Journal of Combustion
Volume 2019 (2019), Article ID 3945453, 1 page
https://doi.org/10.1155/2019/3945453

Corrigendum

Corrigendum to “Prediction of Pollutant Emissions from Bluff-Body Stabilised Nonpremixed Flames”

Nelu Munteanu and Shokri Amzin

Western Norway University of Applied Sciences, N 5020 Bergen, Norway

Correspondence should be addressed to Nelu Munteanu; swed527@gmail.com

Received 18 June 2019; Accepted 23 June 2019; Published 3 July 2019

Copyright © 2019 Nelu Munteanu and Shokri Amzin. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Prediction of Pollutant Emissions from Bluff-Body Stabilised Nonpremixed Flames” [1], the name of the second author was given incorrectly as Shokri M. Amzaini. The author’s name should have been written as Shokri Amzin. The revised authors’ list is shown above.

References

N. Munteanu and S. M. Amzaini, “Prediction of pollutant emissions from bluff-body stabilised nonpremixed flames,” Journal of Combustion, vol. 2018, Article ID 8924370, 11 pages, 2018.