Journal of Chemistry

Volume 2013 (2013), Article ID 103192, 9 pages

http://dx.doi.org/10.1155/2013/103192

Research Article

Liquid Anion Exchange Chromatographic Extraction and Separation of Platinum(IV) with n-Octylaniline as a Metallurgical Reagent: Analysis of Real Samples

Ashwini P. Gaikwad, Ganesh S. Kamble, Sanjay S. Kolekar, and Mansing A. Anuse

Analytical Chemistry Laboratory, Department of Chemistry, Shivaji University, Kolhapur, Maharashtra 416 004, India

Received 3 May 2013; Revised 21 July 2013; Accepted 22 July 2013

Academic Editor: Concha Gimeno

Copyright © 2013 Ashwini P. Gaikwad et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A simple and selective method was developed for the determination of platinum(IV) with n-octylaniline in toluene. In present study, the use of n-octylaniline in toluene for the extraction of platinum(IV) from ascorbate media was carried out. The effect of various parameters, such as pH, equilibrium time, extractant concentration, and organic solvent on the extraction has been discussed. The back extraction of platinum(IV) has been performed. On the basis of slope analysis, the composition of the extracted species was determined as [RR′NH₂⁺ Pt(Succinate)₂⁻](org). The interfering effects of various cations and anions were also studied, and the selectivity of the method is enhanced by using suitable masking agents. The proposed method is rapid, reproducible and successfully applied for the determination of platinum(IV) in binary and synthetic mixtures. The separation of pt(IV) from other associated metals has been studied. Comparison of the results with those obtained using an atomic absorption spectrophotometer also tested the validity of the method.

1. Introduction

The platinum group of metals (PGMs: Pt, Pd, Rh, Ir, Ru, and Os) are extremely scarce in comparison to the other precious metals due to not only to their low natural abundance but also to the complexity of the processes required for their extraction and refinement. In comparison with other precious metals (Au and Ag), these platinum group metals (PGMs) are extensively in the use as catalysts in the automobile, chemical, and petroleum industries. In automobiles, Pt and Pd are used as catalytic converter to reduce harmful emissions. In the petroleum cracking process, the catalyst containing Pt and Pd helps to break oil molecules into smaller organic molecules [1]. Besides, PGMs are also used as conductors in the electrical and electronic industries, in extrusion devices, in dental and medical prostheses, and in jewelry [2]. Due to their special chemical and physical properties, the substitution of PGMs by other metals is difficult [3]. Since the need for PGMs is increasing, recovery of PGMs from spent catalysts is very important.

Economically, the precious metals have been historically important as currency and remain important as investment commodities. Gold, silver, platinum, and palladium are internationally recognized as forms of currency under ISO 4217 [4]. Technological and analytical platinum-containing solutions have diverse ratios of the concentrations of platinum and associate precious, base, and ferrous metals, acidities, and salt backgrounds. This diversity arises from the complex and variable composition of raw materials. Naturally, selective extraction and separation of platinum (as well as platinum-group metals and gold) from associate metals become a problem in subsequent hydrometallurgical processing of these complex solutions. Technological and analytical platinum-containing solutions have diverse ratios of the concentrations of platinum and associate precious, base, and ferrous metals, acidities, and salt backgrounds. This diversity arises from the complex and variable composition of raw materials. A major problem in developing extraction methods for the platinum group metal ions, especially for platinum(II), arises from slow extraction rates. Heating the solution [5, 6] and/or the use of tin(II) chloride as a catalyst [7–9] have been commonly used to accelerate the extraction. Among the PGMs separations, Pd(II)/Pt(IV) mutual separation has been extensively investigated due to its difficulty based on their chemically similar properties. The large difference in the extraction rate between Pd(II), and Pt(IV) from aqueous chloride solutions, which is attributable to the extremely inert properties of Pt(IV) compared with Pd(II) is usually applied to their separation [10].

High molecular weight amines (HMWAs) find many applications in the solvent extraction of platinum(IV) from weak organic acid and mineral acid medium. These are p-octylaniline [11], N-octyl-, N,N-dioctyl aniline and N,N,N-trioctyl anilinium O,O-di(isopropyl)dithiophosphates [12], N-n-octylaniline [13], Trioctylamine [14–19], alamine 336 [20–23], alamine 300 [24], and quaternary amine base salts [25–32]. However, these amines show emulsion formation, narrow extraction pH range. Extraction of platinum(II) by bisacylated diethylenetriamine [33] from hydrochloric acid solution was studied. Platinum can be separated by this method from nonnoble metals. Extraction of platinum(II) was carried out from acidic solution at pH range 1–4 by using two hydrophobic analogs of N,N,N′,N′-tetrakis[2-pyridyl-methyl]-1,2-ethyl-enediamine (TPEN). N,N,N′,N′-Tetrakis[4-(2-butyloxy)-2-pyridyl-methyl]-1,2-ethylenediamine (TBPEN) and N,N,N′,N′-tetrakis(2-quinolinylmethyl)-1,2-ethylenediamine (TQEN) [34] have shown enhanced solvent extraction performance in more acidic media than TPEN. The platinum ion was extracted in the deactivated catalyst for the hydrochlorination reaction of ethyne by acidic thiourea [35] solution. N′N′-dihexyl and phenyl and N′-hexyl and phenyl derivatives of N-benzoyl thiourea [36] are very good reagents for pH selective extractions, especially for platinum. Important interfering elements in the extraction of platinum as Cu, Fe, Ni. Solvent extraction of platinum(IV) by N,N-dihexyl-N′-benzoyl-thiourea [37] in toluene is substantially accelerated in the presence of stannous chloride. The extraction behavior of platinum(II) is not affected by the treatment of stannous chloride. Liquid-liquid extraction of the platinum(IV) with pure synthesized N,N-diethyl-N′-benzoylthiourea (DEBT) [38] was carried out by optimizing the concentration of acid, mole ratio of metal to chelating agent, temperature, and extraction time. The extraction behavior of platinum(II) with 1,3-dimethyl-2-thiourea (DMTU) [39] from a chloride solution was studied. Bromocresol green ion as a counter anion and 1,2-dichloroethane as an extraction solvent were used. Platinum(II) was quantitatively extracted into 1,2-dichloroethane within 15 min. The interferences of Mn(II), Cu(II), Zn(II), Pd(II), Ag(I), and Cd(II) were removed by adding suitable masking agents. The extractant nonylthiourea (NTH) [40, 41] in chloroform has been investigated for the extraction of platinum(IV) from chloride solution at ionic strength 4.0 M. It has been found that chloride concentration has a negative effect on the extraction while proton concentration has no effect. N-Phenyl-N′-[o-(2-ethylhexylthio)phenyl]thiourea (PEPT) [42] which contained donor atoms of sulfur and nitrogen was synthesized to develop a selective extractant for platinum(IV) from base metals from acidic chloride media at 303 K.

In present study, the use of n-octylaniline in toluene for the extraction of platinum(IV) from ascorbate media was carried out. The extraction system is studied as a function of pH, extractant concentration, diluents, and equilibrium period. The conventional slope analysis method was employed for analysis of species formed in organic phase. The method is free from large number of interferences due to various foreign ions.

The review of literature for comparison of liquid-liquid extractive separation of platinum(IV) is given in Table 1.

Table 1: Extraction behaviour of platinum(IV) as a function of diluents. (Pt(IV) = 150 μg, Aq : Org = 2.5 : 1, pH = 0.50, ascorbic acid = 0.01 M, equilibrium time = 3 min, and strippant = water ( mL)).

Solvent
Dielectric constant, ()
Percentage extraction, (%)
Distribution ratio, ()

Benzene
2.27
100

Xylene
2.30
100

Toluene*
2.38
100

Chloroform
4.80
23.8
0.78

Methyl isobutyl ketone
13.10
60.8
3.87

n-Butanol
17.80
No extraction
—

Amyl alcohol
13.90
No extraction
—

Amyl acetate
13.90
No extraction
—

1,2-Dichloroethane
10.50
No extraction
—

Recommended for general extraction procedure.

2. Experimental

2.1. Instruments

An Elico digital spectrophotometer model 12 Chemito 215D with 1 cm quartz cells was used for absorbance measurements, and pH measurements were carried out using an Elico digital pH-meter model LI-127. All weighing operations were carried out by using Tapson’s analytical single pan balance model 200 T having 0.001 g accuracy.

2.2. Chemicals and Solutions

Standard solution of platinum(IV) was prepared by dissolving 1 g of hydrogen hexachloroplatinate (IV) hydrate, H₂PtCl₆H₂O (Johnson and Matthey, UK), in 1 M hydrochloric acid and was standardized gravimetrically [43]. A working solution (100 μg/mL) was made there by appropriate dilution. All chemicals used were of AR grade. Double distilled water was used throughout.

2.2.1. n-Octylaniline, 0.1 mol L⁻¹

The extractant n-octylaniline was prepared by the method of Pohlandt’s [44], and its 0.1 M solution was prepared in toluene. All other solutions were prepared from AR grade reagents, and aqueous solutions were prepared using water.

Standard solutions of diverse ions were prepared by dissolving AR grade reagents in water or dil HCl. All the organic solvents were used after double distillation. All chemicals used were of AR grade.

2.3. General Extraction and Determination Procedure for Platinum(IV)

An aliquot of 150 μg platinum(IV) solution was mixed with a sufficient quantity of ascorbic acid to make its concentration 0.01 M in a total volume of 25 mL of the solution. The pH of the aqueous solution was adjusted to 0.50 by dilute sodium hydroxide and hydrochloric acid solution. The solution was then transferred to a 125 mL separating funnel and shaken with 10 mL of 0.1 M n-octylaniline in toluene for 3 min. After separating the two phases, the aqueous phase was discarded and the organic phase was stripped with two 10 mL portion of water solution. After being stripped with water, all the 150 μg platinum(IV) has come into the aqueous phase. So after stripping with water, in organic phase have no any platinum(IV), which is tested by AAS.

The stripped aqueous phase was evaporated to moist dryness and extracted into water.

A percentage extraction and metal distribution ratio were calculated according to (1) and (2), respectively:

where represents the initial concentration of metal ion in the aqueous phase. and are the total concentrations of metal ion in the aqueous and organic phases after equilibrium, respectively.

2.3.1. Estimation Procedure for Platinum(IV)

The resulting aqueous phase was mixed with 5 mL of concentrated hydrochloric acid in 25 mL volumetric flask and 10 mL of 25% (W/V) stannous chloride in concentrated hydrochloric acid, and the solution was diluted to mark with water. The absorbance of the resulted solution was measured at 405 nm [45]. The concentration of platinum(IV) was found from calibration curve.

3. Results and Discussion

3.1. Extraction as a Function of pH

The extraction studies of platinum(IV) were performed at fixed concentration of 0.01 M ascorbic acid and between pH 0.10 and 5.0 with a 0.1 M solution of n-octylaniline in toluene. The pH range observed for the quantitative extraction was 0.50–1.0 with n-octylaniline. Hence the extraction of platinum(IV) was carried out at pH 0.50 for all extraction experiments (Figure 1).

Figure 1: Plot of pH versus percentage extraction of platinum(IV) (150 μg/mL) from ascorbic acid medium (0.01 M) by using n-octylaniline (0.1 M) as an extractant in toluene with 3 min shaking time.

3.2. Effect of Weak Organic Acid Concentration

The extraction of platinum(IV) was examined at pH 0.50 with 0.1 M n-octylaniline in toluene in presence of varying concentrations from 0.001–0.1 M of ascorbic acid. The extraction of ion-pair complex of platinum(IV) was found to be quantitative in the range of 0.007–0.02 M ascorbic acid. Hence, 0.01 M concentration of ascorbic acid was used for further studies while zero extraction of platinum(IV) was found to be in sodium salicylate, malonate, and succinate (Figure 2).

Figure 2: Extraction of platinum(IV) (150 μg) with 0.1 M n-octylaniline at pH 0.50 as a function of weak acid concentration.

3.3. Effect of n-Octylaniline Concentration

Extraction of platinum(IV) was carried out with various concentrations of n-octylaniline in toluene. To optimize the extraction condition, other parameters like pH, period of equilibration, and diluent were kept constant. The extraction was found to be increased with increasing reagent concentration. The extraction of platinum(IV) was quantitative in the range from 0.09 M to 0.4 M of n-octylaniline in toluene. However, 10 mL of 0.1 M n-octylaniline in toluene was recommended for general extraction procedure (Figure 3).

Figure 3: Extraction of platinum(IV) (150 μg/mL) at pH 0.50 from 0.01 M ascorbic acid medium as a function of n-octylaniline concentration.

3.4. Effect of Diluents

The studies were then performed to find out the most suitable solvent for the extraction of the ion-pair complex of platinum(IV). It was found that a 0.1 M solution of n-octylaniline in benzene, toluene, and xylene provides quantitative extraction of platinum(IV). The extraction of platinum(IV) was incomplete if n-octylaniline is dissolved in chloroform (23.8%), methyl isobutyl ketone (60.8%) while no extraction in amyl alcohol, 1,2-dichloroethane, n-butyl alcohol, and amyl acetate (Table 1). On safety ground, toluene was preferred to other solvents.

3.5. Effect of Equilibration Time

The extraction of platinum(IV) was studied for various time intervals in the range of 1–20 min with 0.1 M n-octylaniline. It was observed that, under the optimized experimental conditions, a minimum 2 min time interval was required for attaining equilibrium in the sense to extract platinum(IV) quantitatively. But with prolonged shaking over 10 min there was decrease in the percentage extraction of platinum(IV) due to the dissociation of ion-pair complex. Hence, in all further studies, both the phases were equilibrated for 3 min.

3.6. Effect of Stripping Agent

Platinum(IV) from organic phase was stripped with the two 10 mL portions of various stripping agents at different concentrations of mineral acids, buffer solutions, and some bases. Platinum(IV) was quantitatively stripped with water (Table 2). However, percentage recovery of platinum(IV) from organic phase was found to be incomplete with strippants ammonia, hydrochloric acid, nitric acid, sulphuric acid, sodium chloride, and hydrobromic acid and no stripping in ammonia buffer (pH 10). In recommended procedure, two 10 mL portions of water were used for the complete stripping of loaded organic phase.

Table 2: Extraction behavior of platinum(IV) as a function of stripping agents. (Pt(IV) = 150 μg, Aq : Org = 2.5 : 1, pH = 0.50, ascorbic acid = 0.01 M, equilibrium time = 3 min, and n-octylaniline = 0.1 M in toluene).

Strippant
mol/L/pH
Percentage extraction, (%)

Ammonia
1–10
53.4

HCl
1–3
16.7

H₂SO₄
1–3
20.7

HNO₃
1–3
31.9

HBr
1–3
12.3

Water*
—
100

NaCl
1–5%
65.2

Ammonia buffer
pH-10
No stripping

Recommended for general extraction procedure.

3.7. Effect of Aqueous to Organic Volume Ratio

The extraction of platinum(IV) was carried out in different aqueous volumes in the range 100–10 mL from 0.01 M ascorbic acid medium with 10 mL 0.1 M n-octylaniline in toluene (Table 3). There was observed quantitative extraction of platinum(IV) when phase ratio A/O maintained from 1 : 1 to 4 : 1. Therefore, in the recommended procedure, the phase ratio 2.5 : 1 was maintained through the all experimental study.

Table 3: Extraction of platinum(IV) as a function of aqueous to organic volume ratio. (Pt(IV) = 150 μg, Aq : Org = 2.5 : 1, pH = 0.50, ascorbic acid = 0.01 M, equilibrium time = 3 min, and n-octylaniline = 0.1 M in toluene).

Aqueous to organic volume ratio
Percentage extraction, (%)
Distribution ratio, ()

10 : 10
100

20 : 10
100

25 : 10*
100

30 : 10
100

35 : 10
100

40 : 10
100

50 : 10
94.6
43.79

75 : 10
74.1
7.15

100 : 10
59.4
3.65

Recommended for general extraction procedure.

3.8. Metal Loading Capacity of Extractant

The influence of the initial platinum(IV) concentration 50–2500 μg on the extraction by 0.1 M n-octylaniline in toluene was studied. It was observed that varying the initial platinum(IV) concentration in the range of 50–1500 μg has no significant influence on platinum(IV) extraction with the 10 mL of 0.1 M extractant (Table 4). The maximum loading capacity of 10 mL 0.1 M solution of n-octylaniline in toluene was found to be 1500 μg platinum(IV).

Table 4: Metal loading capacity of n-octylaniline. (pH = 0.50, Aq : Org = 2.5 : 1, ascorbic acid = 0.01 M, equilibrium time = 3 min, and n-octylaniline = 0.1 M in toluene).

Pt(IV), (g)
Percentage extraction, (%)
Distribution ratio, ()

50
100

100
100

150*
100

200
100

300
100

400
100

600
100

800
100

1000
100

1500
100

2000
81.5
11.01

2500
39.5
1.63

Recommended for general extraction procedure.

3.9. Nature of Extracted Species

Attempts were made to ascertain the nature of extracted species of platinum(IV) with the extractant using conventional slope analysis method. The distribution ratio of platinum(IV) evaluated at different concentration in molar of ascorbic acid was used at fixed n-octylaniline concentration at pH 1.25 and pH 1.50. A graph of log  versus log  gave a slopes of 2.8 and 3.0, respectively (Figure 4). Similarly, a plot of log  versus log  concentrations at a fixed pH 1.25 and pH 1.50 with 0.1 M ascorbate gave slopes of 1.3 and 1.2, respectively (Figure 5). This indicates a mole ratio of platinum(IV) to ascorbic acid as 1 : 3 and that of n-octylaniline as 1 : 1. Thus, the extracted species was calculated to be an ion association complex with the probable composition 1 : 3 : 1 (metal : acid : extractant).

Figure 4: Log-log plot of distribution ratio versus at fixed n-octylaniline concentration.

Figure 5: Log-log plot of distribution ratio versus at fixed ascorbate concentration.

In the extraction of platinum(IV) with ascorbate medium, first platinum(IV) was reduced to platinum(II) [46]; then it was converted into platinum(II) ascorbate as an anion and interacted with . Hence the probable extracted species in toluene is .

3.10. Effect of Various Foreign Ions on Percentage Extraction

The effect of various diverse ions was tested, when platinum(IV) was extracted with n-octylaniline in toluene. The tolerance limit was set as the amount of foreign ion causing a change ±2% error in the recovery of platinum(IV). It was observed that the method is free from interference from a large number of cations and anions (Table 5).

Table 5: Effect of foreign ions on the extraction of platinum(IV). (Pt(IV) = 150 μg, Aq : Org = 2.5 : 1, pH = 0.50, ascorbic acid = 0.01 M, equilibrium time = 3 min, and n-octylaniline = 0.1 M in toluene).

Tolerance limit, mg
Foreign ion added

25
Tartrate, Mg(II)

15
Fe(III), Zn(II), Mo(VI), Se(IV), Ba(II), Ce(IV), oxalate, citrate, bromide

10
Ni(II), Co(II), U(VI), Hg(II)

5
Cu(II), Pb(II), Cr(VI), Cr(III), Bi(III), Te(IV), Cd(II), EDTA, nitrate

2
Tl(I), Ca(II), Al(III), Cr(III), Cd(II)

1
Ag(I), Os(VIII), Ru(III)

0.5
Rh(III)a, Pd(II)a, Ir(III), Au(III)

Masked with 20 mg tartrate.

Species like iodide, thiocyanate, thiourea, palladium(II), and rhodium(III) interfere in the extraction of platinum(IV). However, the interference of Pd(II) and Rh(III) was eliminated by masking with tartrate.

4. Applications

4.1. Separation and Determination of Platinum(IV) from Binary Mixture

The separation of Pt (IV) from some commonly associated metal ions like Ru(III), Au(III), Os(VIII), Se(IV), Te(IV), Fe(III), Co(II), Ni(II), and Cu(II) using n-octylaniline was achieved by taking advantage of the difference in the extraction conditions of metal such as pH of the aqueous phase, reagent concentration, and use of masking agent (Table 6). All the added metal ions remained quantitatively in aqueous phase from which they are determined spectrophotometrically by standard methods [45, 47–51].

Table 6: Separation of platinum(IV) from binary mixtures.

Amount of metal ion, (g)
Mass taken, (g)
Average (%) recovery*
Chromogenic ligand
Reference no.

Pt(IV)

Ir(III)
150

100
99.5

99.4
Stannous chloride-hydrobromic acid
[44]

Pt(IV)

Rh(III)a
150

300
99.7

99.2
Stannous chloride-KI
[44]

Pt(IV)

Pd(II)a
150

200
99.8

99.4
4′-ChloroPTPT
[47]

Pt(IV)

Ru(III)
150

200
99.2

98.9
4′-ChloroPTPT
[47]

Pt(IV)

Au(III)
150

200
99.8

99.1
SnCl₂
[44]

Pt(IV)

Se(IV)
150

200
99.7

99.0
4′-ChloroPTPT
[48]

Pt(IV)

Te(IV)
150

200
99.8

98.9
4′-ChloroPTPT
[49]

Pt(IV)

Os(VIII)
150

200
99.4

99.0
Thiourea
[44]

Pt(IV)

Fe(III)
150

500
99.4

98.7
Thiocyanate
[44]

Pt(IV)

Cu(II)
150

1000
99.0

98.6
4′-ChloroPTPT
[50]

Pt(IV)

Ni(II)
150

1000
99.0

97.9
DMG
[46]

Pt(IV)

Co(II)
150

500
99.9

97.8
Thiocyanate
[44]

Masked with 20 mg tartrate.

*Average of five determinations.

Rh(III) and Pd(II) interfere in the extraction of Pt(IV). Rh(III) and Pd(II) were separated from Pt(IV) by masking with 20 mg tartrate.

4.2. Analysis of Platinum(IV) in Catalysts Sample

Platinum(IV) activated alumina (0.1 g) was dissolved in 20 mL aqua regia. The solution was evaporated to moist dryness. Two 5 mL portions of hydrochloric acid were added and evaporated till all the nitric acid was removed. The residue was extracted in 1 M hydrochloric acid. The solution was filtered, and the filtrate was diluted to 100 mL. An aliquot of this diluted solution was analyzed for platinum(IV) content by the proposed method. It was found that there is a good agreement with the certified value (Table 7).

Table 7: Determination of platinum(IV) from catalysts.

Sr. no.
Alloy
Platinum(IV) taken, μg
Platinum(IV)  *Found by method in μg
Average, % recovery
RSD, %

(1)
Pt-Pda-Rha 

catalyst on alumina
150
149.2
99.4
0.6

(2)
Pt-Rha 

catalyst on alumina
150
149.5
99.6
0.4

(3)
Pt-Pda 

catalyst on alumina
150
149.8
99.8
0.2

(4)
Pt

catalyst on alumina
300
299.5
99.8
0.2

Masked with 20 mg tartrate.

*Average of five determinations.

Composition of synthetic mixtures in percentage

(1) Pt, 0.03–0.25; Rh, 0.005–0.03.

(2) Pt, 0.03–0.15; Pd, 0.02–0.12.

(3) Pt, 0.03–0.20; Pd, 0.03–0.150; Rh, 0.015–0.05.

(4) Pt, 0.3–0.8.

4.3. Analysis of Platinum(IV) from Real Samples

4.3.1. Cytoplatin (Cisplatin Injection)

The method permits the separation and determination of platinum(IV) from drug sample, cytoplatin (cisplatin injection), and platinum-rhodium thermocouple wire. Cytoplatin (cisplatin injection) is an antineoplastic agent with the biochemical properties similar to those of bifunctional alkylating agents, although, not yet clearly established, its cytotoxic actions and antitumor activity are consistent with the hypothesis that major cytotoxic target of cisplatin in DNA. The drug covalently binds to DNA bases and disrupts DNA functions. Cytoplatin appears to enter cells by diffusion.

Cytoplatin is a sterile solution of cisplatin I.P. 1.0 mg/mL, sodium chloride I.P. 9 mg/mL in water for injection I.P. Cytoplatin containing cisplatin which is a heavy metal platinum coordination complex containing a central atom of platinum is surrounded by two entities each of chloride ions and two ammonia molecules in cis geometry. It has a melting point of 207°C.

The empirical formula of the active compound is PtCl₂H₆N₂ with a molecular weight of 300.1.

A known volume (10 mL) of cisplatin solution was digested in perchloric acid/nitric acid (10 : 1) and evaporated to dryness until organic matter was removed. The obtained residue was dissolved in concentrated hydrochloric acid and diluted with water to 10 mL in a standard volumetric flask.

An aliquot of the sample solution was taken, and platinum(IV) was determined using the recommended procedure (Table 8).

Table 8: Analysis of platinum(IV) from real samples.

Sample
Manufacturer
Amount taken
Amount of platinum(IV) found
RSD, %

Cytoplatin (cisplatin injection)
Cipla, Goa
200 g/mL
198.6 g/mL
0.7

Platinum-rhodiuma thermocouple wire (Pt, 87; Rh, 13)
Ruia Resistance Wire Pvt. Ltd., Mumbai
87%
86.4%
0.6

Masked with 20 mg tartrate.

4.3.2. Thermocouple Wire

A known weight (0.100) of thermocouple wire was preliminary fused with zinc powder, and the melt was cooled and dissolved in hydrochloric acid. The black powder that remained was treated with 5 mL aqua regia. After the reaction was over the whole solution was heated with two 5 mL portions of concentrated hydrochloric acid until complete removal of oxides of nitrogen and diluted with distilled water to 10 mL in standard volumetric flask.

An aliquot of sample solution was taken, and platinum(IV) was determined using the procedure described earlier. The results of the analysis are given in Table 8.

5. Conclusion

(i)Quantitative extraction of platinum(IV) was achieved in 3 min with 0.1 M n-octylaniline in toluene at pH 0.50.(ii)Extraction reaction occurred through anion-exchange mechanism.(iii)Developed method is efficient for quantitative separation of platinum(IV) in presence of various interfering cations and anions.(iv)The proposed extractive separation method is simple, rapid, selective reproducible, and suitable for separation and determination of platinum(IV) from associated metal ions, real samples, and synthetic mixtures.

Acknowledgments

The authors are thankful to Sung. H. Han, Professor, Inorganic Nano-Materials Research Laboratory, Department of Chemistry, Hanyang University, Seoul, Republic of Korea for constant encouragement. They are thankful to UGC-SAP and DST-FIST, Department of Chemistry, Shivaji University, Kolhapur.

References

J.-Y. Lee, J. R. Kumar, J.-S. Kim, H.-K. Park, and H.-S. Yoon, “Liquid-liquid extraction/separation of platinum(IV) and rhodium(III) from acidic chloride solutions using tri-iso-octylamine,” Journal of Hazardous Materials, vol. 168, no. 1, pp. 424–429, 2009.

B. Swain, J. Jeong, S.-K. Kim, and J.-C. Lee, “Separation of platinum and palladium from chloride solution by solvent extraction using Alamine 300,” Hydrometallurgy, vol. 104, no. 1, pp. 1–7, 2010.

C. R. M. Rao and G. S. Reddi, “Platinum group metals (PGM); occurrence, use and recent trends in their determination,” Trends in Analytical Chemistry, vol. 19, no. 9, pp. 565–586, 2000.

K. Fujiwara, A. Ramesh, T. Maki, H. Hasegawa, and K. Ueda, “Adsorption of platinum (IV), palladium (II) and gold (III) from aqueous solutions onto l-lysine modified crosslinked chitosan resin,” Journal of Hazardous Materials, vol. 146, no. 1-2, pp. 39–50, 2007.

E. E. Rakoskii, N. V. Shveddova, and L. D. Berliner, “Solvent extraction of the platinum metals in the presence of stannous chloride and di-o-tolylthiourea,” Journal of Analytical chemistry of the USSR, vol. 29, p. 1933, 1974.

S. J. Al-Bazi and A. Chow, “Polyurethane foam for the extraction of rhodium and its separation from iridium,” Talanta, vol. 31, no. 6, pp. 431–435, 1984.

A. Diamantatos and A. A. Verbeek, “Method for the separation of platinum, palladium, rhodium, iridium and gold by solvent extraction,” Analytica Chimica Acta, vol. 91, no. 2, pp. 287–294, 1977.

Y. A. Zolotov, O. M. Petrukhin, V. N. Schevehenko, V. V. Duniva, and E. G. Rukhadze, “Solvent extraction of noble metals with derivatives of thiourea,” Analytica Chimica Acta, vol. 100, pp. 613–618, 1978.

M. Mojski, “Extraction of platinum metals from hydrochloric acid medium with triphenylphosphine solution in 1,2-dichloroethane,” Talanta, vol. 27, no. 1, pp. 7–10, 1980.

M. Cox, “Solvent extraction in hydrometallurgy,” in Principle and Practices of Solvent Extraction, J. Rydberg, C. Musikas, and G. R. Choppin, Eds., vol. 10, pp. 357–412, Marcal Dekker, New York, NY, USA, 1992.

V. V. Belova and A. A. Vasileva, “The extraction of platinum from sulfate solutions with p-octylaniline,” Izvestiya Sibirskogo Otdeleniya Akademii Nauk SSSR, Seriya Khimicheskikh Nauk, vol. 3, p. 58, 1986.

K. K. Turaev, A. K. Turdikulov, and G. Z. Mukimova, “Extraction of sulfate complexes of platinum metals with binary extractants,” Ozbekiston Kimyo Jurnali, vol. 3, p. 19, 2002.

S. S. Kolekar and M. A. Anuse, “Selective liquid-liquid extraction of platinum(IV) from ascorbate media by N-n-octylaniline: its separation from associated elements and real samples,” Separation Science and Technology, vol. 38, no. 11, pp. 2597–2618, 2003.

J. Fu, S. Nakamura, and K. Akiba, “Extraction of platinum(IV) with trioctylamine and its application to liquid membrane transport,” Separation Science and Technology, vol. 30, no. 4, pp. 609–619, 1995.

J. Fu, S. Nakamura, and K. Akiba, “Separation of precious metals through a trioctylamine liquid membrane,” Separation Science and Technology, vol. 32, no. 8, pp. 1433–1445, 1997.

H. Yoshizawa, K. Shiomori, S. Yamada et al., “Solvent extraction of platinum(IV) from aqueous acidic chloride media with tri-n-octylamine in toluene,” Solvent Extraction Research and Development, vol. 1997, no. 4, pp. 157–166, 1997.

T. Sadyrbaeva, “Membrane extraction of platinum(IV) by tri-n-octylamine in the presence of nickel(II),” Rigas Tehniskas Universitates Zinatniskie Raksti, Sderija 1: Materialzinatne Un Lietiska Kimija, vol. 15, p. 126, 2007.

K. Shiomori, K. Fujikubo, Y. Kawano, Y. Hatate, Y. Kitamura, and H. Yoshizawa, “Extraction and separation of precious metals by a column packed with divinylbenzene homopolymeric microcapsule containing tri-n-octylamine,” Separation Science and Technology, vol. 39, no. 7, pp. 1645–1662, 2004.

M. A. Barakat and M. H. H. Mahmoud, “Recovery of platinum from spent catalyst,” Hydrometallurgy, vol. 72, no. 3-4, pp. 179–184, 2004.

M. S. Lee, J. Y. Lee, J. R. Kumar, J. S. Kim, and J. S. Sohn, “Solvent extraction of PtCl4 from hydrochloric acid solution with alamine336,” Materials Transactions, vol. 49, no. 12, pp. 2823–2828, 2008.

P. P. Sun and M. S. Lee, “Separation of Pt(IV) and Pd(II) from the loaded Alamine 336 by stripping,” Hydrometallurgy, vol. 109, no. 1-2, pp. 181–184, 2011.

J.-Y. Lee, R. Kumar, J. S. Kim, and J.-S. Sohn, “Solvent extraction of Pt(IV) from acidic chloride solutions using alamine 336,” in Proceedings of the Global Symposium on Recycling, Waste Treatment and Clean Technology (REWAS '08), pp. 1755–1760, Cancun, Mexico, October 2008.

P. P. Sun and M. S. Lee, “Separation of Pt from hydrochloric acid leaching solution of spent catalysts by solvent extraction and ion exchange,” Hydrometallurgy, vol. 110, no. 1–4, pp. 91–98, 2011.

B. Swain, J. Jeong, S.-K. Kim, and J.-C. Lee, “Separation of platinum and palladium from chloride solution by solvent extraction using Alamine 300,” Hydrometallurgy, vol. 104, no. 1, pp. 1–7, 2010.

V. V. Belova, A. I. Khol'Kin, and T. I. Zhidkova, “Extraction of platinum-group metals from chloride solutions by salts of quaternary ammonium bases and binary extractants,” Theoretical Foundations of Chemical Engineering, vol. 41, no. 5, pp. 743–751, 2007.

H. Watanabe, A. Kakui, and K. Nagao, “Extraction of platinum(IV) from hydrochloric acid solutions by dihexylsulfide containing micro amount of high molecular-weight amine under irradiation of light,” Shigen to Sozai, vol. 116, p. 291, 2000.

S. Katsuta, Y. Yoshimoto, M. Okai, Y. Takeda, and K. Bessho, “Selective extraction of palladium and platinum from hydrochloric acid solutions by trioctylammonium-based mixed ionic liquids,” Industrial and Engineering Chemistry Research, vol. 50, no. 22, pp. 12735–12740, 2011.

W. P. Singh, “Extraction of platinum-group metals with diquaternary ammonium salts,” US Patents Published Application, 2004

M. Grote, U. Hüppe, and A. Kettrup, “Solvent extraction of noble metals by formazans-I. Comparative study on the extractability of Pt(IV), Pd(II) and Ag(I) by formazans combined with a liquid anion-exchanger,” Talanta, vol. 31, no. 10, pp. 755–762, 1984.

D. Wenjun, R. Qingxin, and C. Ruona, “Extraction of thiocyanate complexes of platinum group metals ions by MIBK,” Guijinshu, vol. 19, p. 20, 1998.

A. Warshawsky, “Separation of the rare platinum group elements (rhodium, iridium, ruthenium, osmium) by extraction with solvating π-donor ligands and polymers in the thiocyanate system,” Separation and Purification Methods, vol. 12, no. 2, pp. 119–141, 1983.

T. I. Zhidkova, V. V. Belova, Y. Y. Brenno, L. L. Zhidkov, and A. I. Khol'Kin, “Palladium extraction by a cyanex 301-based binary extractant from chloride solutions,” Russian Journal of Inorganic Chemistry, vol. 54, no. 9, pp. 1502–1506, 2009.

R. A. Khisamutdinov, S. O. Bondareva, Y. I. Murinov, and I. P. Baikova, “Extraction of palladium(II), platinum(II), and platinum(IV) by bisacylated diethylenetriamine from hydrochloric acid solutions,” Russian Journal of Inorganic Chemistry, vol. 53, no. 3, pp. 462–469, 2008.

T. Ogata, K. Takeshita, G. A. Fugate, and A. Mori, “Extraction of soft metals from acidic media with nitrogen-donor ligand TPEN and its analogs,” Separation Science and Technology, vol. 43, no. 9-10, pp. 2630–2640, 2008.

Q. Gaofei, Z. Ying, L. Qin, J. Wenwei, W. Jide, and Y. Qin, “Process and application of recovering platinum from used liquid-phase catalysts by solvent extraction with thiourea,” Yingyong Huaxue, vol. 28, p. 1337, 2011.

K.-H. König, M. Schuster, B. Steinbrech, G. Schneeweis, and R. Schlodder, “N,N-Dialkyl-N′-benzoylthioureas as reagents for selective extractions to separate and enrich platinum-group metals,” Fresenius' Zeitschrift für Analytische Chemie, vol. 321, no. 5, pp. 457–460, 1985.

P. Vest, M. Schuster, and K.-H. König, “Influence of tin(II) chloride on the solvent extraction of platinum group metals with N,N-di-n-hexyl-N'-benzoylthiourea,” Fresenius' Journal of Analytical Chemistry, vol. 339, no. 3, pp. 142–144, 1991.

M. Merdivan, R. S. Aygun, and N. Külcü, “Solvent extraction of platinum group metals with N,N-diethyl-N′-benzoylthiourea,” Annali di Chimica, vol. 90, no. 5-6, pp. 407–412, 2000.

Y. Terada, A. Harada, K. Saito, S. Murakami, and A. Muromatsu, “Solvent extraction of platinum(II) with 1,3-dimethyl-2-thiourea and bromocresol green,” Bunseki Kagaku, vol. 52, no. 9, pp. 725–729, 2003.

A. Uheida, Y. Zhang, and M. Muhammed, “Extraction of platinum(IV) with nonylthiourea dissolved in chloroform from hydrochloric acid media,” Solvent Extraction and Ion Exchange, vol. 21, no. 6, pp. 827–840, 2003.

A. Uheida, Y. Zhang, and M. Muhammed, “Thermodynamic modeling of extraction equilibria of platinum and palladium with nonylthiourea from hydrochloric acid media,” Separation Science and Technology, vol. 39, no. 15, pp. 3665–3677, 2004.

M. Iwakuma, S. Nakamura, and Y. Baba, “Synthesis of a thiourea derivative containing a sulfur atom and extraction equilibrium of platinum(IV) from hydrochloric acid,” Solvent Extraction Research and Development, vol. 11, pp. 103–110, 2004.

T. I. Tikhomirova, V. I. Fadeeva, G. V. Kudryavtsev et al., “Sorption of noble-metal ions on silica with chemically bonded nitrogen-containing ligands,” Talanta, vol. 38, no. 3, pp. 267–274, 1991.

C. Pohlandt, “The extraction of noble metals with n-octylaniline,” Talanta, vol. 26, no. 3, pp. 199–206, 1979.

E. B. Sandell, Colorimetric Determination of Traces of Metals, Interscience, New York, NY, USA, 3rd edition, 1965.

H. Li, J. Ding, and J. Wu, “Physical properties and application performance of platinum-palladium-rhodium alloys modified with cerium,” Guijinshu, vol. 18, p. 42, 1997.

Z. Marczenko, Spectophotometric Determination of Elements, Ellis Horwood Limited, Chichester, UK, 1976.

M. A. Anuse and M. B. Chavan, “Studies on extraction separation of platinum metals and gold(III) with pyrimidinethiol: spectrophotometric determination of palladium(II), osmium(VIII) and ruthenium(III),” Chemia Analityczna, vol. 29, p. 409, 1984.

G. B. Kolekar and M. A. Anuse, “Extractive spectrophotometric determination of selenium(IV) using 1-(4′-bromophenyl)-4,4,6-trimethyl-1,4- dihydropyrimidine 2-thiol,” Research Journal of Chemistry and Environment, vol. 2, p. 9, 1998.

G. B. Kolekar and M. A. Anuse, “Extraction, separation, and spectrophotometric determination of tellurium(IV) with 1-(4’-bromophenyl)-4,4,6-trimethyl-1,4-dihydropyrimidine 2-thiol,” Bulletin of the Chemical Society of Japan, vol. 71, no. 4, pp. 859–866, 1998.

M. A. Anuse, S. R. Kuchekar, and M. B. Chavan, “1-(4′-Chlorophenyl)-4, 4, 6-trimethyl-1, 4-dihydropyrimidine 2-thiol as an effective reagent for the spectrophotometric determination of copper after synergic extraction,” Indian Journal of Chemistry, vol. 25, p. 1041, 1986.