (GMF, MXF, and ENF) in pure forms and pharmaceutical formulations. Compared with the existing visible spectrophotometric methods, the proposed methods have the advantages of being relatively simple, rapid, cost-effective, free from auxiliary reagents, and more sensitive for determination of the studied drugs in pure form and pharmaceutical formulations. Moreover, the proposed methods are free from tedious experimental steps such as heating unlike the previously reported spectrophotometric methods cited earlier. The most attractive feature of these methods is their relative freedom from interference by the usual diluents and excipients in amounts far in excess of their normal occurrence in pharmaceutical formulations. The statistical parameters and the recovery data reveal high precision and accuracy of the methods besides being robust and rugged. Therefore, the validated method could be useful for routine quality control assay of the studied drugs in pure forms and pharmaceutical formulations.

Conflicts of Interests

There is no other conflict of interests related to this paper.

Authors’ Contribution

All the authors contributed to the concept and design, making and analysis of data, drafting, revising, and final approval. Ayman A. Gouda is responsible for the study registration. Ayman A. Gouda and Amira G. Yousef have done the experiments. Alaa S. Amin provided test samples, reference material, and data analysis. Ayman A. Gouda and Ragaa El-Sheikh are responsible for interpretation, paper writing, and administrative support. All authors read and approved the final paper.

References

S. Budavari, Ed., The Merck Index, Merck and Co., Whitehouse Station, NJ, USA, 13th edition, 2001.

C. S. Sean, Martindale, The Complete Drug Reference, Royal Pharmaceutical Society, Pharmaceutical Press, London, UK, 36th Edn edition, 2009.

M. K. Bolon, “The newer fluoroquinolones,” Infectious Disease Clinics of North America, vol. 23, no. 4, pp. 1027–1051, 2009.

The United States Pharmacopoeia, 35, NF 30, vol. 1, United States Pharmacopeial Convention, Rockville, Md, USA, 2012

S. Shamim, N. Sultana, M. S. Arayne, M. Akhtar, and S. Gul, “Optimization and simultaneous determination of gemifloxacin and Non-steroidal anti-inflammatory drugs in bulk, pharmaceutical formulations and human serum by RP-HPLC and its applications,” International Research Journal of Pharmacy and Pharmacology, vol. 2, no. 10, pp. 245–253, 2012.

B. M. H. Al-Hadiya, A. A. Khady, and G. A. E. Mostafa, “Validated liquid chromatographic-fluorescence method for the quantitation of gemifloxacin in human plasma,” Talanta, vol. 83, no. 1, pp. 110–116, 2010.

A. S. Amin, H. A. Dessouki, and I. A. Agwa, “Ion-pairing and reversed phase liquid chromatography for the determination of three different quinolones: enrofloxacin, lomefloxacin and ofloxacin,” Arabian Journal of Chemistry, vol. 4, no. 3, pp. 249–257, 2011.

A. R. Rote and S. P. Pingle, “Reverse phase-HPLC and HPTLC methods for determination of gemifloxacin mesylate in human plasma,” Journal of Chromatography B, vol. 877, no. 29, pp. 3719–3723, 2009.

N. Sultana, M. S. Arayne, M. Akhtar, S. Shamim, S. Gul, and M. M. Khan, “High-performance liquid chromatography assay for moxifloxacin in bulk, pharmaceutical formulations and serum: application to in-vitro metal interactions,” Journal of the Chinese Chemical Society, vol. 57, no. 4, pp. 708–717, 2010.

S. I. Cho, J. Shim, M.-S. Kim, Y.-K. Kim, and D. S. Chung, “On-line sample cleanup and chiral separation of gemifloxacin in a urinary solution using chiral crown ether as a chiral selector in microchip electrophoresis,” Journal of Chromatography A, vol. 1055, no. 1-2, pp. 241–245, 2004.

E. Kim, Y.-M. Koo, and D. S. Chung, “Chiral counter-current chromatography of gemifloxacin guided by capillary electrophoresis using (+)-(18-crown-6)-tetracarboxylic acid as a chiral selector,” Journal of Chromatography A, vol. 1045, no. 1-2, pp. 119–124, 2004.

A. F. Faria, M. V. N. de Souza, M. V. de Almeida, and M. A. L. de Oliveira, “Simultaneous separation of five fluoroquinolone antibiotics by capillary zone electrophoresis,” Analytica Chimica Acta, vol. 579, no. 2, pp. 185–192, 2006.

A. Radi, A. Khafagy, A. El-shobaky, and H. El-mezayen, “Anodic Voltammetric determination of gemifloxacin using screen-printed carbon electrode,” Journal of Pharmaceutical Analysis, vol. 3, no. 2, pp. 132–136, 2013.

A. A. Ensaifi, T. Khayamian, and M. Taei, “Determination of ultra trace amount of enrofloxacin by adsorptive cathodic stripping voltammetry using copper(II) as an intermediate,” Talanta, vol. 78, no. 3, pp. 942–948, 2009.

A.-E. Radi, T. Wahdan, Z. Anwar, and H. Mostafa, “Electrochemical determination of gatifloxacin, moxifloxacin and sparfloxacin fluoroquinolonic antibiotics on glassy carbon electrode in pharmaceutical formulations,” Drug Testing and Analysis, vol. 2, no. 8, pp. 397–400, 2010.

S. M. Al-Ghannam, “Atomic absorption spectroscopic, conductometric and colorimetric methods for determination of some fluoroquinolone antibacterials using ammonium reineckate,” Spectrochimica Acta A, vol. 69, no. 4, pp. 1188–1194, 2008.

H. Salem, “Spectrofluorimetric, atomic absorption spectrometric and spectrophotometric determination of some fluoroquinolones,” American Journal of Applied Sciences, vol. 2, no. 3, pp. 719–729, 2005.

S. E. K. Tekkeli and A. Önal, “Spectrofluorimetric methods for the determination of gemifloxacin in tablets and spiked plasma samples,” Journal of Fluorescence, vol. 21, no. 3, pp. 1001–1007, 2011.

J. Shah, M. R. Jan, I. Inayatullah, and M. N. Khan, “Micellar-enhanced spectrofluorometric quantification of moxifloxacin in pharmaceutical formulations, human urine and plasma samples,” African Journal of Pharmacy and Pharmacology, vol. 5, no. 5, pp. 616–624, 2011.

M. Kamruzzaman, A.-M. Alam, S. H. Lee et al., “Method for determination of fluoroquinolones based on the plasmonic interaction between their fluorescent terbium complexes and silver nanoparticles,” Microchimica Acta, vol. 174, no. 3, pp. 353–360, 2011.

S. T. Ulu, “Rapid and sensitive spectrofluorimetric determination of enrofloxacin, levofloxacin and ofloxacin with 2,3,5,6-tetrachloro-p-benzoquinone,” Spectrochimica Acta A, vol. 72, no. 5, pp. 1038–1042, 2009.

S. S. Panda, B. V. V. R. Kumar, K. S. Rao, V. R. Kumar, and D. Patanaik, “Difference spectrophotometric determination of gemifloxacin mesylate in tablet formulation,” Asian Journal of Biochemical and Pharmaceutical Research, vol. 1, no. 3, pp. 442–447, 2011.

K. Hajera, “Development and validation of a dissolution test with spectrophotometric analysis for gemifloxacin in tablet dosage form,” International Journal of Research in Pharmaceutical and Biomedical Sciences, vol. 3, no. 1, pp. 90–95, 2012.

S. Dey, Y. V. Reddy, B. Krishna et al., “Spectrophotometric estimation of gemifloxacin in bulk and pharmaceutical dosage form by UV spectrophotometry,” International Journal of Chemical and Analytical Science, vol. 1, no. 6, pp. 130–133, 2010.

V. Balaji, S. Poongothai, B. Madhavi et al., “Development and validation of a dissolution test with spectrophotometric analysis for gemifloxacin in tablet dosage form,” Pharma Science Monitor, vol. 2, no. 2, pp. 132–145, 2010.

M. V. Krishna and D. G. Sankar, “Utility of σ and π-acceptors for the spectrophotometric determination of gemifloxacin mesylate in pharmaceutical formulations,” E-Journal of Chemistry, vol. 5, no. 3, pp. 493–498, 2008.

M. V. Krishna and D. G. Sankar, “Spectrophotometric determination of gemifloxacin mesylate in pharmaceutical formulations through ion-pair complex formation,” E-Journal of Chemistry, vol. 5, no. 3, pp. 515–520, 2008.

S. Ganapathy, G. V. H. Raju, D. G. Sankar, and P. Y. Naidu, “Spectrophotometric determination of gemifloxacin in bulk and pharmaceutical formulation,” Asian Journal of Chemistry, vol. 21, no. 8, pp. 6508–6512, 2009.

Z. Y. Al Shoaibi and A. A. Gouda, “Spectrophotometric methods for the determination of gemifloxacin mesylate in pure form and pharmaceutical formulations,” Analytical Chemistry, vol. 9, no. 1, pp. 1–8, 2010.

D. Madhuri, K. B. Chandrasekhar, N. Devanna, and G. Somasekhar, “Direct and derivative spectrophotometric determination of gemifloxacin mesylate in pure form and pharmaceutical preparations using π acceptors,” International Journal of Pharma Sciences and Research, vol. 1, no. 4, pp. 222–231, 2010.

D. Madhuri, K. B. Chandrasekhar, N. Devanna, and G. Somasekhar, “Direct and derivative spectrophotometric estimation of gemifloxacin by chelation with palladium(II) ion,” Rasayan Journal of Chemistry, vol. 3, no. 1, pp. 159–165, 2010.

D. Jyothirmayee, G. S. Sai Babu, and G. D. Rao, “Spectrophotometric determination of gemifloxacin in pharmaceutical formulations,” Asian Journal of Chemistry, vol. 22, no. 2, pp. 1634–1636, 2010.

D. M. Dhumal, A. A. Shirkhedkar, and S. J. Surana, “Quantitative determination of moxifloxacin hydrochloride in bulk and ophthalmic solution by UV-spectrophotometry and first order derivative using area under curve,” Der Pharmacia Lettre, vol. 3, no. 3, pp. 453–456, 2011.

M. Misra, A. K. Misra, P. Zope, G. M. Panpalia, and A. K. Dorle, “Simple and validated UV-spectroscopic method for estimation of moxifloxacin.HCL in bulk and formulation,” Journal of Global Pharma Technology, vol. 2, no. 6, pp. 21–27, 2010.

P. U. Patel, B. N. Suhagia, and M. M. Patel, “Spectrophotometric methods for estimation of moxifloxacin in pharmaceutical formulations,” Indian Drugs, vol. 42, no. 10, pp. 654–657, 2005.

A. Cirić, R. Jelić, L. Joksović, M. Jelikić-Stankov, and P. Djurdjević, “Determination of moxifloxacin in human plasma by derivative UV spectrophotometry in a micellar medium,” Canadian Journal of Analytical Sciences and Spectroscopy, vol. 52, no. 2, pp. 343–350, 2007.

S. K. Motwani, S. Chopra, F. J. Ahmad, and R. K. Khar, “Validated spectrophotometric methods for the estimation of moxifloxacin in bulk and pharmaceutical formulations,” Spectrochimica Acta A, vol. 68, no. 2, pp. 250–256, 2007.

M. A. Sultan, “New, simple and validated kinetics spectrophotometric method for determination of moxifloxacine in its pharmaceutical formulations,” Arabian Journal of Chemistry, vol. 2, no. 2, pp. 79–85, 2009.

D. R. Chaple and K. P. Bhusari, “Spectrophotometric estimation of fluroquinolones as ion-pairs with bromocresol green in bulk and pharmaceutical dosage form,” Asian Journal of Chemistry, vol. 22, no. 4, pp. 2593–2598, 2010.

L. M. Abdellaziz and M. M. Hosny, “Development and validation of spectrophotometric, atomic absorption and kinetic methods for determination of moxifloxacin hydrochloride,” Analytical Chemistry Insights, vol. 6, no. 1, pp. 67–78, 2011.

G. H. Ragab and A. S. Amin, “Atomic absorption spectroscopic, conductometric and colorimetric methods for determination of fluoroquinolone antibiotics using ammonium reineckate ion-pair complex formation,” Spectrochimica Acta A, vol. 60, no. 4, pp. 973–978, 2004.

C. S. P. Sastry, K. R. Rao, and D. S. Prasad, “Extractive spectrophotometric determination of some fluoroquinolone derivatives in pure and dosage forms,” Talanta, vol. 42, no. 3, pp. 311–316, 1995.

S. Mostafa, M. El-Sadek, and E. A. Alla, “Spectrophotometric determination of ciprofloxacin, enrofloxacin and pefloxacin through charge transfer complex formation,” Journal of Pharmaceutical and Biomedical Analysis, vol. 27, no. 1-2, pp. 133–142, 2002.

S. Mostafa, M. El-Sadek, and E. A. Alla, “Spectrophotometric determination of enrofloxacin and pefloxacin through ion-pair complex formation,” Journal of Pharmaceutical and Biomedical Analysis, vol. 28, no. 1, pp. 173–180, 2002.

M. Rizk, F. Belal, F. Ibrahim, S. M. Ahmed, and N. M. El-Enany, “A simple kinetic spectrophotometric method for the determination of certain 4-quinolones in drug formulations,” Scientia Pharmaceutica, vol. 68, no. 1, pp. 173–188, 2000.

Z. A. El Sherif, “Spectrophotometric determination of enrofloxacin through the formation of a binary complex with iron III, ion-pair and charge-transfer complexation in pure and dosage forms,” Analytical Letters, vol. 32, no. 1, pp. 65–78, 1999.

C. S. P. Sastry, K. R. Rao, J. S. V. M. Lingeswara, and D. S. Prasad, “Two simple spectrophotometric methods for the assay of enrofloxacin in pharmaceutical dosage formulations,” Eastern Pharmacist, vol. 38, no. 1, pp. 143–144, 1995.

H. T. S. Britton, Hydrogen Ions, Chapman & Hall, New York, NY, USA, 4th edition, 1952.

P. Job, Spectrochemical Methods of Analysis, Wiley Interscience, New York, NY, USA, 1971.

J. H. Yoe and A. L. Jones, “Determination of tungsten,” Industrial and Engineering Chemistry, Analytical Edition, vol. 16, p. 111, 1944.

International Conference on Harmonization of Technical Requirements for Registration of Pharmaceuticals for Human Use, ICH Harmonized Tripartite Guideline, Validation of Analytical Procedures: Text and Methodology, Q2(R1), Complementary Guideline on Methodology dated 06 November 1996, ICH, London, UK, 2005.

J. N. Miller and J. C. Miller, Statistics and Chemometrics For Analytical Chemistry, Chapman & Hall/CRC, London, UK, 5th edition, 2005.