Journal of Analytical Methods in Chemistry
Volume 2016 (2016), Article ID 9752735, 8 pages
http://dx.doi.org/10.1155/2016/9752735

Research Article

Analyses of Total Alkaloid Extract of Corydalis yanhusuo by Comprehensive RP × RP Liquid Chromatography with pH Difference

Xiaodong Wei,¹ Hongling Shen,¹ Lijun Wang,¹ Qingyan Meng,² and Wenjie Liu1,2

¹College of Life Science, Tarim University, Alar, Xinjiang 843300, China
²Key Laboratory of Protection and Utilization of Biological Resources in Tarim Basin of Xinjiang Production and Construction Corps, Alar, Xinjiang 843300, China

Received 12 May 2016; Revised 13 July 2016; Accepted 16 August 2016

Academic Editor: Rongda Xu

Copyright © 2016 Xiaodong Wei et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A comprehensive two-dimensional (2D) reverse phase (RP) liquid chromatography (LC) method is developed for alkaloid analysis. This offline comprehensive 2D method is developed using different pH values. With a pH value of 10.5, most alkaloids appear in the form of neutral molecules possessing high retention factors based on their polarity, while the alkaloid polarity order is changed when the pH value decreased to 3.0. The performance of pH modulated 2D LC is demonstrated with 8 alkaloid standards which resulted in orthogonal separation. The developed method is then applied to total alkaloid separation in Corydalis yanhusuo. The first-dimension separation is carried out using methanol and water containing 1.0% ammonium hydroxide and a strong base-resistant RP column, which afforded a peak capacity of 94. The second-dimension analysis is carried out with a surface positive charge column providing a peak capacity of 205 using a mobile phase consisting of acetonitrile and water with 0.15% formic acid. 2D analyses of total alkaloid extract from C. yanhusuo afford a total peak capacity of 9090. Sixteen compounds were tentatively identified based on their ultraviolet spectrum and MS/MS analyses. The proposed method provides an alternative approach to achieve high peak capacity for analysis of alkaloid extract.

1. Introduction

Alkaloids belong to a group of naturally occurring compounds that contain one or more basic nitrogen atoms [1]. Alkaloids can be produced by a large variety of living organisms such as bacteria, fungi, plants, and animals [2]. Alkaloids play an important role for living organisms and are assumed to have protection functions for plants. For example, some toxic alkaloids such as swainsonine originally found in Swainsona canescens prevent animals and insects from eating it [3, 4]. Most alkaloids evoke a bitter taste that accounts for the unpleasant taste of some traditional herbal medicines.

The most outstanding and attractive property of alkaloids is that they may have a wide range of pharmacological activities. Many alkaloids such as ephedrine [5], quinine [6, 7], camptothecin [8], and opioids have been intensively used in traditional herbal medicines as well as modern medicines to treat asthma, malaria, cancer, acute pain, and other diseases. Some alkaloids found in medicinal plants appeared as leading compounds for drug discovery. For example, huperzine A comes from a type of moss that grows in China, Huperzia serrata, and has been used as a reversible acetylcholinesterase inhibitor and NMDA receptor antagonist that crosses the blood-brain barrier and was shown to be an efficacious medicine to treat Alzheimer’s disease [9, 10]. For the limited natural resources, the synthesis of huperzine A analogs appeared to be an attractive field and some have shown higher activities compared to huperzine A [11–13]. Other alkaloids, including cocaine, caffeine, and nicotine, possess restorative or stimulating activities and have been used in energy drinks or as recreational drugs. Some alkaloids can be toxic to human beings such as atropine and solanine [14, 15]. The seeking of new bioactive alkaloids from plant extracts appeared to be an attractive source for drug discovery [16]. Though opioids play important roles in the treatment of acute and chronic pain, the search for novel analgesics is an urgent task for the side effects and potential of drug addiction caused by opioids. Recently, dehydrocorybulbine, an analgesic alkaloid compound isolated from traditional Chinese medicine Corydalis yanhusuo, showed a surprising mechanism of inhibitory action against dopamine D2 receptor in clinical trials [17]. Discovering of new alkaloids from C. yanhusuo extract has aroused great interests.

Various analytical methods have been used for the determination of alkaloid extracts of medicinal plants like gas chromatography [18], gas chromatography mass spectrometry [19], electrophoresis [20], liquid chromatography, and liquid chromatography with mass detection, along with other techniques [21–23]. However, the seeking of novel analytical methods is necessary for the diversity of alkaloids and the complexity of samples, especially for the discovery of low abundant alkaloids and structurally similar alkaloids. Comprehensive two-dimensional liquid chromatography (LC × LC) provides high peak capacity which leads to significantly improved analytical performance compared to conventional single-column liquid chromatography by using orthogonal separation mechanisms [24–27]. For the separation of alkaloids, the combination of 2-dimensional separation generally consists of strong cation exchange (SCE), size exclusion chromatography (SEC), and hydrophilic interaction liquid chromatography (HILIC) with reverse phase (RP) chromatograph [28]. Nevertheless, SCE, SEC, and HILIC mode have limited separation capacity compared to RP chromatography, which decreased the total peak capacity of two-dimensional separation. The incompatibility of the mobile phase of two dimensions also restricted the application of those combinations. RP × RP with different column also showed improved performance versus single dimensional separation [29]; the correlation between the two dimensions showed a low degree of orthogonality. Fortunately, the orthogonality between the two RP dimensions is greatly improved by using different pH values for the separation of proteomic samples and carboxylic acids [30]. The applications of different pH values on the first and second dimensions for 2D LC separation have been reported in the literature for natural products [31], peptides, and pharmaceutical samples [32]; however, the analytical application to alkaloids still needs to be detailed.

The objective of this paper is to develop a LC × LC method for the separation of total alkaloids extract using different pH values to achieve a high degree of separation orthogonality and high peak capacity. Traditionally, the separation of alkaloids with HPLC demands a basic buffer to decrease serious tailing by minimizing the interaction between the basic analytes and acidic residual silanol groups of the column material, or it improves performance by ion-pair chromatography [33]. With positive charged surface particle column [34], it is possible to achieve high efficacy with low ionic strength mobile phases for the separation of basic compounds. More important of all, the elution order of alkaloids is significantly influenced by the pH value of the mobile phases. The performance of the proposed pH modulated RP × RP comprehensive two-dimensional liquid chromatography, including orthogonality and peak capacity [31], was evaluated using eight alkaloids standards and the total alkaloids of C. yanhusuo, a traditional Chinese medicine to alleviate neuropathic pain.

2. Experimental

2.1. Chemicals and Reagents

All HPLC grade solvents were obtained from Sigma-Aldrich (Buchs, Switzerland) and filtered with 0.22 µm membrane before using. Formic acid was purchased from J. T. Baker (Phillipsburg, USA). Analytical grade 99% ethanol and ammonium hydroxide were provided by Sinopharm Chemical Reagent Co. Ltd. (Shanghai, China). Eight alkaloids standards, that is, oxymatrine, cytosine, hordenine, sophoridine, sophocarpine, matrine, evodiamine, and rutecarpine, were purchased from TCI (Shanghai, China). Water was processed with a Milli-Q ultrapure water system (Millipore, Italy). The root of C. yanhusuo was purchased from a local traditional Chinese pharmaceutical store and identified by Professor Yuan Liu from the Department of Chemistry in Southwest University for Nationalities in China.

2.2. Sample Preparation

One hundred grams of whole dry root of C. yanhusuo was ground with a home homogenizer and then extracted three times with 2.4 liters of 60% ethanol for 1 hour in an ultrasonic bath (Kunshan, China) under ambient temperature. The extracts were combined and filtrated under vacuum. The filtrate was then evaporated to dryness with rotary vaporization at 60°C under reduced pressure. The residue oily solid was then suspended in 1.5 liters of 0.01 M hydrochloric acid. After filtration, the pH of the solution was adjusted to 12 carefully with 1 M NaOH, and then extraction was performed with 1.5 liters of ethyl acetate three times. The ethyl acetate fractions were then combined and concentrated to dryness with rotary vaporization at 60°C under reduced pressure to afford 920 mg of total alkaloids extract from C. yanhusuo. Ten milligrams of solid was dissolved in 1 mL of methanol and filtered with 0.45 µm membrane and used for HPLC analysis without further preparation.

2.3. High Performance Liquid Chromatography

Shimadzu LC AT-20 high performance liquid chromatography with dual solvent pump high-pressure gradient system, SPD-20A photodiode array detector, and an autosampler were used for the first-dimension separation. Samples were separated both on a 250 mm × 4.6 mm, 5 µm particle, Waters xBridge RP C18 column with a guard column (Waters, Milford, MA, USA), and a 150 mm × 4.6 mm, 5 µm particle, Acchrom PCP C18 column [34] (Acchrom, Wenling, Zhejiang, China).

Chromatographic elution under pH 10.5 was conducted with binary mobile phase gradient consisting of water (A) and methanol (B) with 1% of ammonium hydroxide in both solvents. Initial gradient conditions were set to 5% B at the flow rate of 1.0 mL/min before incorporating a linear gradient increasing to 100% B over 35 min and held for 5 min. At 41 min, the gradient was returned to the initial conditions and equilibrium for 5 min. The column temperature was maintained at 40°C during the whole process.

The chromatographic elution under pH 3.0 was conducted with binary mobile phase gradient consisting of water (A) and acetonitrile (B) with 0.1% of formic acid in both solvents. Initial gradient conditions were set to 3% B at the flow rate of 1.0 mL/min before incorporating a linear gradient increasing to 100% B over 15 min and held for 5 min. At 26 min, the gradient was returned to the initial conditions and equilibrium for 5 min. The column temperature was maintained at 40°C during the whole process.

2.4. Offline RP × RP Two-Dimensional Liquid Chromatography Analysis

For offline RP × RP 2D LC analyses, the first-dimension separation was performed using xBridge column under basic conditions, and each fraction of 30 seconds (0.5 mL each) of the first-dimensional separation effluent was collected to a 1.5 mL Eppendorf centrifuge tube. Collected fractions were then evaporated to dryness with a centrifuge concentrator under vacuum. One hundred microliters of 50 : 50 methanol with 0.1% formic acid was added to the centrifuge tube to reconstruct the sample solution and then transferred to 1.5 mL vials containing 250 µL glass liner ready for the second-dimension analysis. The second-dimension RP-LC separation was performed on a PCP C18 column (150 mm × 4.6 mm i.d., 5 μm particles) under acidic conditions. The binary mobile phases consisted of 0.1% (v/v) formic acid in water (A) and 0.1% (v/v) formic acid in acetonitrile with 20% water (v/v) (B). The elution gradient used was as follows: 5% B (0-1 min), 5–35% B (1–8 min), and 35–100% B (8–25 min), followed by 5 minutes of isocratic elution with 100% of B before returning to initial conditions at 30 min. The flow rate was 1 mL/min and the column was reequilibrated for 5 min before the next analysis. The column temperature was maintained at 40°C. For each analysis, 20 μL of sample was used for each injection and the remaining sample was ready for HPLC-MS analysis.

2.5. HPLC-MS/MS Analysis

The structure identification of individual alkaloids was performed with MS/MS analysis and compared with published mass data and their UV spectrum. A Waters Acquity UPLC TQD triple quadruple mass spectrometer was used for MS/MS analysis with positive electrospray ionization mode. Fractions from the first-dimensional separation performed with pH 10.5 were dried with centrifuge concentrator and reconstituted to 100 μL with 50 : 50 methanol, and 1 μL was injected to the HPLC-MS/MS using the same column and chromatographic condition in the second-dimension analysis. The rate of the API gas was 1 Lmin⁻¹ and that of the dissolvent gas at 450°C was 1000 Lh⁻¹. ESI voltage was 3.8 KV and the source temperature was 120°C, and the cone voltage was 30 V for precursor ion scan, with 30 V of collision voltage for product ion scan. The precursor ions were determined by a full scan mode with m/z from 200 to 650. Once precursor ions were determined, an automatic optimization process was performed to obtain the optimum conditions for product ion scan mode with helium as collision gas. The instrument was controlled and the data were acquired using MassLynx software (Waters). The MS/MS spectra and their UV spectra were used for the structure identification.

2.6. Data Analysis

Data was acquired with the Shimadzu LC solution software and exported to WaveMetrics Igor Pro 6.31 (Tigard, USA); two-dimensional chromatograms were obtained with Gizmo function and the peak capacities of 1D and 2D separation were calculated according to (1) and (2). Hence.

where is the whole gradient time, is the average peak width at baseline, and is the number of peaks for the calculation. The performance of two-dimensional LC × LC was expressed by the finite orthogonality and sampling rates [24]:

where and are the calculated peak capacity from the LC separation under different pH conditions. is the factor of undersampling rate of the first-dimension peaks. is the fractional surface coverage of the practical 2-dimensional space which stands for the evaluation of orthogonality [29].

3. Results and Discussion

3.1. Separation of Alkaloid Standards with Different pH Conditions

For most alkaloids, the logarithmic association constants, , are in the range 6~9; thus, a pH value greater than 10 provided most alkaloids with the form of unprotonated species. Accordingly, under pH value less than 4, most alkaloids are in the form of protonated ions. Consequently, the separation orthogonality of reverse phase liquid chromatography for alkaloids with different pH conditions was evaluated under pH 10.5 and pH 3.0. pH 10.5 is an extremely challenging high basic condition that is beyond the limitation of most silica-based reverse phase column materials, and the polymer-based reverse phase column material affords lower performance than the silica-based separation material in most cases; a commercially available xBridge RP C18 column with high pH stability up to 12 is selected. Figure 1(a) shows the chromatogram of 8 alkaloid standards under pH 10.5 using methanol and water with 0.5% ammonium hydroxide in both solvents. xBridge column provided good separation for most of the 8 standards with the elution order of oxymatrine, cytosine, hordenine, sophoridine, sophocarpine, matrine, evodiamine, and rutecarpine. Under pH 3, a PCP C18 column is determined for the separation of alkaloids because of less tailing for all eight alkaloid standards. Figure 1(b) shows the separation using acetonitrile and water as a mobile phase with 0.1% formic acid in both solvents. It is interesting to see that the elution order in pH 3.0 is completely altered compared to pH 10.5 in Figure 1(a). Figure 1(c) demonstrates the scattering spot in two-dimensional spaces. The horizontal axis denotes the chromatographic retention time in minutes with pH 3 while the vertical axis is the retention time with pH 10.5. It is easy to conclude that the separation with two different pH conditions provides different selectivity. There is no obvious correlation with the two retention times; thus, good orthogonality is achieved with different pH conditions for alkaloid standards. It is worthy to note that the 8 standards are pairs of standards not fully resolved by both conditions; however, they are baseline resolved by another column. For example, oxymatrine and cytisine are very close in retention time and only showed little separation under pH 10.5; however, these two compounds are completely separated under pH 3 with = 10. Consequently, cytisine and hordenine are almost eluted at dead time and thus overlapped under pH 3 and fully resolved under pH 10.5. Matrine, evodiamine, and rutecarpine exhibit the same elution order with two different separation conditions. Therefore, the combining of separation conditions under pH 3 and pH 10.5 would be suitable for 2D separation of alkaloids, especially for complex samples of natural products.

(a)

(b)

(c)

Figure 1: Analysis of alkaloid standards with different pH conditions. ((a) pH = 10.5; (b) pH = 3.0). (c) The scattering of alkaloid standards retention times with different pH conditions. The -axis denotes the separation under pH 3.0, and the -axis is the separation under pH 10.5. All chromatograms were recorded under 280 nm using a photodiode array detector.

3.2. Analysis of Total Alkaloids of C. yanhusuo Using Different pH Conditions

The separation performance of total alkaloid extract from C. yanhusuo root under different pH conditions is optimized for solvents, pH modifiers, columns, and temperature. Firstly, columns with better performance including narrower peak width and lower tailing factor under acidic conditions for the separation of alkaloid extract were compared. Though xBridge column showed satisfactory performance under basic conditions, the peak shapes decreased with acidic conditions using the same column with noticeable tailing. Thus, the PCP column for the separation of total alkaloids of C. yanhusuo under acidic conditions was selected. Secondly, various pH modifiers including formic acid, glacial acetic acid, phosphorus acid, ammonia, phosphate buffer, and triethylamine were compared for separation capability. Though phosphorus acid afforded better peak shape and better UV detection in gradient elution over formic acid and glacial acetic acid, for the convenience of HPLC-MS/MS analysis, formic acid was finally determined as the optimum modifier under acidic conditions. Likewise, ammonia was determined as a basic modifier for volatility reason. To achieve higher separation orthogonality, methanol was chosen for the separation under basic conditions and acetonitrile was determined for the separation under acidic conditions. Figure 2 shows the chromatogram for C. yanhusuo alkaloids separation under optimized conditions.

(a)

(b)

Figure 2: HPLC separation of Corydalis yanhusuo extract using different pH conditions. (a) Basic conditions using xBridge column under pH 10.5. (b) Acidic conditions using PCP C18 under pH 3.0.

3.3. Two-Dimensional Separation of Total Alkaloids of C. yanhusuo with Comprehensive Two-Dimensional Liquid Chromatography

Comprehensive two-dimensional liquid chromatography with reversed phases in both dimensions is specifically reviewed recently for the separation of various samples including biological compounds, environmental samples, natural products, and proteomic samples, and various online schemes are discussed [27]. For the convenient reason of solvent compatibility, the offline operation method was used in this experiment. Both acidic × basic separation and basic × acidic separation were compared for orthogonality and peak capacity. Figure 3 shows offline comprehensive two-dimensional LC × LC separation of total alkaloids of C. yanhusuo with both reverse phases in each dimension. Several conclusions about the LC × LC separation can be made. First, the two separation instances with different pH conditions are orthogonal to one another. That is, there is no obvious correlation between two retention times and peaks are distributed in the whole two-dimensional separation space. In some cases, compounds coelute through the chromatogram in the first dimension and are separated by the second-dimension separation. This is observed in the second dimension where several compounds are not well separated by chromatographic conditions under pH 3.0 and elute continuously throughout the two-dimensional chromatogram; they are separated by another separation under pH 10.5. Secondly, plenty of examples can be found where the number of peaks resolved in 2D space is much higher than 1D separation. For example, columbamine and canadine both have the same retention time of 15.48 min under acidic conditions; they are fully differentiated under basic conditions (22.32 min for columbamine and 29.16 min for canadine, separately). One of the most important features of reverse phase liquid chromatography is the high separation power (peak capacity). Both separation instances under pH 10.5 and pH 3.0 showed satisfactory peak capacity for total alkaloids of C. yanhusuo. Though several tailing peaks appeared in the PCP column dimension, the PCP column demonstrated better peak shape and narrow peak width compared to the xBridge column, which showed no tailing peak in the whole separation space. Under pH 10.5, the calculated peak capacity for the 20 selected highest peaks in 280 nm is 94 for 45-minute gradient elution. For separation under pH 3.0, 20 peaks were also selected for calculation and the peak capacity of 30-minute gradient elution was 205 instead. This high peak capacity represents satisfactory performance for a relatively short gradient time and could be attributed to the column stationary phase for its unique balance between electrostatic property and hydrophobic retention.

(a)

(b)

Figure 3: (a) A 2D contour plot of offline comprehensive two-dimensional separation of total alkaloids extract of Corydalis yanhusuo. The top chromatograms denote separation with pH 3.0, and the right chromatograms denote separation with pH 10.5. (b) 3D demonstration of two-dimensional separation chromatogram. The -axis is the retention time with pH 3.0, the -axis is the retention time with pH 10.5, and the -axis is the absorption at 280 nm.

However, with the whole capacity for offline LC × LC separation, the peak capacity is greatly limited by the sampling time. In our experiment, each fraction was collected in half a minute; thus, the undersampling correction factor is calculated as

where and are the sampling time and the peak capacity for the 1D separation and is the total gradient elution time.

For there are no obvious correlations between the two dimensions, the surface coverage factor was estimated to be 1 approximately. Thus, the estimated peak capacity for offline LC × LC 2D separation is

3.4. Identification of Individual Alkaloids from C. yanhusuo

The identification of peaks from the 2D separation of total alkaloids from C. yanhusuo was performed manually based on their MS/MS data and UV spectra and published data. For a selected peak from the 2D spectrum, the fraction from the first-dimensional separation was selected and injected to HPLC-MS/MS analysis for the determination of the parent ions and daughter ions. It is worthy to note that the high peak capacity of LC × LC separation greatly improved the accuracy of MS detection for qualitative analysis, for there are many examples of isomers that have identical m/z value of their molecular ion and could not be resolved by MS spectra. In all, 272 peaks were distinguished in two-dimensional analyses, and 16 alkaloids were tentatively identified based on mass-to-charge ratio and their elution order from HPLC column (Table 1). The identified alkaloids from C. yanhusuo extract could be categorized into four classes, that is, protoberberine alkaloids (12), protopapaverine alkaloids (2), aporphine alkaloids (1), and protopine alkaloids (1), which stand for the most common alkaloids found in this plant. In addition, still plenty of peaks remain unidentified, especially for low abundant ones, which fully resolved from each other. It is worth noting that there are only 8 and 7 compounds that could be completely separated by either acidic or basic conditions alone.

Table 1: Identified alkaloids in C. yanhusuo with MS/MS and UV spectra.

Number
(min)
pH 10.5
(min)
pH 3.0
(nm)
[M+H]⁺ ()
Fragment ions ()
Identified compound

1
13.05
19.01
233, 346
330.3
269.3, 251.7
Tetrahydroprotopapaverine [35]

2
13.55
8.50
229, 265
352.2
337.4, 322.4
13-Methyl-dehydrocorydalmine [36]

3
15.45
2.04
230, 341
366.2
333.9, 279.0
Dehydrocorydaline [37]

4
16.34
6.89
231, 262
328.2
313.0, 279.4
Demethylcorydalmine [35]

5
17.08
14.02
234, 276
320.2
292.3, 275.1
Coptisine [38]

6
22.32
15.48
217, 282
338.2
322.2, 294.3
Columbamine [39]

7
22.60
7.52
242, 273
342.2
278.0, 178.3
Tetrahydrocolumbamine [40]

8
22.88
5.26
224, 282
352.2
306.2, 293.2
13-Methylpalmatrubine [41]

9
24.39
4.73
214, 288
354.2
336.2, 275.2
Protopine [42]

10
25.26
5.41
222, 276
356.2
310.2, 294.0
D-Glaucine [43]

11
26.81
3.53
260, 282
352.2
336.2, 308.2
Dehydrocorybulbine [44]

12
27.06
5.26
220, 280
356.2
191.9, 165.2
D,L-Tetrahydropalmatine [44]

13
28.09
19.01
226, 346
352.2
337.4, 308.2
Palmatine [44]

14
29.16
15.48
220, 266
340.2
324.0, 292.0
Canadine [40]

15
30.18
9.80
245, 374
324.2
307.2, 248.8
D,L-Tetrahydrocoptisine [44]

16
31.64
22.02
209, 285
370.2
354.4, 295.5
Fumaricine [40]

4. Conclusions

In this work, an offline RP × RP comprehensive two-dimensional liquid chromatography method with different pH values is evaluated for the analysis of alkaloids from C. yanhusuo extract. The first-dimension separation is performed using a base-resistant column with pH 10.5 using ammonium hydroxide in water and methanol. The second-dimension separation is carried out using a positive charge surface column with formic acid in acetonitrile and water as mobile phase. The orthogonality of the two dimensions is significantly improved by using different pH values. The effective peak capacity in the first dimension is up to 94 and is 205 for the second dimension, respectively. Two-dimensional separation provided excellent separation for the alkaloids from C. yanhusuo extract with an overall peak capacity of 9090. Sixteen compounds are tentatively identified from the extract by MS/MS and UV spectra. The developed method could be applied to the separation of complex alkaloid extract, especially for the discovering of coeluent alkaloids in conventional one-dimensional analysis.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this manuscript.

Acknowledgments

This work was supported by the National Natural Science Foundation of China (Grants nos. 21365018 and 21067012) and the International Science and Technology Cooperation Project of Xinjiang Production and Construction Corps (Grant no. 2015AH005).

References

D. O'Hagan, “Pyrrole, pyrrolidine, pyridine, piperidine and tropane alkaloids,” Natural Product Reports, vol. 17, no. 5, pp. 435–446, 2000.

J. Ziegler and P. J. Facchini, “Alkaloid biosynthesis: metabolism and trafficking,” Annual Review of Plant Biology, vol. 59, pp. 735–769, 2008.

D. Cook, D. R. Gardner, and J. A. Pfister, “Swainsonine-containing plants and their relationship to endophytic fungi,” Journal of Agricultural and Food Chemistry, vol. 62, no. 30, pp. 7326–7334, 2014.

X. L. Gao, D. Cook, M. H. Ralphs et al., “Detection of swainsonine and isolation of the endophyte Undifilum from the major locoweeds in Inner Mongolia,” Biochemical Systematics and Ecology, vol. 45, pp. 79–85, 2012.

M. H. Pittler and E. Ernst, “Dietary supplements for body-weight reduction: a systematic review,” American Journal of Clinical Nutrition, vol. 79, no. 4, pp. 529–536, 2004.

D. G. Lalloo, D. Shingadia, G. Pasvol et al., “UK malaria treatment guidelines,” Journal of Infection, vol. 54, no. 2, pp. 111–121, 2007.

S. Saxena, N. Pant, D. C. Jain, and R. S. Bhakuni, “Antimalarial agents from plant sources,” Current Science, vol. 85, no. 9, pp. 1314–1329, 2003.

G. Kai, C. Wu, L. Gen, L. Zhang, L. Cui, and X. Ni, “Biosynthesis and biotechnological production of anti-cancer drug Camptothecin,” Phytochemistry Reviews, vol. 14, no. 3, pp. 525–539, 2015.

J. S. Liu, Y. L. Zhu, C. M. Yu et al., “The structures of huperzine-A and huperzine-B, 2 new alkaloids exhibiting marked anticholinesterase activity,” Canadian Journal of Chemistry-Revue Canadienne De Chimie, vol. 64, no. 4, pp. 837–839, 1986.

R. Wang, H. Yan, and X.-C. Tang, “Progress in studies of huperzine A, a natural cholinesterase inhibitor from Chinese herbal medicine,” Acta Pharmacologica Sinica, vol. 27, no. 1, pp. 1–26, 2006.

S. Feng, Z. F. Wang, X. C. He et al., “Bis-huperzine B: highly potent and selective acetylcholinesterase inhibitors,” Journal of Medicinal Chemistry, vol. 48, no. 3, pp. 655–657, 2005.

J. Yan, L. Sun, G. Wu et al., “Rational design and synthesis of highly potent anti-acetylcholinesterase activity huperzine A derivatives,” Bioorganic & Medicinal Chemistry, vol. 17, no. 19, pp. 6937–6941, 2009.

R. Ding, B.-F. Sun, and G.-Q. Lin, “An efficient total synthesis of (−)-huperzine A,” Organic Letters, vol. 14, no. 17, pp. 4446–4449, 2012.

M. Friedman and R. Rasooly, “Review of the inhibition of biological activities of food-related selected toxins by natural compounds,” Toxins, vol. 5, no. 4, pp. 743–775, 2013.

E. Rytel, G. Lisińska, and A. Tajner-Czopek, “Toxic compound levels in potatoes are dependent on cultivation methods,” Acta Alimentaria, vol. 42, no. 3, pp. 308–317, 2013.

T. Kino, H. Hatanaka, M. Hashimoto et al., “FK-506, a novel immunosuppressant isolated from a Streptomyces. I. Fermentation, isolation, and physico-chemical and biological characteristics,” Journal of Antibiotics, vol. 40, no. 9, pp. 1249–1255, 1987.

S. L. Ingram, “Pain: novel analgesics from traditional Chinese medicines,” Current Biology, vol. 24, no. 3, pp. R114–R116, 2014.

Y.-T. Yu, H.-Y. Wei, H. Y. Fadamiro, and L. Chen, “Quantitative analysis of alkaloidal constituents in imported fire ants by gas chromatography,” Journal of Agricultural and Food Chemistry, vol. 62, no. 25, pp. 5907–5915, 2014.

A. Akhgari, I. Laakso, T. Seppänen-Laakso et al., “Determination of terpenoid indole alkaloids in hairy roots of Rhazya stricta (Apocynaceae) by GC-MS,” Phytochemical Analysis, vol. 26, no. 5, pp. 331–338, 2015.

X. Y. Chen, Y. X. Tang, S. Y. Wang, Y. P. Song, F. X. Tang, and X. P. Wu, “Field-amplified sample injection in capillary electrophoresis with amperometric detection for the ultratrace analysis of diastereomeric ephedrine alkaloids,” Electrophoresis, vol. 36, no. 16, pp. 1953–1961, 2015.

J. M. Hagel, R. Mandal, B. Han et al., “Metabolome analysis of 20 taxonomically related benzylisoquinoline alkaloid-producing plants,” BMC Plant Biology, vol. 15, no. 1, article 220, 2015.

A. Schenk, B. Siewert, S. Toff, and J. Drewe, “UPLC TOF MS for sensitive quantification of naturally occurring pyrrolizidine alkaloids in Petasites hybridus extract (Ze 339),” Journal of Chromatography B: Analytical Technologies in the Biomedical and Life Sciences, vol. 997, pp. 23–29, 2015.

Y. L. Song, N. Zhang, S. P. Shi et al., “Large-scale qualitative and quantitative characterization of components in Shenfu injection by integrating hydrophilic interaction chromatography, reversed phase liquid chromatography, and tandem mass spectrometry,” Journal of Chromatography A, vol. 1407, pp. 106–118, 2015.

R. E. Murphy, M. R. Schure, and J. P. Foley, “Effect of sampling rate on resolution in comprehensive two-dimensional liquid chromatography,” Analytical Chemistry, vol. 70, no. 8, pp. 1585–1594, 1998.

A. van der Horst and P. J. Schoenmakers, “Comprehensive two-dimensional liquid chromatography of polymers,” Journal of Chromatography A, vol. 1000, no. 1-2, pp. 693–709, 2003.

P. J. Marriott, Z. Y. Wu, and P. Schoenmakers, “Nomenclature and conventions in comprehensive multidimensional chromatography—an update,” LC GC Europe, vol. 25, no. 5, pp. 266–275, 2012.

D. Li, C. Jakob, and O. Schmitz, “Practical considerations in comprehensive two-dimensional liquid chromatography systems (LCxLC) with reversed-phases in both dimensions,” Analytical and Bioanalytical Chemistry, vol. 407, no. 1, pp. 153–167, 2015.

C. T. Scoparo, L. M. de Souza, N. Dartora, G. L. Sassaki, P. A. J. Gorin, and M. Iacomini, “Analysis of Camellia sinensis green and black teas via ultra high performance liquid chromatography assisted by liquid–liquid partition and two-dimensional liquid chromatography (size exclusion × reversed phase),” Journal of Chromatography A, vol. 1222, pp. 29–37, 2012.

M. Gilar, P. Olivova, A. E. Daly, and J. C. Gebler, “Two-dimensional separation of peptides using RP-RP-HPLC system with different pH in first and second separation dimensions,” Journal of Separation Science, vol. 28, no. 14, pp. 1694–1703, 2005.

D. R. Stoll, K. O'Neill, and D. C. Harmes, “Effects of pH mismatch between the two dimensions of reversed-phase×reversed-phase two-dimensional separations on second dimension separation quality for ionogenic compounds—I. Carboxylic acids,” Journal of Chromatography A, vol. 1383, pp. 25–34, 2015.

C. G. Horváth and S. R. Lipsky, “Peak capacity in chromatography,” Analytical Chemistry, vol. 39, no. 14, p. 1893, 1967.

Y. N. Zhang, L. Zeng, C. Pham, and R. D. Xu, “Preparative two-dimensional liquid chromatography/mass spectrometry for the purification of complex pharmaceutical samples,” Journal of Chromatography A, vol. 1324, pp. 86–95, 2014.

D. V. McCalley, “Effect of organic solvent modifier and nature of solute on the performance of bonded silica reversed-phase columns for the analysis of strongly basic compounds by high-performance liquid chromatography,” Journal of Chromatography A, vol. 738, no. 2, pp. 169–179, 1996.

C. R. Wang, Z. M. Guo, Z. Long, X. L. Zhang, and X. M. Liang, “Overloading study of basic compounds with a positively charged C18 column in liquid chromatography,” Journal of Chromatography A, vol. 1281, pp. 60–66, 2013.

J. K. Lee, J. G. Cho, M. C. Song et al., “Isolation of isoquinoline alkaloids from the tuber of Corydalis turtschaninovii and their inhibition activity on low density lipoprotein oxidation,” Journal of the Korean Society for Applied Biological Chemistry, vol. 52, no. 6, pp. 646–654, 2009.

X.-Y. Cheng, Y. Shi, S.-L. Zheng, W. Jin, and H. Sun, “Two new protoberberine quaternary alkaloids from Corydalis yanhusuo,” Journal of Asian Natural Products Research, vol. 10, no. 12, pp. 1117–1121, 2008.

C. Wang, Z. Guo, J. Zhang, J. Zeng, X. Zhang, and X. Liang, “High-performance purification of quaternary alkaloids from Corydalis yanhusuo W. T. Wang using a new polar-copolymerized stationary phase,” Journal of Separation Science, vol. 34, no. 1, pp. 53–58, 2011.

H.-T. Xiao, J. Peng, Y. Liang et al., “Acetylcholinesterase inhibitors from Corydalis yanhusuo,” Natural Product Research, vol. 25, no. 15, pp. 1418–1422, 2011.

T. T. Trinh, K. Franke, A. Porzel, L. Wessjohann, and V. Tran, “Quaternary protoberberine alkaloids from Stephania rotunda,” Journal of Chemistry, vol. 44, no. 2, 2006.

B. Ding, T. Zhou, G. R. Fan, Z. Y. Hong, and Y. T. Wu, “Qualitative and quantitative determination of ten alkaloids in traditional Chinese medicine Corydalis yanhusuo W.T. Wang by LC–MS/MS and LC–DAD,” Journal of Pharmaceutical and Biomedical Analysis, vol. 45, no. 2, pp. 219–226, 2007.

T. T. Hu, X. Zhang, S. Z. Ma, and X. S. Yao, “A new protoberberine alkaloid from Corydalis yanhusuo W. T. Wang,” Chinese Chemical Letters, vol. 20, no. 8, pp. 955–957, 2009.

H. Guinaudeau and M. Shamma, “The protopine alkaloids,” Journal of Natural Products, vol. 45, no. 3, pp. 237–246, 1982.

M. Iranshahy, R. J. Quinn, and M. Iranshahi, “Biologically active isoquinoline alkaloids with drug-like properties from the genus Corydalis,” RSC Advances, vol. 4, no. 31, pp. 15900–15913, 2014.

X.-Y. Cheng, Y. Shi, S.-L. Zheng, H. Sun, and W. Jin, “Studies on chemical constituents in the anti-myocardial ischemia effective fraction of Corydalis yanhusuo,” Journal of Chinese Medicinal Materials, vol. 31, no. 11, pp. 1656–1658, 2008.