Journal of Analytical Methods in Chemistry
Volume 2018 (2018), Article ID 7265193, 1 page
https://doi.org/10.1155/2018/7265193

Corrigendum

Corrigendum to “Polythiophene-Chitosan Magnetic Nanocomposite as a Highly Efficient Medium for Isolation of Fluoxetine from Aqueous and Biological Samples”

Shokooh Ehteshami, Alireza Feizbakhsh, and Amir Hossein Mohsen Sarrafi

Analytical Chemistry Laboratories, Department of Chemistry, Islamic Azad University, Central Tehran Branch, Tehran, Iran

Correspondence should be addressed to Alireza Feizbakhsh; ali.fb1973@yahoo.com

Received 26 February 2018; Accepted 4 March 2018; Published 1 April 2018

Copyright © 2018 Shokooh Ehteshami et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Polythiophene-Chitosan Magnetic Nanocomposite as a Highly Efficient Medium for Isolation of Fluoxetine from Aqueous and Biological Samples” [1], the order of the authors was incorrect. The revised authors’ list is shown above.

References

A. Feizbakhsh, A. H. M. Sarrafi, and S. Ehteshami, “Polythiophene-chitosan magnetic nanocomposite as a highly efficient medium for isolation of fluoxetine from aqueous and biological samples,” Journal of Analytical Methods in Chemistry, vol. 2016, Article ID 2921706, 11 pages, 2016.