Journal of Analytical Methods in Chemistry
Volume 2018 (2018), Article ID 4105092, 10 pages
https://doi.org/10.1155/2018/4105092

Research Article

Quality Analysis of Long dan Xie gan Pill by a Combination of Fingerprint and Multicomponent Quantification with Chemometrics Analysis

Jing Liu,¹ Hui Liu,1,2 Zhong Dai,¹ and Shuangcheng Ma¹

¹National Institutes for Food and Drug Control, Beijing 100050, China
²Institute of Food and Drug, Yanbian Korean Autonomous Prefecture, Jilin Province 133002, China

Correspondence should be addressed to Zhong Dai; daizhong@nifdc.org.cn and Shuangcheng Ma; masc@nifdc.org.cn

Jing Liu and Hui Liu contributed equally to this work.

Received 17 July 2018; Revised 17 October 2018; Accepted 21 November 2018; Published 11 December 2018

Academic Editor: Ricardo Jorgensen Cassella

Copyright © 2018 Jing Liu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Long dan Xie gan pill is a traditional complex compound preparation with a long history for treatment of diseases, including hepatocolic hygropyrexia, dizziness, tinnitus, and deafness. Quality of products from different manufacturers may be varied. Since the current standard could not control the quality of products in a comprehensive and effective way, this study aimed at establishing a practical and convenient approach for holistic quality control of the preparation. This study included both qualitative and quantitative works to get information on the overall composition and main components, respectively. As a result, HPLC fingerprint (UV 240 nm) similarities of all fifty samples were in the range of 0.65∼0.99. Results indicated that there was a difference among products from different manufacturers. Additionally, ten characteristic peaks of the fingerprint were tentatively identified by LC-MS. Further chemometrics analysis was utilized to evaluate the products from different manufacturers. At the same time, the HPLC (UV 285 nm) multicomponent quantification result showed that contents of gentiopicrin, baicalin, baicalein, and wogonin were in the range of 0.61–5.40, 1.96–5.33, 0.10–3.40, and 0.046–1.16 mg·g⁻¹, respectively. Data analysis verified the main different component of baicalein from the fingerprint statistical analysis. It is worth mentioning that the qualitative fingerprint and quantitative multicomponent determination were simultaneously accomplished by HPLC-DAD with dual channels. The study provided sound basis for improving quality control standards. This study also provided practical strategy for overall quality control of traditional Chinese medicines.

1. Introduction

Long dan Xie gan pill is prepared from ten species of crude drugs including Gentianae radix et rhizoma, Scutellariae radix, and Akebiae caulis (Mutong) in Chinese Pharmacopoeia (2015 Edition, Volume I) [1]. It is widely used for the treatment of diseases, including hepatocolic hygropyrexia, dizziness, tinnitus and deafness, hypochondriac pain [1]. The preparation has attracted widespread attention, since it caused aristolochic acid nephropathy (AAN) [2, 3]. At that time, the prescription collected the crude drug of Caulis aristolochiae manshuriensis (Guanmutong) instead of Akebiae caulis [4–6]. Because of the serious adverse effect of aristolochic acids, the medicinal standard of Caulis aristolochiae manshuriensis was abolished and replaced by Akebiae caulis without containing such toxic constituents since 2003.

As one commonly used Chinese patent medicine (CPM) with a long history, Long dan Xie gan pill has about 200 manufacturers. Therefore, the quality of products from different manufacturers may be varied. Since quality is directly related to drug safety and efficacy, it is very important to evaluate the holistic quality of the products. Researchers have been working on the essential quality control and evaluation methods for years [2]. For most CPMs, the effective components are not clear and the consistency of product quality is a key indicator of quality product evaluation. It is worth mentioning that fingerprint is an internationally recognized effective method because it could reflect the overall quality information [2–10]. However, fingerprint is usually used for qualitative consistency evaluation. And the quantification could be achieved by applying multicomponent determination [10–13]. In recent years, more and more chromatographic and spectroscopic methods including LC, LC-MSn, and quantitative nuclear magnetic resonance (QNMR) are applied for the aforementioned qualitative and quantitative work [14–21]. Among these methods, high-performance liquid chromatography (HPLC) is still the main method deployed in quality control of traditional Chinese medicines (TCMs) because of its advantages, including good repeatability, wide application, and high efficiency.

In this study, the qualitative and quantitative consistency information of Long dan Xie gan pill samples was achieved at the same time by a combination of fingerprint with multicomponent quantification by HPLC-diode array detector (DAD) with dual channels (UV 240 nm and 285 nm). Additionally, further deep mining of the data by chemometrics analysis helped to evaluate the differences of products in a more comprehensive and effective way. The results indicated that the established method could comprehensively analyze the product quality. This strategy could provide a practical approach for the holistic quality control of TCM.

2. Materials and Methods

2.1. Chemicals and Reagents

Gentiopicrin (97.6%, batch no. 110770-201716), baicalin (93.5%, batch no. 110715-201720), baicalein (98.5%, batch no. 111595-201607), and wogonin (100%, batch no. 111514-201605) were from the National Institutes for Food and Drug Control, Beijing, China. Methanol (analytical reagent) was from National Drug Chemical Reagents Co. Ltd. Acetonitrile (chromatographic pure) and formic acid (mass spectrometry reagent) were from Thermo Fischer Scientific. The water was of ultrahigh purity.

2.2. Materials

Fifty batches of Long dan Xie gan pill samples were from 8 manufacturers (A∼H). All the samples involve two dosage forms including water-bindered pills (WBP) and big candied pills (BCP). The detailed information is listed as follows (Table 1).

Table 1: Sample information.

No.
Manufacturers
Batch number
Dosage

1
A
B16099
WBP

2
B17001

3
B17045

4
B16033

5
B16040

6
A17057
BCP

7
A16065

8
A16119

9
A17004

10
A17104

11
B
20170502
WBP

12
20170504

13
20170503

14
171002

15
171003

16
C
1704058
WBP

17
1801024

18
1801027

19
1801026

20
1711016

21
D
20180336
WBP

22
20180335

23
20180334

24
20180452

25
20180451

26
20170621
BCP

27
20180419

28
20170620

29
20170504

30
20170308

31
E
180203
WBP

32
180201

33
180204

34
180205

35
180202

36
F
171102
WBP

37
171002

38
170902

39
171101

40
171001

41
G
1801001
WBP

42
1802005

43
1801003

44
1801004

45
1802006

46
H
180102
BCP

47
180101

48
171001

49
171002

50
160501

2.3. Instrumentations

HPLC analysis was performed on a Waters 2690 HPLC instrument (Waters, Milford, USA), equipped with a DAD, an autosampler and a column heater. METTLER XS105 electronic analytical balance (Mettler-toledo, Zurich, Switzerland), Milli-Q water purification system (Milli-pore, Burlington, USA), and KQ-300DA numerical control ultrasound cleaning instrument (Kunshan Ultrasonic Instruments Co. Ltd., Kunshan, China) were used. Chemometrics analysis was achieved by ChemPattern software (Chenmind Technologies Co., Ltd., Beijing, China).

2.4. Preparation of Standard Solutions

Standard stock solutions of baicalin (0.1 mg·mL⁻¹) were prepared by dissolving suitable amounts of reference substance in methanol for fingerprint establishment.

Standard stock mixed solution of gentiopicrin (0.4972 mg·mL⁻¹), baicalin (0.5268 mg·mL⁻¹), baicalein (0.4688 mg·mL⁻¹), and wogonin (0.5080 mg·mL⁻¹) was prepared by dissolving suitable amounts of each reference substance in methanol for multicomponents assay.

2.5. Preparation of Sample Solutions

For Long dan Xie gan pill (WBP) (6 g per small bag), 5 bags were mixed and pulverized to powder. For Long dan Xie gan pill (BCP) (6 g per pill), 5 pills were cut into small pieces. Then, 2 g were weighed accurately and put into a 50 mL plug conical bottle. Twenty-five mL methanol (for WBP samples) and 25 mL 80% methanol-water solution (for BCP samples) were added precisely and weighed, respectively. After extracting by ultrasonication (power: 300 W; frequency: 40 kHz) for 30 min, the extract was cooled down and then made up for lost weight by adding methanol (for WBP samples) or 80% methanol (for BCP samples). The continuous filtrate was taken and then filtered by 0.22 μm microporous filter membrane.

2.6. HPLC-DAD Chromatographic Condition

Column: Phenomenex Gemini C18 (4.60 × 250 mm, 5 μm); mobile phase: gradient elution with acetonitrile- (A-)0.1% formic acid-water solution (B) (0–5 min, 7%A–10%A; 5–11 min, 10%A–15%A; 11–15 min, 15%A–20%A; 15–32 min, 20%A–30%A; 32–54 min, 30%A–55%A; 54–60 min, 55%A–80%A; and 60–68 min, 7%A); flow rate: 1.0 mL·min⁻¹; column temperature: 30°C; injection volume: 10 µL; detection wavelength: UV 240 nm for fingerprint and UV 285 nm for multicomponent determination. The typical chromatograms were shown as Figures 1 and 2, respectively.

Figure 1: HPLC (UV 240 nm) chromatogram of the typical sample.

(a)

(b)

Figure 2: HPLC (UV 285 nm) chromatograms of mixed standard solution (a) (A, Gentiopicrin; B, Baicalin; C, Baicalein; and D, Wogonin) and typical sample (b).

2.7. Mass Spectrometry Condition

MS analysis was performed on an Agilent1260-6410B LC-MS couplet system equipped with Agilent Mass Hunter ChemStation (Agilent, Santa Clara, USA). The mass spectrometry settings were as follows: split ratio = 1 : 9; desolvation temperature: 350°C; desolvation air flow N₂: 540 L·h⁻¹; nebulizer pressure: 30 psi; and capillary: 4000 V. Both positive and negative modes were performed with a scan range of m/z 50–1200.

3. Results and Discussion

3.1. Results of Fingerprint

For fingerprint study, all the samples were prepared and analyzed according to conditions under 2.5 and 2.6. Baicalin (tR = 34.02 min) was taken as the reference peak. Relative retention times (RRTs) and relative peak areas (RPAs) of the characteristic peaks were calculated for method validation.

3.1.1. Instrument Precision

The same sample solution (no. 21) was injected for six consecutive times. The result showed that the RSDs of RRTs and RPAs were in the range of 0.073%–2.0% and 0.26–1.74%, respectively. It showed that the precision of the instrument was good.

3.1.2. Repeatability

The same batch sample (no. 21) was taken and prepared for six independent sample solutions for analysis. The result showed that the RSDs of RRT and RPA were in the range of 0.010%–0.44% and 0.51–2.24%, respectively. It indicated that method repeatability was good.

3.1.3. Stability

The same sample solution (no. 21) was injected at 0, 4, 8, 12, 16, 20, and 24 h at room temperature. The result showed that the RSDs of RRT and RPA were in the range of 0.039%–0.81% and 0.71–4.58%, respectively. It demonstrated the sample solution was stable within 24 h.

3.1.4. Establishment of Fingerprint

After fifty batches of the sample solutions were analyzed, their chromatograms (UV 240 nm) were recorded (Figure 3) and imported to ChemPattern software. All variables were used as the common peak screening condition. And Gauss curve simulation method was applied to generate the common mode with 16 characteristic peaks (Figure 4). All sample chromatograms were analyzed by comparison with the common mode.

Figure 3: HPLC chromatograms (UV240 nm) of Long dan Xie gan pill samples.

Figure 4: HPLC (UV240 nm) common mode of Long dan Xie gan pill samples.

3.1.5. Identification and Attribution of Characteristic Peaks

The sample solution was analyzed according to the conditions under Sections 2.6 and 2.7. By combination with the chromatographic behavior of the components, ten characteristic peaks were identified by comparing with reference standards. Also the main origins of the peaks were attributed (Table 2), and they were mainly from five species of crude drugs in the prescription.

Table 2: Identification of characteristic peaks of Long dan Xie gan pill.

Peak no.
Compounds
tR (min)
Molecular formula
Molecular weight
Quasimolecular ions
Origin

3
Geniposidic acid
7.83
C₁₆H₂₂O₁₀
374.34
372.9 [M-H]⁻
Gardeniae fructus

6
Geniposide
15.07
C₁₇H₂₄O₁₀
388.37
433.0 [M+HCOO]⁻
Gardeniae fructus

7
Gentiopicrin
16.18
C₁₆H₂₀O₉
356.32
400.9 [M+HCOO]⁻
Gentianae radix et rhizoma

8
Verbascoside
22.86
C₂₉H₃₆O₁₅
624.59
623.0 [M-H]⁻
Plantaginis semen/rehmanniae radix

10
Baicalin
33.88
C₂₁H₁₈O₁₁
446.36
445.0 [M-H]⁻
Scutellariae radix

11
Isomer of wogonoside
38.62
C₂₂H₂₀O₁₁
460.39
459.0 [M-H]⁻
Scutellariae radix

12
Wogonoside
40.44
C₂₂H₂₀O₁₁
460.39
459.0 [M-H]⁻
Scutellariae radix

14
Baicalein
43.82
C₁₅H₁₀O₅
270.24
268.9 [M-H]⁻
Scutellariae radix

15
Isomer of wogonin
51.40
C₁₆H₁₂O₅
284.26
282.9 [M-H]⁻
Scutellariae radix

16
Wogonin
51.99
C₁₆H₁₂O₅
284.26
282.9 [M-H]⁻
Scutellariae radix

3.1.6. Statistical Analysis

(1) Similarity Analysis. The above HPLC (UV 240 nm) fingerprint common mode was taken as a reference. During the analysis, the included angle cosine method was used to calculate the similarity of each sample (Figure 5). Finally, the similarities of all samples were in the range of 0.65∼0.99. Among them, similarities of seven batches of samples were lower than 0.8, including all samples from enterprise B. The result indicated that there was a certain difference among the overall product quality of these samples from others. Also it was clear that the uniformity of most BCP samples (no. 6∼10 and 26∼30) was not good as the WBP ones.

Figure 5: Similarity analysis results of Long dan Xie gan pill samples.

(2) Principle Component Analysis. Principle component analysis (PCA) was carried out after standardization of all sample data (Figures 6 and 7). The contribution rates of the first and second principle component (PC1) were 45.92% and 39.22%, respectively. And the total contribution rate of 85.14% showed that it could reflect the differences between samples in a more comprehensive way. PCA scatter plot (Figure 6) displayed that samples from each enterprise basically could be grouped into a class. It showed that samples from enterprise B deviated far away from others. The principle component load diagram (Figure 7) gave the proportion of each chromatographic peak in the principal component. And the greater the distance from X = 0 longitudinal axis, the greater the contribution to PC1, such as gentiopicrin and baicalein. Likewise, the greater the distance from Y = 0 transverse axis, the greater the contribution to PC2, such as baicalein and geniposide. The result displayed that samples from enterprise B separated with others along both PC1 and PC2. Therefore, the major contributions to PC1 and PC2 were their main differential components from others. Because of the location at the position of PC1 > 0 and PC2 < 0, contents of such compounds were in positive correlation with PC1 and in negative correlation with PC2. Therefore, the contents of baicalein and wogonin were higher in these samples. Along the PC1, the concentration of baicalein distinguished the samples of enterprise B, whose values were higher than those presented for the others (Figure 6). On the contrary, along with the PC2, the levels of geniposide and gentiopicrin showed that there was a tendency for the separation of the products of enterprises D and G from others. One sample of enterprise A was grouped with samples of enterprises D and G, which presented higher levels for these compounds.

Figure 6: PCA score scatter plot of Long dan Xie gan pill samples.

Figure 7: PCA loading scatter plot of Long dan Xie gan pill samples (1–16 represents the number of chromatographic peaks in the common mode).

(3) Cluster Analysis. Hierarchical cluster analysis (HCA) is a conventional cluster analysis method. It is a detection tool that clearly reveals the natural grouping of data. The block distance was selected for distance calculation and HCA (Figure 8) was performed by error square sum method. Similar to the result of PCA, except that some samples from manufacturer D are not distinguished from those of A, other samples from different enterprises could basically distinguish. Additionally, samples from B were relatively most far away from others. It indicated there existed some differences of these samples.

Figure 8: Dendrograms of hierarchical cluster analysis of Long dan Xie gan pill samples.

3.2. Results of Multicomponent Quantification

3.2.1. Linearity, LOD, and LOQ

Working standard solutions containing gentiopicrin, baicalin, baicalein, and wogonin were prepared by diluting the stock mixed solution with methanol to a series of proper concentrations. Then, they were injected and analyzed. The results of regression equations, linearity, determination coefficient, and limits of detection and quantification of the method are presented in Table 3. The linear range varied from 3.25 to 492.56 μg mL⁻¹, in accordance with the analyte. All analytes presented a determination coefficient (R²) of the 0.9999, which allows the method to be considered linear. The limits of detection (LOD) and quantification (LOQ) were calculated according to guidelines for validation of analytical methods for pharmaceutical quality standards [22].

Table 3: Regression equations, linearity, determination coefficient, and limits of detection and quantification of the method.

Components
Regression equations
Linear range (μg·mL⁻¹)
R²
LOD (ng)
LOQ (ng)

Gentiopicrin
y = 11524 x + 12562
7.76∼485.27
0.9999
0.837
2.790

Baicalin
y = 32266 x + 4256.2
7.88∼492.56
0.9999
0.431
1.077

Baicalein
y = 43732 x − 23130
7.39∼461.77
0.9999
0.439
1.025

Wogonin
y = 47996 x + 23628
3.25∼203.20
0.9999
0.190
0.474

3.2.2. Instrument Precision

The same sample solution (no. 21) was injected for six consecutive times and analyzed. The RSDs of peak areas for gentiopicrin, baicalin, baicalein, and wogonin were 0.63%, 0.29%, 0.41%, and 0.15%, respectively. It indicated that the precision of the instrument was in accordance with the requirement in guidelines for validation of analytical methods for pharmaceutical quality standards [22].

3.2.3. Repeatability

The same batch of sample (no. 21) was taken and prepared for six independent sample solutions. Then, they were analyzed according to conditions under 2.6. The average contents of gentiopicrin, baicalin, baicalein, and wogonin were 4.77, 3.84, 0.62, and 0.40 mg·g⁻¹, respectively. And the RSDs were 0.49%, 1.11%, 0.40%, and 0.56%, respectively. It indicated that method repeatability was in accordance with the requirement in guidelines for validation of analytical methods for pharmaceutical quality standards [22].

3.2.4. Stability

The same sample solution (no. 21) was injected at 0, 4, 8, 12, 18, and 24 h at room temperature. The RSDs of contents for gentiopicrin, baicalin, baicalein, and wogonin were 1.88%, 1.54%, 1.70%, and 3.22%, respectively. It indicated that the sample solution was stable within 24 h.

3.2.5. Recovery

The recovery experiment was performed by adding a known amount of individual reference standards into a certain amount of sample (no. 21).

Six separate samples of 1 g (contents of gentiopicrin, baicalin, baicalein, and wogonin were 4.77, 3.84, 0.62, and 0.40 mg·g⁻¹, respectively) were weighed accurately. And 25 mL of mixed reference standard solution (concentrations of gentiopicrin, baicalin, baicalein, and wogonin were 0.1861, 0.1505, 0.04856, and 0.0300 mg·mL⁻¹, respectively) was added separately and prepared. The results (Table 4) showed that the average recoveries of four components ranged from 97.71% to 100.59% with RSDs in the range of 0.72%–1.29%, which indicated that the method was accurate.

Table 4: Recovery results of four components in Long dan Xie gan pill samples.

Components
No.
Sampling amount (g)
Sample content (mg)
Added amount (mg)
Detected amount (mg)
Recovery (%)
Average recovery (%)

Gentiopicrin
1
1.0005
4.772
4.653
9.371
98.83
100.59% (RSD 1.22%)

2
1.0017
4.778
4.653
9.432
100.02

3
1.0006
4.773
4.653
9.431
100.11

4
1.0047
4.792
4.653
9.473
100.60

5
1.0030
4.784
4.653
9.528
101.96

6
1.0026
4.782
4.653
9.529
102.02

Baicalin
1
1.0005
3.842
3.762
7.478
96.65
97.96% (RSD 0.87%)

2
1.0017
3.847
3.762
7.537
98.09

3
1.0006
3.842
3.762
7.503
97.32

4
1.0047
3.858
3.762
7.583
99.02

5
1.0030
3.852
3.762
7.543
98.11

6
1.0026
3.850
3.762
7.554
98.56

Baicalein
1
1.0005
0.620
1.214
1.807
97.78
97.71% (RSD 0.72%)

2
1.0017
0.621
1.214
1.802
97.28

3
1.0006
0.620
1.214
1.793
96.62

4
1.0047
0.623
1.214
1.809
97.69

5
1.0030
0.622
1.214
1.816
98.35

6
1.0026
0.622
1.214
1.818
98.52

Wogonin
1
1.0005
0.400
0.750
1.141
98.80
99.98% (RSD 1.29%)

2
1.0017
0.401
0.750
1.146
99.33

3
1.0006
0.400
0.750
1.141
98.80

4
1.0047
0.402
0.750
1.153
100.13

5
1.0030
0.401
0.750
1.156
100.67

6
1.0026
0.401
0.750
1.167
102.13

3.2.6. Sample Analysis

Fifty batches of sample solutions were prepared and analyzed. The results (Table 5) displayed that the contents of gentiopicrin, baicalin, baicalein, and wogonin were in the range of 0.61–5.40, 1.96–5.33, 0.10–3.40, and 0.046–1.16 mg·g⁻¹, respectively. It was easily to find the differences among samples from different enterprises by the scatter diagram (Figure 9). It showed that the general content trends of baicalin, baicalein, and wogonin were basically similar. Among them, the contents of baicalein and wogonin in samples from B were apparently higher than others; especially, the content of baicalein was much higher. The determination result was in accordance with the abovementioned PCA analysis result.

Table 5: Contents of four components in Long dan Xie gan pills (mg·g⁻¹).

No.
Manufacturers (dosage)
Gentiopicrin
Baicalin
Baicalein
Wogonin

1
A (WBP)
1.579
3.191
0.778
0.433

2
1.391
2.912
0.992
0.449

3
3.295
3.102
0.741
0.429

4
1.801
2.582
0.718
0.381

5
1.884
3.006
0.976
0.526

6
A (BCP)
1.510
2.133
0.330
0.198

7
0.979
2.173
0.298
0.130

8
0.816
2.269
0.337
0.176

9
0.746
2.148
0.176
0.103

10
1.777
2.409
0.362
0.176

11
B (WBP)
1.019
4.153
3.049
1.129

12
1.013
4.394
3.141
1.158

13
0.963
3.763
3.280
1.080

14
0.860
4.396
3.133
0.994

15
0.826
5.330
3.405
1.084

16
C (WBP)
2.801
3.460
0.295
0.232

17
2.442
3.359
0.502
0.300

18
2.138
3.353
0.423
0.274

19
2.822
3.363
0.411
0.270

20
2.724
3.889
0.294
0.216

21
D (WBP)
4.753
3.747
0.622
0.406

22
4.166
3.123
0.570
0.367

23
4.344
3.118
0.590
0.381

24
4.028
3.047
0.585
0.385

25
4.084
3.642
0.589
0.390

26
D (BCP)
1.562
2.412
0.203
0.110

27
1.157
2.371
0.235
0.125

28
1.688
2.337
0.189
0.102

29
0.606
2.879
0.100
0.046

30
0.670
3.170
0.111
0.052

31
E (WBP)
1.922
2.210
0.722
0.314

32
1.620
2.205
0.698
0.324

33
1.815
2.304
0.715
0.323

34
1.749
2.188
0.715
0.320

35
1.650
2.407
0.779
0.333

36
F (WBP)
0.690
2.297
0.817
0.387

37
0.669
2.279
0.837
0.397

38
0.675
2.175
0.811
0.385

39
0.640
2.051
0.800
0.374

40
0.660
1.963
0.821
0.394

41
G (WBP)
4.544
4.012
0.587
0.291

42
5.331
3.771
0.524
0.256

43
5.103
3.419
0.505
0.263

44
5.402
3.990
0.567
0.261

45
5.128
3.862
0.501
0.249

46
H (BCP)
2.822
3.082
0.372
0.176

47
2.768
3.214
0.376
0.181

48
2.721
3.177
0.367
0.178

49
2.736
3.177
0.365
0.180

50
2.758
3.153
0.359
0.168

Figure 9: The scatter diagram of four components’ contents in Long dan Xie gan pill samples.

3.3. Optimization of Experimental Conditions

3.3.1. Investigation of Extraction Methods

The extraction method was optimized in order to make the fingerprint reflect the chemical composition information as much as possible. For both dosage forms of samples, different extraction solvent (80% methanol and 50% methanol-water), and extraction mode and time (ultrasonic extraction for 30 min, 45 min, and 60 min) were investigated. The result showed that extraction time had little effect on both dosage forms. For WBP samples, the chromatogram could reflect rich chemical information with good separation of peaks with methanol extraction for 30 min. While for BCP samples, the dissolution was good by extraction with 80% methanol-water for 30 min.

3.3.2. Study on the Chromatographic Condition

During the study, different mobile phase systems including methanol-water, acetonitrile-water, methanol-0.1% formic acid, and acetonitrile-0.1% formic acid were investigated. Also different chromatographic, columns including Waters Symmetry Shield™ RP 18, Agilent Zorbax SB-C18, and Phenomenex Gemini C18 were experimented. Additionally, both DAD and DAD-ELSD detection were analyzed. As a result, the chromatogram was good on the Phenomenex Gemini C18 column with acetonitrile-0.1% formic acid as the mobile phase under DAD detection. Finally, UV 240 nm was selected as detection wavelength for fingerprint establishment, since it could reflect much chemical information. Meanwhile, UV 285 nm was determined as detection wavelength for simultaneous determination of main compounds due to the good separation.

4. Conclusions

Quality control is the key issue in modernization and internationalization of TCM. Qualitative fingerprint and quantitative multicomponent determination have been demonstrated as the comprehensive and effective way to accomplish the holistic quality analysis. In this study, both qualitative and quantitative works to get the overall composition and main components information were accomplished simultaneously by HPLC with dual-channel detection. Moreover, further deep mining of the data by chemometrics analysis helped to evaluate the quality of the preparation from different manufacturers. The result indicated that this approach is a powerful tool for quality control of TCM.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Acknowledgments

The investigation was financially supported by the China Food and Drug Administration consignment inspection project.

References

Chinese Pharmacopoeia Commission, Chinese Pharmacopoeia, vol. 1, The Medicine Science and Technology Press of China, Beijing, China, 2015.

Y. Jiang, B. David, P.-F. Tu, and Y. Barbin, “Recent analytical approaches in quality control of traditional Chinese medicine—a review,” Analytica Chimica Acta, vol. 657, no. 1, pp. 9–18, 2010.

H. Sun, X. Chen, A.-H. Zhang, T. Sakurai, J.-Z. Jiang, and X.-J. Wang, “Chromatographic fingerprinting analysis of Zhizhu Wan preparation by high-performance liquid chromatography coupled with photodiode array detector,” Pharmacognosy Magazine, vol. 10, no. 40, pp. 470–476, 2014.

C.-W. Chen, F.-Y. Song, H. Li, F. Chen, and C. Wang, “UPLC fingerprint and chemical pattern recognition method of Antai Pills,” Chinese Journal of Pharmaceutical Analysis, vol. 36, no. 3, pp. 465–471, 2016.

K.-X. Xu, Z.-N. Yin, W.-T. Zhang et al., “Study on UPLC fingerprint of Abri Herba,” Chinese Journal of Pharmaceutical Analysis, vol. 38, no. 1, pp. 168–174, 2018.

F.-Y. He, Y. He, X.-R. Hu, Z. Dai, and S.-C. Ma, “GC fingerprint analysis of dieda huoxue powder,” Chinese Journal of Experimental Traditional Medical Formulae, vol. 23, no. 2, pp. 53–56, 2017.

G.-X. Sun, Z.-F. Hou, W.-Y. Li, Y.-P. Yu, D.-D. Ma, and B. Chen, “Characteristics, composition and evaluation of multi-element and multi-dimensional fingerprints for traditional Chinese medicine,” Central South Pharmacy, vol. 12, no. 6, pp. 497–504, 2014.

C.-Y. Huang, D.-W. Ouyang, L.-X. Niu, J. Zhou, S. Lin, and X. Hu, “Study on quality evaluation of dihuang (Rehmannia glutinosa) by two-dimension HPLC fingerprints and chemometrics methods,” China Journal of Chinese Materia Medica, vol. 43, no. 8, pp. 1667–1674, 2018.

M.-G. B. González, E.-P. Castaño, M.-S. Viñas, and D.-G. Evangelista, “Using the liquid-chromatographic-fingerprint of sterols fraction to discriminate virgin olive from other edible oils,” Journal of Chromatography A, vol. 1380, pp. 64–70, 2015.

A. Hawrył, M. Hawrył, R. Świeboda, and M. W. Hajnos, “Chemometric analysis based on high-performance liquid chromatographic data in the fingerprint construction of selected Achillea species,” Journal of Liquid Chromatography and Related Technologies, vol. 41, no. 1, pp. 1–5, 2017.

A. Karioti, P. Timoteo, M.-C. Bergonzi, and A.-R. Bilia, “A validated method for the quality control of Andrographis paniculata preparations,” Planta Medica, vol. 83, no. 14-15, pp. 1207–1213, 2017.

J. Guan, H.-Y. Zhu, S.-Z. Yin et al., “Simultaneous determination of eight active components in Long Dan Xie Gan Pills by HPLC,” Chinese Journal of Pharmaceutical Analysis, vol. 37, no. 12, pp. 2253–2259, 2017.

K. Zan, C.-R. Wangjie, J. Lu, L.-N. Guo, J. Zheng, and S.-C. Ma, “Content determination of four diester diterpenoid alkaloids in leaves of Aconitum kusnezoffii by HPLC,” China Journal of Chinese Materia Medica, vol. 43, no. 4, pp. 766–771, 2018.

J.-D. Zhang, W. Guo, Y. Tang, A.-J. Shao, and B. Yang, “Quality assessment of commercial rosemary based on liquid/gas chromatography and mass spectrometry with multivariate statistical analysis,” China Journal of Chinese Materia Medica, vol. 43, no. 6, pp. 1192–1200, 2018.

A.-P. Li, J.-J. Chen, Z.-Y. Li, and X.-M. Qin, “Quality consistency investigation of Astragali Radix based on ¹H-NMR fingerprints,” Journal of Chinese Medicinal Materials, vol. 40, no. 9, pp. 2107–2111, 2017.

H. Liu, J. Su, X. Liang et al., “Identification and determination of the major constituents in traditional Chinese medicine Long Dan Xie Gan Pill by HPLC-DAD-ESI-MS,” Journal of Pharmaceutical Analysis, vol. 1, no. 1, pp. 1–7, 2011.

Q. Wang, W. Song, X. Qiao et al., “Simultaneous quantification of 50 bioactive compounds of the traditional Chinese medicine formula Gegen-Qinlian decoction using ultra-high performance liquid chromatography coupled with tandem mass spectrometry,” Journal of Chromatography A, vol. 1454, no. 1, pp. 15–25, 2016.

Y. Ma, J.-C. Li, W.-J. Huang et al., “Simultaneous determination of six triterpenoid acids from Guizhi Fuling capsules by UPLC-MS/MS,” China Journal of Chinese Materia Medica, vol. 42, no. 17, pp. 3368–3373, 2017.

M.-H. Yang, J.-S. Wang, and L.-Y. Kong, “Quantitative analysis of four major diterpenoids in Andrographis paniculata by ¹H NMR and its application for quality control of commercial preparations,” Journal of Pharmaceutical and Biomedical Analysis, vol. 70, no. 1, pp. 87–93, 2012.

M. W.-G. Wang, X.-L. Ma, X.-Y. Guo, M.-B. Zhao, P.-F. Tu, and Y. Jiang, “A series of strategies for solving the shortage of reference standards for multi-components determination of traditional Chinese medicine, Mahoniae Caulis as a case,” Journal of Chromatography A, vol. 1412, no. 4, pp. 100–111, 2015.

M.-H. Gad, E. Tuenter, N. Ei-Sawi et al., “Identification of some bioactive metabolites in a fractionated methanol extract from Ipomoea aquatic (Aerial parts) through TLC, HPLC, UPLC-ESI-QTOF-MS and LC-SPE-NMR fingerprints analyses,” Phytochemical Analysis, vol. 29, no. 1, pp. 5–15, 2017.

Chinese Pharmacopoeia Commission, Chinese Pharmacopoeia, vol. 4, The Medicine Science and Technology Press of China, Beijing, China, 2015.